Biblioteka Politechniki Krakowskiej

100000298377

J &ê>

Ov

t/

7J>

Der Bau

kleiner und wohlfeiler Häuser

für

eine Familie.

Eine Sammlung

von einfachen und reicheren Entwürfen nebst Details

für

Baugewerksmeister, Baueieven und Bauunternehmer.

Herausgegeben

von

O. Keller,

Architekt und Direktor der Bauschule" in Uoss wein-Sachsen,

Dritte verbesserte und vermehrte Auflage.

26 Tafeln mit erläuterndem Text.

y    tier

öfießtlichen Arbeiten

-CM—

Weimar, 1894.

Bernhard Friedrich Voigt.

/Û.

UIU8UAA tjtniciüiisiiâ

KRAKÓW

nMlXI

«•

Àkc. Nr.

(La

Vorwort zur dritten Auflage.

Wenn nach Yerfluss kaum eines Jahres der zweiten Auflage eine dritte folgen musste, so ermutigte dies Verfasser wie Verleger der neuen Auflage wieder verschiedene Neuheiten an Stelle älterer Entwürfe zuzuführen und das Ganze noch um zwei Tafeln zu vermehren.

Der Unterzeichnete und die Verlagsbuchhandlung würden sehr erfreut sein, wenn den verehrten Lesern mit den in dieser dritten Auflage enthaltenen Verbesserungen und Vermehrungen gedient sein würde.

R o s s w e i n.

Otto Keller.

Besehreibung

der auf Tafel I bis XXVI dargestellten Projekte.

Allgemeines.

Sämtliche Projekte sind nach Originaleutwürfen des Verfassers¹) gezeichnet.

Der Quadratinhalt der Gebäude ist nach deren wagerechten Schnitt durch das Erdgeschoss ausschliesslich Veranden etc. berechnet.

Die Umfassungsmauern sind bei den kleineren Gebäuden 0,33 m mit 0,07 m breiter Luftschicht, bei den grösseren 0,40 m stark mit 0,13 m breiter Luftschicht ungeordnet. Die Scheidewände sind, wo irgend angängig 0,13 m stark, aus hartgebrannten Ziegelsteinen und mit Thürgerüsten versehen, angelegt.

Die nötige Ventilation der einzelnen Räume wird durch je eine Oeffnung, unterhalb der Zimmerdecke befindlich, bewirkt, welche die frische Luft einführt, während die verbrauchte Luft durch eine ebenfalls unterhalb der Zimmerdecke in dem Ventilationsschornstein befindliche Oeffnung entweicht. Beide Oeffuungen sind genügend gross und verschliessbar anzuordnen.

Da es sich hier um möglichst billige Herstellung der projektierten Gebäude handelt, sind die einzelnen Räume derselben, soweit es die Bequemlichkeit zulässt, nach Fläche und Höhe auf das geringste Mass beschränkt.

Tafel I.

Dies kleine Arbeiterhaus, von welchem ein kleinerer und ein grösserer Grundriss des Erdgeschosses dargestellt ist, hat nur 27 resp.

30 qm bebaute Grundfläche und kostet 1500 bezw. 2000 Mark als Reihenhaus gerechnet. Das ganze Haus wird durch einen meiner Oefeu erwärmt vom Kochherd aus.

Tafel IÏ.

Die bebaute Grundfläche dieses ebenfalls in Rohbau aufgeführten 2,59 m im Lichten hohen Häuschens beträgt 39 qm und der Preis à Quadratmeter 58 Mk. = 39 • 58 = 2262 Mk.

Das Erdgeschoss enthält das Treppenhaus mit Vorplatz, die Wohnstube, die Küche mit daranliegendem Speiseschrank und den Abort.

Zwei Schlafzimmer zur eigenen Benutzung, ein solches zum Vermieten und ein kleiner Bodenraum sind im Dachgeschoss angeordnet.

Unter der Küche liegt ein Kellerraum.

Tafel III.

Bei diesem Entwürfe in Ziegelrohbau sind Wohnhaus und Stall unter ein Dach gebracht.

Im Erdgeschoss ist das Wohnzimmer, daran gemauerter Kleiderschrank, die Küche mit Treppenaufgang und Speiseschrank, der Abort und der mit diesem verbundene Stall untergebracht, in welchem Falle der Abort zugleich als Vorraum dienend, den Stalldunst aufnimmt und durch das Fenster, welches fleissig zu öffnen ist, abführt, so dass derselbe nicht direkt in den Vorplatz dringen kann. Vor dem Eingang ist eine einfache Veranda angebracht.

Das Dachgeschoss enthält zwei Schlafräume für die Familie, einen solchen zum Vermieten und den von diesen Räumen durch eine Brandmauer getrennten Boden für Futter und Brennmaterial.

Unter der Küche liegt ein vom Vorplatz aus zugängiger Wirtschaftskeller.

Die bebaute Grundfläche beträgt 50 qm, folglich der Preis, wenn das Quadratmeter 80 Mk. kostet: 50 • 80 = 4000 Mk.

Tafel IV.

Das teils im Rohbau, teils im Fachwerk ausgeführte Häuschen hat Verfasser in Stadt Roda erbaut.

Die im Erdgeschoss 2,75, im Obergeschoss 2,50, im Kellergeschoss 2,25 m im Lichten hohen Räume, dürften bezüglich ihrer Verteilung aus der Zeichnung genügend zu erkennen sein, und es braucht nur noch erwähnt zu werden, dass die im Kellergeschoss befindliche Küche mit dem Wohnzimmer durch einen Speiseaufzng verbunden und der Abort mit Tonnensystem versehen ist.

