r

l ii.....“«¥3

WYDZIAŁY POLITECHNICZNE KRAKÓW

■'

BIBLIOTEKA GŁÓWNA

•^PSFSig-'«ff*»

’"t’ :    „ -v>v

xm.

i

s

*

' .v;

pmB

L. inw.

■Ę- i"

. ......

-isr •• »    •■r*-'’» •

ÇJÉ

up

yak.-

À

%

, ^.v. >r*j *ęi

ff*** l j»*reU§£

iÄfc|"»ä=.

fe^-i -

fi

- ■. - ■

WpÇZ

inkbleqje als ‘Baumaterial.

5Ä

m

. . -■ - 3*3?

&    ’ 'S . '    -

S „ -'tV    -L^v "'’ "•

>v"‘

■.«

■1

Mmmmi liii

M

•y

Herausgegeben vom

m**

*

3i«s

ÏV®

mÆ

WĘSm-

•.->■■

m

Bearbeitet von

Dr. Otto Kallenberg,

Erster Lehrer an der städtischen Blechner- und Installateur- Fachschule ,    Karlsruhe i. B. ^

«*

P

■iP

-ii

.

;ri'îf

'

Biblioteka Politechniki Krakowskiej

100000297365

o-

Ą

Zinkbleche als Baumaterial.

Ein Führer und Ratgeber für Bau= meister, Architekten, Bauführer und sonstige Bauausführende zur sachgemäßen Ausführung und richtigen Beurteilung von Zinkarbeiten an Bauten.

Herausgegeben vom

Verbände Deutscher BlnkwaNwcrke Berlin NW. 6,

Älbredhislraßc 11.

Bearbeitet von

Dr. Otto Kallenberg,

Erster Lehrer au der städtischen Blechner- und Installateur-Fachschule Karlstuhe i. B.

Mit 72 Figuren im Text

II. Auflage.

■=®D

• ÉlJfi rw■ -, if®

Selbstverlag des Verbandes Deutscher Zinkwalzwerke Berlin NW. 6.

Druck von F. Stoll jr. (E. Otto Willielmy’s Erben)

.Illustrierte Zeitung für Blechindustiie.

Leipzig 1912.

ISSU8IERA fSLSii.Su :

r-v.

KRAKÓW

CF"

Inhalts=Verzeichnis.

I.

Allgemeines über die Verwendung der Zinkbleche zu Bedachungen, Abdeckungen u. dergl.

1-8

Blech auch bei dem ihm weniger geneigten modernen Stil ein unentbehrliches Material für schwierigere Abdeckungen, Rinnen, Rohre, alle Arten Verwahrungen bei Ziegel-, Schiefer-, Holzzement-, Papp- u. dgl. Dächern. — Von den in Frage kommenden Metallen ist Kupfer für einen allgemeinen Gebrauch zuteuer, Blei nur auf Einzel fälle beschränkt, verzinktes und verbleites Eisenblech im allgemeinen von geringerer Dauerhaftigkeit. Zinkblech haltbar, billig. Beachtung seiner Eigenart bei der Verarbeitung. Oft Versündigung dagegen

II.

Die physikalischen Eigenschaften des Zinkes und die daraus sich ergebenden allgemeinen Grundsätze bei seiner Verarbeitung.

Roh- und Gußzink, stark kristallinisch. Neues Zinkblech geschmeidig, nicht kristallinisch. Grenzen der Sprödigkeit und Geschmeidigkeit. Altes Zinkblech wieder stärker kristallinisch.

Hieraus folgende allgemeine Konstruktions- und Verarbeitungsbedingungen. „Sacken“ des nicht unterstützten Zinkbleches. Abbiegungen rundlich. Indirekte Befestigung des Zinkes. Grundforderung der Ausdehn ungs- oder Bewegungsmöglichkeit. Mißbrauch des Lötens. Bleche in größerer Längenausdehnung, wie Rinnen, Kehlen u. dergl. in mehr profilierter Form verwenden.

. 9-12

Nichtbeachtung dieser Grundforderungen Hauptursache der Zerstörung des Zinkbleches . .

III.

Wetterbeständigkeit und Zerstörung des Zinkbleches.

Harle Oxydhaut bester Schutz des Zinkbleches gegen weitere Oxydation.

Diese Kruste wetterbeständig.

Aber zerstörbar durch Säuren,

Akc. Nr.

starke Laugen, frischen Kalk, Z em e nt (Isolierschichten), Ammoniak und andere Alkalien, Sch weiß wasser, dumpfe Luft, durch galvanische Ströme bei Berührung mit Kupfer oder Eisen oder deren Oxyden oder Ruß; schädlicher Einfluß der Rauchgase 13—14

IV.

Anstreichen, Beizen und Färben des Zinkbleches.

In besonderen Fällen anzuwendende Schutzschichten, als Bestreichen mit Asphaltpräparaten, Dachpix u. dgl., Ölfarbe (Rauhmachen des Zinkbleches vorher); Graphit in Essig verrührt.

Verschönerung des im Wetter grauweißlich gewordenen Zinkbleches durch Ölfarbanstrich, Graphitanstrich, Beizen mit Antimonbutter; Buntpix; Verkupferung. Ausführung. Verarbeitung fertig verkupferter Zinkbleche.

15—18

Berechtigupg der Farbänderung des Zinkes, als dadurch noch nicht verstoßend gegen die Grundforderung der strengen modernen Kunstforderung von der Materialechtheit

V.

Zlnkbedachnngen.

Allgemeines.

Einige Hauptvorteile, als Leichtigkeit, geringe Reparaturen, Leckstellen leicht zu finden und zu beseitigen; Anpassung an jede, auch geringe Neigung; jedwede Fläche abdeckbar; Billigkeit des Zinkdaches (bleibender Wert des Altmetalles); Feuersicherheit; Unschädlichkeit der Zinksalze gegenüber Kupfer- und Bleisalzen.

Korkstein-Zwischenlage als Schalldämpfer und Schutzmantel gegen Kälte und Wärme.

Große Wichtigkeit einer guten Dachschalung. . . .    19—25

1)

2)

3)

4)

Die verschiedenen Haupteindeckungsarten mit Zinkblech.

Falz- und Wulstendeckung ............

Die Leistendeckung..............

Das Wellblechdach..............

(Tabelle über Wellbleche S. 33).

Die Rauten- und Schuppendeckung ........

(Tabelle über gewöhnliche und Spitzrauten S. 37).

26-28

28-31

31-35

35—37

VI.

Wandverkleidungen in Zinkblech.

38-40

Vorteile der Abdeckung von Wetterseiten mit Rauten; vollkommene Trockenheit der Räume, gesunde Luftzirkulation, gefälliges Aussehen, Feuersicherheit, Billigkeit und Haltbarkeit

VII.

Sonstige mit Zinkblech auszufülirende Blech-Verwahrungen.

1)    Saum- oder Fußstreifen. Scharfe Tropfkanten. Befestigung auf

41-43

Holz, Hau- und Ziegelsteinen, Beton u. dergl. — Vorstoßbleche bei Holzzementdächern, Asphaltdeckung u. dergl,

2)    Gesims- und Mauerabdeckungen. Traufkanten, Abstand der

43-44

selben. Indirekte und direkte Befestigung auf dem verschiedensten Material

3) Maueranschlüsse für Ziegel-, Schiefer-, Papp- und Holzzementdächer. Allgemeine Konstruktionsbedingungen. Verschiedene Ausführungen der Überhangstreifen, deren Befestigung und Abdichtung 45—50

4) EindeckungvonSchornsteinen, Oberlichtern,Dachfenstern, Dunstrohren, eisernenStangenu. dgl. Hervorr a gunge n. Grundsätzliches und Einzelausführungen für die verschiedenen Dächer 50—52

. . 52—53

5)    Giebelabschlüsse, Ortgänge u. dergl. . .

6)    Kehlen in verschiedener Ausführung.....

7)    Dachrinnen (Dachkanäle, Kändel usw.)

Allgemeine Konstruktionsbedingungen und eine größere Anzahl Einzel-ausführungen

53-54

55-68

VIII.

Bie Herstellung der Zinkbleche.

69—70

Gewinnung und Reinignng des Zinkes. Das Auswalzen des raffinierten Zinkes zu Blechen. Gewichtstabelle der für Bauarbeiten hauptsächlich in Frage kommenden Bleche

IX.

71—73

Kosten der Bedachung und sonstigen Verwahrungen mit Zinkblech im Vergleich zu anderen Materialien

Vorwort.

Wenn heute in der Baukunst weit mehr als vor einigen Jahrzehnten die Eigenart eines jeden Baumaterials sowohl in konstruktiver als auch ästhetischer Hinsicht weitgehendste Berücksichtigung, das Material nur eine zweckentsprechende Verwendung finden soll, so dürfte es für den praktischen Baumeister zweifellos ein Bedürfnis sein, sich über die verschiedenen Baumaterialien, ihre besonderen Eigenschaften, Verwendungsmöglichkeiten und Verwendungsarten vollkommene Klarheit zu verschaffen.

So ist es bei der großen Bedeutung, die in unserem regenreichen Klima dem Dache zufällt, für ihn auch von großer Wichtigkeit, die zur Ausführung von Bedachungen und die zur ganzen Abdichtung erforderlichen Haupt- und Hilfsmaterialien genau zu kennen.

Zwar fehlt es nicht an guten Büchern, wie die zahlreichen Baukonstruktionslehren, einschließlich des Handbuches für Architektur beweisen. Doch sind sie meist recht umfangreich, und dann können sie, weil sie eben mehr oder weniger das Ganze umfassen sollen, vielfach das Einzelne doch nicht so eingehend und zweckentsprechend behandeln; oder sie sind andererseits wieder zu weitgehend spezialisiert und detailliert.

Diesem Mangel will die vorliegende Broschüre abhelfen. 1 n gedrängter Kürze will sie dem praktischen Baumeister — in ausführlicherer, mehr für den Praktiker berechneten Weise verfolgt die im Jahre 1885 von den Schlesischen Zinkhütten neu herausgegebene Broschüre: „Das Zinkblech und seine Verwendung im Baufache“ den gleichen Zweck — in gedrängtester Kürze, aber in übersichtlicher Weise will die vorliegende Broschüre die besondere Eigenart des Zinkbleches, die daraus folgenden Konstruktionsbedingungen und wohl zu beachtenden Konstruktionsgrundsätze nebst einergrößeren Anzahl bewährter Konstruktionen darbieten.

Vorwort.

VI

Auf dem Zeichen- und Konstruktionstisch will sie ihm bei seinen Entwürfen und Anschlägen treu beratend zur Seite stehen. Auf dem Bau bei der Abnahme und Beurteilung der fertigen Arbeit will das Buch ihn gleichfalls sicher führen und leiten.

Wie oft es gerade bei diesem wertvollen Baumaterial notwendig ist, daß nicht bloß der Klempner die Arbeit nach guter und richtiger Vorschrift solid und gewissenhaft ausführt, sondern daß auch bereits vom entwerfenden Architekt Rücksicht auf die Besonderheit der Zinkkonstruktionen genommen werden muß, ist außer anderem an einer Reihe von Beispielen dargetan. (Man vergleiche hierzu die Figuren 6, .50—56.)

In diesen bestimmten Beispielen ist gezeigt worden, wie die Konstruktionen vielfach entworfen und auch ausgeführt werden, wie sie aber weit besser und zwar oft ohne, oft mit nur geringem Mehraufwand zur Ausführung gelangen könnten und sollten.

Wie überall, so muß auch hier der Theoretiker mit dem Praktiker Hand in Hand gehen. Sie müssen beide sich gegenseitig verstehen und einander entgegenkommen.

Es ist natürlich unmöglich, im Rahmen einer kurzen und handlichen Broschüre, wie es die vorliegende sein will und soll, alle möglichen Ausführungsarten eingehender zu besprechen. Das ist eben Sache der Spezialwerke. Ich habe mich aber bemüht, wie bereits erwähnt, die ein für allemal zu beachtenden Grundsätze und Grundforderungen klar und deutlich abzuleiten und zu formulieren und an einer Anzahl Einzelbeispielen zu erläutern.

Möge das Buch in seinem bescheidenen Umfange, seinem Titel getreu, allen Bauausführenden ein treuer „Führer und Ratgeber“ sein!

Die Tatsache, daß schon nach einem Jahre sämtliche Exemplare vergriffen sind, und eine starke Neuauflage sich nötig macht, beweist wohl deutlich genug, wie sehr die Bearbeitung und Herausgabe eines derartigen Werkes auch den Baumeistern und Architekten willkommen ist.

Karlsruhe, im Mai 1912.

Dr. Otto Kallenberg.

ega ega □ c@a ega

aga ega | □ ega laga

aga I egaJeTfl ega |[ägj

I ggp li ega I □ I c©a]| aga ega I aga"] □ 1 c®a 1 aSP ega ega □ aga ega i

I.

Allgemeines über die Verwendung der Zinkbleche zu Bedachungen, Abdeckungen u. dergl.

Die neue Kunstrichtung, die auch in die Baukunst eingedrungen ist, ist der Verwendung des Bleches zu Bedachungen und bauornamentalem Schmucke weniger geneigt, als dies vor etwa zwei bis drei Jahrzehnten der Fall war.

Der Grund ist ein mehrfacher. Einmal bevorzugt man gegenwärtig die altheimische Bauweise. Außer einer scharf ausgeprägten individuellen und freieren Gestaltung des Ganzen und der Teile bilden vor allem hochansteigende, steile Dächer, sowie spitze Giebel, traute Erker u. dgl. besondere Merkmale des „neuen“ Baustils. Die stark hervortretenden Dächer sollen aber auch durch ihre Farbe, durch mehr oder weniger starke Schattenwirkung des Bedachungsmaterials einen angenehmen harmonischen Gesamteindruck hervorrufen.

