w-&

7';-:,

,v

■ '-‘‘t *

m -

* ** -

* 'Vk

tA r

>7" -

■ /■

*7 i’

Si

7:; •

/it' ;    :

MKi

b -‘ M i--' i-

S»i

. K01F-;■*>'■£ >. '

'i

l-

7*. ■

■/

7/

/ v

4k,

S»? i

*& ? * b- ft    -. j’

’ v .**- /" •.......    ’    • 7

.    5    / 7W* /

.

s*

Jp.

4.4-4>

7 •*: j'. ■'’- VM'

' ?:';:.4-4,,v'.:':.;‘ -u^lyMK' ;7 *V

WriBf"’⁵Tr

Sill

IV

£S*‘

-Tw-

+ ■ ■

. 4'

'IlSjSy

>cC -t

-    ..% V;j

•sflnf

- fh 4 j-W' f

^ K v    #

' : . - . f

’ i?

My

itA

7-y..    ' ■ ■• 4

rs

V-

,tfr

Th ii

:T»"

7-7:74.''

;<

V.v.

4:

:«!. •

:J/.'

Ai

/V,

'' 4*.',

;■

■pvp'XPV’;

577*5477?

‘.-7

■'4

.>•7

■j?

. * .4    • / t

•^7 .»: i -r,.%^$

‘ :tfl|

- 7- ^ ^7/

■ b

J" i ;7 ' y.y. ' ■-'

21?

'*i?\

f.:a

- wih £' ,

' i *V 4

:-'4S

’3^5

It. 4 f: 1. 'I.

r^. i    i

] '] ;.

•S

v 7\ ‘;7t 7

^    . V

■    4    >4 K/.'r--r    '

■/

s.V- >

l VSi,*V;.^ "i.

T --¹* ~ r%. L i '

1

'■    ’^15. V

f:|^ 1

■4

'/

■ft

'7;V

~i

/;■

* \T

■V

< - >. ^

>:vi‘ fi\

%0

■    ¹    ■ V    .J ■■p:-'Sa(&M

......

pP " ^■fri

//

*'■1*

* Vjv>

?• '

-r'

..    i t *- •

-: ' -.

V ? I '44' r

V'V4

•#

14

i 'W⁴¹

r-.;; * K. 7>~

,■?

7-,: ^

■ " .    ,*/ * :■/

"~ > Z J

i ■ it

r\± '■■ A

*■

•-

*. W "

'    '' ::-"^.,_4'.

* '•

:;k-

:'yt V ••>•:•' *-7;‘. 7-V"4';V4 i

••774;'7*:. ■ '-7.-7# t

:m

■    '>. . f.

^r! x

i-

: tlf'- 4^

A-A A,rA Af '■    - v,

'•    4    ■:•*■"■

-ot. •-    -j

4-

■A:

-v;

47-':;f ‘    -

v '.-i-    ; **

■ *' ! • ?

I A'tmA

if *

•3

, ’’i • \

\ !''

•-: ~    \ ■    l •.    •■■„■;■■■.■.-

.;« U'

i /AAy :f;    7 7--^- v'

. ’b"- ij "4' i ■ 4-    . ■-

.* I 44, f*' ... '7.^47-M - 4': li i '^SfC 4lP-r

.1 ;

.    .. ' : H.

’ .4

i-arr *

4^

•?

:?■

' c

4 fvV-

■ -l

■ A f 1 '*■-

AL

;r

'-/

<r

aa<

'7

H /v-i

'.A*

fVjJ

:4

777

AijA-S

47

⁵'a-.

•c s

'!.

-At M

4-*'

,..■>- ~4.*4

WA

14    .77' ife 4.-! j*f

*    * * ' ^Aw'M

■ \r

i.s"W-' v-ns»*7

*4

A, A

A-;

■!

;4;

7:4'-p-j

ts-

■4

7'7>fi| I

. '77 '' '

>%

44*.'

.4

■7*

A •’4

' >4 f: w "r : ■> 'S'7'-7‘

>•    - 7v ■.

?#*

•yK

•li

■ *Vlr

.:

. :f>\

V'

,4

4»*»-

•^,4

iij>:

[if,⁻

...

ijjfe

,>

4/4

-Ai

a;/

,','4 ^

⁴ •>

* ’//* 4    '    /- ip' *

■ ,    -7, '/.X    .417,

' 7""    '    ‘ V,

2' .    .. f % x

f 7y *.    -^3iPW

is ■    f Tit    Tf*j    17wa .

w-.K r '-7. *•    ‘ //    ■ ^: *    a*:..-^ ,.

i%$i MM    ■■

5 *    *    \

-■•ir

7 •^7r-^T'r;

,' M4' r. »

¹ '

.-4*7,    -,"..4 7.7.,

k \ v*

I \. I v,>

fA .' ..    ^

-.;■ 4 **'''

. t7’1@

*Sm‘

V<;'

\ #•

.**'*>. •> >,

/'

•*«

rf

V' ■“

m.

:./■

*    A sr

•.

-•

■"fx

rr

* •.

V.i

v-

a-*.

■» V

: 7»,

». ; l4t

7.f

,-, >71 .

I

•4 7**7, -

■*    '^b.y -    4 't

a,..

‘ v* -

' ■ ^

!    V’/^

<4

V *7. v

- *•

.. -

'‘5.

(5.

:*x

oPv.'tJ

4mA

7;

•l4‘

"    * ’ TV⁻

•, - V .7* \

%S . 7'*, .7;    -

•;«. V1,    »Ph ; • /• .

‘ iV c

V -

77'.;

Jfcy '

s-P,⁻    .*■

v ^4*    ■.

•r.

« .vv .r^ -.,    ,

.S->U T, ,5 ,    , ; , %

77*-7, •/ -.

. a. 7    A %

7 r 4 x-77 7 7. *

fe^.%

•'X’x .jl^vJ*:. / '*

.    ,    7^"

^ -/■■ ■;    . j

"    ^    ' LJ. -A; 1 ■ *%. -

r‘

',V

• 4n

ML

' M

-f

■JP

W:.

«f

r- J

v*;.;

A®'

*4 ■'

♦**

”■

i.

,A. IV

Hkt

• ■ •»

4. X

■\

mmm/

4

:' ¹ :x !

f*Sr^ ^

. ,i-W⁻ 7

■i

“*«*>

-v

*

%

*

*

I

i

.V

a#;.

SUPPLEMENT TO “THE ENGINEER,” FEBRUARY 3, 1SS«.

til ter.

YOL. LXIY.—FROM JULY TO DECEMBER, 1887.

BBS

mam

*>

^onb'on:

OFFICE FOR PUBLICATION AND ADVERTISEMENTS, 163, STRAND, W.C.

AX x

_

AKOW

sbkph|

GtOWNA^J

V^'>«chmc*<£

<=V-%s

Vf

c (I

3, tv. \

INDEX.

/18 %.?/ _

JUustrattmus.

Car for

213

454

Glasgow International Exhibition, General Plan of Site, 417

Glenfield Company, The, Hydraulic Pipe Testing Apparatus, Newcastle Exhibition, 277 Globe Mill Company, Tho, Quartz Crushing Mill, 26 Goodwin and How, Messrs., Foundry Ladle, The Grange Iron Company, Newcastle Exhibition, 5 Messrs., Permanent Way

on of 67-ton Breech-

215

KALAKOUTSKY, General Nicholas, Internal Stresses occurring in Cast Iron and Steel Diagrams, Apparatus for Determining, 467,487 Pearn and Co., Messrs., Pump and Compressor Kempe and Rowell, Messrs., Fog and Safety Works, Lightning Tapper, 239 Signal Apparatus, 57    Penny and Co., Messrs., Pots

Kent, Mr. G., Uniform Positivo Water Meter, 451 Exhibition, 76 Kirkaldy, Mr. John, Combined “Compactum” Portsmouth and Ryde Ferry Steamer, The s.s.

Distiller and Pump, Newcastle Exhibition, 7    “Duchess of Edinburgh,” Mr. W. Stroudley,

Kirkaldy, Mr. John, “Compactum” Feed-Water 128, 129, 154 Heater, Newcastle Exhibition, 7    Portway’s Hand Coke Breaker, 517

Post, Mr. M., Metallic Railway Sleepers, 75 Powell Brothers, Messrs., Potato Digger, Newcastle Exhibition, 76 Proctor, Mr., Furnace Feeder, 160 Prosser, Mr. Jno., Tram Rail Cleaner, 27

one

Mediterranean Railway Company, The, Granile Works at Naples, 512

Melton Constable, Norfolk, Exploded Portable Engine, 316

Midland Railway, Four-coupled Express Locomotive (Supplement, December 23rd, 1887)

Mumford, Mr. A., Compound High-speed Launch Engines, 125

Murray and Co., Messrs., Potato Planters, Newcastle Exhibition, 76

gente, ” Compound Engines of the, 431 Mr. Wm., Method of Obtaining the

nf panics.

ACTON Sewerage Works, Ground Plan of, 227

Adams, Mr. Henry, Chains for Lifting and Hauling, Civil and Mechanical Engineers’ Society, 28

Adams, Mr. W., Vortex Blast Pipe, Newcastle Exhibition, 108

Am Ende, Mr. Max, Constructive Ironwork in a New Theatre, 257

American Institute Electrical Exhibition, Tho Writing Telegraph, 420

American Machinist, The, Seamless Tubes from Solid Blanks, 396

American Stuffing-box Packings, 292

Argentine Republic, Tramway Sleeping the, Messrs. J. G. Brill and Co., 500

Athus Iron and Steel Works, Blowing Engine, 205, 214

Atkinson’s “ Cycle ” Gas Engine, The British Gas Engine and Engineering Co., 537

Automatic Gas Machine Co., The Automatic Gas Machine, 509

BAKER, Mr., Wheelwright’s Sinking Platform, Smithfield Club Show, 472 Baltimore and Ohio Railway, Broken Bridge, 54 Bandora Station, Roof of, 447 Banning’s Steam Hammer, Athus Iron and Steel Works, 205

Barlow and Co., Messrs. H. B., Expanding Mandril, 388

Barrow Engine, The, Messrs. Westray, Copeland, and Co., Manchester Exhibition, 376 B. C., Stresses in a Camp Stool, 173 Bdnier Fr&res, MM., Hot-Air Engino, 372 Bennie and Co., Messrs. James, Radial Arm Steam Hammer, 54

Berthon Ship’s Boats, Midship Section of, 87 Bever and Dorling, Messrs., High-Speed Compound Engino, 508

Birch and Co., Messrs. John, Baling Press, 15 Birch and Co., Messrs. John, Hydraulic Pump, 15 Birmingham Cablo Tramways, Gradients and Curves of the, 126

Birmingham Central Tramways, Tramway Locomotive, Messrs. C. Burrell and Sons, 347 Black, Hawthorno, and Co., Messrs., Locomotive, Newcastle Exhibition, 6 Blakey-Emmott Dynamo, The, 409 Bonifacius Coal Mining Co., Wostphalia, Experiments on the Relative Corrosion of Metals, 55 Bostwick, Mr., Steel Folding Gates and Shutters, 250

Botting, Mr. F., Furnace Boilers, 233 Brighton and Dyke Railway, Hangleton Bridge, 228

Brighton and Dyke Railway, Plan and Section, 228 Brown’s Street Surface Box, The Glenfield Co., 517 Buchholz, Mr. J. A., Multiple Roller Break Mill and Sieves, Manchester Exhibition, 41, 47 Buckley and Taylor, Messrs., 1000-Horse Power Compound Mill Engino {Supplement, December 23rd, 1887)

“ Buzz,” the American High-Speed Steam Launch, Mr. C. D. Mosher, 368

CAMPBELL, Mr., London Glass Water Gauge, 159 Caple’s Combination Set Square, 508 Carron Ironworks, Three-Leggod Pots or Skillets, 135

Carter’s System, Mr. Harrison, First Flow Sheet of, Mr. G. Little on Modern Milling, 405 Carter-Turner Three-High Roller Mill, Tho, Mr.

G. Little on Modern Milling, 405 Case, Mr. Willard E., Primary Battery in which Carbon is Consumed, 265 Castner Sodium Furnace, The, 513 Ceara, Brazil, New Harbour Works, Mr. R. E. Wilson, 88

Chatsworth Culvert, The, 218 China Railways, Ten-Wheeled Tank Locomotive, Mr. C. W. Kinder and Mr. Jas. Cleminson, Messrs. Dubs and Co., 412, 493 City of London and Southwark Subway, The, Mr.

J. H. Greathead, 297, 298 Cleremont, Iowa, U.S.A.,Three-Hinged Wrought Iron Arch, Mr. H. E. Horton, 137 Clyde Estuary, Dredgor Used in the, 139 Clyde Estuary, Map of the, 139 Cobbett, Mr. W. B., Guides and Belt Stretchers, 513

Collit and Co., Messrs., Baling Press, Newcastle Exhibition, 171

Cosgrove, Mr., Universal Vico Chuck, 27 Cowan, Messrs. W. and B., Syphon Meter, Newcastle Exhibition, 277

Craven Brothers, Messrs., Machine, Tool and Crane Works, Diagram showing Plunger Travel, 239

Crockford’s Boiler Cleaner, Tho, 388

DAELIN, Herr Vital, Rolling Mill for Corrugated Sheets, Messrs. Aug. Bachmeyer and Co., 71 Davey, Paxman, and Co., Messrs., Diagrams from their Simple Engine, Newcastle Exhibition, 42 Davey, Paxman, and Co., Messrs., High and Low-pressure Diagrams from their Compound Engine, Newcastle Exhibition, 43

Davey, Paxman, and Co., Messrs., High Speed Compound Vertical Engine, Smithfield Club Show, 473

Davey, Paxman, and Co., Messrs., Prize Compound Engine, Newcastle Exhibition, 63 “Devil” Disintegrator, The, End Elovation and Section, The Hardy Patent Pick Company, 376 Dibdin, Mr. W. J., Diagram showing Percentage Reduction of Oxidisable Organic Matter in Solution by Chemical Precipitation upon Samples of Sewage, 23 Diehl, Mr. Philip, Combined Sewing Machine and Electric Motor, 265

“Dogali,” Triple Expansion Engines of the Italian Cruiser, Messrs. R. and W. Hawthorn, Leslie, and Co., 109, 112, 116 Dunderdale, Wood, and Co., Messrs., Nut-finishing Machine, Manchester Exhibition, 35

EDINBURGH Northern Cable Tramway, The, Mr. N. W. Colam, 351, 369, 389, 390 Edinburgh Water Works and Paper Mills at Penicuik, Map of, 117.

Edison, Mr. J. A., Pyro-magnotic Dynamo, 231 Edison’s System of Continuous Current Transformers, 377

“Elbe” Catastrophe, The, Sketch of Fractured Pipe, 330

“Elbe,” Explosion on Board tho, Sketch showing Arrangement of Boilers, 245 Elieson Electro-motor Gear, The, 318 Essex Boiler, The, 469

FENDER’S Endless Railway, 451 Field, Mr. Stephen D., Electric Locomotives, 450 Fleuss, Mr., Patent Hand Ice-making Machine, American Exhibition, 34

Foden and Sons, Messrs. E., Automatic Cut-off Gear for Reversing Engines, 46 Foden and Sons, Messrs. Edwin, Compound Traction Engine, Newcastle Exhibition, 43, 46 Fordsmith, Mr. Herbert, Shafting Bearings, 27 Forth Bridge, Erection of the, Sir John Fowler and Mr. B. Baker, 434, 438, 439 Forth Bridgo, Tho, Main Cantilever Pier, 438 Forth Bridge, The, Rivetting Cage, 439 Froude Dynamometer, Tho, Apparatus for Determining the Mechanical Equivalent of Heat,

GARRETT, Mr. F., Chilled Moulds for Casting Bearings, Smithfield Club Show, 473 Gentry and O’Brien, Messrs., Gas Apparatus for Removing Tires, 79

German Mail Steamers, Boilers and Engines, The Vulcan Works Company, 516 German Mail Steamers, Triple Expansion Engines,

Grafton and Company,

Hand Crane, 268 Graham, Mr. R. IL, on Elastic Extension, Diagrams Relative to, 145, 146, 185 Granile Works at Naples, Engine and Tender Coupling, 512

Greig’s Tramway Locomotive, Mr. A. Greig and Mr. T. Aveling, 328

Greiner and Erpf, Messrs., Cupola, 480 Gresham and Craven, Messrs., Locomotive Boiler Fittings, Manchester Exhibition, 57

HALL, Mr., Cast Steel Anchor, 296 Hall, Mr. J. B., Stresses in a Camp Stool, Diagram, 107

Hampton, Southwark, and Vauxhall Waterworks, Double Cylinder Compound Pumping Engine, Mr. J. W. Restler, 10, 30 Hardy Patent Pick Company,The, Self-lubricating Pedestals for Colliery Tubs, 459 Hart and Co., Messrs., Prize Cattle Weighing Machine, Newcastle Exhibition, 77 Harrison, Mr. Alfred, Scouring Dredger for Fen Drains and Rivers, 359

Hartland, Mr. R., Stresses in a Camp Stool, 161 Head, Mr. Jeremiah, Blooming Mill, Messrs.

Westgarth, English, and Co., 269 Head, Mr. Jeremiah, Steel Scale Produced by Skidding Railway Wheels, 219 H.M.S. “Trafalgar,” Secti( loading Gun, 123

Herreshoff Yacht, “ Now Then,” Tho, 227 Hetherington and Sons, Messrs., Improved Carding Engine, 238, 239

Hetherington and Co., Messrs. Joist Sawing Machine, 545

Hetherington and Co., Messrs., Radial Drill and Milling Machine, 544

Hetherington and Sons, Messrs., Spinning Machinery Works, Bend Trueing Machine, 238, 239 Hexthorpe Accident, The, Sketch Plan of Lines,

Hornsby and Sons, Messrs., High-speed Vertical Engine, Smithfield Club Show, 473 Horton’s Patent Automatic Cut-off Valve and Governor, 317

Horwich Locomotive Works, Block Plan of, 246 Horwich Locomotive Works, Longitudinal Section of Paint Shop, 248

Horwich Locomotive Works, Smith’s Forge, 249 Horwich Locomotive Works, Tip Truck, 246 Horwich Locomotive Works, Tramway Points, 246 Hulse and Co., Messrs., Machine Tools, Newcastle Exhibition, 256

Hulse and Co., Messrs., Surfacing and Taper-Turning Lathe, 469

INDIAN Government, Stone-Breaking and Delivering Aoparatus, Messrs. W. H. Baker and Co., 431

Indian Midland Railway, Tranship Vans, 429 Indian State Railways, Compound Engines for the—Details, 230, 232

Indian State Railways, Compound Vertical Engine, 194, 207

Indian State Railways, Engine Turntables, 350 Indian State Railways, Underframes and Covered Wagons for, 3

Indian State Railways, Water Cranes for, 288

Inquirer, A Defective Bridge, 386

Isle of May, Electric Lighthouse on the, Messrs.