Der Eingang ist von einer Veranda umgeben.

Das Haus nimmt 47,60 qm Baufläche ein. Die Bausumme beträgt 47,6 • 80 Mk. = 3808 Mk.

Tafel V.

Das Erdgeschoss besteht aus Wohnstube, Schlafzimmer mit Kleiderschrank, Küche nebst Speiseschrauk, Abort, Treppenhaus und Veranda.

Das Obergeschoss enthält ein zweites Schlafzimmer für die Familie und zwei Zimmer zum Vermieten.

Im Kellergeschoss ist die Waschküche und der teils unter der massiven Kellertreppe befindliche Wirtschaftskeller untergebracht.

Ein genügend grosser Bodenraum, welcher von einer Leiter aus zugängig, liegt, wie dies auch bei dem vorigen Projekt der Fall, dessen Geschosshöhen auch hier gelten, über dem Obergeschoss.

Das Haus, welches in Putzbau ausgeführt ist, hat 52,36 qm Grundfläche und kostet 52,36 • 85 Mk. = 4450 Mk.

Tafel VI.

Dieses Gebäude, dessen Aeusseres Rohbauformen zeigt, hat 68,64 qm Grundfläche.

Das Erdgeschoss, welches wie das Obergeschoss 2,50 m lichte Höhe hat, bestellt aus Wohnzimmer, Schlafzimmer nebst jKIeider-schrank, Küche mit Speiseschrank, Vorplatz mit Treppe und Abort. Eine kleine Vorhalle vermittelt den Zugang.

Im Obergeschoss haben ein zweites Schlafzimmer der Familie, ein kleiner Bodenraum, eine von der Treppe aus zugängige Holzkammer und eine Stube mit Schlafraum zur Vermietung Platz gefunden. An jedes Schlafzimmer stösst ein gemauerter Kleiderschrank. Das Quadratmeter Baufläche stellt sich auf 70 Mk., daher das Ganze auf 4900 Mk.

Tafel Vll.

Das hier dargestellte Gebäude nimmt 56,2 qm Baufläche ein und kann zur Aufnahme von zwei wie auch nur von einer Familie dienen. Die Einrichtung ist wohl genügend aus den Grundrissen zu ersehen und es braucht nur noch bemerkt zu werden, dass das Häuschen 1890 in einem Badeort der Provinz Sachsen ausgeführt wurde. Die Baukosten betrugen 5000 Mk., demnach das Quadratmeter Grundfläche 88,96 Mk.

Tafel VIII.

Diese kleine Villa hat Verfasser im Jahre 1887 für eigene Zwecke in Roda erbaut.

Das Erdgeschoss, 2,75 m hoch, enthält die Wohnstube mit von dieser aus zugängiger und nach dem Garten führender Veranda, die gute Stube, Küche mit Speiseschrank, Abort, Vorplatz und Treppe.

Ein weiteres Zimmer mit Balkon, zwei Schlafzimmer und die Mädchenkammer, welche zugleich mit als Schrankraum etc. dient, sind im Dachgeschoss, welches 2,50 m Höhe hat, untergebracht.

Im Kellergeschoss ist die Waschküche und ein geräumiger Wirtschaftskeller, der zugleich als Raum zur Aufnahme von Brennmaterial dient, placiert.

Das als Türmchen ausgebildete Treppenhaus endigt mit einem Stübchen, welches eine herrliche Aussicht überblicken lässt.

Die bebaute Grundfläche beträgt 64,56 qm. Das Ganze stellte sich

auf 6450 Mk., das Quadratmeter Grundfläche

= ca. 100 Mk.

6450

64,56

Tafel IX.

Das in Putzban gedachte Gebäude hat 71,94 qm Grundfläche, Wohnstube, gute Stube, Küche, Speisekammer und Abort haben ihren Platz im Erdgeschoss, an welches noch eine Veranda mit Zugang zum Vorplatz und Treppe stösst.

Das Dachgeschoss birgt zwei Schlafzimmer, den Bodenraum und die Mägdekammer.

Im Kellergeschoss ist die Waschküche und ein geräumiger Wirtschaftskeller angelegt.

Die Geschosshöhen betragen 2,75 und 2,50 m.

Der Baupreis stellt sich auf 71,94 • 85 Mk. = 6115 Mk.

Tafel X.

Vorliegendes Haus, welches in Ziegelrohbau entworfen ist, hat folgende Einrichtung:

Das Erdgeschoss enthält Wohnstube, gute Stube, ein Schlafzimmer, Küche, Speisekammer, Abort und Treppenhaus.

Das Dachgeschoss besteht aus einem Schlafzimmer für die Familie, Mädchenkammer, Bodenraum und Stube nebst Schlafzimmer zum Vermieten.

Im Kellergeschoss befinden sich die Waschküche und ein Wirtschaftskeller.

Die Grundfläche des Hauses misst 84 qm. Das Gebäude kostet

in Summa 7140 Mk., à Quadratmeter also

= 85 Mk.

7140

84

Tafel XI.

Das 82,90 qm Fläche einnehmende Gebäude enthält in den einzelnen Geschossen dasselbe, wie der vorige Entwurf bei denselben Geschosshöhen ; nur kommt im Erdgeschoss noch eine von der guten Stube zugängige Veranda hinzu.

Das Aeussere ist in Backsteinrohbau aufgeführt.

Das Quadratmeter kostet 85 Mk., daher die Bausumme 7047 Mk.