Dann soll alles „materialecht“ sein. Täuschende Nachahmungen sind verpönt. Die Außenseite ist möglichst einfach.

Außerdem sind ja in neuerer Zeit auch die Papp-, Asphalt- und Beton-Abdichtungen zu weiterer Vervollkommnung und allgemeinerer Anwendung gelangt.

Inwiefern unsere gegen frühere Jahrzehnte mit weit mehr Ruß und verschiedenen Säuren erfüllte Atmosphäre den Blechen nachteilig ist, wird im 111. Abschnitt unter Metallzerstörung eingehender betrachtet werden.

Gleichwohl sind indes die Bleche auch heutzutage bei uns in Deutschland¹) noch ein gar wertvolles und unentbehrliches Material für den Baumeister.

Die gerade vom neuen Baustil so bevorzugten Erker, Türmchen, Kuppeln u. dgl. wird man nicht bloß aus technischpraktischen, sondern auch vielfach aus ästhetischen Gründen einer ruhigeren Flächen- und Kontrastwirkung wegen, gern mit Metall abdecken (s. Fig. 1). Ebenso wird man viele große Hallen, Lüftungstürme, Fabriken, gar manche flache Dächer der im hoheitsvollen griechisch-römischen oder Renaissancestil erbauten Theater und andere Monumentalbauten auch heute noch zweckmäßigerweise mit solider Blechbedachung versehen (siehe Fig. 10). Und bei allen Rinnen, Abfallrohren, bei Schornsteineindeckungen, Mauerverkleidungen, Mauerabdeckungen, Oberlichtern u. dgl., bei den vielerlei Verwahrungen aller Hervorragungen an Holzzement- und Pappdächern wird nach wie vor das leicht biegbare, sich jeder Falte anschmiegende, in jede Ecke und jeden Winkel passende und gut abzudichtende haltbare Blech sehr willkommen sein, den unangenehmen und so viel Schaden bringenden Gast, den eindringenden Regen, abzuhalten.

Fisr. 1.

[T I AU IT

fia

Dachreiter auf Ziegeldach, mit Zink, roh oder verkupfert, abgedeckt, gewendete Eisenbau zur Bedachung und zum ornamentalen Schmucke des

Daß auch der in neuerer Zeit viel an-

Bleches nicht bloß bedarf, sondern auch durch das Blech erst einen neuheitlichen Charakter bekommt, zeigen gar manche moderne Bauten. Es sei hier nur auf einige Beispiele der elektrischen Hoch- und Untergrundbahn in Berlin hingewiesen (siehe

Fig. 3, 4 und 5).

Weder Schiefer, noch Ziegel, noch weniger aber die mehr an Vorübergehendes, Interimistisches erinnernden Pappdächer kann sich hier denken. Blechbedachung und Bekleidung macht einen

nur

man

durchaus einheitlichen, günstigen und soliden Eindruck.

In rein ornamentaler Beziehung ist das Blech oder die Bronze, wie das verwendete Messing- oder Kupferblech vornehmer heißt, besonders für den Innenausbau, hier und da auch für die Außenarchitektur, gerade durch den neuen Baustil wieder bevorzugt.

Fis. 2,

T. %

- .3sSŁ^

m33

=s| isi j.1 b*

j*««

\mmm

111

yj s

pi

fr

Ml

[niw

(ii.

i I

\ riï I r

L-J

Ks»>

V -1

1

f 1 uac

Dachreiterchen und Erkertürmchen an einem Wohnhaus in Stuttgart mit vorher verkupfertem Zinkblech nach dem Falz- u. Wulstsystem abgedeckt.

Daß der Architekt und Baumeister auch am modernsten Bau ohne Blech nicht auskommen kann, dürfte aus dem eben Angeführten wohl hervorgehen.

Mit Zinkblech gedeckte Türmchen und Halle der Berliner elektrischen Hochbahn,

Haltestelle Oranienstraße.

Welches Metall, bezw. was für Blech soll man nun in diesem oder jenem Falle verwenden, welchem den Vorzug geben?

*****!&»

mkJ mm i

Ifi

wm

**■

is tili

:."7

■waasa#

aast

...i

lamii

3iw

<■ ,1

•nn r / ' ’•

W

\

K    J

ifij

Fis. 3.

ær²4²-;

, -»fcv

Zweifellos ist ja das schon in den ältesten Zeiten verwendete Kupfer ein vorzügliches, wegen seines hohen Preises²) aber nicht allgemein anzuwendendes Metall.

Die Kupfer-Zinklegierungen (Messing in seinen vielerlei Spielarten) sind für Außenarchitektur wegen der baldigen Zerstörung in-

Fisr. 4.

■ S* t.L

*'*J

4f|g

ft

'«à

..

n?f

’Ji,'frS! *

mIn

„•* r-- -

L <0*5™

'“•Jnrï ■ :*■ ¹

Tn

HI

SB

if

W'

[$> J

SÄ

: S§pl

'.V

V-

_~t-

Kohlenförderturm der Hochbahngesellschaft am Schöneberger Ufer in Berlin, mit Eisenblech abgedeckt.

folge Oxydbildung nur da zu brauchen, wo ständiges Putzen die Oxydhaut rasch beseitigt, kommen also bei Gebäuden nur für kleine Schilder u, dergl. in Betracht.

Kassenhäuschen der elektrischen Hcchbahngesellschaft in Berlin am Wittenbergplatz, mit Kupferblech

abge leckt.

Das früher bei Dächern großer Kirchen besonders viel ver-wendete W e i c h b 1 e i oder Walzblei ist aus verschiedenen, hier nicht näher zu erörternden Gründen mehr auf kleine Abdichtungen be-

itîUÏÏH

g!

l\

Ni !

ra

t «pr - ~_

JLj--ij

pml%\

wn

Mÿfi;

xl

Sil

■ ai

_L.

mm

X X ■'-"? w%

\\k

rr**#

iÄ#'^

są

fil

schränkt, wo man ein ganz besonders weiches, sehr leicht biegsames Material braucht, wie bei vielen Blechverwahrungen an Ziegelund Schieferdächern, zum Verstemmen von Überhangstreifen, Abdeckungsblechen u. dergl., bei Bruchstein- und anderem Mauerwerk und in ähnlichen Fällen mehr.

Das ebenfalls früher viel benutzte rohe Schwarz blech braucht öftere, teure Anstriche, sonst ists dem Verrosten in kürzester Zeit verfallen. Es findet bei uns kaum noch bei Bedachungen Verwendung.

Besser haben sich ja die durch Zink- oder Bleiüberzug geschützten Schwarzbleche, die verzinkten und verbleiten Eisenbleche, bewährt. Da aber der Überzug nur von geringer Stärke ist, zudem besonders bei Zink bei der Verarbeitung selbst und durch die stärkere Wärmeausdehnung der Zinkhaut leicht Risse bekommt oder sich wohl auch abblättert, so wird auch hier früher oder später durch das Freilegen des Eisenkerns Rostbildung eingeleitet, die dann leicht rasche Fortschritte macht.

Um diesem bald mehr, bald weniger auftretenden Übelstande sicher und wirksam zu begegnen, müßte man also auch hier, wenigstens in rußiger Groß- und Fabrikstadtluft, für immerhin teure und von Zeit zu Zeit zu erneuernde Ölfarbanstriche Sorge tragen.

ln dem Zinkblech bietet sich dem Architekt ein Material, welches bei ziemlicher Geschmeidigkeit und billigem Preise verhältnismäßig lange Haltbarkeit verbürgt und zwar ohne irgend welchen Ölfarbanstrich oder sonstigen Schutz.

Diese großen Vorzüge sind auch seit länger als fünf Jahrzehnten von praktischen Baumeistern voll und ganz gewürdigt worden.

Eines freilich ist richtig und muß immer wieder hervorgehoben und betont werden, daß dieses eigenartige Material zufolge seiner ganz besonderen Eigenschaften bei der Verarbeitung in ganz besonderem Maße Berücksichtigung seiner Eigenart verlangt. Wird es nicht sinn- und sachgemäß verarbeitet, so stellen sich bald allerlei Schäden ein. Mit Unrecht macht man dann das Material als solches verantwortlich³), wo man ausirgend einem Grunde, sei es aus Unkenntnis, sei es aus Unachtsamkeit, sei es in dem Bestre-

I. Allgemeines über die Verwendung der Zinkbleche zu Bedachungen.

ben, nur recht billig oder wohl auch bequem zu arbeiten, dies Material durch falsche Konstruktion oder falsche Behandlung gleichsam vergewaltigt.

Aus seiner Eigenart und seinem besonderen Verhalten ergeben sich auch die für Zinkbleche besonders geltenden Konstruktionsbedingungen, die man nicht ungestraft vernachlässigt.

Ehe dieselben im allgemeinen und im besonderen näher zu besprechen sind, sollen im nachfolgenden Abschnitt die physikalischen und chemischen Eigenschaften in gedrängter Kürze angeführt und daraus sich ergebende Folgerungen zur praktischen Ausführung und zweckmäßigen Verwendung der Zinkarbeiten im allgemeinen abgeleitet werden.

II.

Die physikalischen Eigenschaften des Zinkes und die daraus sich ergebenden allgemeinen Grundsätze bei seiner Verarbeitung.

Bekanntlich besitzt das Zink in gegossenem Zustande eine stark kristallinische Struktur und ist ziemlich spröde.

Die zur Verarbeitung erforderliche Geschmeidigkeit erlangt es erst, wenn es im erwärmten Zustande (100—150° C etwa) ausgewalzt wird. Bei stärkerer Erwärmung als 150° wird es wieder sehr spröde und leichtbrüchig, über 200° läßt sichs pulverisieren.

In der Kälte wird es ebenfalls härter und vor allem spröder.

Auch stellt sich bei dem sonst geschmeidigen neuen Zinkblech eine gewisse Sprödigkeit ein, wenn es mehrere Jahre draußen auf Bau gelegen ist. Es geht z. T. wieder in den alten kristallinischen Zustand zurück.

Die Zugfestigkeit des Zinkbleches ist bei 16° für Längsfaser mit 19 kg, für Querfaser mit 25 kg pro qmm bestimmt worden.

340

Von größter Wichtigkeit ist es aber, zu wissen und stets zu beachten, daß das Zink einen großen Ausdehnungskoeffizient besitzt. Er beträgt bekanntlich x/ (für 100°), während er für Eisen rund ¹/₉₀₀, für Kupfer x/₆₀₀ , für Blei ebenfalls rund ¹/₃₅₀ ausmacht. In der Richtung der Längsfaser, also in der Walzrichtung, ist diese Ausdehnung ein wenig größer, als quer zu derselben. Aus diesen allerwichtigsten physikalischen Grundtatsachen ergeben sich folgende

Praktische Folgerungen bezw. allgemeine Konstruktions-bedingungen für das Zinkblech:

1) Bei flachen oder sehr wenig gebogen e-n Rinnen oder Kehlen soll man es nicht sich freitragen lassen, sondern ihm stets eine entsprechende feste Unterlage von Holz, Stein, Beton u. dergl. geben (vergl. Fig. 47, 50, 52—56). Bei Sima- u. dergl. Rinnen, sowie bei Gesimsen aus Zinkblech soll man stets für gute Versteifung durch geeignetes Abbiegen, Wülsten u. dgl. oder Eisenschienen und ähnliches Sorge tragen, da das durch warme Sonnenstrahlen weicher werdende Material sich leicht ausbiegt und „sackt“ (vergl. die Fig. 36, 50—53, 56 — 64 in diesem Buche, sowie Fig. 57, 63 u. a. m. in des Verfassers „Rinnen- und Gesims-Konstruktionen “).

2)    Alle Ab- und Umbiegungen, Auf- und Umkantungen, alle Falze u. dergl. sind sehr ran (Hielt auszuführen, niemals scharf zu machen (s. Fig. 42, 57 u. a. m.).

ln ganz besonderem Maße ist dies zu beachten, wenn man die Bleche der Länge der Tafel nach, also in 2 m-Stücken oder bei geringerer Temperatur (unter 12° Wärme) verarbeitet. In letzterem Falle sollte man stets mit Kohlenpfanne, Gasofen u. dergl. oder bei Abbiegebänken wohl auch direkt durch kleine Gasflämm-chen entsprechend, aber ja nicht zu stark erwärmen.

Wenn auch oft nicht gleich, so stellt sich doch häufig später durch das „Arbeiten“ des Zinkbleches ein Reißen der Falzen und sonstigen Abbiegungen leicht ein (s. Fig. 57 z. B.).

3)    Alles Zinkblech soll auf Bau so befestigt werden, daßesdem starken Ausdehnungsbestreben Folge leisten kann.

Es darf deshalb niemals mehr als höchstens auf einer Seite festgenagelt werden (wie Kiesleisten z. B.). Wo irgend möglich, ist es indirekt durch eingehängte Hafter u. dergl. zu befestigen (s. Fig. 15, 32, 42, 46 a und b u. a. m.).

Wo irgend angängig, sollte man lieber einzelne von einander unabhängige Teile machen, als alles aus einem Stücke, wie bei Kastenrinnen u. dergl. z. B. (s. Fig. 52 und 53).

So ist es auch als ein grober Konstruktionsfehler zu bezeichnen, wenn man, wie in nebenstehendem Falle geschehen, die Bedachung und Rinnen bei geringem Gefälle zusammenlötet (s. Fig. 6).