D. and T. Stevenson, 158, 159 Italian Railways, Map of, 365 Italian Reversing Gear, 512

JEFFERY and Blackstone, Messrs., The “Viator” Vertical Engine, Newcastle Exhibition, 268

Jerome’s Metallic Packing, 289

Johnston and Blandford, Messrs., Stoker, Newcastle Exhibition, 256

Jones, Mr. Gavin, Tool Holder, Newcastle Exhibition, 256

Jongh, Mr. J. S. de, Constructive Ironwork in a New Theatre, 471

Jordan, Son, andCommans, Messrs., Machines for Treating Auriferous Materials, 210

LADD and Co., Messrs. John H., Tho National Lock Washer, 180

Lade Bank, Lincolnshire, Engine and Pump, 103 Lake Haarlem Pumps and Boiler, 323 Lambert and Sons, Messrs. Thomas, Screw-Down Guided Valve, 358

Lancashire and Yorkshire Railway Company’s Works at Horwich, 246, 248, 249 Lancashire and Yorkshire Railway, Passenger Engine, the Vulcan Foundry Company, Manchester Exhibition, 174, 179 Lancardemont Flour Mill, Tho, Messrs. T. Powell and Co., 50, 55, 72

Lees and Co., Messrs. Asa, Cotton Preparing and Spinning Machinery, 336, 340 Lehman, Mr. J., Domestic Cooking Apparatus, 316 Leicester Snow Ploughs, Messrs. Vipan and Headly, 517

“ Lever” Dynamo and Arc Lamp, The, 329 Lightfoot Mr., A Spliced Rail Joint, 481 Lindsay, Messrs. W. H. and Co., Steel Flooring, 289, 290

London and S. W. Railway, Express Engine, Mr.

W. Adams, Newcastle Exhibition, 108 London and S. W. Railway, Four-Coupled Outside Cylinder Locomotive, designed by Mr. W. Adams, constructed by Messrs. R. Stephenson and Co. {Supplement, Nov. ilh, 1887), 385, 392 Lowestoft Ravine Bridge, Mr. E. M. Parkinson, 191 Lowry’s Continuous Action Gyratory St Breaker, Messrs. Jas. Farrar and Co., 521 Luigi Bardea, Stresses in a Camp Stool, 173 Lundborg, Captain, Ship Section, 136

MoDOUGALL’S Steam Trap, Tho Chatterton Ironworks Co., 521

Maclaine, Mr., Feed-water Heater, 265

McLaren, Messrs. J. and H., Compound Portable Engine, Newcastle Exhibition, 147

McLaren, Messrs. J. and H., High Speed Road Locomotive, 496

McLaren’s Brake, R.A.S.E. Type, 482

McLaren’s Messrs., Engine Trials, Testing Apparatus, 461

Mannheim Bridge, Competitive Designs, 489, 492

Mason’s Lever Cracking Motion Stone Breaker, 328

Mediterranean Railway, The, Sketch of “Cus-todia,” 458

NEWBURN-ON-TYNE Steel Works, Sketch of Casting forming Shank and Crosshead for an Anchor, 310

Newcastle Engine Trials, Compound Portable Engine, Messrs. J. and H. McLaren, 147 Newcastle Engine Trials, Diagrams and Tables Relating to, 42, 44, 45

Newcastle Engine Trials, Diagrams from the Six most Economical Engines, 105 Newcastle Exhibition, Locomotives at, 6 Newcastle Exhibition, Machine Tools at, 256 Newcastle, Plan of the Implement Yard at, 15 Newhaven, The Drainage Works of, Mr. W. H. Radford, 92

Niagara Suspension Bridge, New Towers of the, 481 Nordelph, Scoop Wheel at, 187

“OCHWADT,” Self-registering Meter, 536 “Olympia,” Compound Engines, Electric Light Installation, Messrs. Davey, Paxman, and Co., 132

Olympia Hall, Kensington, Portion of the, 150

PARIS International Exhibition, 1889, Fine Arts Court, 190

Paris International Exhibition of 1889, The Great Machinery Hall, 150

Paris International Exhibition, Side Galleries of Fine Arts Court, 234

Paris, Lyons, and Mediterranean Railway, 50ft.

Travelling Crane, 206, 211 Patent Rivet Company, The, Lock Nut and Washer, 358

Pattison, Messrs. C. and T. T., Boilers, 533 Pattison, Messrs. C. and T. T., Engine Works, Naples, 533

ato Digger, Newcastle

QUELCH, Mr., Metallic Permanent Way, 536

R.A.S.E. ENGINE Trials, Diagrams, 470

R.A.S.E. Steam Engino Trials, Sketch relating to, 535

Rayner’s Patent Double Distilling Condenser, Messrs. Ernest Scott and Co., Newcastle Exhibition, 276

“Reina Regente,” Spanish Cruiser, The, Messrs.

Thomson, 352, 354 “ Reina Re Robertson,

Stresses on Lattices, Figs. 1, 2, 3, 4, 5, p. 531 Robey and Co., Messrs., Electrical Governor, Newcastle Exhibition, 7

Robey and Co., Messrs., Vertical Engine, Smith-field Club Show, 472

Rollason’s Gas Engine, The Beck Gas Engine Company, Newcastle Exhibition, 276 Royle’s Coke Breaker, Portway’s Patent, 517 Rush worth and Co., Messrs., Shears, 430

ST. CHAMOND Projectile, Effect of a, on a Steelfaced Plate, 198 Sandbrook’s Safety Lamp, 513 Schiele Ventilating Fan, Manchester Exhibition,

Seek Brothers, Messrs., New Grease Cup Lubricator, 34

Seller’s Patent Compound Engine, Messrs. Bradley and Craven, 536, 540

Shanks and Son, Messrs. Alexander, Triple-compound Marine Engines, 178 Siee Ho Bridge, The, China Railways, Mr. C. W.

Kinder and Mr. James Cleminson, 450, 476 Simon, Mr., Flow Sheet of the First Complete Roller Mill Plant, 167

Sinclair, Mr. Nisbet, Strength of Copper Steam Pipes, 525

Smith, Professor E. H., Struts, their Working Strength and Stiffness, Diagrams, 425, 426 Smith, Mr. T. L., Rail Joints, 107 Smith, Mr. Wasteneys, Stockless Anchor Bows of the s,s. “Emilie,” 171

TANGYE, Messrs., Self-acting Shaping Machine, 368

Tangye and Co., Messrs., Univeral Milling Machinery, 396

Tansa Works for the Water Supply of Bombay, Mr. W. Clarke, 53

Tay Viaduct, Section of Pier of the New, 199 Terni Steel Works, Vertical Turbines, M. M. J.

J. Rieter and Co., 252 Terry’s Theatre, Asbestos Curtains, 430 Terry’s Theatre, Structural Ironwork of, Messrs.

Matthew T. Shaw and Sons, 285 Thursfield, Mr. W. E., Aero-steam Disinfector, 90 Turner, Mr., Light Baling and Finishing Press, 26 Tweddell, Platt, and Fielding, Messrs., Plateclosing Rivetter, Newcastle Exhibition, 5, 7

UMARIA Colliery, Indian State Railways, Differential Pumping Engine, 151

VAUGHAN and Sons, Messrs., Water Separator, 269

Victoria Cream Separator, The, Messrs. Watson, Laidlaw, and Co., 326

Villepigne, M. Florian de, Autographometre, 96 Vincennes Railway Jubilee, Exhibition Building, The, 408, 416

WALLIS and Steevens, Messrs. Compound Vertical Engine, Smithfield Club Show, 472 Wallsend Slipway and Engineering Company, The Marine Boiler, 7

Waterford and Limerick Railway, Adjustable Vortex Blast Pipe, Mr. Appleby, 14 Whampoa Docks, Pumping Engines, Messrs. W H. Allen and Co., 409

Wheeler, Mr. W. H., on Drainage of Fens and Lowlands by Steam Power, 103, 186, 187, 323 Whittlesea Mere Pump, 186, 187 Widnes Waterworks—New Pumping Machinery, Mr. Henry Davey, 170

Wild and Co., Messrs. J., Portable Hand-power Drilling Machine, 458 Williams’ Fusible Plugs, 5131 Williamson, Mr. J. R., Electric Lighting from Central Stations, Figs. 1, 2, 3, 4, 5, 6, p. 500, 501 Willis, Mr. R., Hydro-pneumatic Speedometer, 358 Wilson, Mr. E. J., Stresses in a Camp Stool, 173 Witt, Mr. 0. N., Simple Air Pump for use in the Laboratories of Works, &c., 14 Woods, Mr. T., Chaser Stocks and Dies, 481

Subject ^tatter.

ACCIDENT, The Hexthorpe, Sketch Plan of Lines, 245

Air Pump for Use in the Laboratories of Works, Ac., Mr. 0. N. Witt, 14

Anchor, Sketch of Casting, Forming Shank and Crosshead for an, Newburn-on-Tyne Steelworks, 310

Asbestos Curtains, Terry’s Theatre, 430 Autographometre, M. Florian de Villepigne, 96 Automatic Gas Machine, The Automatic Gas Machine Co., 509

Auxiliary Steam Generator for Locomotives, 200

BALING Press, Messrs. Collit and Co., Newcastle Exhibition, 171 Belted Cruisers, J. S., 419

Bend Trueing Machine, Messrs. Hetherington and Sons’ Spinning Machinery Works, 238, 239 Blast Pipe, Adjustable Vortex, Waterford and Limerick Railway, 14

Blooming Mill, Mr. Jeremiah Hoad — Manufacturers, Messrs. Westgarth, English, and Co., 269

Boats, The “ Berthon ” Ship’s, Midship Section,

Boiler Cleaner, The Crockford, 388 Boiler, The Essex, 469

Boiler-house, Boilers, and Connections, Southwark and Vauxhall Waterworks, 97 Boilers, Messrs. C. and T. Pattison, 533 Boilers and Engines, German Mail Steamers, The Vulcan Works Co., 516

139

Engine, High-speed Vertical, Messrs. Hornsby and Sons, Smithfield Club Show, 473

132

Engines, Compound ways, 230, 232

Engines, Compound, Spanish Cruiser, ‘ ‘ Reina Regente,” 431

Engines, Compound High-speed Launch, Mr. A. Mumford, 125

Engines, Compound, Southwark and Vauxhall Waterworks, Hampton {Supplement, July 29th, 1887), 65, 68, 69

Engines at Newcastle, Trial of, Diagrams and Tables relating to, 42, 44, 45

Engines, Pumping, Umaria State Colliery, Indian State Railways, 151

Engines, Triple Compound Marine, Messrs. Alexander Shanks and Son, 178

Engines, Triple Expansion, German Mail Steamers,

FAN, Schiele Ventilating, Manchester Exhibition, 171

Fens, Drainage of, 103, 186, 187, 323 Feed-water Heater, Mr. Maclaine, 265 Feed-water Heater, The “ Compactum,” Mr.

John Kirkaldy, Newcastle Exhibition, 7 Ferry Steamer, Portsmouth and Ryde, The s.s. “Duchess of Edinburgh,” Mr. W. Stroudley {Supplement, September 23rd, 1887), 128,129, 154 Fine Arts Court, Paris Exhibition, 1889, 190 Fine Arts Court, Paris International Exhibition, Side Galleries of, 234

Fires in Theatres, Diagram of Plan for Escape of Smoke, E. H., 307

First Flow Sheet of Mr. Harrison Carter’s System, Mr. Gilbert Little on Modern Milling, 405 Flow Sheet Roller Milling, Harrison’s First, 405 Flow Sheet Roller Milling, Simon’s First, 167 Foundry Ladle, Messrs. Goodwin and How, The Grange Iron Company, Newcastle Exhibition, 5 Furnace Boilers, Mr. F. Botting, 233 Furnace, Castner’s Sodium, 513 Furnace Boilers, Diagram, F. B., 213 Furnace Feeder, Mr. Proctor, 160 Fusible Plugs, Williams’, 513

GAS Apparatus for Removing Tires, Messrs. Gentry and O’Brien, 79

' Gas Engine, Atkinson’s “Cycle,” The British Gas Engine and Engineering Company, 537 Dynamometer, The Froude, Apparatus for De- Gas Engine, Rollason’s, The Beck Gas Engine termining the Mechanical Equivalent of Heat, ! Company, Newcastle Exhibition, 276

Gas Machine, Automatic, 509 Gates, Folding, 250

Gauge Glass, Water, Mr. Loudon Campbell, 159 ELASTIC Extension, Mr. R. H. Graham on, ] Gland Packing, Messrs. Skelton and Grimshaw Diagrams Relative to, 145, 146, 185 Electric Light on the Isle of May, Horizontal Section through Focal Plane, 159 Electric Light on the Isle of May, Vertical Section through Apparatus and Lantern, 159 Electric Lighting from Central Stations, Mr. J.

R. Williamson, Figs. 1, 2, 3, 4, 5, 6, p. 500, 501 Electrical Governor, Messrs. Robey and Co.,

Newcastle Exhibition, 7 Electro Motor Gear, The Elieson, 318 Endless Railway, Fender’s, 451 Engine, The Barrow, Messrs. Westray, Copeland, and Co., Manchester Exhibition, 376 Engine, Blowing, Athus Iron and Steel Works,

205, 214

Engine, Carding, Messrs. Hetherington and Sons,

238, 239

Engine, Compound Mill, 1000-H.P., 507 Engine, Compound Portable, Messrs. J. and H.

McLaren, 147

Engine, Compound Prize, Messrs. Davey, Pax-man, and Co., 63

Engine, Compound Traction, Messrs. Edwin Foden and Co., Newcastle Exhibition, 43, 46 Engine, Compound Vertical, Indian State Railways, 194, 207

Engine, Compound Vertical, Messrs. Wallis and Steevens, Smithfield Club Show, 472 Engine, Diagrams from, Messrs. Davey, Paxman, and Co.'s Simple, Newcastle Exhibition, 42 Engine, Exploded Portable, Melton Constable,

Norfolk, 316

Engine, Express, London and South-Western Railway, Mr. W. Adams, Newcastle Exhibition, 108

Engine, High and Low Pressure, Diagrams from,

Messrs. Davey, Paxman, and Co. ’s Compound Engine, Newcastle Exhibition, 43 Engine, High-speed Compound, Messrs. Bever and Dorling, 508

Engine, High-speed Compound Vertical, Messrs.

Davey, Paxman, and Co., Smithfield Club Show,

Gold Ores, Machines for Treating, 210 Grease Cup Lubricator, New, Messrs. Seek Brothers, 34

Guides and Belt Stretchers, Mr. W. B. Cobbett, 513

Gun, 12-pounder Breech-loading Field, 325 Gun, Section of 67-ton Breech-loading, H.M.S. “Trafalgar,” 123

Guns, 12-pounder and 20-pounder Field, 325

HAMMER, Radial Arm Steam, Messrs. James Bennie and Co., 54

Hammer, Steam, Mr. Banning’s, Athus Iron and Steel Works, 205

Harbour Works, New, Ceara, Brazil, Mr. It. E.

Wilson, 88 Hot Air Engine, 372

Hydraulic Pump, Messrs. John Birch and Co., 15 Hydro-pneumatic Speedometer, Mr. R. Willis, 358

ICE-MAKING Machine, Patent Hand, Mr. Fleuss, American Exhibition, 34

JOIST Sawing Machine, Messrs. Hetherington, 545

LATHE, Surfacing and Taper Turning, Messrs.

Hulse and Co., 469 Launch, Steam, “Buzz,” 368 Launching Lifeboats, J. W., 534 Lock Nut and Washer, The Patent Rivet Company, 358

Lock Washer, The National, Messrs. John H. Ladd and Co., 180

Locomotive, Messrs. Black, Hawthorne, and Co., Newcastle Exhibition, 6

Locomotive Boiler Fittings, Messrs. Gresham and Craven, Manchester Exhibition, 57 Locomotive, Electric, Mr. Stepheu D. Field, 450 Locomotive, Four-coupled Express, Midland Railway {Supplement, December 23rd, 1887)

Smith, Professor W. H., Table of Value for Strut Sections, 303

Spanish Government, Torpedo Boats for the, Messrs. Yarrow and Co., 332 Skelton and Grimshaw, Messrs., New Gland Packing, 249

South America, Shallow Draught Siern Wheel Steamer, Messrs. Yarrow and Go., 272 Southwark and Vauxhall Waterworks, Hampton, Boiler-house, Boilers and Connection, 97 Southwark and Vauxhall Waterworks, Hampton, Detail of Equilibrium and Throttle Valve, and of Main Pump Valves, 69 Southwark and Vauxhall Waterworks, Hampton, Compound Vertical Rotative Pumping Engine Cylinders, 65, 68, 69

Southwark and Vauxhall Waterworks, Hampton, Compound Engines (Supplement, July 29th, 1887), 68, 69

Southwark Experiments, Driving Chain for Electric Tramcar, 95

Stead, Mr. J. E., Apparatus for Taking Samples of the Products of Combustion, Newcastle Exhibition, 48

S.S. “Bencroy,” Triple Expansion Engines, Messrs. J. Jones and Sons, 308, 309

S.S. “Duchess of Edinburgh,” Portsmouth and Ryde Ferry Steamer, 128, 129, 154

S.S. “ Duchess of Edinburgh,” Portsmouth and Ryde Ferry Steamer, Mr. W. Stroudley (Supplement September 23rd, 1887)

S.S. “Duchess of Edinburgh,” Details of Cylinders, Messrs. J. and J. Thomson, 129

S.S. “ Duchess of Edinburgh,” Details of Machinery, Messrs. J. and J. Thomson, 154

S.S. “ Elbe,” Burst Steam Pipe, 305

S.S. “ Elbe,” General Arrangement of Boilers, 522

S.S. “Fifeshire,” Refrigerating Machinery, Mr.

T. B. Lightfoot, 305, 312

S.S. “ Worcester ” and “ Oxford,” Triple Expansion Engines, The Central Marine Engine Co., 89 Stevenson, Mr. J. J., Eclectic Disintegrator, 249 Stuart’s Steam Grease Extractor, 397

Boilers, General Arrangement of, s. s. “Elbe,” 522 Bollard for Self-righting Lifeboat, J. W., 87 Bows of the s.s. “Emilie,” Mr. Wasteney Smith’s Stockless Anchor, 171 Brake, R.A.S.E. Type, McLaren’s, 482 Bridge, A Defective, Inquirer, 386 Bridge, The Forth, Sir John Fowler and Mr. B. Baker, 434, 438, 439

Bridge, Hangleton, Brighton and Dyke Railway, 228

Bridge at Mannheim, Competitive Designs, 489,492 Bridge, New Towers of the Niagara Suspension, 481

Bridge, Ravine, Lowestoft, Mr. E. M. Parkinson, 191

Bridge, Broken, Baltimore and Ohio Railway, 54 Bridge, The Siee Ho, China Railways, Mr. C. W.

Kinder and Mr. James Cleminson, 450, 476 Bridge, the New Tay, 199 Burst Steam Pipe, s.s. “ Elbe,” 305

CABLE Tramway, The Edinburgh Northern, Mr. W. N. Colam, 389, 390

Carding Engine, Double Composite, Messrs. Asa Lees and Co., 336 Cast Steel Anchor, Mr. Hall, 296 Chains for Lifting and Hauling, Mr. Henry Adams, on, at the Civil and Mechanical Engineering Society, 28

Chaser Stocks and Dies, Mr. T. Woods, 481 Chilled Moulds for Casting Bearings, Mr. F.