Tafel XII.

Das Erdgeschoss enthält Wohnstube, daran Veranda mit Schutzdach aus Zink, gute Stube, zwei Schlafzimmer, Küche mit Speiseschrank, Abort, Vorplatz und Treppe.

In das Obergeschoss sind zwei Giebelzimmer, das eine mit Balkon und zwei Schlafkammern zum Vermieten, ein Bodenraum und die Mädchenkammer, welche zugleich als Schrankraum auftritt, gelegt.

Im Kellergeschoss ist die Waschküche und der Wirtschaftskeller angeordnet.

Das in Ziegelstein mit Architekturformeu aus Zementputz hergestellte Gebäude hat 86,30 qm Grundfläche.

hoch.

also 86,3 • 80 = 6904 Mk.

Das Erdgeschoss ist 2,75, das Obergeschoss 2,50 m im Lichten Das Quadratmeter Baufläche kostet 80 Mk., der ganze Bau

Tafel XIII.

Diese in reicheren Putzformen projektierte kleine Villa hat 77,31 qm

6958

77,31

Grundfläche und kostet 6958 Mk., à Quadratmeter also ca. 90 Mk.

Im Erdgeschoss, welches eine lichte Höhe von 2,75 m hat, ist Wohnstube, gute Stube, Küche und Speisekammer, sowie Abort und Treppenhaus mit Eingang untergebracht. Von der guten Stube aus gelangt man in eine Veranda, von welcher eine Treppe in den Garten führt.

Zwei Schlafzimmer, eia Fremdenzimmer, Mädchenkammer und Bodenraum sind in dem 2,50 m hohen Obergeschoss enthalten.

Das Kellergeschoss dient zur Aufnahme der Waschküche und des Wirtschaftskellers.

Tafel XIV.

Die Räume, welche diese kleine, in reinem Ziegelrohbau herzustellen gedachte Villa enthält, sind:

Wohnstube, daran Veranda, Schlafstube, zugleich als Essraum mit zu benutzende Küche, Speisekammer, Abort, Vorraum und Treppenhaus in dem 2,80 m hohen Erdgeschoss, und gute Stube, Schlafzimmer, Fremdenzimmer, Mädchenkammer (über Abort und Speisekammer), Vorplatz und Treppe, welche nach einem Aussichtsstübchen und dem Bodenraum führt, im Obergeschoss, sowie Waschküche und Wirtschaftskeller im Kellergeschoss.

Bei 65 qm bebauter Fläche stellen sich die Kosten des Baues auf 6685 Mk., also 103 Mk. à Quadratmeter.

Tafel XV.

Die zu Tafel XV gehörenden Grundrisse enthalten:

Zwei Stuben, zwei Schlafzimmer, Fremdenzimmer, Küche, Abort und Treppenhaus. Von der nach dem Boden führenden Treppe, wo sich eine Mädchenkammer befindet, ist im Obergeschoss eine kleine offene Halle abgeschnitten.

Im Kellergeschoss befinden sich Wirtschaftskeller und Waschküche.

Das Aeussere zeigt Rohbauflächen mit Zementputzformen.

Die Geschosse sind 2,80 m im Lichten hoch. Das Quadratmeter Baufläche kostet 92 Mk. und der ganze Bau 4876 Mk. bei 53 qm Grundfläche.

Die Grundrisse zu Tafel XVI zeigen folgende Einrichtung:

Von einem kleinen Vorplatz hinter der Eingangsthür gelaugt man in einen geräumigen Vorplatz und zum Treppenhaus. Dieser Vorplatz vermittelt den Zugang zum Esszimmer, Wohnstube, Salon, Küche mit Speisekammer und Abort.

Das Obergeschoss mit 2,50 m lichter Höhe enthält zwei Schlafzimmer, ein Fremdenzimmer, Abort, Garderobe, einen Raum für Schränke, die nach dem Aussichtsturm und Boden führende Treppe, sowie einen Balkon.

Der Boden enthält Kammern für verschiedene Zwecke.

Im Kellergeschoss sind die Waschküche, die Zentralluftheizung, Bad und Wirtschaftskeller untergebracht.

Diese in Verblendsteinen mit Architekturteilen aus Zementputz in Klosterlausnitz ausgeführte Villa nimmt 105 qm Grundfläche ein. Die Baukosten betragen à Quadratmeter 142 Mk. und im ganzen 1500cMk,

Tafel XVI u. XVII.

Diese Tafeln stellen die perspektivischen Ansichten zu den auf vorheriger Tafel beschriebenen Gebäuden dar.

Tafel XVIII.

also

= 120 Mk.

Vorliegende Villa ist ebenfalls in Putzbau ausgeführt und hat 96,20 qm Grundfläche. Das Ganze kostet 11545 Mk., à Quadratmeter 11545

96,2

Der Haupteingang zum Erdgeschoss ist von einer verdeckten

Veranda aus zu erlangen und führt in einen hellen Vorplatz, vou wo man in das Wohn- und Esszimmer, die gute Stube mit offener Halle, das Zimmer des Herrn und den Abort, sowie zur Geschosstreppe gelangt.

Eiu zweiter Eingang am Treppenturm führt nach dem Kellergeschoss, welches ausser dem Vorkeller die Wirtschaftsräume, Küche mit Speisekammer und Speiseaufzug nach dem Esszimmer, Raum für Brennmaterial, Waschküche, Gemüse- uud Weinkeller enthält.