Und warum ? Aus Bequemlichkeit oder Unkenntnis. Was helfen da die Leisten, was die Querfalzen, wenn das Zinkblech oben an der Mauer durch Verlötungen der Tafeln und unten durch feste Lötverbindung mit der Rinne sich nicht bewegen, nicht spielen oder „schaffen“ kann ! Ist es dann ein Wunder, wenn, wie in diesem bestimmten Falle geschehen, das sonst nach allen Regeln abgedeckte Dach nach zwei Jahren schon geflickt wurde, daß die Querfalze aufsprangen, die aufgesetzten Flecke wieder auf den Falten und Bauschen Risse erhielten?

Das Zinkblech selbst war noch wenig angegriffen. Es hätte gut und gerne drei und vier Jahrzehnte ohne Reparaturen liegen

~Q

Fig. 6.

Maßstab 1:100.

oft)

tötet

NTäfeln

oben Zus (fehl erh

amenge

Gelölet

Fa/z-

Geplatzt

Naht

'/

{fehlerhaft,

Loht-.Naht .(fehlerh aff)

<1

Beulen u. Risse

s\

/M

é* / %Z-

■s>

'S

<v

o~»

CI

■c

runql

V

in

in

cu

-O

nu 59

Verhexe

iuoo

Querschnitte a-b

Ein der Sonne stark ausresetztes Zinkdach, das sich infolge fehlerhafter Konstruktion nicht bewährt, nur wenig gehalten hat (Beulen, Falten. Risse, also nur physikalische Zerstörung), dann arg geflickt, nach etwa 10 Jahren vollständig erneuert

werden mußte.

Fehler: 1) Die einzelnen Scharen durften oben und unten an den Leisten nicht zusammengelötet werden.

2) Die Tafeln der sehr breiten Kehle durften nicht zusammengelötet

werden.

3) Die Rinne durfte mit der Bedachung nicht durch Lötung verbunden sein. Verbesserung: 1) Scharen oben und unten vollkommen getrennt

(s. Fig. 15).

2)    Kehle in Mitte hohe Leiste; Nähte alle gefalzt (Notfalz, s. Fig. 18).

3)    Rinne vertieft (s. Verbesserung 1) und rundlich gehalten, mit Schiebenaht (s. Fig. 65, 68); oder einfache Hängerinne (s. Verbesserung 11 der Fig. 6).

können, wenn man richtig, sinn- und sachgemäß konstruiert hätte. (Rundliche Rinne vertiefen, ebenso Kehle durch Auflage auf Sparren.

Schiebenähte in vertiefter, flachgerundeter Rinne.) Oder besser noch, Zinkblechbedachung bis zur Traufkante glatt durchgehen lassen und einfache Hängerinne anbringen, Kehle mit Notfalz versehen (s. Fig. 18 und 47). Das freilich konnte der Klempner nicht, das wäre Sache des Architekten gewesen.

Sieht man sich alte re Z i n karb e ite n, Bedachungen, Kehlen, Rinnen, Abdeckungen u. dergl. m. näher an, so wird man überhaupt finden, daß das Schadhaftwerden allermeist den physikalischen Ursachen, also dem behinderten Au s d e h n u ng s b es tr e b e n zuzuschreiben ist. Alle Falten, Bauschen, die sich auf dem Bleche in den verschiedensten Richtungen bilden und allermeist früher oder später zu Rissen führen, sollten an uns jedesmal den dringenden Mahnruf ergehen lassen: Gib mir Bewegungsfreiheit, gib mir freies Spiel der Kräfte und ich berste nicht!

Daß dieser Forderung nicht in jedem Fall so ganz leicht zu genügen ist, sei gern zugegeben. Aber rechtes Nachdenken seitens des Klempners, guter Wille und volles Verständnis und Entgegenkommen auch auf seiten des Architekten würden auch hier allermeist zu einem befriedigenden Ergebnis führen.

Die sonst so vorzügliche Eigenschaft des Zinkbleches, sich so leicht und gut löten zu lassen, hat das freilich bequeme, zunächst auch so billige Zusammenlöten aller Teile z. T. mit verschuldet. Diesem Mißbrauch des Lötens muß möglichst gesteuert werden. (Rundliche Falze, Notfalze, Wulst- u. a. Leisten, Schiebenähte u. dergl. m., wie später ausführlicher gezeigt werden wird.)

4) Wo irgend möglich, sollte man, eben wegen der starken Ausdehnung und der damit verbundenen Faltenbildung mit ihren Rissen, besonders Bleche von größerer Längenausdehnung, wie Rinnen, Kehlen, Kehlrinnen u. dergl. in rundlicher, also mehr oder weniger profilierter Form verwenden. Das Material schiebt sich bei der vorhandenen Standhaftigkeit bei der Dehnung und Stauchung aneinander. Es gibt keine Falten, folglich auch keine Risse, mithin auch eine weit größere Haltbarkeit. Daß dies im allgemeinen recht wohl ausführbar ist, zeigen eine Anzahl angedeuteter Abänderungen ausgeführter Flach-rinnen-Konstruktionen in den Figuren 50—55. Das ist auch der Grund, weshalb Wellblechbedachungen eine weit größere Haltbarkeit zeigen und Reparaturen so gut wie ausgeschlossen sind.

III.

Wetterbeständigkeit und Zerstörung des Zinkbleches.

Wie bekannt, bildet sich auf neuem, dem Wetter ausgesetzten Zinkblech zunächst eine dünne weiße Schicht von abwaschbarem Zinkoxyd. Nach wenigen Monaten schon geht aber diese Schicht durch Aufnahme von Kohlensäure in eine harte, feste, unverwaschbare Kruste von kohlensaurem Zinkoxyd über (dem Zinkerze Galmei vergleichbar).

Dank diesem Selbstschutz kann Zinkblech viele Jahrzehnte allem Wetter ausgesetzt sein, ohne zerstört zu werden, wie u. a. auch zahlreiche Zinkblechbedachungen beweisen. Einer besonderen Schutzdecke, wie es das Eisen in Form von Anstrichen, galvanischen Überzügen u. dergl. unbedingt nötig hat, bedarf das Zinkblech im allgemeinen nicht. Das ist eine äußerst wertvolle Eigenschaft.

Allerdings gibt es eine Anzahl Stoffe, die sowohl diese harte Kruste, als auch das Zinkblech selbst mehr oder weniger angreifen, bezw. „zerfressen“, wie der Praktiker kurz und treffend sagt.

Wir können sie unterscheiden in chemische und elektrochemische Zerstörungsursachen.

Zu den chemischen gehören:

1)    Alle Säuren, sowohl die starken anorganischen (Salzsäure, Schwefelsäure u. dergl.), wie auch die schwächeren anorganischen; so die Harnsäure (Pissoirrinnen), die Gerbsäure harzreicher grüner Schalungsbretter, die Essigsäure, die beim Ranzigwerden aller Fette sich bildenden Fettsäuren (Zink nicht zu Küchenabfallrohren nehmen), die verschiedenartigen Säuren von Kanalabwässern, die Humussäure usw.

Wo also solche Säuren in flüssiger oder dampfförmiger Form mit Zink in Berührung kommen, wird es früher oder später zerfressen werden. (Anstrich mit Ölfarbe, Dachpix u. dergl.)

2)    Alle starken Laugen greifen Zinkblech mehr oder weniger an. So der Salmiakgeist, vor allem aber frischer, noch nicht erhärteter Kalk und Zement. Man wird es also möglichst vermeiden, frischen Mörtel mit Zinkblech in direkte Berührung zu bringen. Bei Rohren, Rinnen, Abdeckungen u. dergl. könnte man eine Schicht Dachpappe (Goudron-papier u. dergl.) dazwischen bringen.

3)    Unter Umständen kann auch das Schweiß- oder Kon-denswasser starke Oxydbildung (kleine weiße Wärzchen) veranlassen, besonders, wenn die Luft noch abgeschlossen ist, wie bei Schutzrinnen z. B., die dicht unter die Hauptrinnen gelegt werden. Man sorge für möglichste Luftzirkulation bei allen derartigen Konstruktionen.

4)    Bekanntlich bildet sich, wenn Zink mit einem anderen Metall oder auch mit Kohlenstoff (Ruß) in direkte Berührung kommt und von etwas salz- oder säurehaltigem Wasser umspült wird, ein galvanischer Strom. Der aber wirkt zersetzend auf die Schutzschicht und aufs Wasser und kann so allmählich eine Zerstörung (Art Auflösung) herbeiführen. Ähnlich wie die Metalle, vor allem Eisen und Kupfer, wirken auch deren Oxyde (Rost und Grünspan).

Man wird es also vermeiden, nicht gestrichenes oder unverzinktes Eisen (Rinneneisen, Rohrschellen, Mauerhaken, Dachnägel u. dergl. m.) in direkte Berührung mit Zink zu bringen. Ebenso wird man Zink nicht unmittelbar an Kupfer anlegen oder Zinkrohre an ein Kupfer dach an schließen. Auch das von Kupfertürmen abspritzende Regenwasser mit dem aufgelösten Grünspan wirkt auf Zinkblech zerfressend ein (Weichblei verwenden, Zink mit Dachpix streichen), und zwar um so stärker, je mehr das vom Kupferblech kommende Wasser auf eine Stelle spritzt oder läuft, wie bei Kehlen, Rinnen, Rohren u. dergl.

„Er zerfrißt den Zink“, Besonders wird sich dies auch wieder

5)    Ähnliches gilt auch für den Ruß. sagt der Praktiker kurz, hauptsächlich da zeigen, wo der Ruß längere Zeit in größeren Mengen liegen bleibt, in Ecken und Winkeln, hinter Schornsteinen, Oberlichtern u. dergl., in Rinnen mit geringem oder gar keinem Gefälle usw.

Daß die Rauchgase unserer Kohlenfeuerungen, vor allem wegen ihres Gehaltes an schwefeliger Säure und Ammoniakdämpfen eine schädliche Wirkung ausüben, ist klar.

IV.

Anslreichen, Beizen und Färben des Zinkbleches.

Trotz des wirksamen Selbstschutzes vom Zinkblech (durch Entstehung der erdigen harten Kruste von kohlensaurem Zinkoxyd) gibt es in der Baupraxis eine Anzahl Fälle, wo man die Kruste und damit das Zinkblech selbst schützen muß, oder wo man es durch anderen Farbton verschönern wi'1.

Zum Schützen vor Zerstörung kann man, wie im III. Abschnitt angegeben, überall da genötigt sein, wo die Rauchgase der Kohlen mit ihren heißen Dämpfen von schwefeliger Säure und Ammoniak direkt aufs Zinkblech treffen, wie bei den mit Zinkwellblech abgedeckten Eisenbahnhallen z. B. Oder da, wo Grünspanwasser von Kupfer aufs Zink spritzt, oder wo Dämpfe von Essigsäure, Salmiakgeist u. dergl. die nun einmal vorhandenen Zinkkonstruktionen zu zerstören drohen u. dergl. m.

Als Schutzmittel kommen in Frage:

1)    Bestreichen mit angewärmtem Asphalt, Dachpix und ähnlichem Teerpräparat.

2)    Ein Ölfarbanstrich. Um diesen haltbar und am Zinkblech haftbar zu machen, sollte man ihn am besten erst dann ausführen, wenn das sonst glatte Zink durch Oxydation genügend rauh geworden ist, also zwei bis drei Monate nach dem Verlegen; selbstredend in mehreren Schichten nur dünn auftragen und jedesmal gut trocknen lassen.

Ein Anstreichen des neuen blanken Bleches mit sehr verdünnter Salzsäure stellt die gewünschte rauhe Oberfläche sehr schnell her. Oder man streicht vorher mit Silikatfarbe an, die einen sehr rauhen Grund abgibt, oder mit verdünnter Antimon-butter (s. unter Nr. 3).

3)    Auch ein Anstreichen mit Graphit (Ofenschwärze) in Essig aufgelöst soll u. a. gute Dienste leisten und haltbar sein.

Ein eigen Ding ist’s mit der Farbe des Zinkbleches. Das neue Blech wirkt mit seinem matten Graublau an sich eigentlieh nicht so unangenehm. Erst, wenn sich die weißliche, mit Rußteilchen mehr oder weniger grau oder wohl auch schwarz gefärbte Oxydhaut bildet, stellt sich der dem heutigen Architekt und seiner strengeren künstlerischen Auffassung unangenehme weißlichgraue, stumpfe Farbton ein. Es macht ihm einen etwas ärmlichen, „blechernen“ Eindruck.

Gleichwohl gibt es auch Bauten, wo dies natürlich gar nicht in Frage kommt, wie bei reinen Nutz- und Zweckbauten; oder man sieht das Blech überhaupt nicht; oder es wirken die stumpfgrauen Farbtöne der Mansardenfenster, Kuppeln, Mansardengesimse u. dgl. auf Dächern, die mit roten Ziegeln gedeckt sind, gar nicht einmal so unangenehm infolge beruhigender Kontrastwirkung.

Zur Beseitigung der nicht gewünschten stumpfen Farbe des ausgewetterten Zinkbleches kommen hauptsächlich folgende Maßnahmen in Betracht:

1)    Ein Ölfarbanstrich mit Berücksichtigung der unter 2 oben angeführten Vorsichtsmaßregeln.

2)    Bestreichen mit Graphit, in Essigsäure verrührt, wie unter 3 angegeben.