Garrett, Smithfield Club Show, 473 Chuck, Universal Vice, 27 Coke Breaker, Royle’s, Portway’s Patent, 517 Colliery, Umaria Pumping Engine for, 151 Combination Set Square, Mr. Dashwood-Caple, 508 Condenser, Rayner’s Double-Distilling, Messrs.

Ernest Scott and Co., Newcastle Exhibition, 276 Constructive Ironwork in a New Theatre, Mr. J. S. de Jongh, 471    -

Continuous Current Transformers, Edison’s System of, 377

Copper Steam Pipes, Strength of, Mr. Nisbet Sinclair, 525

Corrosion of Metals in Mine Waters, Relative, 55 Corrugated Sheet Mill, 71

Cotton Mule (Back View), Rim at Side, Selfacting, Messrs. Asa Lees and Co., 340 Cotton Mule (Rim at Back) Self-acting, Messrs. Asa Lees and Co., 340

Cotton Repairing and Spinning Machinery, Messrs.

Asa Lees and Co., 336, 340 Crane, Permanent Way, Hand, Messrs. Grafton and Co., 268

Cream Separator, The Victoria, Messrs. Watson, Laidlaw, and Co., 326

Cruiser, Spanish, The “Reina Regente,” Messrs.

Thomson, 352, 354 Culvert, The Chats worth, 218 Cupola, Messrs. Greiner and Erpf, 480 Cut-off Gear for Reversing Engines, Automatic, Messrs. Edwin Foden and Sons, 46 Cut-off Valve and Governor, Horton’s Patent Automatic, 317

Cylinders, Details of, s.s. “Duchess of Edinburgh,” 129

DISINFECTOR, Aero-Steam, Mr. W. E. Thursfield, 90

Disintegrator, the “Devil,” End Elevation and Section, the Hardy Patent Pick Co., 376 Disintegrator, Eclectic, Mr. J. J. Stevenson, 249 Domestic Cooking Apparatus, Mr. J. Lehman, 316 Double Cylinder Compound Direct-acting Pumping Engine, Hampton, Southwark and Vauxhall Waterworks, Mr. J. W. Restler, 10, 30 Drainage of Fens and Lowlands, 103,186, 187, 323 Drainage Works of Newhaven, Mr. W. II. Radford, 92

Dredger, Scour, Harrison’s, 359 . Dredger Used in the Clyde Estuary,

Drilling Machine, Portable Hand Power, Messrs. J. Wild and Co., 458

Driving Chain for Electric Tramcar, Southwick Experiments, 95

Dynamo and Arc Lamp, The “ Lever,” 329 Dynamo, The Blakey-Emmott, 409

473

Engine, Hot-air, MM. Benier Freres, 372 Engine, Passenger, Lancashire and Yorkshire Railway, The Vulcan Foundry Co., Manchester Exhibition, 174, 179

Engine and Pump, Lade Bank, Lincolnshire, 103 Engine-room, Electric Lighthouse on the Isle of May, 158

Engine, Sellar’s Patent Compound, Messrs. Bradley and Craven, 536, 540

Engine and Tender Coupling, Granile Works at Naples, 512

Engine Trials, Newcastle, Diagrams from the Six most Economical Engines, 105 Engine Trials, the R.A.S.E. Diagrams, 470 Engine Turntables, Indian State Railways, 350 Engine, Vertical, Messrs. Robey and Co., Smith-field Club Show, 472

Engine, The “ Viator ” Vertical, Messrs. Jeffery and Blackstone, Newcastle Exhibition, 268 Engine Works, Naples, Messrs. C. and T. T. Pattison, 533

Engines, Compound, Electric Light Installation, “Olympia,” Messrs. Davey, Paxman, and Co.,

for the Indian States Rail-

451

Engines, Triple Expansion, The Italian Cruiser “ Dogali,” Messrs. R. and W. Hawthorn,

- Leslie, and Co., 109, 112, 116 Engines, Triple Expansion, s.s. “Worcester” and “Oxford,” The Central Marine Engineering Co. , 89

Equilibrium and Throttle Valve and of Main Pump Valves, Detail of, Southwark and Vauxhall Waterworks, Hampton, 69 Exhibition, Glasgow International, General Plan of Site, 417

Exhibition of 1889, The Paris, The Great Machinery Hall, 150

Explosion on Board the “Elbe,” Sketch showing Arrangement of Boilers, 245

249

Locomotive, Four - coupled Outside Cylinder, London and South-Western Railway, designed by Mr. W. Adams, constructed by Messrs. R. Stephenson and Co. (Supplement, November 4th, 1887), 385, 392

Locomotive, High-speed Road, Messrs. J. and H. McLaren, 496

Locomotive, Ten-wheeled Tank, China Railways, Mr. C. W. Kinder and Mr. Jas. Cleminson, Messrs. Dubs and Co., 412, 493 Locomotive, Tramway, Greig’s, 328 Locomotive Works, Horwich, Block Plan of, 246 Locomotives at the Newcastle Exhibition, 6

MACHINES for Treating Auriferous Metals, Messrs. Jordan, Son, and Commans, 210 Machine Tool and Crane Works, Messrs. Craven Brothers, Diagram showing Plunger Travel, 239 Machine Tools at the Newcastle Exhibition, Messrs. Hulse and Co., 256 Mandril, Expanding, Messrs. H. B. Barlow, 388 Map of the Clyde Estuary, 139 Map of Edinburgh Waterworks and Paper Mills at Penicuik, 117

Marine Boiler, The Wallsend Slipway and Engineering Company, 7 Metallic Packing, Jerome’s, 288 Metallic Piston Rod Packing, Corliss Engines in Mr. F. S. Sandeman’s Works, 136 Metals, Corrosion of, 55 Meter, Kent’s Positive, 451 Meter, Self-registering, The “Ochwadt,” 536 Meter Syphon, Messrs. W. and B. Cowan, New castle Exhibition, 277 Mill, Carter-Turner, Three-high, 405 Mill Engine, 1000-H.P. Compound, Messrs. Buckley and Taylor {Supplement, December 23rd, 1887)

Mill, Flour, The Laubardemont, Messrs. T. Powell and Co., 50, 55, 72

Mill, The Globe Quartz Crushing, The Globe Mill Company, 26

Mill and Sieves, Multiple Roller Break, Mr. J. A.

Buchholz, Manchester Exhibition, 41, 47 Milling Machinery, Universal, Messrs. Tangye and Co., 396

NUT Finishing Machine, Messrs. Dunderdale, Wood, and Co., Manchester Exhibition, 35

PACKING, Metallic, Jerome’s, 289 Paper Mills at Penicuik, 117 Pedestals for Colliery Tubs, Self-lubricating, The Hardy Patent Pick Company, 459 Permanent Way, Mr. M. Post’s Metallic Railway Sleepers, 75

Permanent Way, Metallic, Mr. Quelch, 536 Pier of the New Tay Viaduct, Section of, 199 Pipe, Fractured, The “Elbe” Catastrophe, 330 Pipe-testing Apparatus, Hydraulic, The Glenfield Company, Newcastle Exhibition, 277 Plan of the Implement Yard at Newcastle, 15 Plan of the Isle of May, 158 Plate-closing Rivetter, Messrs. Tweddell, Platt, and Fielding, Newcastle Exhibition, 5, 7 Potato Digger, Messrs. Penny and Co., Newcastle Exhibition, 76

Potato Digger, Messrs. Powell Brothers, Newcastle Exhibition, 76

Potato Planters, Messrs. Murray and Co., Newcastle Exhibition, 76

Pots or Skillets, Three-legged, Moulded at Carron, 135

Press, Baling, Messrs. John Birch and Co., 15 Press, Light Baling and Finishing, Mr. Turner, 26 Primary Battery in which Carbon is Consumed, Mr. Willard E. Case, 265 Problem in Strains, Diagram, C. S., 213 Problem in Strains, A. T. E. N., Diagram, 193 Problem in Strains, W. A. S. B., Diagram, 193 Problem in Strains, X., 153

Products of Combustion, Apparatus for taking Samples of the, Mr. J. E. Stead, Newcastle Exhibition, 48

Projectile on a Steel-faced Plate, Effect of a St. Chamond, 198

Pump, Whittlesea Mere, 186, 187 Pump and Compressor Works, Messrs. Pearn and Co., Lightning Tapper, 239 Pump, Differential Feed and Force, 35 Pumps, Hydraulic, 15

, Pump and Distiller, Combined, “ Compactum,” Mr. John Kirkaldy, Newcastle Exhibition, 7 Pumping Engine, Cylinders, Southwark and Vauxhall Waterworks, 10, 30, 65, 68, 69 Pumping Engines, Whampoa Docks, Messrs.

W. H. Allen and Co., 409 Pumping Machinery, Widnes Waterworks, Mr. Henry Davey, 170

Pumps and Boiler, Lake Haarlem, 323 Pyromagnetic Dynamo, Mr. T. A. Edison, 231

RADIAL Drill and Milling Machine, Messrs.

Hetherington and Co., 544 Rail Joint, A Spliced, Mr. Lightfoot, 481 Rail Joints, Mr. T. L. Smith, 107 Railway, Brighton and Dyke, Plan and Section, 228 Railway Company, The Mediterranean, Granile Works at Naples, 512 Railway, Endless, Fender’s, 451 Railway Jubilee Exhibition Building, The Vincennes, 416

Railways, Map of Italian, 365 Railway, The Mediterranean, Sketch of, “Cus-todia,” 458

Railway Shops at Horwich, Lancashire and Yorkshire, 248

Railway Wheels, Skidding, Scale Produced by, 219 Refrigerating Machinery, s.s. “Fifeshire,” Mr.

T. B. Lightfoot, 305, 312 Reversing Gear, Italian, 512 Roller Mill Plant, Mr. Simon’s Flow Sheet of the First Complete, 167

Roller Mill, Three-high, The Carter-Turner, 405 Rolling Mill for Corrugated Sheets, Herr Vital Daelin, Manufacturers, Messrs. Aug. Bachmeyer and Co., 71

Roof of Bandora Station, 447

Roving Frame, Messrs. Asa Lees and Co., 337

SAFETY Lamp, Sandbrook’s, 513 Scoop Wheel at Nordelph, 1S7 Scouring Dredger for Fen Drains and Rivers, Mr. A If. Harrison, 359

Scutcher, Improved, Messrs. Asa Lees and Co., 336

and

Association of

Municipal and Sanitary

Mer-

109

131

Commercial and Utilitarian v. International Views, 162

Compass, A New, 317 Competition in the Home Trade, 172 Compound Locomotives in France, 235 Concrete Work under Water, 56 Condenser, Rayner’s Double Distilling, 276 Constructive Ironwork in a New Theatre, Mr. Max am Ende, 257, 283

Constructive Ironwork in Terry’s New Theatre by Max am Ende, 283, 285 Continental Girders in England, Advanced Prices for, 95 Contracts Open:

Bombay, Baroda, and Central India Railway, Specification for Ironwork for Roofing, Ban-dora Station, 446, 447

Indian State Railways, Pillar Water Cranes, 288, 290

Indian Midland Railway, Specification of Carriages, Brake Vans, &c., for 5ft. 6in. Gauge,

Indian State Railwa

r Third-

on

238

Seamless Tubes from Solid Blanks, The American ! Steel FoldingGatesand Shutters, Mr. Bostwick, 250 Struts, their Working Strength and Stiffness

Diagrams, Prof. E. H. Smith, 425, 426 Stuffing-box Packings, American, 292 Subway, City of London and Southwark, Mr. J. H. Greathead, 297, 298

Steel Scale produced by Skidding Railway Wheels

Machinist, 396

Sewage Sludge and its Disposal, Mr. W. J. Dib-

din on, and Diagrams Relative to, 118    ! Stoker, Messrs. Johnston and Blandford, 256

Sewerage Works, Acton, Ground Plan of, 227 Stone-Breaker, Mason’s Lever, Cracking Motion Sewing Machine and Electric Motor, Combined, 328

Mr. Philip Diehl, 265    Stone - Breaker, Continuous Action Gyratory,

Shafting Bearings, Mr. Herbert Fordsmith, 27    i Lowry’s, Messrs. Jas. Farrar and Co., 521    TESTING Apparatus, Messrs.    McLaren’s, Engine

Shaping Machine, Self-acting, Messrs. Tangye, 368 Stone-Breaking and Delivering Apparatus for the Trials, 461

Shears, Messrs. Rush worth and Co., 430    Indian Government, Messrs. W. H. Baker and Theatres, Fires in, Plan of Exit, Bob, 287

Ship Section, Capt. Lundborg, 136    Co.,    431    Theatre, Constructive Ironwork in a New,    Mr.

Signal Apparatus, Fog and Safety, Messrs. Kempe    Strains,    a Problem in,    213    Max    am Ende, 257

and Rowell, 57    Street Surface Box, Brown’s, The Glenfield Co., 517    Theatre, Ironwork in, Mr. de Jongh, 471

Slubbing Frame, with Taylor’s    Patent Cone Stresses in a Camp Stool, Luigi Bardea, 173    Theatre, Strand, Terry’s, Structural Ironwork    of,

Releasing Motion, Messrs. Asa Lees and Co., 337 Stresses in a Camp Stool, B. C., 173    Messrs. Matthew J. Shaw and Sons, 285

Smith’s Forge, Horwich Works, 249    Stresses in a Camp Stool, Mr. R. Hartland, 161    Three-Hinged Wrought Iron Arch, Cleremont,

Snow Ploughs, Leicester, Messrs. Vipan and    Stresses    in a    Camp Stool,    T. E. N., 161    Iowa,    U.S.A., Mr. H. E. Horton, 137

Headly, 517    Stresses in a Camp Stool, Mr. E. J. Wilson, 173 Tool Holder, Mr. Gavin Jones, Newcastle Exliibi-

Sodium Furnace, The Castner, 513    j Stresses in a Camp Stool, Diagram, D., 212    tion, 256

Steam Engine Trials, R.A.S.E., Sketch relating Stresses in a Camp Stool, Diagram, Mr. J. B. Hall, Torpedo Boats for the Spanish Government, to, 535    |    107    Messrs. Yarrow and Co., 332

Steam Grease Extractor, Stuart’s, 397    Stresses in a Camp Stool, W. A. S. B., Diagram, 193    Tram Rail Cleaner, Mr. John Prosser, 27

Steam Hammer, Barring’s, 205    Stresses in a Camp Stool, Diagram, E. K.; 107    Tramway, Edinburgh Northern Cable, Mr.    W.    N.

Steam Hammer, Bennie’s Radial, 54    I    Stresses in a Camp Stool, Diagram, R. W. M. M.,    Colam, 351, 369

Steam Launch “ Buzz, ” the American High Speed    107    Tramway,    the Gradients and Curves of    the    Bir-

Steam Launch, 368    Stresses occurring in Cast Iron and Steel, Internal, mingham, 126

Steam Trap, McDougall’s, The Chatterton Iron- Gen. N. Kalakoutsky, Diagrams, and Apparatus Tramway Locomotive, Birmingham Central Tram-works Co., 521    ; for Determining, 467, 487    ways, Messrs. C. Burrell and Sons, 347

Steamer, Shallow Draught Stern Wheel, for S. ; Stresses in a Lattice Girder, Evaluation of, Figs. Tramway Locomotive, Mr. A. Greig and Mr. T.

America, Messrs. Yarrow and Co , 272    1, 2, 3, 4, 5, Mr. Wm. Robertson, 531    Aveling, 328

Steel Flooring, Messrs. W. II. Lindsay and Co., Strut Sections, Table of Values for, Prof. W, H. Tramway Sleeping Car for the Argentine Republic, 289, 290    ¹ Smith, 303    Messrs. J. G. Brill and Co.,    500

219

Transship Vans, Indian Midland Railway, 429 Travelling Crane, Fifty Feet, Paris, Lyons, and Mediterranean Railway, 206, 211 Tubes from Solid Blanks, 396 Turbines, Vertical, Terni Steel Works, MM. J. Rieter and Co., 252

UNDERFRAMES and Covered Wagons for Indian State Railways, 3

VALVE, Automatic Cut-off, Horton’s, 317 Valve, Screw-down Guided, Messrs. Thomas Lambert and Sons, 358 Vice Chuck, Universal, Mr. Cosgrove, 27 Vortex Blast Pipe, Mr. W. Adams, Newcastle Exhibition, 108

WATER Cranes for the Indian State Railways, 289 Water Meter, Uniform Positive, Mr. G. Kent, 451 Water Separator, Messrs. Vaughan and Sons, 269 Water Supply of Bombay, The Tansa Works for the, 53

Weighing Machine, Prize Cattle, Messrs. Hart and Co., Newcastle Exhibition, 77 Wheelwright’s Sinking Platform, Mr. Baker, Smithfield Club Show, 472 Writing Telegraph, The, 420

YACHT, “Now Then,” The Hcrreshoff, 227

-4-

A BSTR ACTS of Consular and Diplomatic Reports, 2, 23, 70, 98, 108, 147, 167, 188, 208, 225, 250,

278,    284, 304, 329, 352, 367, 397, 405, 428, 452, 468, 488, 514, 533

Accidents on Indian Railways, 386 Accidents on Tramways, 193, 213 Accumulator, An Efficient, 212 Acton and Ealing Sewage Works and Ealing New Storage Reservoir, 339 Acton Sewerage Works, The, 227 Address of the President of the Institution of Civil Engineers, 393 Adelaide Jubilee Exhibition, 395 Admiralty Coefficients, On, Mr. Robert Mansel, 510

Aerostation and Aeronautics, 196, 440 Agra Waterworks, The Proposed, 220 Agricultural Engineers’ Association, 497 Air Pump for use in the Laboratories of Works, A Simple, 14

Air Brakes in the United States, 197

Aluminium Company, The, 2

America, Locomotive Cylinder Practice in, 83

American Cities, Growth of, 21

American Engineering News, 36,115,162,200, 240,

279,    318, 360, 398, 429, 482, 526

American Engineering News, Construction of Hydraulic Dock at San Francisco, 80 American Ironclad, 107 American Locomotives in Australia, 153, 173 American Notes, 21, 39, 61, 83, 101, 121, 143, 223, 242, 281, 301, 321, 343, 401, 443, 465, 485, 528

American Shipbuilding, 156

American Stuffing-box Packings, 290, 292

American War-ships, 79

Anchor, Cast Steel, Mr. Hall. 296

Anchor Tests, 348

Anchors, Cast Steel, 310, 328

Anchors, Stockless, Wasteneys Smith’s, 171

Ardrossan, New Docks at, 36

Armour and Projectiles, 357

Armstrong, Lord, 24

Army Tools, 314

Asbestos Theatre Curtains, Terry’s Theatre, 430 Ashbury Railway Carriage Works, The, 247 “Asiatic Express,” The, 271 Association for the Advancement of Science, The American :—