Im Obergeschoss befinden sich Vorplatz und Treppe, drei Schlafzimmer und Bad.

Das Dachgeschoss besteht aus einem Fremdenzimmer, Mägdekammer und Bodenraum über den Kehlbalken.

Das Erdgeschoss ist 3 m, das Obergeschoss 2,75 und das Dachgeschoss 2,50 m im Lichten hoch.

Tafel XIX.

Dieselbe stellt die beiden Schichten einer Hohlmauer von 0,33 m Stärke mit 7 cm Luftraum dar.

Statt der Durchbindersteine sind hier in Entfernung von ca. 0,50 m 3 mm starke und 2 cm breite Flacheisenstäbe i i angeordnet. Letztere werden mit Mennige gestrichen, und wie Fig. 1 und 2 zeigt, in jede dritte Schicht wechselweise schräg gelegt. Die Köpfe der Bindersteiue an den Fensterecken sind, damit keine Feuchtigkeit durch die Mauern schlagen kann, wie a a zeigt, zu teeren. Bei den Kopfschichten, welche aus halb durchgeschlagenen, ganzen Steinen bestehen, ist der Bruch dem Hohlraum zuzuwenden. Der Schnitt (Fig. 3) zeigt IP2 Stein starkes Hohlmauerwerk in derselben Ausführung mit Angabe der Balkenauflagerung, Einmauern des Balkenkopfes, Zufuhr der frischen Luft und Isolierung des Kellermauerwerkes von den Erdgeschossmauern.

Zur Fig. 3 ist noch kurz hinzuzufügen: Zwei Schichten unter der Mauerlatte werden die beiden 0,13 m starken Mauern durch Bindersteine miteinander verbunden. Die Balkenköpfe sind seitlich stramm einzumauern, wie Fig. 4 zeigt, vorn und unten aber mit einem Luftraum e zu umgeben. Die Mauerlatte liegt am besten auf einem Pappstreifen c. Die Luftzufuhr nach den Zimmern geschieht am besten durch Vermittelung schornsteinartiger Aussparrungen im Mauerwerk vom Sockel aus, wie die Pfeilrichtung s f zeigt.

Damit keine Zugluft im Zimmer entsteht, wird ein verschliess-barer Ausströmungskasten A aus Blech unterhalb der Decke eingemauert. Die Isolierung o p der Fundamentmauer vom Erdgeschoss geschieht gut uud billig durch Streifen von Dachpappe, welche sich 10 cm überdecken.

Der auf der Tafel angegebene Mauerverband findet schon seit Jahren in Dänemark Anwendung. Derselbe hat sich vorzüglich bewährt, ist leicht herzustellen und insofern billig, weil man bei Berechnung des Materials den Kubikinhalt der Hohlräume von dem des gesamten Mauerwerkes abziehen kann.

Tafel XX.

Diese vom Verfasser erfundenen Oefen beruhen auf der Anwendung eines gusseisernen Rippenheizkörpers²), welcher auf der Kochmaschine oder in einem Zimmerofen aus Kacheln placiert wird.

Zweck der Oefen ist, mehrere Zimmer von einer Feuerung aus zu heizen, ohne mehr Brennmaterialverbrauch als bei einem gewöhnlichen Zimmerofen.

Der Ofen, Fig. 1, steht in der Küche und besteht aus einem Etageukochofen und dem auf demselben stehenden Heizkörper d, welcher in einem Abstand von 5 cm durch einen Kachelmantel eiuge-schlossen ist. Dieser Heizkörper mit 2 qm Fläche ist durch ein Rohr c mit der Ofendecke so verbunden, dass die in noch hohem Grade erhitzten Heizgase, nachdem sie den kurzen Weg im Kochofen durchgangen, erst seine beiden stehenden Züge passieren müssen, ehe sie in den Schornstein gelangen. In der Pfeilrichtung wird nun, nachdem der Ofen im Brande ist, kalte Luft durch einen Kanal e weggesaugt, au den Wandungen der Heizkörper stark erhitzt und durch eine ver-schliessbare Oeff’nung f der Stube zugeführt.

Bei dem Ofen Fig. 2 ist der Heizkörper d mit der Decke der Feuerkiste a verbunden. Die Thätigkeit desselben ist, wie die Pfeile zeigen, ebenso wie bei dem Ofen Fig. 1.

Wie man mehrere der erwähnten Rippenheizkörper d zu einem Luftheizofen verwenden kann, zeigt die Fig. 3. Es werden 4 bis 8 neben und übereinander liegende auf kleineu Trägern ruhende Heizkörper mit dem Feuerraum a aus Schamotte verbunden, so dass die Heizgase die Züge der Körper in der Pfeilrichtung durchziehen, um von dem Fuchs e aus in den Schornstein zu entweichen. Die Reinigung geschieht leicht von f aus.

Um die Heizkörper herum wird nun frische Luft geführt, an ihren Wandungen stark erhitzt und von h aus mit Wasserdunst aus c gesättigt. Durch die Rohre i dem Heizkörper k zugeführt, wird diese Luft bei m durch verschliessbare Gitter an die Zimmer abgegeben.

In die oberen Geschosse führen Kanäle p.

Alle Oefen sind praktisch erprobt und haben sich ausgezeichnet bewährt. Der Preis ist ein sehr niedriger³).

Tafel XXI his XXVI.