3)    Bestreichen mit Antimonbutter, d. i. eine Auflösung von Antimonchlorid in Alkohol. Man erhält, je nachdem man nur einmal oder öfter aufträgt, einen helleren oder dunkleren bis schwarzen, schiefergrauen oder sammetähnlichen, haltbaren Farbton (die Lösung mit Wasser verdünnen).

Auf das so behandelte Zinkblech kann man auch, wie oben angegeben, jeden beliebigen Ölfarbanstrich in sehr haltbarer Weise auftragen.

4) Wo starke Säuredämpfe oder elektrolytische Einwirkungen Zerstörungen herbeiführen und wo man das tiefe Schwarz nicht wünscht (bei Eiskellern u. dergl. z. B.), kann man auf die Dachpix-Grundierung noch einen in beliebiger Farbe gehaltenen Anstrich von Bunt-Dachpix (weiß, schiefergrau, ziegelrot, blattgrün, patinagrün) auftragen*)- Auch kann man statt eines Anstriches mit Ölfarbe einen solchen mit Emaille-Pix ausführen.

5) Zuletzt käme noch das in neuerer Zeit beliebt gewordene Verkupfern des Zinkbleches in Frage.

Bekanntlich hat sich das mit Kupfer plattierte Zink- und Eisenblech als Baumaterial nicht bewährt. Durch elektrolytische Ein-

*) Näheres findet man in der Broschüre: „Dachpix für Metalldächer“, herausgegeben von der Dachpix-Gesellschaft Klemann & Ço., Oberschöneweide-Berlin.

Wirkungen wurde das Grundmetall Zink oder Eisen in kurzer Zeit zerstört.

Besseren Erfolg erzielt man mit der Verkupferung auf nassem oder galvanischem Wege.

Man bedient sich dazu meist des schwefelsauren Kupferoxydes oder Kupfervitrioles (des sogenannten Blausalzes) oder auch des Kupferchlorides. Beide Salze werden in reichlicher Menge weichen Wassers aufgelöst, durch Zusatz von Salmiakgeist schwach alkalisch gemacht. In diese Flüssigkeit werden die vorher gut gereinigten, noch nicht verarbeiteten Bleche eingetaucht, dann gut abgerieben und rasch vollkommen getrocknet; oder man macht durch Zusatz von Schlämmkreide u. dergl. eine Art Brei zurecht und reibt sie (auf Bau) auf. Nach sofortigem gutem Nachspülen mit Wasser wird mit Sägemehl u. dergl. getrocknet, dann die Verkupferung mit gekochtem Leinöl, auch wohl unter Zusatz von wenig Terpentinöl bestrichen.⁴) Am Zinn haftet das Kupfer nicht. Deshalb sind die zinnbedeckten Lötnähte nach dem Verkupfern des Bleches mit Lack oder Ölfarbe zu bestreichen.

Auch gibt es in neuerer Zeit ein- und zweiseitig galvanisch verkupferte Zinkbleche im Handel zu kaufen. Sie haben einen schönen gleichmäßigen, kupferroten Farbton ohne die unangenehmen hellen und dunklen Streifen und Flecke. Vermeidet man, wie später auch in vielen Fällen als recht wohl ausführbar gezeigt werden soll, alles Löten dabei, so hat man hierin ein zur Abdeckung von Kuppeln, Erkern, kleinen Vordächern, Pavillons u. dergl. recht geeignetes Material (s. oben Fig. 2, S. 3).

Doch, wie sieht diese Verkupferung nach ein oder zwei Jahren aus? — Nun, die Schicht wird schwärzlich, wie einfaches Kupferoxyd. Hierin teilt sie aber das Schicksal mit fast jeder Metallbedachung, wenigstens soweit sie innerhalb der Kohlenatmosphäre sich befindet. Auch Kupferblech wird in der gewöhnlichen Rußluft meist bald schwarz, weniger grün.

Daß aber eine derartige Verschönerung der Oberfläche des Zinkbleches dem von der neuen Kunstrichtung aufgestellten und so streng betonten Grundsatz von der Materialechtheit durch die bloße Farbänderung an sich noch keinesfalls widerspricht, ist wohl klar. Sonst dürfte man ja das so reichlich verwendete Holz auch nicht durch Anstrich verschönern oder mit der Umgebung harmonisch abtönen. Daß nicht gestrichenes oder gebeiztes und sonstwie behandeltes, also naturechtes Holz im Freien ebenfalls recht mißfarben wird, einen recht „rohen“, schmutzigen und ärmlichen Eindruck macht, kann man an alten Bretterzäunen oder den alten Holzbekleidungen der Wetterseiten von Scheunen u. dergl. leicht erkennen. Dasselbe gilt für Eisen und viele andere Stoffe.

Die Verschönerung des Zinkbleches als solche durch irgend welche Farbgebung dürfte demnach in keiner Weise gegen den Fundamentalsatz von der Materialechtheit verstoßen, solange man es nur in konstruktiver Hinsicht richtig, also als deckendes, schützendes, bekleidendes Material verwendet.

V.

Zinkblechbedachungen.

Allgemeines über Zinkbedachungen überhaupt.

Von den Vorteilen, die ein Zinkdach bietet, seien nur die folgenden hervorgehoben:

1) Es ist eine sehr leichte, dabei doch stur in sichere Bedachung. Durch das geringe Gewicht wird gegenüber dem so schweren Holzzement- und Ziegeldach nicht unwesentlich an Ilolz-und Mauerwerk erspart.

Gewichte einiger Hauptbedachungsarten.

Ziegeldach 1 qm wiegt kg

Schieferdach 1 qm wiegt kg

Holzzemcntdach 1 qm wiegt kg

Glattes Zinkdach 1 qm wiegt kg

ca. 100-140

ca. 65—85

ca. 30-50 ca. 9-12

(ohne das aufgenommene Regenwasser, Schnee u. dergl.)

2)    Ein Zinkdach braucht bei richtiger sinn- und sachgemäßer Konstruktion sowie bei solider Ausführung sehr wenig Reparaturen. Es bedarf nicht, wie ein Asphalt-Pappdach, immer wieder zu erneuernde, darum kostspielige Anstriche. Es ist unter normalen Verhältnissen (s. unter III) nicht so leicht der Zerstörung ausgesetzt, wie verzinktes und verbleites Eisenblech mit ihren dünnen Schutzhäuten (unter ¹/₁₀ mm Stärke).

3)    Etwaige Leckstellen sind leicht aufzufinden, rasch und leicht zu beseitigen. Dies ist ein entschiedener Vorteil gegenüber manchen anderen Bedachungen, wie z. B. dem Holzzementdach, dem neuen Pappdach mit Zementstrich auf Bim-steinzwischenlage („Dachperle“).

4) Man kann bis zu sehr geringen Dachneigungen heruntergehen, hat dadurch in der ganzen Dachkonstruktion

Fis. 7.

's

Ml

mtä

iS?

lilOOr°U

fHnlzzement

<r

Gebäudetiefe

Mindestneigung für die verschiedenen Bedachungsarten.

Fis. 8.

4'

(K,

o\

,-iüSÖ

^tssi

v-5

oi«S

5ŚWft5jW

tó

K-*

Hohe

3°

7 777

Die Neigungen von Fig. 7 bezogen auf die halbe Tiefe bezw. aufs

Meter.

eine größere Freiheit. Ferner spart man entsprechend am Gebälk des Dachstuhls, sowie an Bedachungsmaterial selbst, wie nachstehende Tabelle zeigt.

Zusammenstellung der Mindestneigung für die verschiedenen Bedachungen.

Gefälle auf 1 m bezogen

Neigungs

winkel

Verhältnis der Art der Bedachung Höhe zur ganzen Gebäudetiefe

Ziegel . . Schiefer . .

00 to

er er

v>'

00

45° bis 34° 34° bis 27°

1 m bis 67 cm pro m 67 cm bis 50 cm pro m

Zink

Raute und Wellblech . j Leistensystem 1 : Notfalz . .

OO

CD

1 :40

3°

Pappe ! ! ! . I 1 :10 bis 1 : 15 Holzzement . .

11° bis 7° 20 cm bis 13 cm pro m 5 cm pro m

Fig. 9.

Wie man aus Fig. 9 sofort sieht, ist die Größe der Dachfläche = Traufk. X b-

CT SU

Nun ist aber

= cos oc oder b = —-—.

cos rx

Traufkante

bach fläche

Grundfläche

Folgi. Dachfl. = Traufk. X

Dachfläche =

cos a

d. i.:

Grundfl.

cos a

Diese Zunahme der Dachfläche mit dem Neigungswinkel ist aus nachstehender Zusammenstellung für 150 qm Grund-

Abhängigkeit der Größe der Dachfläche von dem Neigungswinkel und der fläche genau zu ersehen: Grundfläche.

Größe der Dachfläche

Bedachung

Neigungs

winkel

Ziegel

45°

150

0,71

211,30 qm

Schiefer

34°

150

0,83

180,75 qm

Raute . .

18°

150

Zink

0,95

157,90 qm

Leistensystem

10°

150

0,99

151,55 qm

5) Man kann jede Art Fläche, ob eben, von beliebiger Neigung, oder einfach gekrümmt (Zylinder- oder Kegelflächen), wie

Fis. 10.

'~kA

Große Kuppel mit Lüftungsjalousien, großen Schnecken.

bei zahlreichen Erkerabdeckungen, Kuppeln u. dergl.; ob doppelt

gekrümmt, wie bei manchen Kuppeln, gleich gut abdecken (s. Fig. 10, 11, ferner oben 4, 5 u. a. m.)

Fig. 12.

Fis. 11.

10 cm

•5

Mit Blech ab gedecktes Erkerdach.

iS

Ein cbdm massiven Metalles gibt 1 qm Blech von 1 mm Stärke.

6) DieZinkbedachung ist, richtig betrachtet, billig, d. h. unter Beachtung aller in Frage kommenden Faktoren, als: wenig Reparaturen, lange Haltbarkeit, geringe Anlagekosten z. B. dem Kupfer gegenüber, Wegfall laufender Unterhaltungskosten, bleibender Wert des Altmetalles (mit rund 40°/₀ mindestens vom Neuwert), wohingegen verzinkte und verbleite Eisenbleche nach dem Verrosten vollkommen wertlos sind.

Bei richtiger Bewertung ist auch das dem Kupfer und Eisen gegenüber geringere spezifische Gewicht nicht außer acht zu lassen.

Da 1 cbdm eines Metalles 1 qm Blech von 1 mm Stärke gibt — man braucht sich ja den Würfel in Fig. 12 nur in 100 dünne Plättchen zerlegt zu denken — so erhält man die in nachstehender Tabelle angeführte Anzahl qm, die man mit je 100 kg der verschiedenen Metalle eindecken kann.

Tabelle der Deckungsfähigkeit (Ergiebigkeit) der verschiedenen Metallbleche von je 1 mm Stärke.⁵)

Name

des Metalles

Sprzif.

Gew.

1 kg Metall deckt

100 kg Blech von 1mm Stärke decken ⁵)

Deckungsfähigkeit bezogen auf Kupfer

Zink.....

Verzinktes Eisenblech . . . .

7,1

7,1

— 0,140 qm

14 qm

1,3«

7,6

7,6

--- 0,131 qm

13,1 qm

1,18

Kupfer . .

Ol

0,111 qm

11,1 qm

Wie man hieraus ersieht, kann man also mit 100 kgZink 1,26 mal mehr, also rund x/₄ mehr, als mit Kupfer decken (gleiche Stärke vorausgesetzt).

7) Eine Zinkbedachung, desgleichen eine Zinkbekleidung von Giebeln u. dergl. bieten vorzüglichen Schutz gegen die bei Holzschindeln, Bretterwänden u. dergl. oft sehr verhängnisvoll werdende Weiterverbreitung des Feuers durch F1 u g f e u e r.

Beim Brande selbst ist Zinkblech entgegen einer immer noch verbreiteten Annahme ebenfalls ungefährlich. Es wird mit seinem Schmelzpunkt von 420° bei mäßiger Glut schmelzen und in geringen Mengen abtropfen. Bei stärkerer Glut verwandelt es sich in weißflockiges Zinkoxyd, das sich der Luft mitteilt, bezw. mit dem Rauch entweicht. Ein eigentliches feuerförderndes Brennen des Zinkes, wie bei Holz und anderen Materialien, ist ausgeschlossen.

8) Zu beachten ist endlich, daß weder Zink noch seine Oxyde oder Salze irgendwelche giftige Eigenschaften zeigen, wie dies bei Blei sowohl als auch bei Kupfer in so hohem Maße der Fall ist. Man hat also bei Verwendung des von Zinkdächern aufgefangenen Regenwassers bei Gebrauch zu Bade- oder sonstigen Zwecken nichts zu befürchten.

Den allen Metallbedachungen eigenen, natürlich nur in unmittelbar darunter befindlichen Wohn- und Schlafräumen unangenehm sich bemerkbar machenden Nachteil, daß auffallender starker Regen und Hagel störende Geräusche hervorbringen, kann man, wenn nötig, durch Zwischenlagen von Korksteinplatten stark mindern, (s. Fig. 58). Ein Ausfüllen mit Sägemehl, Torfmull oder Lohe wirkt ja ebenfalls sehr schalldämpfend und ist weit billiger. Durch die stockende und vom Kondenswasser angefeuchtete Luft ist aber ein Fäulnisherd geschaffen, der sowohl dem Holz wie auch dem deckenden Zinkblech gleichermaßen gefährlich werden kann, abgesehen von dem großen Übelstande, für manches Ungeziefer eine willkommene Brutstätte geschaffen zu haben.