The Pyromagnetic Dynamo, by Mr. Thos. A. Edison, 231

Association, The Agricultural Engineers’, 471,

497

Association, The City and Guilds of London Finsbury Technical College Old Students’, 368 Association of Engineers, The Manchester Electric Lighting from Central Stations, Mr. J. R. Williamson on, 501

Foremen Engineers Draughtsmen, The London, 61, 474 Heat and Work, Mr. W. T. Coates, 474 Jottings on Hydraulic Lifts, Mr. Suggate, 240 The Native Army in India, Mr. Haggis, 61 Propelling Ships by Sail and Paddle, Mr. Hitt, 474

Welsbach Incandescent Gas Lamp, The, Mr. Heath, 318

Association, the Geologists’, Excursion to Sheppey,

71

Association of

Engineers and Surveyors, The Visit to Luton Sewage Works, 420 Athus Iron and Steelworks, 205, 214 Atkinson’s Cycle Gas Engine, 536, 537 Austrian Consul on British and Germ chants, 363

Autographometer, The, 96 Automatic Cut-off Valve Gear of Steam

348

Automatic Gas Machine, The, 508, 509 Automatic Shops, 335 Axle Boxes, 287

BALLOON Ascent, Professor Mendelief’s, 212 Baltimore and Ohio Railway, Broken Bridge, 54 Band Saws, 495, 518 Barcelona, Proposed Canal at, 39 Barrow Engine, The, 376

Basic Open Hearth Process, Mr. J. Wailes on the, 258

Basic Slag, The Origin, Composition, and Use of

Basic Steel, Present Position of, as a Material for Shipbuilding, 96

Basic Steel, Recent Experiments with, 96 Beaumaris Sewerage Works, 126 Belgian Coal Industry in 1886, 498 Belt Guides and Belt Stretchers, Cobbett’s, 513 Belted Cruisers, 419 Bend Trueing Machine, 238 Benier’s Hot Air Engine, 366, 372 Benzine Barrels, Empty, as Dangerous as Full Ones, 340

Berlin Screw Industry, The, 74 Birmingham Cable Railway, The, 126 Birmingham and Gloucester Ship Canal, The, 131 Blakey,-Emmott Dynamo, The,

Blast Pipe, Messrs. Appleby and Robinson, Waterford and Limerick Railway, 14 Blast Pipes, 11

Blooming or Cogging Mill, Mr. Jeremiah Head,269 Blowers, Experiments and Experience with, 499 Boats, Self-righting, 87

Boiler Cleaner, Feed-water Heater, and Purifier, The Crockford, 388 Boiler, The Essex Vertical, 469 Boiler Feeders, Automatic, 273 Boiler Registry, 383

Boiler Registry and Inspection Bill, 212 Boilers and Engines of the German Mail Steamers, 516

Boilers, Furnace, 213, 233 Boilers, High-pressure Marine, 4, 29 Boilers, Pattison’s, 533

Boilers, s.s. “Elbe,” General Arrangement of, 522 Boilers, Torpedo Boat, 29 Boilers, Water Tube, 294, 338, 356, 419 Bolton Strike, The, 375 Bolton Strike, Close of the, 374 Bombay, The Tansa Works for the Water Supply of, Mr. W. Clarke, Engineer, 53 Books Received, 13, 74, ll5, 296, 315, 375 Boring Machinery, 31 Bostwick’s Folding Gates, 271 Bostwick’s Steel Folding Gates and Shutters, 250 Bows of the s.s. “ Emilie,” 171 “ Boycotting,” v. Railways, 414 Bradford Water Supply, 409 Brake, Mr. Wicksteed on a, 359 Brake, Continuous, 348

Brake, The London and North-Western Railway,

Brake, R.A.S.E. Type, McLaren’s, 460, 461, 482 Brakes, Continuous, 162, 386, 419 Brakes on Freight Trains, 395 Brakes on the London and North-Western Railway, 162

Brakes, Railway, 371 Brewing Trades Exhibition, The, 375 Bridge, A Defective, 348, 371, 386 Bridge, the Siee Ho, 450, 476 Bridge Structures, A Railroad Bed for, 499 Brighton and Dyke Railway, The, 228 British Association, The, 215 Address of the President, Sir H. Roscoe, 199 City of London and Southwark Subway, 297 Excursion to Northwich and Anderton, 217 Experiments on the “Mechanical Equivalent of Heat ” on a Large Scale, by E. A. Cowper and W. Anderson, 213

Horwich and Rivington, 246, 248, 249 Improvements in the Manufacture of Portland Cement, Mr. F. Ransome, 218 Injector and Brake Works, Messrs. Gresham and Craven, 240

Ironworks, Messrs, de Bergue and Co., 239 Machine Tool and Crane Works, Messrs. Craven Bros., 239

Mather and Platt’s Machine and Electrical Works, 217

Pump and Compressor Works, Messrs. Frank Pearn and Co., 239 Sharp, Stewart, and Co.’s Works, 217 Specimens of Steel Produced by Skidding Railway Wheels, Mr. Jeremiah Head, 218 Spinning Machinery Works, Messrs. Hethering-ton and Sons, 238

Tidal Estuaries and the Bar of the Mersey, Mr. Shelford, 383

Visit to Messrs. Hetlierington and Son’s Machine Tool Works, 544

Visit to Messrs. Platt Bros, and Co., Oldham, 545 Visit to Messrs. Thos. Robinson and Sons, Rochdale, 545

British Industries and Technical Education, 313

British Manufacturers and Consular Reports, 436 British Trade at Canton, Opening for, 395 British Trade in Foreign Markets, 517 Brown’s Street Surface Box, 517 Brunswick Park, Wednesbury, Opening of the, 29 Buckling of Rails under the Sun’s Heat, Prof. A.

G. Greenhill, 23 Buddicom, Mr. W. B., 180 Bute Docks Extension, 61 Burrell’s Tramway Locomotive, 347 Burst Steam Pipe, s.s. “ Elbe,” 305 “ Buzz,” The American Steam Launch, 368

CABLE Tramway, The Edinburgh Northern, 347, 351, 369

Cable Tramway, Birmingham, 126 Calais Harbour, Improvements in, 168 Calorific Value of Coal, 370 Calorific Value of Fuel, The, 440, 459 Canadian Imports of Iron, 21 Canadian Tariff, The, 32 Canal, Birmingham and Gloucester, 131 Canal Connecting Two Seas, A, 32 Caple’s Combination Sot Square, 508 “ Carbonit,” The New Explosive, 255 Cardiff, Opening of the Roath Dock, 197 Carding Engine, Double Composite, Messrs. Asa Lees and Co., 336 Carding Engine, Improved, 238 Carron Ironworks, The, 116 Carter-Turner Three-High Roller Mill, The, 405 Castner’s Sodium Furnace, 513 Catalogues, 432

Ceark Harbour Works, Brazil, 88, 90 Cement for Ships, 4

Cements, How to Test the Strength of, 499 Chains for Lifting and Hauling, The Use and Care of, 28

Charterhouse Science and Art Schools and Literary Institute, 233

Chaser Stocks and Dies, Mr. T. Woods, 480

Chats worth Disaster, The, 218

Chilled Moulds for Casting Bearings, Messrs.

Richard Garrett and Sons, 473 Chilled Plate Rolls, Strength of, 270 Chimneys, Shape of, 175

China Railways, Ten-Wheeled Tank Locomotive, 410, 493, 498 Cinderlithic, 286

Circular Saw, Invention of the, 371 City of London College, Mr. H. Adams on “ Foundation,” 310

City of London College, Syllabus of Lectures in the Engineering Department, 257 City of London and Southwark Railway, Map of, 298 City of London and Southwark Subway, Mr. J. H. Greathead, 297

Claremont, Iowa, U.S.A., Three-Hinged Wrought Iron Arch at, 136, 137 Clark, Mr. Alvan, 173

Clark Process, The, 78, 86, 87, 107, 172, 348, 371 Clark Process for Bristol, The, 12 Clarke, Mr. John Algernon, 437 Clock and Watch Making, Technical School of, Brussels, 396

Clyde Shipbuilding for July, 134 Clyde Shipbuilding for August, 216 Clyde Shipbuilding Trade, Revival in, 374 Clyde Shipbuilding Trades, 294 Coal, Calorific Value of, 370, 394 Coal Measures in Upper Burmah, 375 Coal Miners and Restriction, 436 Coal Production, Our, 498

Coal Production, The Year’s for the United Kingdom, 306 Coal in South Africa, 478 Coal Trade, Restriction in the, 295 Cobbett’s Belt Guides and Belt Stretchers, 513 Coins, The New, 13

Coke Breaker, Royle’s, Portway’s Patent, 517 Collisions in the English Channel, 481 Collisions at Sea, 55 Colombo Shipping Wharf, 66 Colonial College of Hollesely Bay, The, 543 Colonial Defence, 232, 270, *386 Colonial Land Sales and Public Works, 113 Colonies and their Railways, Our, 455 Combination Set Square, Caple’s, 508 Combustion, 157, 205

Combustion, Analysis of the Products of, 48 Commercial Education in Relation to Foreign Competition, 270

ys, Underframes fo class Carriages and Covered Goods Wagons, 3 Copper, Comparative Tensile Strength of Electrolytic and Ordinary, 471 Copper at High Temperatures, 535 Copper Mines in the Ufa Government, 153 Copper, and its Price, 394

Copper Steam Pipes, Mr. Sinclair’s Experiments the Strength of, 524 Correction, 479

Corrosion of Lead Pipes Built up in Walls or Laid Underground, 101

Corrosion of Metals in Mine Waters, 55 Cost of Transmission of Power, 177 Cotton Machinery at the Manchester Exhibition, 75 Cotton Mule, Self-acting, Messrs. Asa Lees and Co., 340

Cotton Spinning in Manchester, 336, 340 Cotton Spinning by Water Power in India, a New Industrial Enterprise, 502 Coupling, Engine and Tender, 512 Crane, Five Tons, Permanent Way Hand, 268 Craven Brothers, Machine Tool and Crane Works,

“Craven” Scholarship at the Yorkshire College, The, 419

Cream Separator, the Victoria, 326 Crockford Boiler Cleaner, The, 388 Croton Aqueduct, Reports on the, 357 Cruiser Designs, Recent, 366 Cruiser, the Fastest in the World, 309 Croydon Waterworks, 162 Cupola, Messrs. Greiner and Erpf, 480 Cut-off Gear for Reversing Engines, Mr E Foden, 46

Cut-off Valve and Governor, Horton’s Patent Automatic, 317 Cut Steel Nails ? Patent, 273

DAIRY Show, The, 156 Dairy Show, Novelties and Trials at the, 326 Davits'( Hinged, 235 De Bergue and Co. ’s Ironworks, 239 Decrease in Wages, and Improvements in Machinery, 290 Dee, Spanning the, 177 Defence of Colonial Harbours, The, 31 Depression of Trade and Foreign Competition, 357

Depression of Trade, Foreign Competition, and Technical Instruction, 448 Devil Disintegrator, The, 376 Dieppe, New Docks at, 74

Disinfector, Aero-steam, Mr. W. E. Thursfield, 90 Disintegrator, The “Devil,” 376 Disintegrator, The Patent Eclectic, 249 Distiller and Pump, Mr. John Kirkaldy’s Combined “ Compactum,” 7

Distribution of Heat in a Stationary Steam Engine, Experiments on, Major T. English, 16 Diving Apparatus, Mr. Sparks’, 465 Dock Accommodation in the East, 414 “Dogali,” Engines of the, 109, 112, 116 Domestic Cooking Apparatus, 134, 286 Domestic Cooking Apparatus, Mr. J. Lehman, 316 Drainage, Domestic, 18

Drainage of Fens and Low Lands by Steam Power, Mr. W. H. Wheeler, 103,186,283,323,359,404 Draughtsmen’s Provident Society, 440, 471, 495 Draughtsmen’s Salaries ? 273

125

318

Elieson Electro-motive and Electric Launch, 318 Emigration of Capital, The, 455 Endless Railway, Fender’s, 451 Engine, The Barrow, 376 Engine, Benier’s Hot air, 366, 372 Engine, Blowing, Athus Iron and Steel Works, 205, 214

Engine, Compound High-speed Box, Messrs. Bever and Dorling, 508

Engine, Compound, for the Indian State Rail-194, 198, 207, 230, 232

an

English and Foreign Locomotives and Bridges, 56 English and French Railway Competition in the East, 294

English Ironstone and Spanish Ore, 236 Exeter Disaster, The, 216 Exhaust Injector, The, 481 Exhibition, Adelaide, Jubilee, 395 Exhibition of Artificial Illumination and of the Naphtha Industry at St. Petersburg, 171 Exhibitions, Awards at, 295 Exhibition, The Brewing Trades, 375 Exhibition, The French Railway, 75 Exhibition, The Glasgow International, 101, 417 Exhibition, The Manchester — see Manchester Exhibition

Exhibition, The Newcastle, 371 Exhibition, The Newcastle — see also Newcastle Exhibition

Exhibition of 1889, The Paris International, 150 Exhibition, The Saltaire, 508 Exhibition, The Vincennes Railway Jubilee, 408, 416

Experimental Machinery, 51 Experiments on our Shot and Armour, Effect of Recent, 73

Explosion on Board the s.s. “Elbe,” 245, 521, 522, 535

Explosion on Board a Torpedo Boat, 20 Explosion, A Curious, 193

Extended Electro-Metal, Extracting Refining, and Plating Co., Limited, 501 Extension of the Mersey Railway, 543 Eyemouth Harbour, The, 13

GAS, Apparatus for Removing Tires, Messrs. Gentry and O’Brien, 79

Gas Engine, Rollason’s, The Beck Gas Engine Co., 276

Gas Fuel, Value of Natural, 278 Gas Heating, 410

Gas Lamp, The Welsbach Incandescent, 318 Gas Lighting Buoys, 343

Gas Lighting of the Clyde, Extension of the, 255

Gas Lighting, The Invention of, 216

Gas, Natural, 410

Gas Production, Profits on, 314

Gas, Reduction in the Price of, 374

Gas, A Sensational Story about, 114

Gas v. Steam Engines, 535

Gas Supply, 11

Gates, Folding, 250, 271

Gatling, The Eighty-pound, 428

Generation of Steam, 137, 205, 271

German Competition with British Shipping, 196

German Cycles, 348

German Imitation of Trade Marks, 295 German Mail Steamers, Boilers and Engines of the, 516

Gilchrist Engineering Scholarships, University College, 210

Gland Packing, A New, 249

Glass Manufacture in Norway and Sweden, 263

Globe Quartz Crushing Mill, The, 26

Glucose, Machines for Extracting, 195

Gold, Note on the Atomic Weight of, Messrs. T.

E. Thorpe, and A. F. Laurie, 403 Goods and Passengers on Railways, 197 Government Sale of Historic Steamships, 371 Granile Works at Naples of the Mediterranean Railway Company, 512

Grease-cup Lubricator, Messrs. Leek Bros., 34 Grease Extractor, Steam, 397 “Great Eastern” Steamship, The, 71 Greenwich Hospital Pension, The, 237 Greig’s Tramway Locomotive, 328 Gresham and Craven’s Injector and Brake Works, 240

Grinnel Automatic Sprinkler and Fire-alarm, Experiments with at the Victoria Corn Mills, Sheffield, 520

Gun, Bursting of an 11-ton Howitzer, 330 Gun, 12-pounder Breech-loading Field, 325 Gun, Section of 67-ton Breech-loading, H.M.S. “Trafalgar,” 123

Gunpowder as a Boiler Cleaner, 56 Guns, American Steel Cast, 330 Guns, Horse and Field Artillery, 324 Gyrating Stone Breaker, Continuous Action, Lowry’s, 521

295

96

Irish County Surveyorship Examination, An, 406 Iron Arch, Three-Hinged, Cleremont, Iowa, U.S.A., 136, 137

Iron, Coal, and General Trades of Birmingham, Wolverhampton and other Districts, 18, 37, 58, 80, 99, 119, 140, 163, 180, 200, 221, 241, 259, 279, 299, 318, 341, 360, 379, 398, 421, 441, 463, 483, 502, 526, 546

Iron Founders and Steel Castings, 520

Iron Manufacture in France, Decrease of the, 345

Iron Mountain, An, 183

Iron Ore in the Blast Furnace, Notes on the, Mr.

L. Bell on Reduction of, 258 Iron and Steel Duties, The New Canadian, 177 Iron and Steel Imports, 414 Iron and Steel, The Improvement in, 498 Iron and Steel Ships’ Bottoms, Complete Protection of, against Rust, 306 Iron and Steel Ships, Preservation of, 415 Iron Trade Association Boards, 156 Iron Trade, Improvement in the, 456 Ironwork in a New Theatre, On the Construe tive, 471

Ironworks Practice and Steel Competition, 310 Irrigation, Mr. Jones on, 390 Irrigation in India, 546 Irrigation Work, Hindrance to, 437 Isinglass ? Machinery for Cutting, 273 Isle of May, Electric Light on, 158, 159 Italian Government, The “Kangaroo” and the “International” Chartered by the, for Distilling Water at Massowah, 320 Italian Made Steam Plate, Trial of, 498 Italian Railways, 365 Ivory, Artificial, 51

478

Dredger, New Form of, for Kemoval of Rocks in the Suez Canal, 306

Dredger used in the Clyde Estuary, 138 Dredging of the Lower Estuary of the Clyde, 138 Drilling Machine, Wild’s Improved Portable Hand-power, 458

Dronfield—An Unfortunate Town, 135 Dublin and Kingstown Railway, History of the,

Durability of Iron and Steel Ships, The, 156 Dynamite Gun, Lieutenant Zalinski’s, 171 Dynamo and Arc Lamps, The “ Lever,” 329 Dynamo, The Blakey-Emmott, 409

EAST London Water Supply, Official Inquiry into the, 235

East Molesey, Oil Lamps v. Gas, 339 Economic Theory of the Location of Railways, 428 Edinburgh Northern Cable Tramway, The, 347, 351, 369, 389, 390 Edinburgh Waterworks, The, 117 Edison’s New Electrical Generator, 271 Edison’s System of Continuous Current Transformers, 377

Education of Engineers, 4, 56, 78, 87, 162 Elastic Extension, a Species of Motion, Mr. R. H. Graham, 145, 185 Elbe” Catastrophe, The, 330 Elbe,” Messrs. Kirkaldy’s Reports on the Steam Pipe of the, 331 “ Elbe’s ” Steam Pipe, The, 348 Election of Water Engineer of Nottingham, 339 Electric Light at the Adelaide Jubilee International Exhibition, 1887, 305 Electric Light v. Gas for Glasgow Public Buildings, 78

Electric Lighthouse on the Isle of May, Messrs.

D. and T. Stevenson, 158, 159 Electric Lighting from Central Stations, W. J. R.

Williamson on, 501 Electric Lighting and Inertia, 498 Electric Lighting, Trials of Motors for, 66 Electric Lighting in Works and Factories, Prof.