Auf diesen Tafeln sind die hauptsächlichsten architektonischen Details der einzelneu Entwürfe dargestellt. Eine nähere Beschreibung derselben dürfte überflüssig sein, da die Nummern der einzelnen Tafeln, zu welchen die betreffenden Figuren gehören, unter diesen angegeben sind und bedarf es nur noch der Erwähnung, dass ein und dieselbe Detailfigur oft zu mehreren Entwürfen passt.

das Stadthaus und die Villa.

C. Weichardt,

Entwürfe, enthaltend Typen von Miethäusern verschiedener Städte und Länder, städtische Wohngebäude für einzelne und mehrere Familien, Häuser mit Ladeneinrichtungen, sowie vorstädtische Wohngebäude; ferner Entwürfe von Landhäusern, Villen, Schweizer- und Weinbergshäusern etc. 50 Tafeln mit erläuterndem Texte. Zweite unveränderte Auflage, gr. 4. Geh. 6 Mark.

C. Weichardt,

Motive zu Gartenarchitekturen.

Eingänge, Veranden, Brunnen, Pavillons, Bäder, Brücken, Ruheplätze, Volieren, Terrassen, Freitreppen, Veduten etc. 25 Blatt, enthaltend 20 Projekte und etwa 100 Skizzen in Randzeichuungen, nebst 6 Tafeln Details in natürlicher Grösse. Folio in illustr. Mappe. 12 Mark.

Audr. König,

Entwürfe zu ländlichen Wohngebäuden

oder Häusern für den Bauer, Arbeiter und Handwerker, sowie Pfarr-, Schul- und Gasthäuser, mit den dazu erforderlichen Stallungen. Nebst der ausführlichen Angabe des zu deren Erbauung nötigen Aufwandes an Materialien und Arbeitslöhnen. Dritte Auflage, vollständig neu bearbeitet, verbessert und vermehrt von Paul Gründling, Architekt zu Leipzig. Mit Atlas von 12 Foliotafeln, gr. 8. Geh.

7 Mark 50 Pfge.

R. Manega die Anlage von Arbeiterwohnungen

vom wirtschaftlichen, sanitären und technischen Standpunkte, mit einer Sammlung von Plänen der besten Arbeiterhäuser Englands, Frankreichs und Deutschlands. Dritte neu bearbeitete Auflage, herausgegeben von Paul Gründling, Architekt in Leipzig. Mit einem Atlas von 16 Foliotafeln, enthaltend 176 Figuren, gr. 8. Geh. (Unter der Presse.)

Herrn. R o b r a d e,

Taschenbuch

Mit

für die Praxis des Hochbautechnikers uud Bauunternehmers. 180 Abbildungen im Texte. 8. Geb. 4 Mark 50 Pfge.

Max Graef,

der dekorative Holzbau (Renaissance und Modern)

in seinen Einzelheiten und kleinen Baulichkeiten für Zimmerer, Bautischler und Baubetlissene. Vorlagen zur Ausschmückung aller vor-kommeuden Holzbauten nach neuen Mustern, dargestellt von den einfachsten bis zu reichereu Vorbildern, umfassend sowohl die Teile der Innenräume, als auch die der Fassaden und der freistehenden Bauteile. 36 Foliotafeln mit erklärendem Texte, gr. 4 in Mappe. 9 Mark.

Dr. W. H. Behse,

die praktischen Arbeiten und Baukonstruktionen

des Maurers und Steinhauers

in allen ihren Teilen. Ein Handbuch für Maurer und Steinhauer, sowie für Baugewerkschuleu. Sechste vermehrte und verbesserte Auflage. Mit einem Atlas von 51 Foliotafeln, enthaltend 659 Figuren.

8. Geh. 10 Mark.

Dr. W. H. Behse,

die praktischen Arbeiten und Baukonstruktionen

des Zimmermanns in allen ihren Teilen. Ein Handbuch für Zimmerleute, sowie für bautechnische Lehranstalten. Achte verbesserte Auflage. Mit Atlas von 51 Foliotafelu, enthaltend 595 Abbildungen. 8. Geh. 9 Mark.

R. To r m in,

Bauschlüssel

für Zimmerer, Maurer, Dachdecker, Bauunternehmer, Schachtmeister, Kommuual-Wege- und Eisenbahn-Baubeamte und alle sonstigen in der Bau-Praxis beschäftigten Gewerke, wie auch für Fabrikanten und Gutsbesitzer zum leichten Verständnis der wichtigsten bauwissenschaftlichen Formeln in Bezug auf Geometrie, Statik, Mechanik und der übrigen im Baufache vorkommenden Begriffe, Wörter und Kunstausdrücke, sowie der Preisangabe verschiedener Materialien und auszuführenden Arbeiten, nebst den unentbehrlichen Notizen und Tabellen behufs schneller Anordnung, Veranschlagung, Berechnung und Ausführung. Mit Umgebung der mathematischen Formeln in allgemein verständlicher Weise und durch Beispiele erläutert. Dritte vollständig durchgesehene und umgearbeitete Auflage. Taschenformat. Geb. 6 Mark.

W. G. Bleichrodt,

das Meister-Examen

der Maurer und Zimmerleute.

Ein Machschlagebuch für die Praxis nach den neuesten Konstruktionsgebräuchen und Erfahrungen und Wiederholungsunterricht für Innungs-Kandidaten und Bauschul-Abiturienten, zur Vorbereitung für die Prüfung. Vierte völlig umgearbeitete und vermehrte Auflage, zusammengestellt und herausgegeben von Paul Gründling. Mit einem Atlas enthaltend 16 Tafeln mit über 600 Figuren, gr. 8. Geh. 9 Mark.