Eine solche Ausfüllung würde auch zugleich dem ebenfalls allen Metallbedachungen eigenen Übelstand begegnen, durch das gute Leitungs- und Ausstrahlungsvermögen der Metalle die darunter befindlichen Räume stärkerer Erwärmung und größerer Abkühlung durch äußere Einflüsse auszusetzen.

Die Dachschalung

M

IX.

¹

Daß man in manchen andern Ländern, wie Nordamerika, Rußland, in vielen südlichen Ländern mit ihren flachen Dächern auch heute noch in vorteilhafter Weise die verschiedenen Bleche zur Abdeckung in weit allgemeinerer Anwendung, als bei uns verwendet, sei nur nebenbei erwähnt.

Dr. Kallenberg, Zinkbleche als Baumaterial.

²

Der augenblicklich geltende niedere Preisstand ist eben eine außergewöhnliche, deshalb auch jedenfalls nur vorübergehende Erscheinung.

³

Nicht selten hört man wohl von Praktikern den Ausspruch : „Ja, der Zink war eben sonst besser, als heute.“ Eine durch nichts bewiesene Behauptung! — Inwiefern gewisse zerstörende Einflüsse zugenommen haben, wird genauer im III. Abschnitt gezeigt.

⁴

Genauere, besonders für den ausführenden Praktiker wichtige Angaben findet man in der größeren Broschüre: „DasZtnkblech und seine; Verwendung im Baufache“. III. Aufl.

Dr. Kallenberg, Zinkbleche als Baumaterial.

⁵

Für Stärken von V₂ mm wird die gedeckte Fläche natürlich doppelt so groß usw.

Die Dachschalung.

Ol

HO

Die Dachschalung

ist von wesentlichstem Einflüsse auf die Güte und Haltbarkeit der darüber liegenden Zinkbedachung.

Sie soll glatt und eben sein und so bleiben. Es sind deshalb nur trockene, glatte Bretter von mäßiger Breite (ca. 16 bis 20 cm) zu verwenden. Die Nägel sind gut einzutreiben, da vorstehende Köpfe das Metall zerstören (mechanisch und chemisch bezw. elektrochemisch).

Die Stärke der Bretter darf nicht zu gering sein (2,5—3,5 cm), da sonst beim Arbeiten des Holzes sich alles wirft und das Blech natürlich in Mitleidenschaft gezogen wird.

Behufs guter Durchlüftung und rascher Beseitigung des dem Metall schädlichen Schweißwassers bekommen die Schalbretter am besten Zwischenräume von etwa 5 mm.

Die Bretter sollen möglichst ast- und harzfrei sein. Gerade an den Aststellen hat man öfters Zerstörungen des Zinkes wahrgenommen.

Eine eigentlich selbstverständliche Forderung sollte es sein, daß man nur gut ausgetrocknete, glatte, neue Bretter verwendet und nicht etwa mit Kalk u. dergl. beschmutzte alte Rüstbretter u. dergl. Abfall zur Schalung gerade gut genug findet.

Ist durch dichte Abdeckung, wie beim Leistendach, die zur Verhütung des jederzeit schädlichen Kondenswassers erforderliche natürliche Durchlüftung der Dachräume nicht in genügendem Maße möglich, so ist sie anderweitig durch Luftlöcher, Dunsthauben, regensichere Jalousiedachfenster u. dergl. herbeizuführen.

Wenn auch bei steileren Dächern die quergelegten Schalbretter mit ihrer Rinnenbildung auf dem Zink nach dem Werfen weniger Schaden bringen, so sollte man bei Dächern von geringer Neigung diesem Übelstande doch dadurch begegnen, daß die S c h a 1 b r e 11 e r auf Querpfetten senkrecht zurTraufe, nicht parallel zu ihr, verlegt werden.

Die verschiedenen Haupteindeckungsarten mit Zinkblech.

Wenden wir uns nun der Konstruktion und Ausführung der Zinkbedachung selbst zu.

Der oben (unter II) angeführten Grundforderung von der Bewegungsmöglichkeit des Zinkbleches entsprechend, werden die glatten Bleche durch Falze, Wülsten, Leisten u. dergl. mit einander verbunden; oder man verwendet auch wohl mit großem Vorteil besonders profilierte, sogenannte Wellbleche.

Demnach kann man folgende vier Hauptdeckungsarten unterscheiden:

1)    Die Falz- und Wulstendeckung.

2)    Die Leistendeckung.

3)    Die Rauten- und Schuppendeckung.

4)    Die Wellblechdeckung.

Sie sollen in den Hauptzügen jetzt näher besprochen werden.

Fi*. 13.

v\£

o*:

'M,

Hafrer

Blech- I Tafel

Wie

-XU

ter

?”

Qrat im, Weichblei

2*5

X rr>

u>

Weichblei

Scheibe

Bleikappe

in

N‘

ex

ca 3 bis kam

jrjrnr/f/Ą/rrmrn^

Mit einfachem Steh- und Querfalz bezw. Gratwulst in Zink abgedeckte

Türmchen.

1. Die Falz- und Wulsfendeckung

ist der bei Schwarzblech (Kupfer u. dergl.) üblichen Eindeckung entlehnt, natürlich der Eigenart des Materials entsprechend abgeändert.

Man macht von ihr Gebrauch bei der Abdeckung von kleineren Zeltdächern (Gartenhäuschen u. dergl.), Vorhallen, Erkern, Türmchen u. dergl. m. (s. Fig. 2). Bei ebenen oder mäßig geschweiften Formen kann man auch recht gut das vornehmer aussehende (vorher recht gleichmäßig) verkupferte Zinkblech verwenden, da ja im allgemeinen nichts oder nur sehr wenig gelötet wird.

Die vorgerichteten Tafeln bezw. Tafelstücken (s. Fig. 13, b und c) werden unten mit Falz, Wulst u. dergl. (s. Fig. 29) in einen Vorsprungstreifen (siehe Fig. 14) eingehängt, oben mit Falz versehen, seitlich aufgebogen. Diese Längs- oder Gratfalze

pis. 14.

1h

y

Vinkel- Vorsprung-

3treifen

boppelter-

Verschiedenartige Vorsprungstreifen, auf Holzschalung zu befestigen.

Einfacher-

Das über-

werden natürlich bei Zink nur einmal herumgeholt, greifende Blech muß unbedingt angereift (s. Fig. 20, 48), wenn möglich der Wetterseite (West bezw. Südwest) abgewendet sein.

Oder man kann auch eine Wulst aufsetzen bezw. überschieben, wie in der Fig. 13 angegeben. Die Wirkung ist eine kräftige, gute.

Die Tafelstücken werden oben mit Haftern befestigt, wie in Fig. 15 und 18 angegeben. Auf den Graten erfolgt die Befestigung mit einfachen oder in der Mitte oben eingeschnittenen Haftern, wie aus Fig. 13 a zu ersehen. Am unteren Ende wird die Grat- oder Deckwulst schräg abgeschnitten oder mit ovalem Boden verschlossen (s. Fig. 13).

2. Die Leistendeckung

ist im Grunde genommen nur eine Art Abänderung der Falz- und Wulstendeckung. Die Querfalze bleiben (s. Fig. 15). Statt der Längs- oder Gratfalze bezw. Wülsten werden besondere Deckleisten oder Kappen von Zink über fest aufgenagelte Holzleisten geschoben.

Je nach der Form dieser Holz- oder Deckleisten und der Befestigung der letzteren hat man zwei Hauptdeckungssysteme, nämlich das deutsche und das belgische, die sich besonders bewährt haben und in Deutschland vorwiegend Verwendung finden (s. Fig. 16 und 17).

Der Falz der Qu er nähte ist in Fig. 18 veranschaulicht. Die zweite, vor allem aber die dritte Ausführungsart mit dem söge-

<?=o

Zinkbedachung nach dem belgischen Leistensystem.

a — aufgelöteter Hafter (Notfalz, Fig. 18). b ^einfacher Falz bei Neigung über 15° (s Fig 7)-c — Leistenende. Tafel geschweift- d = Schiebenaht des Leistenendes an Maueraufkan-tungen u. dergl. H = Hafter (pro lfd. m 2—3). Kein Versetzen der Quernähte.

Fis. 16.

H after um gebogen

,7^

, r'

Fis, 15. ¹)

f/age/hopf

versenkt

: UO

4-5

v\

\5orn~^

\l

Deutsche oder Berliner Leiste mit zweierlei Haftern in a und 6.

nannten Notfalz, wohl auch Doppelfalz genannt, eignet sichvorallem für Dächer von sehr geringer Neigung. Bei ca. 10 cm Überdeckung kann man gut bis zu 10° Dachneigung (s. Fig. 7 und 8) herunter-

Seite 122.

gehen, ja noch weiter herunter, ohne ein Eindringen des Wassers befürchten zu müssen.

Fis. 17.

v>\e'

mssjsWf

Hafter

P|e

Falsch

Richtig

(Wasser hoch gezogen.)

a — vereinigte deutsche und französische Leiste, einfach und gut. h deutsche Leiste mit Falz statt Wulst in richtiger und falscher Ausführung.

c belgische Leiste.

Die in diesen Fällen meist beliebte Lötung mit all ihren oben unter Abschnitt 11 angeführten großen Nachteilen fällt weg. Die

Fis. 18.

4$/

irr»

Eingehängte, t Engelöt.

Hafter

37 ĆT7

■é—Z - -

JE

(tiy

fei C

/VOTEELZ bei geringer d^TfE£/6ü/V6(L/nt. 15°)

Querfälze in verschiedener Ausführung.

Tafeln bleiben glatt und ohne die gefürchteten Falten und Bauschen mit ihren Rissen.

Der Mehrverbrauch an Material ff₅ bis ¹/₂₀) wird durch Fortfall aller ärgerlichen und kostspieligen Reparaturen, sowie weit größere Dauerhaftigkeit der ganzen Eindeckung reichlich aufgewogen.

An den Längsnähten legen sich die aufgekanteten Tafeln an vorher festgenagelte Holzleisten an (s. Fig. 16 und 17). Die schräg eingeschlagenen Nägel sind gut zu versenken, am besten mit eisernem Dorn. Beide Arten, die deutsche und die belgische,

Fis. 19. ²)

sind unten schmäler, damit das Zinkblech sich seitlich bewegen kann.

Leistenende mit Kappe (Tafel abgeschnitten).

K— Kappe, am Ende anreifen (s. Fig. 20, 48). T— Tafel. V= Vorprungstreifen.

Bei der Ausführung der Eindeckung ist ja darauf zu sehen, daß nicht bloß den durch Querfalz verbundenen einzelnen Tafeln, sondern auch den der Länge nach ineinander gehängten Tafeln, den sogenannten Scharen, der notwendige Spielraum zum Ausdehnen und Zusammenziehen bleibt (s. unter Abschnitt II).

Als grober Konstruktionsfehler ist es demnach zu bezeichnen, wenn die Tafeln unten an den Leistenenden und oben bei Maueranschlüssen u. der gl. in bequemerer Weise einfach zusammengelötet werden. Hier muß unbedingtjede Schar für sich bleiben (s. oben Fig. 6, sowie Fig. 15 und 19).

An der Traufe oder beim Auslaufen in der Mitte des Daches hinterm Schornstein (s. Fig. 15) werden die Holzleisten entweder schräg oder auch gerade abgeschnitten (s. Fig. 19 und Tafel I in der größeren Broschüre: „Das Zinkblech und seine Verwendung im Baufache“). Oben wird eine aus Fig. 15d deutlich zu ersehende Schiebenaht gebildet. Ebenso ist bei Kehlen zu verfahren. Bei geringerer Neigung Doppelfalz verwenden (s. Fig. 18).

Zu solider Bedachung sollte man Zinkblech Nr. 13 oder 14 nehmen. Ferner ist darauf zu sehen, daß zu den mit Wulst versehenen Deckstreifen der deutschen Eindeckung (s. Fig. 16) ja nicht zu schwaches Blech verwendet wird, da sonst durch Einwirkung der Sonne gern ein Aufrollen der Wülsten erfolgt.³)

In Fig. 17a ist noch eine der französischen Leistendeckung (s.größ. Broschür.) ähnliche Kappe aus starkem verzinkten Eisenblech angegeben. Die Ausführung ist billig (leicht zu befestigen und abzunehmen) und gut.

Daß bei dieser zwar vollkommen staub- und rußfreien Eindeckung über erwärmten Räu men mit ihrer verderblichen Schweißwasserbildung für gute Durchlüftung der Bodenräume gesorgt werden muß, darauf ist im III. Abschnitt bereits hingewiesen worden.

3. Das Wellblechdach

eignet sich in erster Linie für kleine und große offene Hallen (Fig. 3), Lagerhäuser, Wagenschuppen, Eisenbahngebäude der verschiedensten Art, aber auch für andere Gebäude, wie Theater (Dresdener Hoftheater), Werkstätten, Fabrikgebäude u. dergl. m.

Es hat verschiedene große Vorteile:

1)    Die Eindeckung der vom Werke fertig bezogenen oder wohl auch von größeren Bauklempnereien selbst gewellten Zinkbleche ist eine verhältnismäßig einfache.

2)    Die Bedachung ist standhaft. Falten und Bauschen mit ihren Rissen können sich nicht bilden.

3)    Sie ist infolgedessen auch dauerhaft. Das mit Zinkwellblech im Jahre 1874 abgedeckte Hoftheater in Dresden hat sich nach Aussage der Kgl. Sachs. Hofbau-Inspektion sehr gut bewährt.