J. A. Fleming on, 259 Electric Meters, Mr. A. H. Preece, 360 Electric Sewing Machine, Mr. Philip Diehl, 265 Electric Telegraph, Jubilee of the, 4 Electric Tramcar Propulsion, 95 Electric Tramways, 490 Electrical Engineering, The School of, 27 Electrical Generator, Edison’s New’, 271 Electrical Governor, Messrs. Robey and Co., 8 Electrical Launches, 131

Electricity, Modern Views of, Dr. Oliver Lodge, 367

Electrical Tramways and Railways, 541 Electro-deposition of Alloys, 233 Electro-motive and Electric Launch, The Elieson,

ways,

Engine, Compound Mill, 1000-H.P., Messrs. Buckley and Taylor, 507

Engine, Compound Portable, Messrs. J. and H. McLaren, 147

Engine, Compound Traction, Mr. E. Foden, 43,46 Engine, Compound Vertical, Messrs. Wallis and Steevens, 472

Engine Economies, Steam, 78 Engine, Explosion of a Portable, 316 Engine, Express, L. and S.W. Railway, 108 Engine, Express, Midland Railway, 517 Engine, The de Glehn, 235

Engine, High-speed Compound Vertical, Messrs.

Davey, Paxman, and Co., 473 Engine, High-speed Vertical, Messrs. Hornsby and Sons, 473

Engine, Passenger, Lancashire and Yorkshire Railway, 174, 179

Engine, Passenger, L. and S.W. Railway (Supplement November 4dh, 1887), 370 Engine, Prize Compound, Messrs. Davey, Pax man, and Co., 63

Engine, The Steam, Prof. Ryan on the, 514 Engine Trials, The Newcastle, 42, 48, 63, 78,105, 106, 147, 172

Engine Turntables—Indian State Railways, 347,

Engine, Vertical, Messrs. Robey and Co., 472 Engine, The “Viator” Vertical, Messrs. Jeffery d Blackstone, 268 Esk Paper Mills, The, 117 Essex Vertical Boiler, The, 469 Engineering and Applied Science Department of King’s College, London, 526 Engineering Education, University College, Bristol, 176

Engineering Laboratories, The Use and Equipment of, 277

Engineering Students’ Club, Newcastle-on-Tyne, 360

Engineering Trade Prospects, 114 Engineering Trades, 80 Engines of the “ Bencroy,” 308, 309 Engines, Compound, 50, 54, 55, 542 Engines, Compound, Electric Light Installation at Olympia, 131, 132

Engines, Compound High Speed Launch, 125 Engines, Differential Pumping, Umaria Colliery, 149, 151

Engines of the “ Dogali,” 109, 112, 116 Engines, Export of Steam, 518 Engines, Multi-cylinder, 75 Engines, Portable, at Tansa Waterworks, 107 Engines, Pumping, Indian State Railways— Umaria Colliery, 149, 151 Engines of the Spanish Cruiser, “ ReinaRegente,” Messrs. J. and G. Thompson, 431 Engines, Steam, at the Royal Agricultural Society’s Newcastle Show, 510 Engines, Triple Expansion, 29 Engines, Triple Expansion, for German Mail Steamers, 452, 454

Engines, Triple Expansion, s.s. “Worcester” and “

Engines, Triple Expansion, s.s. “Worcester” and “ Oxford,” 89

Engines, Triple Expansion Marine, Messrs. A. Shanks and Sons, 178

English and Continental Railway Traffic Charges, 478

English Foot v. tlie Metre, The, 440, 449

FASTEST Cruiser in the World, 309 Feathering Paddle Wheels, 172, 193, 232, 471, 494 Featherstone, West Riding, Water Supply of, 147 Feed-water Heater, Maclaine’s, 265 Feed-water Heater, Mr. John Kirkaldy, 7 Fender’s Endless Railway, 451 Fens and Lowlands, Drainage of—See Drainage Ferry Steamer Running Both Ways, 175 Field Electric Locomotive, The, 450 Filter, A Large, Messrs. Slack and Brownlow’, 331 Finsbury Technical College, 71 Fires in Theatres, 287, 307, 355 Fishing, An Easy Way of, 330 Floating Dock for Cardiff, Messrs. Clark and Stand field, 8

Flour, Export of, from the United States, 18 Flour Mill, the Laubardemont, 50, 55, 72 Flow Sheet of Mr. Harrison Carter’s System, First, 405

Flow of Water, The, 518

Flow of Water in Pipes and Open Channels, A New Formula for the, Mr. Edgar C. Thrupp, 499

Fly Ropes, 479

Fog and Safety Signal Apparatus, Messrs. Kempe and Rowell, 57

Fog and Smoke, Sir Douglas Galton on, 490 Foreign Competition, 293, 306, 348 Foreign Ships and British Trade, 52 Foreign Torpedo Boats, 440 Forth Bridge, The, 71

Forth Bridge, the Erection of the, Mr. Andrew S. Biggart, 438

Forth Bridge, Erection of the, Sir John Fowler and Mr. B. Baker, 434 Forth Bridge, A Main Cantilever Pier, 438 Forth Bridge, Rivetting Cage, 439 Forth Bridge Works, The, 116 Foundations, Mr. Henry Adams, 310 Foundry Ladle, Messrs. Goodwin and Howe, 5. Fraud, A, 419, 440

Free Trade and No Trade, 306, 338, 339, 348, 371, 419, 439, 449, 471, 495, 518, 535 French in Japan, The, 240 French Shipbuilding and Shipping, 255 Friction in Toothed Gearing, 499 Fuel, Liquid, 419 Fuel, Value of Natural Gas, 278 Furnaces commonly called Destructors, some Defects in, 471

Furnaces commonly known as Destructors, some Defects in, 495 Fusible Plugs, Williams’, 513

HALL, Mr. W., 131 Halle, Sewage Works of, 159 Hammer, Radial Arm Steam, 54 Hammers, Radial Steam, 271 Hangchow-, Fire Engine at, 261 Hangleton Bridge, Brighton and Dyke Railway, 228

Harbour Improvements at Melbourne, Australia,

Harlem River Bridge, New York, Sinking Foundation for New, 183

Harrison’s Scouring Dredger for Fen Drains and Rivers, 359

Haslar, New Experimental Tank at, 130 Heat and Work, Mr. W. T. Coates, 474 Heating Gas, 410

Heisler Incandescent Light, The, 309 Henley-on-Thames Sewage Works Machinery, 348 Henley-on-Thames, Sewerage of, 325 H.M.S. “Trafalgar,” 123 Herreshoff Yacht, “Now Then,” The, 227 Herreshoff Yacht, A 28-Knot, 101 Hetherington and Co.’s Machine Tool Works, 544 Hetherington and Sons’ Spinning Machinery Works, 238

Hexthorpe Accident, The, 245, 440

Hexthorpe Collision, The, 273, 286, 307, 338, 413

Hoists and Lifts, 215

Holyhead Steamers, 11

Horse and Field Artillery Guns, 324

Horwich and Rivington, 246, 248, 249

Hotchkiss Guns, The, 159

Hot Water Cylinder Jacket, 314

Hull and Barnsley Railway, The, 356

Hunt, Mr. Robert, 335

Hydraulic Baling Machinery, Messrs. John Birch and Co., 15

Hydraulic Lifts, Jottings on, Mr. Suggate, 240 Hydraulic Pipe Testing Apparatus, The Glenfield Company, 277

Hydraulic Pressure, Application of, to Gunnery,

IBBOTSON’S Lock Nuts and Fish Bolts, 193 Ice-making Machine, Hand, Fleuss’ Patent, 34 Ignition of Mine Gases and Coal Dust, Experiments on the, 150 India, The Native Army in, 61 Indian Coal and its Storage, 313 Indian Midland Railway, Transship Vans, 429 Indian State Railways, Compound Vertical Engine, 194, 198, 207, 230, 232

Indian State Railways, Pumping Engines, Umaria Colliery, 149, 151

Indian State Railways, Underframes and Covered Wagons for, 3

Indian State Railways, Water Cranes for the, 288, 290

Injectors for Portable Engines, 78 Institute, City and Guilds of London, 192 School of Art Wood Carving, 295 Institute of Great Britain, The Sanitary :

Programme of the Autumn Meeting, 1887, 240 Institute, The Iron and Steel, 95, 240, 462 Inaugural Address of the President, Mr. Daniel Adamson, 228

Basic Open Hearth Process, Mr. J. Wailes, 258 Electric Lighting in Works and Factories, Prof. J. A. Fleming, 259

Notes on the Reduction of Iron Ore in the Blast Furnace, Mr. Lowthian Bell, 258 Programme of the Autumn Meeting, 240 Institute Mining and Mechanical Engineers :

Visit to Newcastle-on-Tyne, 90 Institution, Birkbeck Literary and Scientific :

Conference of Teachers on the Technical Education Bill, 287

Prospectus for the Sixty-Fifth Session, 286 Institution of Civil Engineers, The, 31, 149 List of Papers to be Read during the Winter Season, 381

Magnesia, a Substitute for Plaster of Paris, D. Frank, 317

Permanent Way for the Belgian State Railways, 301

Presidential Address, Mr. George R. Bruce, 391, 418

Sewage Works of Wiesbaden, 321 Upsetting of a Railway Train by Wind, 203 Visit to Messrs. J. and E. Wright’s Wire and Hemp Rope Works, 277 Water Supply of Birmingham, 180 Institution of Civil Engineers—Association of Birmingham Students, 508 Institution of Civil Engineers, Ireland : Electrical Tramways : the Bessbrook and Newry Tramway, Mr. Edward Hopkinson, 490 Enlargement of the Westland-row Terminus, with a Sketch of the Early History of the Dublin and Kingstown Railway, Mr. T. B. Grierson, 125

Institution of Engineers and Shipbuilders— North-east Coast :

Reaction and Efficiency of the Screw Propeller, On the, Mr. A. Blechynden, 1 Institution of Mechanical Engineers, 79 Description of the New Tay Viaduct, by Mr.

Fletcher F. S. Kelsey, 198 Dredging of the Lower Estuary of the Clyde, Mr. C. A. Stevenson, 139 Experiments on the Distribution of Heat in a Stationary Steam Engine, Major Thomas English, 16

Visit to the Carron Ironworks, 116 Visit to the Edinburgh Waterworks, 117 Visit to the Esk Paper Mills, Penicuick, 117 Visit to the Forth Bridge Works, 116 Visit to the Valleyfield Paper Mills, Penicuik, 118

Institution of Naval Architects, 66 Application of Hydraulic Pressure to Gunnery, Lord Armstrong and Mr. J. Vavasseur, 96 Present Position of Basic Steel as a Material for Shipbuilding, Mr. B. Martell, 96 Recent Developments in Marine Engineering, Mr. F. C. Marshal], 96

Recent Experiments with Basic Steel, Mr. W. H. White, 96

Instruction of Engineer Officers in the Navy in Hydraulic Gun Machinery, 31 Insurance Value of Steamships, The, 176

JEROME’S Metallic Packing, 289, 290 John, Mr., of the Barrow Shipbuilding Company, his “ Armoured Battle Ship,” 138 Joist Sawing Machine, 545 Jubilee, The Business Side of the, 13 Jubilee Calamity, A, 377

KENT’S Uniform Water Meter, 450, 451 Kerosene Oil in Steam Boilers, Use of, 499 Khyber Railway, The, 52 Kirch off, Prof., 328 Kirkaldy, Mr. John, 150

Kirkaldy’s Messrs., Reports on the Steam Pipe of the “Elbe,” 331 Kout’s Car-stove Cremation, The, 363 Krupp, Herr Alfred, and his Work as a Cast Steel Manufacturer, 74 85, 104, 123

LABOUR Market, Food Supply, and Population, 534

Lade Bank, Lincolnshire, Engine and Pump, 103 Lake Haarlem, Pumps, 323

Lancashire Annexe in the Melbourne Exhibition, 1888, 226

Lancashire and Cheshire Institutes, Union of, 390 Lancashire and Yorkshire Railway Shops at Horwich, 246, 248, 249

Lathe, Surfacing and Taper Turning, Messrs. Hulse and Co., 469

Laubardemont Flour Mill, The, Messrs. T. Powell and Company, 50, 55, 72 Launches and Trial Trips, 60, 95, 120, 140. 182, 219, 242, 298, 339, 362, 381, 410, 462, 482, 518 Launching Lifeboats, 534 Lead Mines and Lead, 478 Lead Pipes, Corrosion of, 101 Lead Shot and Tin Canister Machinery, 175 Leaders :—

Address of the President of the Institution of Civil Engineers, 393

Advanced Prices for Continental Girders in England, 95

Aerostation and Aeronautics, 196 Agricultural Engineers’ Association, The, 497 Air Brakes in the United States, 197 American Shipbuilding, 156 Armour and Projectiles, 357 Army Tools, 314

Association of Electrical Engineers, 335 Awards at Exhibitions, 295 Belgium Coal Industry in 1886, 498 Berlin Screw Industry, The, 74 Blast Pipes, 11

Boiler Explosion Act of 1882, The, 333 “Boycotting” and Railways, 414 Brakes on Freight Trains, 395 Brewing Trades Exhibition, The, 375 British Association, The, 215 British Industries and Technical Education, 313 British Manufacturers and Consular Reports, 436

British Workman in Foreign Countries, The, 334

Calorific Value of Coal, The, 333, 394

Canadian Iron and Steel Duties, The New, 177

Canadian Tariff, The, 32

Canal connecting Two Seas, A, 32

“Carbonit,” The New Explosive, 255

Clark Process for Bristol, The, 12

Close of the Bolton Strike, 374

Clyde Shipbuilding for August, 216

Clyde Shipbuilding for July, 134

Clyde Shipbuilding Trades, 294

Coalminers and Restriction, 436

Coal in South Africa, 478

Coins, The New, 13

Colonial Land Sales and Public Works, 113 Compound Engines, 542 Compound Locomotives in France, 235 Copper and its Price, 394 Dairy Show, The, 156 Defence of Colonial Harbours, The, 31 Depression of Trade and Foreign Competition, 357

Dock Accommodation in the East, 414 Domestic Cooking Apparatus, 134 Dronfield—An Unfortunate Town, 135 Durability of Iron and Steel Ships, The, 156 Effect of Recent Experiments on our Shot and Armour, 73

Electric Lighting and Inertia, 498 Electrical Tramways and Railways, 541 Emigration of Capital, The, 455 Engineering Education, University College, Bristol, 176

Engineering Enquiry into the Lower Thames Drought, 456

Engineering Trade Prospects, 114

English and Continental Railway Traffic Charges,

133

Leaders (continued):—

English and French Railway Competition in the East, 294

English Ironstone and Spanish Ore, 236

Exeter Disaster, The, 216

Experimental Machinery, 51

Extension of the Mersey Railway, 543

Eyemouth Harbour, The, 13

Faulty Sword Bayonets and Sir John Adye, 274

Fires in Theatres, 355

Foreign Competition, 293

Foreign Ships and British Trade, 52

French Shipbuilding and Shipping, 255

Gas Lighting, The Invention of, 216

Gas, A Sensational Story about, 114

Gas Supply, 11

German Competition with British Shipping, 196 German Imitation of Trade Marks, 295 Glehn’s Engine, M. de, 235 Goods and Passengers on Railways, 197 Harbour Improvements at Melbourne, Australia,

Hexthorpe Collision, The, 273, 413 Hindrance to Irrigation Work, 437 Hot-water Cylinder Jackets, 314 Hull and Barnsley Railway, The, 356 Improvement in Iron and Steel, The, 498 Improvement in the Iron Trade, 456 Indian Coal and its Storage, 313 Instruction of Engineer Officers in the Navy in Hydraulic Gun Machinery, 31 Insurance Value of Steamships, The, 176 Ironfounders and Steel Castings, 520 Iron and Steel Imports, 414 Iron Trade Association Boards, 156 Jubilee, The Business Side of the, 13 Lead Mines and Lead, 478 Leviathans of the Deep, 295 Local Government and Public Works, 215 Lord Carnarvon on Imperial Defence, 236 Loss of Merchant Shipping, The, 543 Machinery for the East, 155 Maligakanda Reservoir, The, 51, 542 Manchester Meeting of the Iron and Steel Institute, 253

Marine Boilers, The Management of, 155 Marine Engines from the Shipowner’s Point of View, 175

Midland Railway, The, 134 Mining Bill, A Year’s, 197 Mining in East Scotland, 216 Naval Review, The, 93

Newberry-Vautin Gold Extraction Process, The, 273

New Water Scheme for Halifax, A, 543 Nordenfelt, The, 519 North-east Coast Engineers, 334 Novel Railway Accident, A, 13 Official Enquiry into the East London Water Supply, 235

Opening for British Trade at Canton, 395

Our Coal Production, 498

Our Colonies and their Railways, 455

Our Merchant Fleet’s Change, 334

Panama Canal, The, 73, 156

Parkes’ Smelting Process, The, 543

Perpetual Motion in Disguise, 254

Petroleum Refuse as a Fuel, 176

Petroleum Trade of the Black Sea, 357

Piece-work and Technical Education, 436

Ports and Steamships, 74

Practice of Pig Iron Manufacture, The, 520

Preston Docks, 255

Preston Docks Scheme, The, 274, 373

Priming, 32

Profits in Gas Production, 314 Public Works Department of India, 394 Pumping Engines at Work in Staffordshire, 295 Railway Dividends, 95 Railway Enterprise in Turkey, 175 Railway Half-year, The, 520 Railway Mismanagement in New South Wales, 216

Railway Rates and Charges, 437 Railway Working, 114 Railways in India, 478 Reduction in the Price of Gas, 374 Registration of Workmen, The, 114 Reports on the New Croton Aqueduct, 357 Restriction in the Coal Trade, 295 Revival in Clydo Shipbuilding Trade, 374 Richmond Main Drainage Board, Tho, 197 Roads in the Colonies, 414 Roath Dock, Cardiff, Opening of the, 197 Russian Iron Trade, The, 94 Sanding Locomotives, 357

Sanitary Registration of Buildings Bill, The, 52 Sanitary Registration of Buildings—The Society of Civil and Mechanical Engineers, 94 Sanitary Surveyors and Inspectors of Nuisances, 435

Saving Life at Sea, 195 Softening Water by the Clark Process, 334 Spanish Ore and British Steamships, 456 Spanning the Doe, 177

Staffordshire Colliery Owners and Pumping Operations, 357 Standard of Light, The,

Steam Engine Economies, 12 Steamship Freights and the Iron Trade, 374 Steamship Power, Our, 32 Steam Tramway Locomotives, 355 Steel Trade, Activity in the, 74 Structural Stiffness, 497 Successful Railway Legislation, 519 Technical Education, 393 Technical Instruction, 94, 133 Thames at Richmond, The, 177 Thames, The State of the, 113 Trade Competition and Education, 253 Trial of New Italian-made Steam Plates, 498 United States Navy, The, 477, 541 Vacuum Brake, Another Failure of a, 275 Village Sanitation, 293 W. A. Scholten Disaster, The, 435 War-office Organisation, 113 Water-tube Boilers, 294, 356 Yorkshire College, Leeds, The, 255 Lees and Co., Messrs. Asa, Cotton Preparing and Spinning Machinery, 336, 340 Legal Intelligence :