A. und M. Graef,

die moderne Bautisehlerei

für Tischler und Zimmerleute.

Enthaltend die Architektur in Bezug auf die Säulenordnungen und alle beim inneren Ausbau vorkommendeu Arbeiten des Bautischlers, als: Thüren, Thore, Fenster, Treppen, Fussböden und Parkettmuster, ferner Ladeneinrichtungen und Vorbaue, Verkaufsbuden, Brunnenhäuschen, Kolonnaden, für kirchlichen Ausbau, Altäre, Kanzeln und Kirchenstühle, sowie auch Gesimse, Bekrönungen, Verzierungen für Sägearbeiten und Werkzeuge. Nebst bildlicher Darstellung der besten bekannten Holzbearbeitungsmaschinen, sowie spezielle Beschreibung über Leistungsfähigkeit etc. mit Angabe der Bezugsquellen. Ferner Anweisung zur Bereitung von Polituren, Firnissen und Lacken, Beizen, Leim- und Oel-anstrichen, Beschreibung der in- und ausländischen Hölzer, welche der Tischler verarbeitet und eine Anleitung zur Veranschlagung der Bautischlerarbeiten, letzterer Teil den jetzigen Lohn- und Preisverhältnissen gemäss gänzlich umgearbeitet. Elfte vermehrte und verbesserte Auflage. Mit einem Atlas, enthaltend 40 Foliotafeln und 150 Text-Holzschnitten. gr. 8. Geh. 10 Mark 50 Pfge.

Alfred Schubert,

Taschenbuch

der landwirtschaftlichen Bankunde.

Eine Sammlung technischer Notizen, Tabellen und Kostenangaben zum unmittelbaren Gebrauch beim Entwerfen und Veranschlagen der wichtigsten landwirtschaftlichen Bauten. Für Techniker, technische Schulen, Landwirte u. s. w. 8. Geb. 1 Mark 80 Pfge.

taf: i.

[°o

ft.

Vm.

JL. t

Sri:

Nàà- K-

mm mm

K

B

g.

m

7^

m

w.

;

I

!

py

^1

r

%

1*1 I I I f

M,

HlhTWk. I“

£

\10Mder ¹ r-wo

lOMeter

MMte

imm

K.

S. JL S.

eKetfW.

^\\l iiifpj.QL

W.

t!

•î

».25

Kutw. iißzz. v.0.t(él 1er.

Ł :

- v:

V

,

o!

TAR II

auö

■.

P|ï

I;

f ■ i

L'-l

Ë.

(%dU

<SlvuyLcf)kÇ$

C¹

10

Li

Meter

'MOO

30££*U

|2-4

lOMder I 200

w.

Ab.

L-:4

ćl ^91^CjC>c()O^Ó

/

■ •

Ql%ß/nJ?xuv) fui eine etcvmi£ie.

Ül

ill:

'I

te

i¹

s.

i|

mm

Heu.

ii.... j.igj]__

IjjtM

ein:'! u fj t.

Æm

y/.

P h I I I \⁵

I.OMełer ' *400

ipa

wmf

éKe£Ce^

lOMeier 1:200

K.

w.

Słali.

rVrT

'v.

fl

'

il

sa

!=r

M|U

iEE:EjE:EEEEEEE:EEEE:jEE:E::EjEEEEjEEEEEE:

0

■I Vrtl-I

S.

c^o/mifi

e .

►

^ R>

s$>

pJM

^Cs

LJÏÏLJ

Î

ssnu

P

iBiia

ii'

jf.

|iiiiinniiii|[mTTnirm

kL.

s.

5 Meter r-hoo

am Bill EffilillS alia

< f—=

pz

“

P=.X. Ij

il u* ß ef ©.

s.

I]

h°i 1111 £-1* i* i³1* i⁵

6 Meier I t wo

'©1

I®

SI

Kü.

-Wfcr

SKeQki.

'V

V.

ni V

Ab.

li ik

/ i r

W.

G.-St.

-

s.

OÊ

s.

w.

l^GYuj^cf)

TA F. V.

iii exyvc

QÏawûXve^.

jjPj

iwfflpilt¹— V

ILGçJI

iBgn

wk;

f'in f, iH.g

«ü

\0,ô,ù. £-4—1

4-1-1-1-1-[ 10 Meter P 200

Ab.

>Pj

v.

IÄI-S:

K.

w.

s.

Si.

WU««W. :WuMM

>•1/a-fj n f> a no |>u/t c ivxe

wnuia»

mm

!£j

Kjj'.j

iji.yi

^Lyiùaa>Ç)X.

6r.

s.

s.

#§

imé

w.

K.

0$>4A^Z5£$yo.

ft -i-11

TV

uv>.

Ÿ-- I- ■ I-1-1 - - $ I

i_19 Meter

' 1:200

cKeffev.

d~0b:

K.

S.

w.

cjeacß

KJOÔ .

Vf

WL ewe-

ełamifle.

ÿjg

C3~H F:

bSl^igSJ

SfMMQ]

,■--, <r !—i ...^~-v'...    , C==^> ,

•X- Ä Ä

rm

si

’ ||S| ‘    tO

Łfe

(?Lrto (5U

I Ym..

K.

Vm.

t c l SB.

me*

XQ I

F.

/•'łoo

i 6- St..

=J

Bn.

kk>.

-f-4

iw

Meier rwo

S.p. ln Ab.

s.

w.

v.

(SL

&Axiaebtj).

o .y .'y.

Entw: a^ez.Y.O. tÇllep.

S.

S.