4)    Sie bedarf so gut wie keiner Reparaturen. Das Werkstattgebäude der Auer Fachschule ist mit klein gewelltem Zink auf Latten im Jahre 1877 gedeckt worden und bis heute ohne irgend welche Reparaturen noch gut imstande, also nach 35 Jahren! Ein beredtes Beispiel für die Dauerhaftigkeit. Dabei ist Aue eine im Talkessel gelegene, sehr betriebsame Fabrikstadt.

5)    Sie ermöglicht gute Durchlüftung ohne besondere Vorrichtungen. Das Zink bleibt unterhalb fast wie neu.

6)    Bei provisorischen Bauten kann man bei deren Abbruch die Tafeln leicht abnehmen und anderweitig wieder verwenden.

7)    Die Bedachung ist feuersicher.

8)    Da, wo verzinktes Eisenblech bald zerfressen wird, wie bei großen Eisenbahnhallen, hat sich Zinkblech drei- bis viermal so lange gehalten (und behält seinen Altmetallwert von 40°/₀ noch!).

Der Nachteil des gewellten Zinkes dem verzinkten Eisenblech gegenüber, mehr Unterstützung zu benötigen, wird also wohl reichlich durch die weit größere Dauerhaftigkeit aufgewogen.

9)    Man spart die Unterschalung, kann gleich gut auf eisernen, wie auf hölzernen Dachstühlen verlegen.

10)    Die W e 11 b 1 e c h b e d ac h u n g macht einen gefälligen Eindruck.

Was nun die für gewöhnlich verwendeten Profile, deren Materialverbrauch, sowie die Pfettenabstände anlangt, so sind sie aus der nachstehenden Tabelle (s. auch S. 33) zu ersehen.

Die Zahlen gehen von Mitte zu Mitte Pfette.

Profil

Nr. 12

Nr. 13

Nr. 14

Grillo

bedürfen der Unterstützung durch Dachschalung

Für gewölbte oder bombierte Wellbleche kann man je nach der geringeren oder stärkeren Wölbung (Krümmungshalbmesser) Abstände von 1,5 bis 2 m nehmen.

Für die Eindeckung selbst mögen kurz folgende Anhaltspunkte dienen.

Fis. 20.

v°

5,no ht-

HrrgęreiffJ

tu

Längsnaht der Wellblechtafeln, der Wetterseite abgewendet.

1)    Die Dachneigung soll nicht unter 30° betragen (etwa 55 cm pro m; s. Fig. 7 und 8).

2)    An den Quernähten sollen sich die scharf übereinander-gelegten Tafeln 10 cm, besser 12 cm, überdecken. Eine Verbreiterung der Naht gestattet im allgemeinen kein Heruntergehen unter die eben angeführte geringste Dachneigung. Ein nicht zu geringes Anreifen beider Tafelenden würde am ehesten das erreichen lassen (s. Fig. 20, 48).

10 qm Deckung erfordern an glattem Blech (bei 10cm Überdeckung etwa)

°l °0, O, m r—

o oj o

co co

T—H    ł—<

14,0 qm 15,0 „

12,9 qm 12,5 „

12,8 qm 13,0 „ 13,1 „

13,5 qm 13,2 „ 13,1    „

der Breite nach gewellt etwa

Materialverbrauch der verwendeten Profile.

Art der Herstellung und Größe

der Länge nach gewellt etwa

ca. 1,6 m X 2,05 m „ 1,3 „ X 2,05 „

„ 1,0 „ X 1,37 „

ca. 1,18 m X 3,0 m „ 0,92 „ X 3,0 „

„ 0,69 „ X 2,0 „

ca. 1,6 m X 2,36 m „ 1,3 „ X 2,36 „ „ 1.0 „ X L63 „

ca. 1,33 m X 3,0 m „ 1,08 „ X 3,0 „ ,, 0,81 X 2,0

ca. 1,35 m X 2,4 m

ca. 1,00 m X 2,64 m

ca. 1,5 m X 2,61 m „ 1,3 „ X 2,61 „

„ 1,0 „ X 1,72 „

ca. 1,0 m X 1J2 m „ 1,0 „ X 2,58 „

0,35 m X 2,48 m 0,35 „ X 1,65 „

ca. 1,08 „ X 3,0 m „ 0,80 „ X 2,0 „

1,00 m X 2,80 m

ca. 1,30 m X 1,5 m

“ s‘i x “ zïi “

„ 0 87 „ X 1,5 „

ca. 0,86 m X 1,0 m

Glatte Tafeln

von

Herstellende

Firma

Bezeichnung des Profils (Maße in mm)

Blech-

No.

O O. O co co c\T

XXX

E * «

CO CO O

Zinkwalzwerk Silesia in Lipine

10-16

1,6 m X 3,0 m 1,3 „X 3,0 „ 1,0 „ X 2,0 „

1,35 m X 3,0 m 1,00 „X 2,0 „

Zinkwalzwerk Silesia in Lipine

'srX '

10-17

Zinkwalzwerk Humboldt in Kalk

I*.

Jßß-Xv

8—16

1,00 ni X 3,0 in 1,14 „ X 2,8 „

Zinkwalzwerk

Grilio

in Oberhausen

8—14

co co co

E c c !2- 2- XXX XXX

-H N co

0,35 m X 3 m 0,35 „ X 2 „

Zinkwalzw. Silesia in Lipine und Piela in Rudzinitz

Zinkwalzwerk Silesia in Lipine

Zinkwalzwerk ’Humboldt in Kalk

J)

Wellenhöhe6mm, VVellenbreite20mm

d-i

! Wellenhöhe 9mm, Well eil bi eite 14m ml

10-17

5-14

6—12

3) An den Längsnähten müssen die Bleche sich mindestens */₂ Welle überdecken. Die Enden sollen möglichst federnd angebracht werden. Unter Umständen Enden anreifen! Die übergreifenden Tafeln sollen der Wetterseite zugewendet (s. Fig. 20), die Naht also dem Wetter abgewendet sein.

Fig. 21.

Wetterseite.

Das Überdecken der Wellen in den Längecnähten gezeigt. (Vergl. auch Fig. 20.)

Traufendę am Wellblechdache, die Ösen an den ; Wellen und die Haken an den Pfetten zeigend.

4) Ein „Heften“ der Tafeln (kleine Tropflötstellen) sie zum besseren Aufliegen zu bringen, nützt auf die Dauer nichts. Die Löthafter platzen infolge des Schaffens des Materials auf.

Fig. 23.

um

Fig. 22.

-\

Abschluß am First der Wellblechdeckung durch eingekantete Blechstreifen, über welche ein Schlußstreifen übergeschoben

ist.

Abschluß am First der Wellblechdeckung mittels des von der Schlesischen Aktien-Gesellschaft fabrizierten Firstbleches, unter welches ein oben abgerundetes Holz gelegt ist.

Will man, um vollkommen staubfreien Dachraum zu erhalten, die Quer- und Längsnähte löten, so hat man durch geeignete Be-

festigung mittels der Hafter für genügenden Spielraum beim Ausdehnen und Zusammenziehen zu sorgen.

5)    Die Befestigung der Tafeln auf Holz- und Eisen-pfetten ist aus den Figuren 21 und 23 zu ersehen, ebenso die Firstabdeckung aus Fig. 23.⁴)

6)    Die kleingewellten Profile verlangen Lattung oder wohl auch Schalung. Man kann sie sowohl bei Dächern als auch bei Wandflächen („Wetterseiten“) benutzen, sowohl allein als auch in Verbindung mit Rauten (s. Fig. 28).

4. Die Raufen- oder Schuppendeckung

bietet sowohl zur Eindeckung von Dachflächen als auch ganz besonders zur Abdeckung von Wetterseiten der Häuser besondere Vorteile.

1)    Sie gewährt bei richtiger Ausführung einen wasserdichten, dabei aber doch gut ventilierten Dachraum.

2)    Sie macht einen gefälligen Eindruck, besonders wenn man die Größe und Form der Rauten der Größe und Art der abzudeckenden Fläche und dem Charakter des ganzen Gebäudes anzupassen weiß (s. auch Fig. 27).

3) Sie ist sehr haltbar, da es keinerlei Falten und Beulen

mit Rissen geben kann.

Teile können dem Spiel der ausdehnenden und zusammenziehen-

Alle

Fig. 24,

1 00 TD -

den Kräfte ungehindert folgen.

Gestanztes Schuppenblech der Ornamentenfbr. Kraus, Walch en-bach & Pelzer, Stolberg (Rhld.)

4) Der Mehrverbrauch an Material durch die vielen Falzüberdeckungen wird nicht bloß durch den gänzlichen Fortfall an Reparaturen, sondern auch dadurch aufgewogen, daß man schwächere Bleche Nr. 10 bis 12, bei Wandverkleidungen Nr. 9 und 10, verwenden kann.

5)    Sie eignet sich allerdings am besten für steilere Dächer mit Neigung über 30° (s. oben Fig. 7).

6)    Man verwendet Quadrat-, ferner Spitzrauten mit und ohne Mustereinprägung, sowie auch sogenannte Schuppenbleche (s. Fig. 24). Sie sind in größeren Stücken gepreßt, werden ebenso

verlegt wie die Rauten selbst. Bei eisernen Pavillons, wo man Gratwulste nehmen kann (s. Fig. 13), sowie zur Abdeckung von Feldern an Holzveranden u. dergl. nehmen sich solche galvanisch verkupferte Schuppenbleche recht gut aus.

Was die Herstellung, die Größe und Verlegung der Rauten anlangt, so ist folgendes zu beachten:

1) Die Falzen sollen hinten recht rundlich gebogen, am besten mit Wulst versehen sein (s. Fig. 25), damit das Wasser sich nicht hochziehen kann.

Fig:. 26,*) :l

T~i:>

Fi?. 25.*)

Z_/o

Ex

Sie⁷

O = obere, U — untere Ecke einer schlesischen Raute.

Zinkbedachung nach dem Rautensystem. 5 = Saumstreifen. E= Einfassungsstreifen. /⁷=First-streifen H ~ Hafter. Z/¹ = Hafter (a — angelötet. b — angenagelt). L — abgeschnürte gerade Linien.

2) Bei Dächern mit größerer Neigung sollen diese Wulstfalze etwa 2 cm, bei geringerer Neigung (bis 30°, nicht darunter) 2'/₂ cm breit sein.

3)    Einen guten Abschluß sowohl gegen Wirbelschnee, als gegen das vom Sturm gern in der Ecke eingepeitschte Wasser bieten der Schutzwinkel unten und die oben am Hafter angelötete Schutzkante der schlesischen Patentraute (s. Fig. 25).

4)    Die Befestigung geschieht mittels besonderer Eck-und Seitenhafter (s. Fig. 26). Sie dürfen nicht eingehängt, sondern nur aufgelegt bezw. angehängt sein, wie die Fig. 27 zeigt.

5)    Bei Saumstreifen, Oberlichtern, Schornsteinen, Kehlen u. dgl. kann man den einfachen, oder besser noch (bei den untergreifenden seitlichen und oberen Stücken) den Notfalz (s. Fig. 18) benutzen.

*) Aus des Verf. Buch: „Der prakt. Klempner“, II. Aufl., S. 124 u. 134.

Dimensionen und Gewichte der fertig gelieferten Patentrauten.

Seiten

lange

der

Raute

Diagonale

Gewicht in Kilogramm pro 100 Stück

Gewicht in Kilogramm pro qm Dachfläche

Nr. 10 Nr. 11 Nr. 12 Nr. 13

Nr. 10 Nr. 11 Nr. 12 Nr. 13

Anzahl pro qm Dachfl.

£ R R R R R R

8 8 $.8 8 8 S

o" o' S S S S S

0,56

0,63

0,71

0,78

0,85

1,06

69,20

84,80

101,43

120,20

140,60

oo S S r—"    t-' i ’

N O) CO (O 00 t>

— — CM

gj to    —

5.P 22 £ g g 23

o b oo oo c - u

Tf o, o I cm" in o ¹ o co m

CM CM CO

Ul jjl O' po <J> to T&. "-0 to "co

- O OC W IO

cm co o m b- oo co

b O © N O) CO

i>" i>" S S S S S

CM 't —■    Tf CM CM

O ffll¹ O b n O

oo c-" t-" t-" S S S

p> j~a j>j j to “en Ol oo —

OO OO ^ Ol IQ

'lo 'o ^ Ol "co "oo oj LO Ol O Ol OI

Dimensionen und Gewichte der fertig gelieferten Spitzrauten.

jsjr Länge Breite

Gewicht in Kilogr. pro 100 Stück

Nr. 10 Nr. 11 Nr. 12

Gewicht in Kilogr. pro qm Dachfläche

Nr. 10 Nr. 11 Nr. 12

Anzahl

oP :cö E^

o o o o

Ol Ol P co

00 O OJ 00

O CM 1C 05 CM CM CM CM

o" o" o" o"

4^ U tJ tO

o oi o « "o "o 05 tfc.

o o

Ul 4^ OJ tO

co to to o

o o — o

in^ m o o o" S co" —"

CO CO o

05 05

to 05 t- Ot

t" CM t" 8

00 oo" t> b-"

00 CO b~ S

oT oT cc cc

— — to co

OJ CG Ol JO

oi to o "o

VI.

Wandverkleidungen von Zinkblech.

Wohl jeder Baumeister hat schon mit der großen Unannehmlichkeit und Schwierigkeit zu kämpfen gehabt, die „Wetterseite“ eines freistehenden Hauses trocken zu halten. Ob er harte Steine (Klinker) nimmt, ob Zement unter den Putz kommt, immer wieder so und so oft nasse Wände, modrige Zimmer!