Albo-Carbon Light Company v. J. Kidd and Co., 410

Bristol Tramways Company (Limited)*’. Grindell and Kent, 543 Challender v. Boyle, 86 Ellington v. Clark, Bunnett, and Co., 514 Haslam Foundry Company v. Hall and Another, 219, 410, 446, 470 Proctor v, Bennis and others, 160

Leicester Snow Ploughs, 517 Letters to the Editor :

Accidents on Tramways, H. Conradi, 193, 213 Aerostation and Aeronautics, Eduardo Claudio, 440

American Locomotives in Australia, C., 173 American Locomotives in Australia, A Colonial Locomotive Superintendent, 153 American Transit Theodolites, J. M. F., 435 Anchor Tests, Justicia, 348 Artificial Ivory, E. A. G., 51 Automatic Boiler Feeders, J. J. B., 273 Axle Boxes, II. Kenneth Austin, 287 Band Saws, The Author of “ Sawmills,” 495 Band Saws, R. F. Drury, 518 Band Saws, J. H., 477

Bearings for High-speed Engines, Marine Engineer, 413

Bearings for High-speed Engines. Steam Launch, 373

Belted Cruisers, J. A., 419 Bevel Wheel Cutting, Engineer, 413 Boiler Registry and Inspection Bill, M. Powis Bale, 212

Boring Machinery, Selbats, 31 Bostwick’s Folding Gates, Yankee, 271 Brakes on the London and North-Western Railway, Kpni)?, 162 Broken Propellor Shafts, China, 339 Button-making Machinery, C. S. M., 519 Calorific Value of Fuel, Anthony J. Bower, 370, 440

Calorific Value of Coal, Alfred Chatterton, 459 Calorific Value of Fuel, Bryan Donkin, jun., 440 Calorific Value of Coal, John Goodman, 370 Calorific Value of Coal, Practical, 459 Caustic Soda ? Atlas, 455 Cement for Ships, E. C. S., 4 Comparative Tensile Strength of Electrolytic and Ordinary Copper, Alexander Watt, 471 Chain-making and Testing Machinery? F. S. and Co., 355

Circumlocution at the Patent-office, C. E., 270 Clark Process, The, J. W. Gray and Son, 107, 172, 348

Clark Process, The, Andrew Howatson, 86 Clark Process, The, C. J., 87 Clark Process, The, J. Alfred Wanklyn, 86 Clark Process for London, The, W. J. Cooper, 78 Colonial Defence, Robert A. E. Scott, 232,270,386 Commercial Education in Relation to Foreign Competition, W. A. S. B., 270 Commercial Education in Relation to Foreign Competition, U., 270

Commercial and Utilitarian v. International Views, H. A. T. S., 162 Competition in the Home Trade, X. M., 172 Complete Protection of Iron and Steel Ships’ Bottoms against Rust, Holzapfel and Co., 306 Compressed Lime Cartridges, A. H. F., 519 Compressed Yeast? H. G. B., 113 Continuous Brakes, John E. Hopkinson, 162 Continuous Brakes, Clement E. Stretton, 386 Contraction of Concrete ? A. C. G., 413 Constructive Ironwork in a New Theatre, On the, John S. de Jongh, 470 Continuous Brakes, G. Mitchell, 419 Continuous Brake, Clement E. Stretton, 348 Copper at High Temperatures, Leslie S. Robin son, 535

Cream Separator Trials ? Freeth and Pocock, 355 Croydon Waterworks, Thos. Walker, 162 Curious Explosion, A, Chas. Fredk. Fuller, 193 Defective Bridge, A, Inquirer, 348, 386 Defective Bridge, A, Wilfrid Stokes, 371 Depression of Trade, Foreign Competition and Technical Instruction, C., 448 Domestic Cooking Apparatus, D. J. Russell Duncan, 286

Domestic Drainage, W. Silver Hall, 18 Draughtsmen’s Provident Society, John Brindley, 440

Draughtsmen’s Provident Society, The, W. A. Chambers, 495

Draughtsmen’s Provident Society, The, G. A. T. Middleton, 470

Draughtsmen’s Salaries? W. R., 273 Drying Gelatinous and Pasty Substances? A. D., 435

Early Roller Milling, J. Harrison Carter, 87 Edison’s New Electrical Generator, Volt, 271 Education of Engineers, E. H. B., 162 Education of Engineers, Slow Coach, 4, 78 Education of Engineers, The G. G., 87 Education of Engineers, Via Media, 56 Efficient Accumulator, An, W. T. de L. Roberts, 212

“Elbe’s” Steam Pipe, The, Oswald, Mordaunt, and Co, 348

Election of Water Engineer of Nottingham, Arnold Wym, 339

Electrical Launches, A. B. Frenzel, 131 Electro-Disposition of Alloys, Alexander Watt, 233

English and American Locomotives, J. D., 339 English Foot v. the Metre, The, G. E. Child, 440 English and Foreign Locomotives and Bridges, England, 56

Export of Steam Engines, R. Marshall, 518 Explosion on Board the s.s. “Elbe,” J. P. Williams, 535

Feathering Paddle Wheels, M. E., 193 Feathering Paddle Wheels, A. G. Greenhill, 172, 471

Feathering Paddle Wheels, R. Hartland, 232, 494

Ferry Steamer Running Both Ways, An Advocate for Double-ended Ferry Boats, 175 Fires in Theatres, Bob, 287 Fires in Theatres, E. H., 307 Flanging Steel Plates ? Ferrum, 477 Flow of Water, The, D. L., 518 Foot v. Metre, Saddleton Frank Sainty, 449 Foreign Competition, E. Gobert, 306 Foreign Competition, Richard Kerr Miller, 348 Foreign Torpedo Boats, Bolling and Lowe, 440 Fraud, A, Exporters, 419 Fraud, A. E. Schroiter, 440 Free Trade and No Trade, W. A. S. B., 449 Free Trade and No Trade, John Brett, 371, 439, 470

Free Trade and No Trade, International Cooperation, 518

Free Trade and No Trade, Wm. Muir, 339, 371, 439

Free Trade and No Trade, Protectionist, 348 Free Trade and No Trade, G. Fredk. Ransome, 419, 535

Free Trade and No Trade, Slow Goach, 338 Free Trade and No Trade, Roger T. Smith, 495

Letters to the Editor (continued):—

Free Trade and No Trade, A Sufferer, 449 Free Trade and No Trade, Trader, 306, 449 From New York to Liverpool in a Cattle Ship, R. S. Edwards, 286 Furnace Boilers, F. B., 213 Furnace Boilers, F. Botting, 233 Furnace Boilers, Furnace Builder, 233 Gas v. Steam Engines, H. E. C., 535 Generation of Steam, H. Leupold, 271 German Cycles, Hon. Life Director of an English Chamber of Commerce, 348 Glasgow International Exhibition, 1888, Arrol Bros., 435

Guide for Forging Iron and Steel? J. A., 355 Gunpowder as a Boiler Cleaner, J. W. Smith, 56 Hand Power Mills ? E. J. B., 235 Henley-on-Thames, Sewage Works Machinery, Pratchitt Bros., 348

Hexthorpe Collision, The, Westinghouse Brake Co., 286

Hexthorpe Collision, The, F. Gobert, 338 Hexthorpe Collision, The, John E. Hopkinson, 307

Hexthorpe Collision, The, Clement E. Stretton, 286, 307, 338

High and Low Locomotives, Fred. A. Field, 470 High Pressure Marine Boilers, Boiler, 29 High Pressure Marine Boilers, H. P. Fenby, 4 Hinged Davits 1 W. K., 235 Hoists and Lifts, Scrutator? 215 Holyhead Steamers, Paddle? 11 Ibbotson’s Lock-nuts and Fish-bolts, Ibbotson Bros, and Co., 193 Ice Crushing Machines? J. C., 455 Injectors for Portable Engines, Geo. F. Hooper, 78

Invention of the Circular Saw, John Place, 371 Invitations for Tenders, Contractors, 271 Inventor of the Circular Saw, M. Powis Bale, 339

Labour Market, Food Supply, and Population, Indicator, 534

Latent Heat of Steam, Latent Heat, 495 Launching Lifeboats, J. W., 534 Lead Shot and Tin Canister Machinery, K., 175 Liquid Fuel, Balance, 419 Locomotive Blast Pipes, Boiler, 56 Locomotive and Elastic Oscillation, Robert II. Graham, 494

Locomotive Engine Blast, Boiler, 161 London and North-Western Railway Brake, The, H. C. W. Borrie, 131 Long Struts? H. W. G., 175 Machinery for Cutting Isinglass ? II. 0. E., 273 Machines for Extracting Glucose ? S. S., 195 Management of Marine Boilers, The, J. W. R.,

Marine Engine Bearings, J. II. K., 193 Masouta ? G. B. Froom, 477 Masouta ? Influx, 413

Match-box and Match-making Machinery ? Ulzella, 435

Mersey Bar, The, Joseph Boult, 287 Modern Milling Machinery, J. A. Arnold Buch-holz, 4

Modern Milling Machinery, A. M. Robinson, 29

Modern Milling Machinery, The Writer of the

Monitors and Turret Ships, G. W. Cobb, 131,

172

Monitors and Turret Ships, U. S. N., 153 Moorgate-street Station, Roof, Pessimist, 271 Multi-cylinder Engines, M. E., 153 Multi-cylinder Engines and Monitors v. Turret Ships, Slow Coach, 213

Newcastle Engine Trials, The, Thos. Cooper, 78 Newcastle Engine Trials, The, An Ex-portable Engine Builder, 106

Newcastle Engine Trials, The, E. Hall-Brown, 172

Newton’s Third Law of Motion, Eduardo Claudio, 29

Non-conducting Silicate Cotton? T. G. and C., 175

Patent Cut Steel Nails ? E. Davies, 273 Patent-office Library, Wm. Spence, 286 Pearl Button Makers ? D. J., 133 Pipe Cores, A Constant Subscriber, 175 Portland Cement Concrete, A Portland Cement Manufacturer, 87

Portland Cement Concrete, F. E. Duckham, 78 Preston Dock Scheme, The, Benjamin Sykes, 287

Preston Docks, Nemo, 307 Preston Docks, The, River Ribble from Preston to the Irish Sea, G. Henry Roberts, 439 Preston and the River Ribble Navigation Works, G. Henry Roberts, 270

Preston and the River Ribble Navigation Works, Benjamin Sykes, 270 Problem of Flight, The, I. Lancaster, 56 Problem in Strains, A, W. A. S. B., 193, 339 Problem in Strains, A, John Batey, 193, 271 Problem in Strains, R. Hartland 193, 233, 271, 287

Problem in Strains, A, T. N. M., 212 Problem in Strains, A, T. E. N., 193 Problem in Strains, C. G. Major, 271 Problem in Strains, C. S., 233 Problem in Strains, A, D. S. Sinclair, 193 Problem in Strains, J. Trevor, 271 Problem in Strains, A, X., 153 Problem in Strains, A, Zit, 247 Professor Mendeleef’s Balloon Ascent, W. Anderson, 212

Provident Fund for Draughtsmen, A. Edgar Farman, G. A. T. Middleton, 371 Pulp Boilers ? A., 113 Quantity of Coke from Coal, Foreman, 56 Radial Steam Hammers, Jas. Bennie and Co., 271

Rail Joints, A. M. Clark, 78 Rail Joints, Baldwin Latham, 107 Rail Joints, S., 107 Railway Brakes, G. Mitchell, 371 Re Test of Stone Breakers, S. Mason and Co., 338

Relative Strength of Screw Threads, R. Hart-land, 270

Relative Strength of Screw Threads, The, Inquirer, 233

Relative Strength of Screw Threads, N. D. Y., 270

Riachuelo Bridge, The, W. C. Kernot, 4 Ribble Docks and Estuary, The, J. B., 247 Ribble Scheme, The, G. E. Child, 419 Ribble Scheme, The, Engineer, 348 Ribble Scheme, The, W. C. Hankinson, 386

Letters to the Editor (continued); llibble Scheme, The, James Hibbert, 386 Kibble Scheme, The, A Prestonian, 386 Roller Milling, W. A. S. B., 131 Roller Milling Machinery, One Who Knows, 56 Royal Agricultural Society’s Trials of Brakes Jas. Atkinson, 495

Royal Agricultural Society’s Trials of Brakes, Wilson Hartnell, 494

Royal Agricultural Society’s Trials of Brakes, J. and H. McLaren, 495 R.A.S.E., Engine Trials, J., 470 R.A.S.E., Engine Trials, L. St. Lawrence, 470 R.A.S.E., Steam Engine Trials, J. and H. McLaren, 460

R.A.S.E’s Steam Engine Trials, The, R., 518 R.A.S.E., Steam Engine Trials, R. A. S., 470, 518, 535

Safety Match Making Machinery? A. G., 195 Sanitary Registration of Buildings Bill, Reginald E. Middleton, 86 Sanitary Surveyors, N. B., 449 Sawing Grindstones? R. P. and S., 11 Sea-Water and Cement, Henry Faija, 494 Self-Righting Boats, J. W., 87 Shape of Chimneys, The, An Outsider, 175 Sheet Brass with Diagonal Indentations? J. C. and Co., 293

Ship Canal from Woolwich to Newhaven, W. H. Thomas, 270

Ships’ Boats, E. L. Berthon, 87 Sir Wm. Thomson’s Recent Lecture and the Lundborg Design, E. H. Parker, 172 Skidding Railway Wheels, Effect of, John Place, 233

Skidding Railway Wheels, Effect of, Clement E. Stretton, 233

Softening Water, John H. Porter, 370 Softening Feed Water, B. Donkin and Co., 131 Softening Feed Water, Gimson and Co., 131 Softening Feed Water, J. W. Kennard, 131 Some Defects in Furnaces commonly called Destructors, A.M.I.C.E., 471 Some Defects in Furnaces commonly known as Destructors, Another A.M.I.C.E., 495 Southwark Tramways, William D. Gooch, 107 Specimens of Steel Scale Produced by the Skidding of Railway Wheels, C. P. F., 271 Specimens of Steel Scale Produced by the Skidding of Railway Wheels, R. Hartland, 271 Standard Gauges for Brass Unions to Hose, Tubal-Kain, 494

Standard Gauges for Hose Coupling Screws, Hayward Tyler and Co., 440 Steam Engine Economies, H. Leupold, 78 Steam Engine Economies, Chas. Whitfield, 78 Strength of Chilled Plate Rolls, R. T. C., 270 Strains in the Legs of Cross-legged Stools, R. W. M. M., 212

Stresses in a Camp Stool, B. C., 173 Stresses in a Camp Stool, W. A. S. B., 193 Stresses in a Camp Stool, John Batey, 193, 271 Stresses in a Camp Stool, D., 212, 213 Stresses in a Camp Stool, Common Mechanical Engineer, 131

Stresses in a Camp Stool, R. Hartland, 161, 233, 287

Stresses in a Camp Stool, B. J. Hall, 107 Stresses in a Camp Stool, E. K., 107 Stresses in a Camp Stool, R. W. M. M., 107 Stresses in a Camp Stool, T. E. N., 161 Stresses in a Camp Stool, C. E. S., 173 Stresses in a Camp Stool, Scrutator, 131 Stresses in a Camp Stool, E. J. Wilson, 173 Stresses in the Iowa Bridge, J. H. Cunningham, 172

Stresses in the Iowa Bridge, The, Robt. H. Graham, 153, 193

Stresses in the Legs of a Cross-legged Stool ? Puzzled, 93

Stresses in Rolling Mills, R. T. C , 73 Stresses in Tension Rods, L., 307 Technical Education, Expert, 339 Technical Education, H. J., 87 Technical Education in its Bearing on Foreign Competition, C., 247

Technical Education and Foreign Competition, Gaffer, 439

Technical Education and Foreign Competition,

U., 534

Technical Instruction, W. A. S. B., 107, 162 Technical Instruction, C., 106 Technical Instruction, An Engineer, 162 Telegraphy and Lightships, T. Bradshaw, 172 Test of Stone Breakers, S. Mason and Son, 287 Theoretic Diagrams, J. Jennings Campbell, 18 Theoretic Diagrams, Thomas Mudd, 56 Theory of the Steam Engine, Technical Unit, 173

Theory of Struts, The, T. Claxton Fidler, 347 Tidal Estuaries and Bar of the Mersey, Joseph Boult, 418, 518, 535

Tidal Estuaries and the Bar of the Mersey,

A. F. Fowler, 418

Tidal Estuaries and the Bar of the Mersey, C. P. J., 459

Tidal Estuaries and Bar of the Mersey, J. W., 535

Tinning Gun-metal ? Fortis, 11 Torpedo Boat Boilers, M. A., 29 Torpedo Boat Casualties, J. A., 4 Torpedo Boat Casualties, John Donaldson, 4 Torpedo Boat Casualties, W. A. Martin, 4 Torpedo Boat Casualties, Wm. Thompson, 78 Town Refuse Crematories ? Subscriber, 51 Trial of Stone Breakers, W. H. Baxter and Co., 307

Trial of Stone Breakers, Pp. Lancashire Patent Belting and Hose Company, S. J. McMeehan,

Trial of Stone Breakers, H. J. McMeehan, 307 Triple Expansion Engines, Robt. S. Lawrence, 29 Water Softening, J. W. Gray and Son, 386,448 Water Softening, Andrew Howatson, 153, 348, 386, 448

Water Softening, John H. Porter, 439, 448 Water Softening, The Stanhope Company, Limited, 439

Water Softening, The Clark Process, A. B. C., 371

Water Softening, The Clark Process, The Stanhope Company, Limited, John S. Sawrey, 371 Water-tube Boilers, T. W. Baker, 338, 419 Water-tube Boilers, Conrad Knap, 338, 370 WTelding and Tempering Cast Steel ? N. W., 293 Working \YTomen, their Present, their Future, Walter Besant, 87

“Lever” Dynamo and Arc Lamp, The, 329 Leviathans of the Deep, 295 Lifeboat Service, The, 391

9 Si

w iiiiriii mu fp w m iifyim if { mm%i is mnmi

-°g    SS>|s 8 & ® S* g Is    mooted *,2 o3oP g.g'glfg.-⁶ $2.°°$    Vs*

£ fcif    *$*fi    11    i    r»    %    $    sb    mini*!    i.«os    i% i    f    t s n m

n    n    Sr    '    r    &    fi    iplUh    f *    f    i I ®r -1

.³    *8 ³    I |    ⁸ M % I i K*ss£? 11 l I “3

r a-³    •’*1°*    r    SS    *    *    I    i'J    S-Sf    s -    b-|8    *8    i K    I    § 3

■ "    i    V    11    18*    H    I    I    I!    I    I!

Ox b-t CO Ox

O o

3

c3

548

Railway Dividends, 95 Railway Enterprise in Turkey, 175 Railway Extension in Ceylon, 204 Railway Half-Year, The, 520 Railway Legislation, Successful, 519 Railway Materials for Italy, 504 Railway Matters, 9, 25, 49, 67, 91, 111, 126,153, 169, 189, 209, 229, 251, 267, 291, 311, 327, 349, 378, 387, 411, 433, 453, 475, 491, 515, 539 Railway Mismanagement in New South Wales, 216, 264, 345

Railway Rates and Charges, 437 Railway System of South Africa, The, 391 Railway Work in New Zealand, 192 Railway Working, 114 Railways in India, 478

Railways in India, Mr. R. L. Tapscott, on, 502 Railways in India, New, 506 Railways of Italy, Map of the, 365 Railways and Population, 187 Ravine Bridge, Lowestoft

191

Light for Instantaneous Photographs, Messrs.