“*Ff

Z.

XMVC/

■!'3

PS««

,11

il

iS;

I/«:"'

fe

Jflu-Schr

Vm.

P-f

ĆLns ic fjŹ .

^4-1-1 I 1*1 I I I \,0MUer

1 WO

L_

[I Gr.||

Vitt,

J¥k__

+-f-t

110 Meter

' P200

|K.

ÔÇœxaeùA>ty

M)s&£> .

.......~'i|

&iei(ex

G. St.

Ab.

K.

w.

$/u}ae&c$

v/>xy.

-

cWtlEle/.

S.

j/lfL ei/HC

ĆLnóicfjł (5U7

|Q i i i_j_ęi_ i_ÿt Meter t ’too

tr"

Iom i /    jł |3 |ł |i jg    J y Meter

;Gr

r=n

K.

_a

! Vm.

W.

■«J

ci}

sap

e-v-

SP.

G. St.

K.

w.

XXö£>.

ii/

jii

Vm.

[7/

p:

Ent w. uj^ez v. 0. ł^eller.

s.

Vm.

Z.

i) Il f)

I!«

B.

TP

s.

L4X&Ö

TAF X

OAXÖ

l'iVL

MWC

üiüJ

(5Lio^)to^/F

f I I I I I⁵'

11

CÏamiCic

■m

si

...

«s

Il 6r. Il

I Vm.

wik

JO Meter l'too

Lie al-

Æ.

-110 Meter vwo.

cKe£fc4X

K.

SP

G. St.

w.

S.

4=

55_J?5

fkùuxeôcpa

s.

IF

iTg

IS

iiiiiif

.Will!,

|inmnnt{uLimAiB)

vite (ref ĆL.

Ttnll

ô$y&LC^eb£$)

a no

fa é i tie t'I'a m i lit’.

pSUpPUp

nçn

in mini

icunicnrii

irTTT-IBITTT I

ĆVn&/icf)k cB.

1° I I I I I-

X>/9A.

It—I—I

Sp

s.

ITStj]

- Wasch-: hu{he.

ç^ïelùiaeôci)

, IQ Meier /f

t / inn

O&ù.

K.

V.

G.5t.

W.

X7/.V>.

Kn\w. u-jzi- vc £? fueller.

QüoJy/n^<iu.ô    ^Hte^eWv\Xać/\

MW>

ii

«fi

■H

Ćtnôicfyk' S5.

[B]

S.

Mu. Schn

K.

fc Wk.3

Z.

ff Z.

I Bn I

7T/

11

iG3L _L J

cJûCÙiqarcf}

I I I⁵ I I 1    1    \¹?^'    °

O D .*>.

s.

s.

K.

il

‘I

G. St.

W.

Entw.

U__Ç7<2Z. Y

0. lielUr.

::

[äl

TÄF. XIII.

j^itA evKte cf'amifi

IflltaMOl

rrs

HT 1

&

-■

ÏÏIJ

;;;

! liillii    -

I =    III

n]

[r:

Ćl ti.> icly t (5U

cK)auptavv:> tcfjł*

S-ieêeE

S.

|P.t ! .I.) ,Æt. , My

an

|E

.□JE

! fi—i

JOMetcr ¹ 1:200

/m

S.

jl

» -=

(!yß&ujtscf)

Ok>’) .

sP

K.

cr-sŁ-

[Ab.

ckt’CtW

e. st.

w.

£/7f)K ujez.v 0. Ifeller.

$

il

*

fi

M

K.

S.

L' VmJ

w.

s

&ibÿeïd)oyô 1 VOO.

tś

; r

r fH r3

MBiy,. mim^r

^imem

Mm*kïiW"à

'«S

fil

iV

//

»

If'/

[j;;i:{

! ^ĘiifŁ¹¹ ==

OT

c >ą

"LJ

& 'A

JjSIV

■sa:—, Ü

-■'■’»•s

ÎT1

i

“>r:

il '7

^l'/

-Er i

<

N

fsi

s x®* - -%ft. S;"L'r--_

Ciggp

j|§|j

^ fcrii«fey A~i''Vy

sśfSl

c^Âs|M

pf

:

SS

=-~tr =4\v^

Ä:

i

SK

iSKli

*±'~-xà.

_™|U - VîSk

tqs»*gf:^=r'—°

~=~

t*'-:

%&*&&

;v

£

y.

.X'

y

——■—- y- *gr

S^-sg?2S

Aa

-254' : ?

51-«

ftéi

/

^7//=Ty

g55

—J    r-^£

I7F3

5

aiÈ^fciWfe..-" A

.

^Tiu/yu) ti^oe ził oWj? 16 a. Î7.

V/ÆK

b

K.

w.

s.

^■>r>

l:200.

G St. J F.

gin^dSrT

/yy/A K \

^nnB

<?&e/upacÇ

0Ù5

-&

1 : «fOO.

lLJnu

cKef(W 1: łt00

Es.

K.

V.

W.

ill:

Sp.

Ab. o

G. St.

SI

IT

z u <Saj: 17

1-200

£nfvK w^cjez. k (2 Ur

.v;

\.p-

*HL

r.

V:

4*

i ^

-i

;

jST;'*

X'

i

■JT"-

--ksbt C

— • «=

sr— E3

:JSg8

<TOB

‘ä

Mm

sda

îCSïïfl

fpMIa

a*-

:

••

:;:S3

E3

E3

E3 . ^

■:^r

w?