Asphaltanstriche auf dem Putz sind wahrlich keine Zierde, oft auch wenig haltbar. Asphaltähnlicher dicker Belag unterm Putz läßt keinerlei Durchlüftung zu. Schieferbelag stört häufig durch das lästige Klappern. Ziegeln sind plump und schwerfällig. Bretterbeschlag sehr feuergefährlich, dabei immerhin roh. Holzschindeln wohl zierlich, auch dem Zwecke entsprechend wasserdicht und luftdurchlässig, allein ebenfalls sehr gefahrbringend bei Feuersbrünsten, dabei doch nur in manchen Gebirgsgegenden (Schwarzwald z. B.)

„heimisch“.

Die großen Vorteile, die Räume vollkommen

trocken, hygienisch luftdurchlässigzu halten, einen recht gefälligen, wenn man will auch zierlichen, dem Charakter des Gebäudes an z u p a s s e n d e n Eindruck zu machen, ohne besonders teuer, dabei doch von großer Haltbarkeit zu sein, alle diese und andere Vorteile mehr bietet der Belag mit Rauten oder Schuppen.

Man kann sie in rechteckiger (s. Tafel II der größeren Broschüre), besser in quadratischer Form verwenden, bei Ziegelsteinen oder Holzfachwerk wohl auch direkt ohne Lattung annageln (oben 2 Stifte), bei Bruchsteinmauerwerk auf Lattung verlegen, ähnlich wie bei Dächern (s. Tafel V der größeren Broschüre und Fig. 26 dieses Buches).

Durch Größe und Form, durch wechselnde Stellung, die Rauten an den Enden und bei Stockwerksübergängen gerade, die übrigen diagonal gestellt, durch einfache Muster u. dergl. m., durch immer gut haltbaren Ölfarbanstrich (s. oben unter IV) kann man den heute gestellten höheren ästhetischen Ansprüchen wohl genügen (s. Fig. 27).

(Sb

jsssśgś

^v' f! i

:■-• .

;t-i -S

; rr~~j

- .f v* ■*    ...^,^1

mm

Ilu Ut

J*

si

»    aS

■hhmsmmmé^æ

.

< M* ' g

• *<?

,%a, •- <.

Abdeckung der Wetterseite des in Holzfachwerk ausgeführten Bahnhofes in Reinhardtsbrunn i. Thüring. Die zierlichen Rauten mit der Umkleidung der Balken u. dergl. bilden einen dicht anschmiegenden grauen Regenmantel. Das Ganze macht einen zweckentsprechenden, günstigen Eindruck. Die feine Struktur der Holzarchitektur kommt unter dem Schutzmantel aus Blech noch deutlich zum Ausdruck.

Bei Türen, Fenstern u. dergl. sind besondere Saumstreifen anzubringen, desgleichen an den Ecken.⁵)

Fis. 28.

nxrn

¹

Aus des Verfassers Buch : „Der praktische Klempner“, II. Aufl.

²

Aus des Verfass. Buch : „Der prakt. Klempner“, II. Aufl., S. 123.

³

Alle übrigen Einzelausführungen sowie Gesamtüberblicke der verschiedenen Zinkbedachungen auf farbigen Tafeln findet man in der erwähnten größeren Broschüre : „DasZinkblech und seine Verwendung imBau-fache“, kostenlos zu beziehen vom Verbände Deutscher Zinkwalzwerke in Berlin N.W. 6, Albrechtstraße 11, und (gegen Portovergütung) von der Illustrierten Zeitung für Blechindustrie in Leipzig R., Frommannstraße 6.

⁴

Weitere fachliche wichtige Einzelheiten findet man in der größeren Broschüre: „Das Zinkblech und seine Verwendung etc.“

⁵

Näheres hierüber findet man in der größeren Broschüre: „Das Zinkblech und seine Verwendung im Baufache“.

M

II

Mit Rauten und Wellblechstreifen verwahrte Wetterseite eines Beamtenwohnhauses auf der Zinkhütte Lipine i. Oberschlesien.

Diese solide, preiswerte, haltbare, dabei doch gefällig wirkende Wandverkleidung verdient wirklich mehr verwendet zu werden, als es heute im allgemeinen geschieht.

VII.

Sonstige Blechverwafarungen.

Wie oben im I. Abschnitt bereits angeführt, kann der praktische Baumeister bei Dichtung seiner Dächer des Bleches nicht entbehren. Wo er gute, scharfe Tropfkanten braucht, wo er dichte, haltbare An- und Abschlüsse an die verschiedensten Bedachungs-stofte herstellen, wo er zusammenlaufendes Wasser auf dem Dache schnell und sicher ableiten will und in vielen anderen Fällen, wo er eben den tückischen Feind des eindringenden Regens wirksam bekämpfen will, bedarf er des Bleches zur sicheren Verwahrung.

Nachstehend sollen die Hauptgrundsätze und wichtigsten Ausführungsarten zur Darstellung gelangen und zwar für S a u m s t r ei f e n, Gesims-, Mauerabdeckungen, Maueranschlüsse, Giebelabschlüsse, Schornstein- und Oberlichter- u. dergl. Eindeckungen und Kehlen.

Fis. 29.

fl

* AiĄ

Falz

Dreikonf

Gute Tropfkanten für Traufbleche, Saumstreifen, Gesims-Mauerabdeckungen, auslaufende Tafeln der Zinkdächer u. dergl. m.

1. Saum- und Fußstreifen, auch Traufbleche genannt.

Bei allen Saum- oder Fußstreifen oder Vorstoß blech en die also das Wasser vom Dache der Rinne zuführen sollen, ist zunächst vorne für eine gute Tropfkante zu sorgen (s. Fig. 29).

Hinten ist in der Regel, mit Ausnahme bei Papp- und Holzzementdächern, ein Falz anzubiegen (s. Fig. 29 ä).

Die etwa 20 — 25 cm breiten Streifen werden hinten im Falz mit Blechhaftern befestigt, vorne am besten in Vorsprungstreifen aus verzinktem Eisenblech eingehängt (s. Fig. 32).

F/acheisen. Blech

Fig. 30.

i fi offer »Asphalt

<5c/7ah;/7gr;

Pappe /o

-B/ecp

W/Æ

SC

■m ⁰

<''-A ula Non

ö — Vorstoßblech an einer Veranda mit Betondecke und Asphaltbedeckung. b = Gewöhnliche Kiesschutzleiste, c

Pat. lose Kiesschutzleiste.

rs?it<Sj

cg

Fig. 31.

VzHf. Eisenblech

'pies

ÊkïScrnc/

an?

ICLÛ

imm

-> Pappe Papier

Zp

Blei happe aufgelötet

ni

V/27222Z

M0L*

fio/z Dübel

Zink </[

Sj

N

7/.

Vorspringende Kiesschutzleiste, lose in Eisen gelegt, an einem Dachbruche.

Die Befestigung dieser Streifen bei hartem Material, als Steinen, Beton u. dergl. ist aus Fig. 32 zu ersehen.

Eine besondere Ausbildung haben diese Saumstreifen (Tropfbleche, Vorstoßbleche, Fußstreifen usw.) bei Holzzementdächern erfahren (s. Fig. 30 und 31).

2. Gesims- und Mauerabdeckungen.

Vor allem ist bei all diesen Abdeckungen auf zweckentsprechende Tropfkanten und vor allem aber auch darauf zu sehen, daß diese Kanten nicht zu nahe an das Gesims oder die Mauer kommen. Der Wind treibt die anhängenden Regentropfen leicht an die Mauer oder ans Gesims, durchnäßt und schwärzt alles in häßlicher, nachteiliger Weise. Besonders bei den in neuerer Zeit so beliebten Betonmauern, Gesimsen u. dergl. glaubt man oft

Fis. 32.

W//

bV

m.

\JefŁ

W//

Verzinkte Winkel schiene

Indirekte Befestigung von Gesimsabdeckungen auf Bruchstein-Zementguß- u. dergl. Gesimsen. Bleche haben freieres Spiel.)

eine Abdeckung entbehren zu können. Man berücksichtigt aber oft viel zu wenig, daß dies Material sich zur Ausbildung scharfer und guter Tropfkanten sehr schlecht oder gar nicht eignet. Eine Blechabdeckung hilft diesem Übelstande ab (s. u. a. Fig. 39).

Die scharfen Tropfkanten (d, g und h in Fig. 29) sind besonders empfehlenswert. Der Abstand einer jeden Tropfkante s o 111 e m i n d e s t e n s 2—3 c m b et r a ge n (bei Wulst noch etwas mehr). Siehe Fig. 32.

Die Befestigung der Bleche geschieht entweder indirekt durch Einhängen, bezw. auch wohl Einschieben in Vorsprungstreifen aus verzinktem Eisenblech, Bandeisen, Winkelschienen (s. Fig. 32), oder durch Befestigung der Wulsthafter (s. Fig. 34, b) aus starkem verzinkten Eisenblech oder Bandeisen (s. Fig. 34 a), bei verzinktem

Eisenblech durch angenietete Blechlappen (s. Fig. 34, c), oder auch direkt mittels Steinschrauben (s. Fig. 33, a), Bankeisen (s. Fig. 33, c),

Fis. 33.

WS.

Blech Splinte

Bankeisen

^'Steinschraube

mW-.

Direkte Befestigung der Abdeckungsbleche auf Stein- und Zementguß-Gesimsen. HB — Hauer-Buckel (aufgelötete runde Blechscheibe».

mittels Blechsplinten (s. Fig. 32, b) oder besonderer, an Drahtstiften befestigten Drahtachter (s. Fig. 34, d), eingemauerter Blech- oder

Fis. 34.

^Bandeisen //

>el

]_

ü>

nrj

ßlechlaßche bei vert Eisen bl.

xOOOOOÜOOOC

u/

/£

ÿr'n/ï

Abdeckung von Brandgiebeln (indirekt a und b). Direkte Befestigung von Gesimsabdeckungen und Mauern aus Ziegelsteinen, Verblendern (d und e). Vergleiche auch Fig. 32, 33 und 39.

Drahtsplinten (s. Fig. 34, c), die beiden letzteren Arten vor allem bei Ziegelstein-Bauten u. dergl. m. (S. auch die größere Broschüre: „Das Zinkblech und seine Verwendung i m B auf ach e “.)

3. Maueranschlüsse.

Eine Anzahl verschiedenartiger älterer und neuerer Konstruktionen zur Abdichtung der Bedachung bei Anschlüssen an Mauern, (Brandmauern, Giebeln u. dergl.) ist in den Fig. 35—41 zur Dar-stellufig gebracht.

Fis, 35.

*■

\2>

s

oV

■Æ

<N

V,

<V.

•\v

(A-

/

X Ü^wvn^ 41 tw®?

sc/Cr-

H *ś

s/

tW/7^

wz%

b⁷ /<7// e

,o"

7)

ffngenij V ^

ra/z

&s

V ^

/V

Eindeckung und gute Abdichtung der Flachziegeln mittels nicht sichtbarer Bleilappen.

Die Konstruktion in Fig. 35 und 36 eignet sich besonders zur Eindeckung von Flachziegeln (Biberschwänzen, Ochsenzungen u. dergl.).

ln Fig. 37 ist der Anschluß für Falzziegeln veranschaulicht. Das Seitenblech könnte auch kehlenartig vertieft sein, wie es beim Ortgang in Fig. 45, c, geschehen ist.

VII. Sonstige Blechverwahrungen.

Figr. 36.¹)

Fis. 37.

//'

Bleilappen

'ë

7 A/

«X-

'MILL

-IK

oj

łjFjncjeLofef.

Maueranschluß bei Biberschwänzen mit Abdeckungswinkeln. Vio nat. Gr.

Abdichtung der Ziegeln bei Maueranschlüssen mittels aufgelöteter Bleilappen.

10

QJ

Fis. 38.

Verzhf. Winhelschiene

ca 30 x 15«nf¹

'Â

cu

■Ö

ZAi

QJ

.<n

k3

v:

;/

hr.. ZŻ

Einige neue und eigenartige Formen von Überhangstreifen bei Maueranschlüssen.

Für Schieferbedachung genügen einfache Seitenbleche, wie sie in den Figuren 40 und 42 dargestellt sind.

Fis. 39.

Zmh

fr?

Wb

Poppe

hies

■13

4;

iî7

53 .

Pappe

Papier

Ca6om

Befon

Ml

Maueranschlüsse für Ho lzzem'e'nt'beda'c’hung.'*''Abdeckung unten lose

aufgelegt (angereift).

Bei Pappdächern verfährt man ebenso, wie bei Schieferdächern, nur daß die Bleche keinen Falz bekommen und auf die erste Papierlage aufgenagelt werden.

- Fis. 40.

rsön

rsS

4 /'////////r/////////7\^^

Anschlußblech für Schieferbedachung, den Fugen entsprechend ausgeschnitten, mit gleichbreiten, in den Fugen eingelassenen Überhangstreifen.

man

Bei Holzzementdächern kann man die gleiche Konstruktion anwenden, wie bei Pappdächern. Besser aber ist es, wenn die Anschlußbleche unten anreift und lose auf die oberste

vom

Spiel der Ausdehnung und Zusammenziehung nicht folgen.

Papplage auflegt, oben in die Fugen einläßt oder mit der Gesimsabdeckung verbindet, wie die Figur 39 zeigt. Unten werden sie aufliegenden Sand und Kies gehalten. Sonst können sie dem

-t

tr

Anschlußblech für Schieferbedachung, gleich breit aufgebogen, mit ungleich breitem, treppenförmig abgesetzten und in die Fugen eingelassenen Überhangstreifen a). Schornstein-Einfassung (6).

Fis. 42.