Goedicke and Miethe, 131 Lighthouses, Mr. A. K. Brydges, 371 Lightning Tapper, 239 Limpsfield and Oxted Waterworks, 197 Liquid Fuel, 474 Liquid Fuel on the Thames, 395 Literature:

Analysis of the Accounts of Gas Companies and Corporations, 1886, John Allan, Offices of the Gas World, 315

Annali di Agricoltura, 1887, Rivista del Ser-vizio Mincrario nel 1885, 375 Civil Engineers’ Field Book, The, Designed for the Use of the Locating Engineer, by Edward Butts, 357

Civil Engineers’ Pocket Book, The, by John'C. Trautwine, 375

Conversion of English Timber, The London: W. Rider and Son, 357

The Economic Theory of the Location of Railways, by Arthur Mellen Wellington, 414 Exercises on Quantitative Chemical Analysis, with a Short Treatise on Gas Analysis, by W. Dittmar, 395

Des Ingenieurs Taschenbuch, von dem Verein Hiitte, 157

Electrical Distribution by Alternating Currents and Transformers, by Rankin Kennedy, 456 Electricity for Public Schools and Colleges, by W. Larden, 296

Elementary Treatise on the Mathematical Theory of Perfectly Elastic Solids, with a short Account of Viscous Fluids, by W. J. Ibbotson, 13

Factory Accounts: Their Principles and Practice, by Emile Garcke and I. M. Fells, 217 Field Practice of Laying Out Circular Curves for Railroads, The, by John C. Trautwine, 375

Geology of England and Wales, The, by Horace Woodward, 74

Health of Nations, The : Review of the Works of Edwin Chadwick, with a Biographical Dissertation, by Benjamin Richardson, 237 Iron Bridges of Moderate Span : Their Construction and Erection, by Hamilton Weldon Pend red, 395

London Water Supply: An Analysis of the Accounts of the Metropolitan Water Companies, by Alfred Lass, 335 Magneto and Dynamo Electric Machines, with Description of Electric Accumulators : Practical Handbook, Trans, from the German of Glacer de Cew, 177

Matter and Energy: Are these Two Real Things in the Physical Universe, by B. L. L., 74 Metallurgy of Silver, Gold, and Mercury in the United States, The, by T. Egleston, Vol. I., Silver, 395

Modern American Methods of Copper Smelting, by E. D. Peters, jun., 415 Notes and Formulae for Mining Students, by J. H. Merivale, 315

Particulars of the War-ships of the World, extracted from the “ Universal Register” for the Year commenced 1st April, 1887, 32 Practical Engineers’ Handbook, The: Comprising a Treatise on Modern Engines and Boilers, Marine, Locomotive, and Stationary, &c., by W. S. Hutton, 177 Practical Handbook on Pump Construction, by Philip H. Bjoerling, 479 Practical Treatise on Petroleum, by Benjamin J. Crew, 74

Pump Catechism: A Practical Help to Runners, Owners, and Makers of Pumps of any Kind, by Robert Grimshaw, 479 Die Schiffmaschinen, ihre Construction, Wirk-ungsweise, und Bedienung, Ein Hand u Nachschlagebuch fiirlngenieureu.s.w., Bear-beitet von Carl Busley, 197 Theory and Practice of Electro-Deposition, &c., by Dr. G. Gore, 296

Theory and Practice of Surveying, The, by J.

B. Johnson, 114

Treatise on Azimuth, with a Study of the Astronomical Triangle and of the Effect of Errors in the Data, by Joseph Edgar Craig, 456

Treatise upon Cable or Rope Traction as Applied to the Working of Street or other Railways, by J. Bucknall Smith, 357 Treatise on the Integral Calculus, Part I. containing an Elementary Account of Elliptic Integrals and Applications to Plain Curves, by R. A. Roberts, 477

Littleport and Downham Pumping Stations, 103 Local Government and Public Works, 215 Lock-nut and Washer, New, 358 Lock Washer, New, 180

Locomotive, Messrs. Black, Hawthorne, and Co., 6 Locomotive Blast Pipes, 56

Locomotive Boiler Fittings, Messrs. Gresham and Craven, 57

Locomotive Cylinders, The Proportion of, 538 Locomotive and Elastic Oscillation, 494 Locomotive Engine Blast, 161 Locomotive, The Field Electric, 450 Locomotive, Four-coupled Outside Cylinder, London and South-Western Raiiway (Supplement, November 4th, 1887), 370 Locomotive, High-speed Road, 496, 500 Locomotive, London and South-Western Railway, 385, 392, 407, 432, 462

Locomotive, The Ten-wheeled Tank, China Railways, Messrs. Dubs and Co., 410, 412, 493, 498 Locomotives, English and American, 339 Locomotives, High and Low, 470 Locomotives, High and Low, Professor A. G. Greenhill on, 445

Locomotives at the Newcastle Exhibition, 6 Locomotives, Sanding, 357 Locomotives, Steam Tramway, 355 London, Chatham, and Dover Railway Company’s Denial of Report Concerning Cattle Trucks, 249

London and South-Western Railway Locomotive, 385, 392, 407, 432, 462 Long Struts ? 175

Lord Canarvon on Imperial Defence, 236 Loss of Merchant Shipping, The, 543 Lowestoft Ravine Bridge, Mr. B. M. Parkinson, 191

Lowry’s Continuous Action Gyratory Stone Breaker, 521

Lundborg Design, Sir Wm. Thomson’s Lecture and the, 172

Luton Sewage Works, The, 420 Luxemburg, The Iron Industry of, 57

McDOUGALL S Steam Trap, 521 Machine Drawing, Cheap Copies, 499 Machine Tools at the Newcastle Exhibition, 256 Machinery for the East, 155 Machines for Treating Auriferous Materials, Messrs Jordan and Comma ns, 210 McLaren’s Brake, R.A.S.E. Type, 482 McLaren’s, Messrs., Engine Trials, 460, 461, 482 McLaren’s High Speed Road Locomotive, 496, 500 Magnesia, a Substitute for Plaster of Paris, Dr. Frank on, 317

Maligakanda Reservoir, The, 51, 542 Manchester Exhibition : 64, 118 Cotton Machinery at, 75

Locomotive Boiler Fittings, Messrs. Gresham and Craven, 57 Locomotives at, 64, 118

Nut Finishing Machine, Messrs. Dunderdale, Wood and Co., 35 Schiele Ventilating Fan, 171 Manchester Fire Brigade, 317 Manchester Meetingof the Iron and Steel Institute, 253

Manchester Ship Canal, 500 Manchester Ship Canal Commenced, The, 409 Mandril, Expanding Face Plate, 388 Mannheim, New Bridge at, Competitive Designs, 489, 492

Map of the Clyde Estuary, 138 Margate, Dr. Page’s Report on the Sanitary Condition of, 75

Marine Bailers, The Management of, 155 Marine Boilers, Management of, 172 Marine Engine Bearings, 193 Marine Engineering, Recent Developments in, 96 Marine Engines from the Shipowners’ Point of View, 175

Mason’s Lover Cracking Motion Stonebreaker, 328 Mechanical Engineers at Edinburgh and Dundee, With the, 135

Mechanical Equivalent of Heat, Apparatus for Determining, 213 Mediterranean Railway, The, 457 Mediterranean Railway Co.’s Pietrarsa and Granile Works, Naples, 512 Mersey Bar, The, 287

Metallurgical Department of King’s College, The, 247

Mica Mine, A, 232 Midland Railway, The, 134 Midland Railway Express Engine, 517 Mill, The Carter-Turner Three High Roller, 405 Mill, Head’s Improved Blooming or Cogging, 269 Mill and Sieves, Multiple Roller Break, Mr. J. A. Bucholz, 41, 47

Millers’ Convention, Mr. H. Simon’s Paper at the, 36, 58

Milling, Early Roller, 87

Milling Machine, The, a Substitute for the Planer, 499

Milling Machine, Universal, Messrs. Tangye and Co., 396

Milling Machinery, Modern, 4, 29

Milling Machinery, Roller, 56, 87, 131

Milling, Modern—its Birth and Development, Mr.

Gilbert Little, 41 Mills, Hand Power, 235

Miner’s Safety Lamps, Mr. Wm. Wood on, 471 Mining Bill, A Year’s, 197 Mining in East Scotland, 216 Mining Institutions of Great Britain, 124 Miscellanea, 9, 25, 49, 67, 91, 111, 126, 153, 169, 189, 209, 229, 251, 267, 291, 311, 327, 349, 378, 387, 411, 433, 453, 475, 491, 515, 539 Modern Milling—its Birth and Development, by Mr. Gilbert Little, 167, 404 Monitors and Turret Ships, 131,153, 172, 213 Montreal, The Harbour of, 296 Moorgate-street Station Roof, 271 Moseley, Mr. Charles, 296 Motors for Electric Lighting, Trials of, 66 Multi-Cylinder Engines, 153, 213 Mumford’s Marine Engine, 125

NAVAL Docks in China, 307 Naval Engineer Appointments, 20, 52, 69, 126, 183, 243, 278, 328, 359, 375, 396, 420, 452, 479, 511

Naval Engineer Students, 367 Naval Review, The, 93

Newberry-Vautin Gold Extraction Process, The, 273

Newcastle Engine Trials, The, 63, 105, 147 Newcastle Exhibition, The :

Apparatus for the Analysis of the Products of Combustion, Mr. J. E. Stead, 48 Condenser, Double Distilling, Messrs. Rayner, 276

Distiller and Pump, Combined “Compactum,” Mr. John Kirkaldy, 7

Electrical Governor, Messrs. Robey and Co., 8 Engine, Compound, Messrs. Davey, Paxman and Co., 43

Engine, Compound Portable, Messrs. J. and H. McLaren, 147

Engine, Compound Traction, Mr. E. Foden, 43, 46

Engine, Simple, Messrs. Davey, Paxman, and Co., 42

Engine Trials at, 42

Express Engine, London and South-Western Railway, Mr. W. Adams, 108 Feed-water Heater, Mr. John Kirkaldy, 7 Foundry Ladle, Messrs. Goodwin and How, 5 Furnace Mouth Rivetter, Messrs. Tweddell, Platt, and Fielding, 5, 7 Gas Engine, Rollason’s, The Beck Gas Engine Company, 276

Hydraulic Pipe Testing Apparatus, The Glen-field Company, 277 Implement Trials at, 76

Locomotive, Messrs. Black, Hawthorne, and Company, 6 Machine Tools at, 256 Plan of the Implement Yard at, 15 Plate-closing Rivetter, Messrs. Tweddell, Platt, and Fielding, 5, 7

Potato Digger, Messrs. Penny and Co., 76 Potato Digger, Mossrs. Powell Bros., 76 Potato Planter, Messrs. Murray, 76 Stoker, Messrs. Johnston and Blandford, 256 Syphon Meter, Messrs. W. and B. Cowan, 277 Tool Holder, Gavin Jones, 256 Weighing Machine, Prize Cattle, Messrs. Hart and Co., 77

New Companies, 21, 39, 61, 83, 101, 121,143,165, 183, 203, 243, 261, 281, 301, 321, 343, 363, 381, 401, 423, 443, 465, 485, 505, 529, 549 Newhaven Drainage, 92, 96

New South Wales Railways, The, 23 Newton’s Third Law of Motion, 29 New York to Liverpool in a Cattle-ship, From, 286 New Zealand, Total cost of the Harbour Defences of, 398

Niagara Suspension Bridge, New Towers of the, 481

Nordenfelt, The, 519

Nordenfelt Submarine Vessel, Official Trial of the, 511

North Derbyshire Colliery, Visit to, 220 North of England, The, 19, 38, 59, 82, 100, 119, 142, 164, 181, 202, 222, 241, 260, 300, 319, 342,

361,    380, 400, 422, 442, 463, 484, 504, 527, 547 Notes from Germany, 20,38, 60, 82, 100, 120, 142,

164, 182, 202, 222, 242, 260, 280, 300, 320, 342,

362,    380, 400, 422, 442, 464, 484, 504, 528, 548 Notes from Lancashire, 19, 37, 59, 81, 99,119, 141,

163,    181, 201, 221, 241, 259, 279, 299, 319, 341,

361,    379, 399, 421, 441, 463, 483, 502, 527, 546 Notes and Memoranda, 9, 25, 49, 67, 91, 111, 126,

153, 169, 189, 209, 229, 251, 267, 291, 311, 327, 349, 378, 387, 411, 433, 453, 475, 491, 515, 539 Notes from Scotland, 20, 38, 60, 82, 100, 120,142,

164,    182, 202, 222, 242, 260, 280, 300, 320, 342,

362,    380, 400, 442, 464, 484, 504, 528, 548 Notices to Correspondents, 11, 31, 51, 73, 93, 113,

133, 155, 175, 195, 215, 235, 253, 273, 293, 313, 333, 355, 373, 393, 413, 435, 455, 477, 497, 519, 541

Nut-finishing Machine, Messrs. Dunderdale, Wood and Co., 35

OBITUARY:

Buddicom, Mr. W. B., 180 Clark, Mr. Alvan, 173 Clarke, Mr. John Algernon, 437 Hall, Mr. William, 131 Hunt, Mr. Robert, 335 Kirchhoff, Professor, 328 Kirkaldy, Mr. John, 150 Krupp, Herr Alfred, 74, 85, 104, 123 Walker, Mr. Thomas, 502 Moseley, Mr. Charles, 296 Woodhouse, Mr. O. E., 296 “Ochwadt” Self-registering Meter, The, 536 Oil Lamps v. Gas at East Molesey, 339 Olympia, Electric Light Installation at, 131, 132 Olympia Hall, Kensington, Portion of the, 150 Oxford Waterworks, Extension of the, 360

QUELCH’S Metallic Permanent Way, 536 Quicksilver Deposits, Prof. S. B. Cristie, 188

RADIAL Drill and Milling Machine, 544 Radial Steam Hammers, 271 Railroad Sleepers in America, 307 Railroads of New York, The Elevated, 317 Rail Joint, Spliced, Mr. Lightfoot, 481 Rail Joints, 78, 107 Railway Accident, A Curious, 420 Railway Accident, A Novel, 13 Railway Brakes, 371 Railway Congress, International, 315 Railway Construction, A Remarkable Achievement in, 546

Railway Diary and Officials’ Directory, 1888, The,

, Mr. B. M. Parkinson,

Reaction and Efficiency of the Screw Propeller, Mr. A. Blechynden on the, 1 Refrigerating Machinery, s.s. “ Fifeshire,” Mr.

T. B. Lightfoot, 305, 312 Registration of Workmen, The, 114 “Reina Regente,” Spanish Cruiser, The, Messrs.

J. G. Thompson, 352, 354 Reversing Gear, Italian, 512 Riachuelo Bridge, The, 4 Ribble Navigation and Preston Dock Act, 266 Ribble Scheme, The, 348, 386, 419 Richmond Main Drainage Board, The, 197 Rio Tinto Mines, The, 225 Rivetters, Plate Closing and Furnace Mouth, Messrs. Tweddell, Platt, and Fielding, 5, 7 Rivetting of Iron and Steel Ships, 85 Roads in the Colonies, 414

Robinson and Sons, Messrs. Thomas, First Order of Merit Awarded to, for Wood-working Exhibit at the Adelaide Exhibition, 422 Robinson and Sons’ Works, Rochdale, 545 Roburite Experiments at Monk Bretton, 352 Roller Brake Mill and Sieves, Multiple, 41, 47 Roller Mill Plant, Mr. Simons’ Flow Sheet of the First Complete, 167 Roller Milling, 56, 87, 131

Roller Mills, Tests as to the Power Consumed by Various Machines Used in, 36, 58 Rolling Mill for Corrugated Sheets, 71 Roof of Bandora Station, Bombay, Baroda, and Central India Railway, 446, 447 Roscoe, Sir H., His Address at the Annual Meeting of the British Association, 199 Roving Frame, Messrs. Asa Lees and Co., 337 R.A.S.E. Steam Engine Trials, 459, 470, 534 Royal Agkicultuual Society’s Show, The, 33 Brakes, Trials of, 494

Steam Engine Trials at, 459, 461, 470, 482, 535 Steam Engines at, 403, 427, 457 RoyaUAgricultural Society’s Trials of Brakes, 495,

Royal Indian Engineering College, Cooper’s Hill, Distribution of Prizes at, 86 Royle’s Coke Breaker, Portway’s Patent, 517 Rushworth’s Strong Bar and Angle Iron Shears,

Russian Iron Trade, The, 94

SAFETY Lamps, Sandbrook’s, 513

Safety Match-making Machinery, 195

St. diamond Projectile, Effect of, on a Steel Plate,

St. Helen’s Water Supply, 130 Sandbrook’s Safety Lamp, 513 Sanding Locomotives, 357 Sanitary Registration of Buildings Bill, 52, 86 Sanitary Registration of Buildings, The Society of Civil and Mechanical Engineers, 94 Sanitary Surveyors, 449

Sanitary Surveyors and Inspectors of Nuisances,

Saving Life at Sea, 195

Sawing Grindstones, 11

Schiele Fan, Large, 171

Scholten Disaster, The, W. A., 435

School of Art Wood Carving, 295

Scientific Education, 266

Scoop Wheel at Nordelph, 187

Screw Threads, Relative Strength of, 233, 270

Scutcher, Improved, Messrs. Asa Lees and Co..

336    *

Seamless Tubes from Solid Blanks, 396 Selected American Patents, 22, 40, 62, 84, 102, 122, 144, 166, 184, 204, 224, 244, 262, 282, 302, 322, 344, 364, 382, 402, 424, 444, 466, 486, 506, 530, 550

Seller’s Patent Compound Engine, 536, 540 “ Severn,” Placing of the, on the Active List of the Royal Navy, 329

Sewage Treatment, Mr. W. J. Dibdin’s Experiments on,118

Sewage Utilisation Works, Leicester, 140 Sewage Works of Halle, 159 Sewage Works of Wiesbaden, 321 Sewerage of Henley-on-Thames, 325 Sewing Machine and Electric Motor Diehl’s Combined, 265

Shafting Bearings, Mr. H. Fordsmith, 27 Shaping Machine, Tangye’s Self-Shaping, 368 Shears, Rushworth’s, 430 Sheffield District, The, 19, 37, 59, 81, 99, 119, 141, 164,181, 201, 221, 241, 260, 280, 299, 319, 341, 361, 379, 399, 421, 441, 464, 483, 503, 527, 547 Sheffield, Water in, 331 Shell for the Dynamite Gun, A Large, 505 Ship Canal from the Thames to Newhaven, 259 Ship Canal from Woolwich to Newhaven, 270 Shipbuilding Orders for the Clyde, 69 Ships’ Boats, 87

Siee Ho Bridge, China Railways, The, Mr. C. W. Southwark and Vauxhall Waterworks, Hampton, Supplements (continued):

Kinder and Mr. Jas. Cleminson, 450, 476    Double Cylinder Compound Pumping Engine    Four-coupled Express Locomotive, Midland

Silicate Cotton ? Non-conducting, 175    (Supplement July 22nd, 1887), 10, 13, 30, 65,    Railway, December 23rd, 1887

Silk Reeling, A New Departure in, 105    68, 69, 97    Four-coupled Outside-cylinder Locomotive, L.