-S'

!*f|f

¹ "•*" -Ä

I “4 < a ■

tÄ^yrm

* i

yM

,>■;

V

^ M

m0m&

- 'iiii

3P

■8M

m

1IÉP

BBäMR^^sÄ

K, ttfjdUBs

f - -. MM

H

-■

ii-J

fi

iV*

*

:

<&iæm

ly

■;

■43-,

if.?

ii i

gJiM

-7

SIX

X23

r-

'•

rv

gg;

”rj

g-j • -i. >

ZjM. T

h-

X \'Ai

"■■•% •’

'4î

tfeSiS rn’.-sj

riŁśok^

■ *'

jiftlWilfr*

:,.jSferffaS

V* :

dtâsÊ

lgij§|p

ĄuA/ erne- Qfoxwttù

te .

[Uj

ilAÜ«Ç.

Il¹'

llill: »,

âill

ii.

ma

h>.

Ifî

K.JK.

tïB 1 HH

Ć\s\X0 lcfy t.

S.

Bd

Sp

Bn.

-Il

Vm.

U'

K.

fWeink.

\° \ i i

S.

cKcÎÙa.

(tOMiter

'1:%00

$fjeitjcôe(yo.

G. St.

■

Iggl

Z.d H.

HI.

W.u.Es.

V.

Si

O-ô ô.

B^ujez.-vO. lulle

r.

%

//

oKonô tuv(<Jùmv jlev

d)$4^ i •

v//////////////////////////////////////^^

(£) S    ,XOj. /HO/TV 3 .

I

$

K

!

■“111

\

'S

ft

9TiW&ó/taf) 120 .

Ćltto eitel/CWo &fenJionz> but fel l

tom’u .

Z////////////////////M

W/M

tH_3

I?

eJfucfJć

>c

SM

b> \

łe

If

JE

Fy.1.

Fig. Z.

w±,.

ft

¹

Derselbe fertigt vollständige Bauzeichnungen einschl. Details und genauer Massenberechnung zu billigen Preisen in kurzer Zeit.

²

Gesetzlich geschützt im Deutschen Reiche.

³

Alles Nähere beim Verfasser.

ft

-fe4*

; t-

hz

wÆSm.

1 knê

ff

i I,

ÜI ■ffia—~Sj«t ’Ä __

2 03

ji

|| ^ II

Fig. 3.

ZuyTaf.1v/Z.

<?y.

m

Za Taf3uf.

^D^ytcUyÙ).

m

II

»

Zn Taf2u/S.

Â'

y

S>

O

A

i&SJi

ry

Kf

fx)

A

OD

U

-BP

R

1M&ter

■1:25

/

N

A

o

D

i

■t--

Zu Ta f i.

O_[

—;

Zu Taf. T.

:

L

J

f

1 IT

; z?

I

ZnTa£5.

1-25

ZivTaf 6. 1:50

#-

clki i ù.

Zu Taf.5.

1-25

il

S"

mm

::

I Zu T.6

P 25

m.

-I

pjpjojojo

ZuTaf.6.

1:25.

,wm.

Wm

{1 Mater io_ 1 ■■50

^0 oms_₍ 1 Meier 125

Entw. u.jez. y. 0. Relier.

kr

SÖ

Nsa

t)

pi

ga

5S

Sä

ZL

ZuTa,f7.

125

Q.

b,2iv

L Zu, Taf 7.

1:25

(Zu Taf. 7.

1-25

OAsCô .

!.

! L.

Zu Taf8. Ej

so ¹-----' p

*-i m i r

il

it

JL

fV

UTaf.r

Taf r / '50

Zn Taf 7 1:Z5

m E.....

Zu, Taf. 8.

1 Meter

/•\2J

ZuTafS

1-5CI

IMeter

t-25

/••5Ö

rom

^Cl&tcUyÙ>

nlllnlBäligiliip

fYf\

Zu Taf f).

a,

<M

A

fS

!o>

:r, i.. js. m j

m

i

I

M

ry

”

y

r

JO

}

G G G D d 0 C

Zu Taft).

fJ

ZuTaflOSj p'

i-

r\

W7Ą

ID]

Wz

y

Q

Q

Zu Taf.IO.f J>

J>

.Q

>

zfYWi

^ or> ■

+

+

&-

f

1 Meter V 25

JZntw. u• qez. yO. l{ell

>

er.

T ⁶D^tatCó.

E-) ZuTaf.11.

1-25

fn

ZP/

hü=77=ü

=?

Zulkf 1Z.

V)

f 50

Ziu Taf. 11 1 25.

JB

Zu Taf ‘12 .

Zu Ta f! 111-25

1 25

f-

■f

1Meter 1 25 Ą 2Mełer> 1 -50

Entw.u.gex.v. O. }{dlep.

-i—

ZuTaf. 14.

1 50

ZuTaf 14

/ 50

••S»

or

t."

®V/C fc(JLtÙ>.

ti

Tharmmotiv 1 •' 25

5;.

H Te

ZuTaf 14.

/ Fenstermoüv T25 -

——/    -    1-25

ZuTaf 15.

1:50

₍ 1 Meter TZ5 tMeter 15ü

c.

mrt

ZuTtt

1- 50 ,—.

iH....... M

y____r

3âl

JEntw. u.qez-, v. 0. Relier.

/&

f.

WYDZIAŁY POLITECHNICZNE KRAKÓW

BIBLIOTEKA GŁÓWNA

U „„31223

Kdn., Czapskich 4 — 678. 1. XH. 52. 10.000

Biblioteka Politechniki Ki akowskiej

100000298377