Skidding Railway Wheels, Effect of, 233    South wick Tramways, 107    and S.W. Railway, Mr. W. Adams, Con-

Slag Manure, 437    Spanish Cruiser “ Iteina llegcnte,” The, 352,    354    |    structed by Messrs. R.    Stephenson and Co.,

Slabbing Frame, Messrs. Asa Lees and Co., 337 j Spanish Ore and British Steamships, 456    j    November 4th, 1887

Smithfield Club Show, The :    ! Speedometer, Willis’s Hydro-pneumatic, 358 j One Thousand Horse-power Compound Mill

Chilled Moulds for Casting Bearings, Messrs. ! Staffordshire Colliery Owners and Pumping Opera- Engine, Messrs. Buckley and Taylor, Decern -Richard Garrett and Sons, 473    tions, 357    her 23rd, 1887

Compound Vertical Engine, Messrs. Wallis and Standard Gauges for Brass Unions to Hose, 494 S.S. “ Duchess of Edinburgh,” Portsmouth and Steevens, 472    Standard Gauges for Hose Coupling Screws,    440    Rydo Ferry Steamer,    Mr. W. Stroudley,

High-Speed Compound Vortical Engine, Messrs.    Standard of Light, The, 133    September 33rd, 1887

Davey, Paxman and Co., 473    Stead, Mr. J. E., Apparatus for Analysis of Pro- Surveying and Levelling Apparatus, 96

High-Speed Vertical Engine, Messrs. Hornsby ducts of Combustion, 48    Sword Bayonets, The Faulty, and Sir John Adye,

and Sons, 473    Steam Boilers’ Bill, 20

Vertical Engine, Messrs. Robey and Co., 472 Steam Engine Economies, 12 Wheelwrights’ Sinking Platform, Baker’s “Sim- Steam Engines at the Royal Agricultural Society’s plex,” Exhibited by Messrs. Pfeil, Stedall, and Newcastle Show, 403, 427, 457 Son, 472    Steam Grease Extractor, Stuart’s, 397

Smith’s Forge, Horwich Works, 246, 249    Steam, Latent Heat of, 495

Smoke Nuisance, The, 440    Steam Launch “Buzz,” The American, 368

Snow Ploughs, Leicester, 517    Steam Piston Packing, New Principle in, 499

Society of Arts, 8, 388    S.S. “ Bencroy,” Engines of the, 308, 309

Society, Bristol University College Engi- S.S. “ Duchess of Edinburgh,” Portsmouth and NEERING:    Ryde Ferry Steamer (Supplement, September

Early Forms of Stamping Machinery used in 23?'d), 128, 129, 148, 154, 245 Brazil, Mr. Fonsica, 460    S.S. “Elbe,” Explosion or Board the, 521, 522

Submarine Torpedo Boats, Mr. Littleton, 460 S.S. “ Fifeshire,” Refrigerating Machinery, 305,

Society, The Chemical :

Note on the Atomic Weight of Gold, Mr. T. E,

Thorpe and Mr. A. F. Laurie, 403 Society, Civil and Mechanical Engineers’,

513

Use and Care of Chains for Lifting and Hauling, The, Mr. Henry Adams, 28 Society, Dundee Mechanical, 70 Visit to the North Derbyshire Colliery, Mr. G.

Worrall, jun., 220

Society of Engineers, The, 79, 490 Acton and Ealing Sewage Works, and Ealing New Storage Reservoir, Visit to, 339 New Formula for the Flow of Water in Pipes and Open Channels, Mr. Edgar C. Thrupp,

am-

fcioijisSuiiding?

335

499

Primary Batteries for Illuminating Purposes, Mr. Perry F. Nursey, 388 Visits of the, 79

Society, Junior Engineering, 87 Visit to the Beckton Gasworks, 263 Visit to the Royal Mint, 87 Society, King’s College Engineering :

Diving Apparatus, Mr. Sparks, 465 Electric Meters, Mr. A. H. Preece, 360 Irrigation, Mr. Jones, 390 Lighthouses, Mr. A. K. Brydges, 371 Photographic Apparatus, Mr. Ranken, 443 Society, Liverpool Engineering 149 Society, The Manchester Geological :

Miners’ Safety Lamps, Mr. Wm. Wood on, 471 Society of Mechanical Engineers, The American:

Experiments and Experience with Blowers, Mr. Henry I. Snell, 499

Friction in Toothed Gearing, Prof. Gaetano Lanza, 499

Investigation how to Test the Strength of Cement, Prof. Jerome Sondericker, 499 Milling Machine, The, as the Substitute for the Planer in Machine Construction, Mr. John J. Grant, 499

New Principles in Steam Piston Packing, Mr. John E. Sweet, 499

Railroad Bed for Bridge Structures, A, Mr. O.

C. Woolson, 499

Results from Steel Tested shortly after Rolling, Mr. Felton, 499 Steel Car Axles, Mr. John Coffin, 499 Use of Kerosene Oil in Steam Boilers, On the, Mr. Louis F. Lyne, 499

Society of Municipal Engineers and Surveyors, The :

Examination of some Recent Experiments on Sewage Treatment made by Mr. W. J. Dib-dinfor the Metropolitan Board of Works, 118 Society, Yorkshire College Engineering, 359 “On a Brake,” Mr. Wicksteed, 359 Sodium Furnace, Castner’s, 513 Softening Feed Water, 131 South Kensington Museum, 8, 55, 101, 240, 368 437

Southport Railway, The New, 173

312

S.S. “ Worcester” and “Oxford,” Triple Expansion, Engines, 89

Steam Tramway Locomotives, 355

Steam Trap, McDougall’s, 521

Steamship Freights and the Iron Trade, 374

Steamship Power, Our, 32

Steel Cables for the Birmingham Tramways, 126

Steel Car Axles, 499

Steel Decking, Messrs. W. H. Lindsay and Co., 289

Steel-faced Armour Trials in Russia, 197 Steel Guns at the Watervliet Arsenal, 89 Steel and Iron Trade Changes, The Advance of, 390

Steel Scale Produced by Skidding Railway Wheels, 218, 219

Steel Scale, Specimens of, Produced by the Skidding of Railway Wheels, 271 Steel Tested shortly after Rolling, 499 Steel Trade, Activity in the, 74 Stern-wheel Steamer for the River Magdalena, South America, 268, 272 Stockton Bridge, Removal of the Old, 183 Stoker, Messrs. Johnston and Blandford, 256 Stone-breaker, Mason’s Lever Cracking Motion, 328

Stone-breakers, Test of, 287 Stone-breakers, Trial of, 255, 271, 307 Stone-breaking and Delivering Apparatus for the Indian Government, Messrs. W. H. Baxter and Co., 431

Stoney Stratford Town Waterworks, 452 Strains in the Legs of Cross-legged Stools, 212 Street Surface-box, Brown’s, 517 Stresses in a Camp Stool, 107, 131, 161, 173, 193, 212, 233, 271, 287

Stresses in the Iowa Bridge, 153, 172, 193 Stresses on Lattices, A New Method of Obtaining the, Mr. William Robertson, 531 Stresses in the Legs of a Cross-legged Stool, 93 Stresses Occurring in Cast Iron and Steel, The Internal Investigation into, General Nicholas Kalakoutsky, 467, 487, 507 Stresses in Rolling Mills, 73 Stresses in Tension Rods, 307 Stretton, Mr. C. E., Presentation to, 504 Structural Stiffness, 497 Struts, The Theory of, 347 Struts, their Working Strength and Stiffness, 345

Struts, their Working Strength and Stiffness, Professor R. H. Smith, 303, 425 Stuffing-box Packings, American, 290, 292 Stuffing-boxes, Independent, 358 Subway, City of London and Southwark, 297 Sukkur Bridge, The, 107 Sumatra, Proposed Railway for, 223 Supplements :

Compound Engines, Southwark and Vauxhall Waterworks, Hampton, Constructed from the Designs of Mr. J. W. Restler by Messrs. R. Moreland and Sons, July 22nd, 1887

274

Syphon Meter, Messrs. W. and B. Cowan, 277

TANGYE’S Shaping Machine, 368 Tank at Haslar, New Experimental, 130 Tansa Waterworks, Portable Engines at, 107 Tansa Works for the Water Supply of Bombay, The, Mr. Killingworth Hedges on the 53 Tay Viaduct, Description of the New, 198 Technical Education, 87, 106, 107, 162, 173, 278, 339, 393

Technical Education Bill, Conference of Teachers on the, 287

Technical Education in its Bearing on Foreign Competition, 247

Technical Education and Foreign Competition, 439, 534

Technical Education, Mr. Henry Dyer, 384 Technical Instruction, 94, 133, 149 Telegraph, The Writing, 420 Telegraphy and Lightships, 172 Telephone into China, Introduction of the, 180 Tenders :—

Borough of Leicester, 396 Canterbury, 353

Corporation of Leicester, 353, 375 Drainage Works, &c., at the Hailsham Union, Polegate, Sussex, 148

Laundry, and Married Couple’s Quarters, St.

Marylebone Workhouse, 24 Litherland Road Bridge, 24 Lymington Sewerage, 232 Public Conveniences at Bournemouth, 148 Road Making under the 150th Section, Public Health Act, 1875, at Bournemouth, 148 Sea-water Scheme for Watering Roads, &c., at Bournemouth, 148 Storm Outfall, Bournemouth, 148 Tenders, Invitations for, 271 Terni Steel Works, Vertical Turbines, 252, 255 Terni, Visit of the King of Italy to, 124 Terry’s New Theatre, Constructive Ironwork of, Messrs. Matthew T. Shaw and Sons, 283, 285 Test of Stonebreakers, The, 338 Testing Apparatus, Messrs. McLaren’s Engine Trials, 460, 461

Thames at Richmond, The, 177 Thames, The State of the, 113 Theoretic Diagrams, 18, 56

Tidal Estuaries and the Bar of the Mersey, 418, 459, 494, 518, 535

Tidal Estuaries and the Bar of the Mersey, Mr.

W. H. Wheeler on Mr. Shelford’s Paper on, 383 Tinning Gun Metal? 11 Tire Testing, Woehler’s Experiments on, 502 Tonnage of Ships, The, 532 Tool Holder, Gavin Jones, 256 Torpedo Boat Casualties, 4, 78 Torpedo Boats, Bids for, 462 Torpedo Boats, The Concealment of, 511 Torpedo Boats for Spain, Messrs. Yarrow and Co., 331, 332

Torpedo Boats for the United States Navy, 135 Town Refuse Crematories ? 51 Trade Competition and Education, 253 Trade Marks in Roumania, 507 Tram Rail Cleaner, Mr. Jno. Prosser, 27 Tramway Engines, Greig and Aveling’s, 328 Tramway Locomotive, Birmingham Central Tr ways, 347

Tramway Sleeping Car for the Argentine Republic, 500

Tramways, Cable v. Horse, 326 Transvaal Industry, A New, 226 Travelling Crane, 50ft. span, to Lift Three Tons, 206, 2il

Trial Trip of the “Halcyon,” General Steam Navigation Company, 95 Tributary Development, Modern Milling, Mr. G. Little on, 404

Tunnel in Colorado, A, 106

Turbines, Vertical, Terni Steel Works, 252, 255

UM ART A Colliery, Differential Pumping Engines, 149, 151

Union of Lancashire and Cheshire Institutes, 390 United States Geological Survey, 110 United States Navy, 477 United States Navy, The, 541 United States Navy, Progress in the, 146 United States War Ships, Five, 173 University College, London, 277 Upsetting of a Railway Train by Wind, 203

VACUUM Brake, Another Failurmof a,"275 Valleyfield Paper Mills, The, 118yrV    v

Valve, Lambert’s Screw-down GAffied, 358 a* Vice Chuck, Cosgrove’s, 27 J Village Sanitation, 293 Vincennes Railway, Jubilee Exh

The, 408, 416    ..

Volga, Steam Tug Boat for the, 499^

WAGES in Great Britain, 66 Wales and Adjoining Counties, 20, 38, 60, 82,100, 120, 142, 164, 182, 202, 222, 242, 260, 280, 300, 320, 342, 362, 380, 400, 422, 442, 464, 484, 504, 528, 548 Walker, Mr. Thomas, 502

Wallsend Slipway Company’s Marine Boiler, The, 7 Walsall Chamber of Commerce and the New Merchandise Marks Bill, 275 War-office Organisation, 113 Waste Bolts, Nuts, Rivets, and Washers, 22 Waste Power for Mills, 107 Wasteneys Smith’s Stockless Anchor, 171 Water Capacity of Soils, The, 219 Water Cranes, Pillar, the Indian State Railways, 288, 290

Water-gauge Float, Improved, 159 Water Meter, Kent’s Uniform, 450, 451 Water Power for Mills, 55, 65 Water Scheme for Halifax, A New, 543 Water Separator, Messrs. Vaughan and Sons, 269 Water Softening, 348, 370, 371, 386, 439, 448 Water Softening—The Clark Process, 348, 371 Water Supply of Birmingham, 180 Water Supply Case, A Complicated, 409 Water Supply of West Gloucestershire, 48 Water-tube Boilers, 294, 338, 356 Water Waste in Town Supplies, 495 Watervliet Arsenal, Steel Guns at the, 89 Wear Shipbuilding in 1887, 546 Weardale Railway, The, 35 Wednesbury Sewerage Works, The, 490 Weighing Machine, Prize Cattle, at the Newcastle Exhibition, 77

Welsbach Incandescent Gas Lamp, The, 318 Westinghouse Automatic Engine, The, 415 Westinghouse Brake Tests near New York, 489 Whampoa Docks Pumping Engines, 409 Wheel Pen, Mr. W. F. Stanley, 396 Wheelwright’s Sinking Platform, Baker’s Simplex 472

Whittlesea Mere Pump, 186 Whitworth Scholarships for 1887, 233 Widnes Waterworks, New Pumping Machinery 170, 171

Wild’s Improved Portable Hand-power Drilling Machine, 458

Williams’ Fusible Plugs, 513 Willis’s Hydro-pneumatic Speedometer, 358 Woehler’s Experiments on Tire Testing, 502 Woodhouse, Mr. O. E., 296

Working Women: Their Presentand their Future 87

Writing Telegraph, The, 420

YEAST, Compressed, 113 Yorkshire College Evening Classes, Yorkshire College, Leeds, The, 255 ' ZALINSKI, Lieut., Dynamite Gun, 171

LONDON: PRINTED FOR THE PROPRIETORS BY OEOROE LEOPOLD RICHE, AT THE OFFICE OF GEORGE REVEIRS, GRAYSTOKE-PLACE, FETTER-LANE, E.C., AND PUBLISHED BY HIM AT THE OFFICE OF “THE ENGINEER,” 163, STRAND,

IN THE PARISH OF ST. MARY-LE-STRAND, IN THE COUNTY OF MIDDLESEX.—FRIDAY, FEBRUARY 3, 1SS8.

*

\

*

s*?

TA

**

U.

'I

jr

i-*.

„•*

-4    »

*s;

tr

> •* >>

«>

*gr #-v , :

fc*"'    ^Vr- . * • *

! '4. -£■' -

’.-•j

?■ \ v-A

• P'J

. .""V¹

C.

■ A.

'i:f

r: hi

*■»-

^ 4

r*

■' S'^?C

■JW.

>:

> «r

‘4    ’

-tfMk

Atif,¹

xm m*

V ®f •

* V.

jn 3.

■?

, «* •

4J

• rtr    v

4.^

:• 1 I -

I u>

'*>'

kV. ^

r.w

* '

iHKi

,JS

At; - "1

4*^

iP,

•v

’ i^. ...

«r

i v%,

•■• jp    *

^ V 'v

V.

•■s.*

V'

R A-

,v

ss«<

:^V f

—4 .:- r

Hy

%r

v.V’

flLjky V

'v. J    w

-"Sy,

jTt

V,

"i.

Av;

: -L • V *

SA:4^

VV^

fi nr;    ■

r ;    / 1/. /

_____^ Q C*    '**

V %

?/>

■*/    / f

/■

■'

H <

\    '    ■ Qy%

M

*    5

; r ;

‘1

r V •Wf

/• I

•*1/

-/

^ i ^..\ y vy

.<» fr i, / >>'

■rtSf

'ty v

- /%

v*

4rr% •

u

Pi

-■I

.. #!< f" .-. -

‘A'jL ; :

Vi

• A ^

v tjr, * r H <V.-

4,4 . f’kA

v |A

vi> . =■• /•

4

-WLV..

r-^

<!r

u.

\

A s: .

.- 4-:

V----

>•.

•f

. , V . '■«

-. vx>#*

.. r^A

’ * ‘i >

‘»-“-r,.,

f ¥**

r^N

1. .*,?^r A

S,4S| •'*■

Ayj y

-.*<# ^ \

if

sX<U _

....

r*

:r

v\

•0 V

V '■■ K

v

vV

^    -"'A'‘    ~*r‘4.

L    r *- y.

VF V J

•4

%-*** ■

%p

r>.

4,

' .17*

v "■ > ^ ^4

y 4; *5^

XV A

■ \ X.4 .

x:

'W

M'L. >!*:•

SM

■ u >* ifi ,

«    »    »    ¥    * i

' 4&“r'- j

■‘A* >

il

V;'»\ ft

■#

♦f A'

SWP * KA,,

r .    <

-M*

' V,

^ tej * >•'

*» y

</

jh tX,

4 .v-    -■ •;■ •    '

Vv

•Si •. 3

.*«•

2    *. ,f^5t

v ’|g

V."

ft

d,

*/• *

>>

** S* j *

.. * **

,...■ ; . ...

VW;

■>y

\\

\ ' **/

mm

- . ”A.J»ak ’

*£40

/ s*|*‘

Jr-V-

,'JC%

:«S*.

y*. ;

r a .

TfJkt

J ;■

f «■

-    4 V

•A' f

v > »    ..f'A -. «

^ ^

<*X ' ;*• ’ r

*,•

■ ‘V .. ,v

4

V*

>*

/»

*•

*%

ftr

Sr

i- /

^V7-*'A    \ ***

h&

■h

•>

y/T-

\y

■y:

ft:-

■ rv . f V

-v Jr\ ^

r-* --f³?"'    f i

* tv'

- *

■< .■ ■

•/ *

:•.>

rv*

r.

-■

>. ,₍ C«*'    f

Vy ‘N >. A. %r* ' X *

■ > 's

'Gk »

A.

*'«v!

I

* ^i-i \ rr?

mm k

tr;

.....

' V?

V* .

X.

■*/

*■,%

<A

:*JS~ \

'

-r

-jp-v

■V ■'

'.y v." W"’

.

'■ .v;

.•v

-CViV

'Mi

i, *N>

.r