7T

II

Fis. 41.

tf

t—¹—t

“7? J-ß~

Uberhgstrf.

hi^sS

blech

s*.

Anschluß- oder Seitenblech, gleich breit aufgebogen. Überhangstreifen aus zusammenzulötenden Stücken bestehend, in Fugen eingelassen,

Bei allen diesen Anschlüssen ist auf viererlei zu achten:

. -- it «m *TFBawar»

1)    Die Bleche dürfen weder auf dem Dache, noch an der Mauer zu schmal sein (15—20 cm etwa, u. U. noch breiter, besonders an der Mauer).

2)    Eine A b d i c h tu n g der unteren Auflage mit Kalk u. dergl. ist durchaus zu verwerfen, nicht haltbar und das Zinkblech bald zerfressend (s. III. Abschnitt). Vorzüglich eignet sich hierzu das Weich bl ei (s. Fig. 35 und 37).

3)    Die auf der Schalung fest aufliegenden und mit Haftern befestigten Abschluß- oder Seitenbleche dürfen oben niemals direkt in die Mauer eingelassen werden. Wenn der Dachstuhl bei Schnee- und Winddruck sich bewegt, würde oben ein Lockern der Abdichtung oder Herausgehen des Bleches erfolgen, da die Mauer an diesen Bewegungen nicht teilnimmt.

4)    Es ist vielmehr ein besonderer Überhangstreifen (Kapp-leiste usw.) anzubringen, von etwa 8—10 cm oder noch größerer Breite (s. Fig. 35 bis 40, sowie Fig. 42). Oben wird er etwa 1,5 bis 2,5 cm in eine besonders eingehauene Nut oder in die Ziegelstein-Mauerfugen eingesteckt, mit Mauerhaken (verzinkt!) befestigt und mit Zement verstrichen, bei Bruchsteinen wohl auch mit Weichblei verstemmt.

Ob man ihn in eine besonders eingehauene Nut einläßt (siehe Fig. 35, 36, 39, 43) oder in die vorhandenen (nach Bedarf auch eingehauenen) Mauerfugen steckt (s. Fig. 40—42), hängt außer vom Material auch von der Dachneigung ab.

Bei Bruchsteinen, sowie bei Beton, wo ohnedies wenig oder keine Fugen da sind, wird man eine zur Dachschräge parallele Nut von 2V₂ bis 3 cm Tiefe einhauen. Ebenso kann man dies bei Ziegelmauerwerk tun, wenn das Dach steil ist (s. Fig. 43). Bei geringerer Dachschräge wird man bei Ziegelmauerwerk wohl den treppenförmig abgesetzten, in die Fugen selbst eingelassenen Überhangstreifen den Vorzug geben, da hier leicht ein Zerspringen oder Ausspringen der Ziegelsteine erfolgt.

5)    Die in Fig. 38 veranschaulichten Konstruktionen eigenartiger Überhangstreifen sind noch wenig bekannt, dürften aber wohl Beachtung verdienen.

6)    Daß der Überhangstreifen unten gut (stark) an gereift, oder mit Falz, Wulst u. dergl. versehen sein muß, damit durch Kapillarwirkung kein Wasserhochziehen erfolgt, ist klar. Man achte aber ja darauf, daß dies sorgfältig geschieht. Vergl. Fig. 35, sowie die rechte Nebenskizze daselbst.

Dr. Kallenberg,*Zinkbleche'als Baumaterial.

7)    Bei der neueren Anordnung an Holzzementdächern (siehe Fig. 39 b) bildet der Abschlußstreifen gleich den Überhangstreifen mit.

8)    Empfehlenswert ist es, die Abbiegung des Überhangstreifens, die in die Fuge oderNut kommt, ein wenig nach oben aufzukanten (anreifen), wie Fig. 35 veranschaulicht.

Fig-. 43.

//

cl.

Kamineinbindung für Schieferdächer.

4. Eindeckung von Schornsteinen, Oberlichtern, Dachfenstern, Dunstrohren, eisernen Stangen u. dergl. Hervor-

ragungen.

Bei all diesen und ähnlichen Eindeckungen werden in der Hauptsache dieselben Konstruktionen angewendet, wie bei den Maueranschlüssen.

Es sind überall Abdeckungsstreifen von etwa 12—20 cm Breite, Platten u. dergl. anzubringen. Bei Ziegel-, Schiefer- und ähnlichem harten Bedachungsmaterial enthalten die seitlichen und der obere Streifen (bezw. Seite der Platte) breite nach oben stehende Falze, das untere über das Bedachungsmaterial gehende Blech einen nach unten gerichteten (Fig. 44). Bei Falzziegeln lötet man an die Seitenbleche auch vorteilhaft Bleistreifen auf, die dann, über die Ziegeln gelegt,

4. Eindeckung von Schornsteinen, Oberlichtern, Dachfenstern etc.

51

einen sehr guten, schnee- und wasserdichten Abschluß gewähren (s. Fig. 37).

Bei breiten Schornsteinen, Aussteigladen, Oberlichtern u. dgl. bringt man auf der oberen (hinteren) Seite einen Keil an, damit

Fis:. 44.

cu

S.

t/1

■id

Ol.

- Rohrschelle N f m'i

jś Weich blel-Dichtung

aL» Finge lotet

ff

é ł

/ł

Am

//

'SanW

/ Anschluss ■ B/ech ; A

KL ^ p?RPe

Wm    Zmh

wm-J/^PaPier

ÏV

Abdichtung von eisernen Stangen, Drahtseilen, Drähten u. dergl.

das Wasser in diesem-'gefährlichen Ecken und Winkeln rasch ablaufen kann.

Die nach oben gehende Einfassung der Schornsteine wird bei steilen Flächen parallel zur Dachfläche (s. Fig. 43), bei flachen Dächern und geringer Tiefe des Schornsteins in der ganzen Tiefe (s. Fig. 41 b), bei größerer Tiefe treppenförmig abgesetzt (s. Fig. 40 bis 42) angeordnet. Wegen des unbedingt notwendigen Überhangstreifens gilt das oben bei den Maueranschlüssen Gesagte (s. Fig. 35, 37—43).

Für Holzzement- und Pappdächer gilt ebenfalls das oben Gesagte. Das Zinkblech kommt entweder auf die erste Papier- bezw. Papplage und unter die anderen Lagen (s. Fig. 46 b und d). Dann wird es vermittels des Asphaltes fest mit der Bedachung verbunden. Ein Überhangstreifen ist dann natürlich notwendig.

Oder das Zinkblech überdeckt die an Keilen aufwärts gehende Bedachung (s. Fig. 46 b und e), natürlich nur bei Holzzementdach anwendbar, wie auch in Fig. 39 gezeigt. In diesem Falle bildet der übergreifende, auch unten anzureifende Streifen (s. Fig. 39 a, 48) selbst den Überhangstreifen. J    .    .

Wegen der Abdichtung mit der Mauer, bezw. der Befestigung in derselben gilt dasselbe, was oben bei den Maueranschlüssen ausführlich besprochen worden ist.

Die wichtige Abdichtung von eisernen Stangen, Drahtseilen u. dergl. ist aus Fig. 44 zu ersehen. Über den eigentlichen Abdichtungstrichter, der ganz lose an der Stange anliegt, muß hier unbedingt ein zweiter, ja nicht dicht anschließender Trichter fest und dicht an der Stange angebracht werden. Bei dicken runden Stangen bewirkt man den dichten Anschluß durch Rohrschelle mit Weichbleizwischenlage (bezw. nachträglichem Farb- oder Dachpix-überstrich); bei dünnen Drähten, viereckigen Geländerstangen u. dgl. durch Verlötung. Diese Trichter entsprechen also vollkommen den Überhangstreifen.

Für die Abdichtung der Deckplatte mit dem Bedachungsmaterial verfährt man ebenso, wie bei den Schornsteineinfassungen, Maueranschlüssen u. dergl. Das Gleiche gilt für alle Oberlichter, Dachfenster, Dunsthüte usw.

Fis. 45.

rpd

<a

<=_, p

WML-Sü

m.

mm

Giebelabschlüsse (Ortgang-Verwahrungen) für Ziegel- und Schieferdächer.

5. Giebelabschlüsse (Ortgänge) u. dergl.

Einige Hauptkonstruktionen für die bei vielen Bedachungen wegen der Sturmsicherheit unerläßlichen Abschlüsse an Giebeln sind in den Fig. 45 und 46 für Schiefer-, Ziegel-, Papp- und Holzzement-Dächer dargestellt.

Auf Grund der oben im II. Abschnitt ausführlich behandelten physikalischen Eigenschaften und allgemeinen Konstruktionsbedingungen des Zinkbleches sollte man bei Zinkblech auch hier die direkte Befestigung mit Nägeln möglichst umgehen und der indirekten durch Hafter, Streifen u. dergl. den Vorzug geben (s. Fig. 45 b, 46 b und e). Die Nägel werden beim Arbeiten des Zinkbleches stets gelockert. Blechkappen (s. Fig. 46 c, Kappnägel) können dies vermindern.

5. Qiebelabschlüsse (Ortgänge) u. dergl. 6. Kehlen.

53

Fis. 46.

ßt ech Happe

/___

Zink

mmm

y//.

Verz. Eisen b/ecbi

7.

rPaPF*

mm

WuLsth after

linh

Pries -Lage

Pappe

Æ'-

x ,»Scincl

»dr, P°ppe

v£2

Giebelabschlüsse (Ortgang-Verwahrungen) für Papp- und Holzzementdächer.

6. Kehlen.

Wenn auch bei steilen Dächern die gewöhnliche Form (a in Fig. 47) genügt, so sollte man besonders bei geringerer Dachneigung doch möglichst darauf sehen, daß die Kehle ein rundliches Profil erhielte und etwas vertieft würde, wie in Fig. 47, b angedeutet.

Fis. 47.

Notfalz

Einige Kehlenausbildungen.

a — gewöhnliche Kehle, b und c = vertiefte, rundlich profilierte Kehle, viel widerstandsfähiger. d= Kehle mit seitlichem Notfalz für flache Zinkdächer (s. Fig. 6 und 18).

Bei Zinkbedachung könnte man bei geringer Dachneigung mit Vorteil den Notfalz anwenden (s. Fig. 6, 18 und 47).

In welcher Weise die Breite der Überdeckung der einzelnen (2 m) Stücke von der Stärke der Neigung abhängt, zeigt die Fig. 48. Hierbei sind 6 cm als senkrechte Steighöhe angenommen. Nicht zu viel, wenn man bedenkt, daß sie bei 1 mm Abstand etwa 3 bis 4 cm beträgt.

Ein Anreifen beider Teile, wie es Fig. 48 zeigt, dürfte nicht nur bei Kehlblechen, sondern auch sonst am Platze sein, wo Bleche

Fis. 48.

lf>? i '

Jil#

Wb

'a

ii

Je geringer die Dachneigung, um so breiter muß 'die Abdeckung der Kehlbleche sein.

Fig:. 49. *)

■er

SS-

fCpXy / „ sr

WV/

Hohlkehle mit Blechwinkeln gegen das Abrutschen der schräg abgehauenen Falzziegel. Vio nat. Größe.

Fig:. 50. 33 am

ft

■V,,

fbder

U\

^ tto/zschmube im Blei.

Eckige Rinne mit Sima, alles aus Zinkblech.

scharf Übereinanderliegen und nicht gelötet werden sollen oder können, wie bei Wellblechen, Dachbruchgesimsen, First- und Gratblechen, Simablechen an Rinnen u. dergl. m.

- *) Aus des Verf. Buch: „Der prakt. Klempner“, II. Aull., S.*ll2.

7. Dachrinnen (Dachkanäle, Kändel usw.).

Ihrem Zwecke am besten entsprechend, wird die Rinne in halbrunder oder rundlicher bezw. rundlich profilierter Form herzustellen sein (s. Fig. 56—65). Es können sich dann weder bei Zink noch bei anderen Metallen die jederzeit nachteiligen,

Fig. 51.

Feder

Schraubenmutter

Schraube"" hi.

Ijorh

er verbietet

Die Rinne von Fig. 50 in weit haltbarerer rundlicher Form.

auch den raschen Wasserabfluß hemmenden Falten bilden.

Zink tritt auf den Falten kein Reißen des Materials, bei Kupfer, verzinktem und verbleitem Eisenblech kein Aufplatzen der Nähte ein. Die ganze Lötarbeit ist bei rundlichem Profil eine viel bessere, weit haltbarere.

Bei

Fig. 52.

(981

Siiriablech^on Schraubenmutter gehalten (Unterleg-Jcheibchen)

Hafter

56cjri__

/rniiifrrn

Sehr flache Gesimsrinne mit breitem geraden Boden und angebogenem Fußstreifen (nicht empfehlenswerte^Konstruktion).

Daß man die allerdings beim ganzen Entwurf, Aufzeichnen und z. T. auch in der Ausführung bequemere eckige, kastenförmige, gerade Rinne recht gut rundlich gestalten kann, zeigen die Konstruktionen in den Figuren 50 und 51, ferner 52 und 53, sowie 54 und 55.

Daß alle diese eben angeführten und andere ähnliche Rinnen eine feste Unterlage bekommen müssen, ist eigentlich selbstverständlich (wenn schon nicht immer vorgesehen). Bei rundlicher

Hafter

Fis. 53.

öchrb. Mutter i/ersenht Bolzen vorher im Eisen vernietet /

ii

____red er ^

56 cm

Die flache Rinne von Fig. 52 in abgeänderter, verbesserter, rundlicher Konstruktion. Fußstreifen für sich.

Fis. 54.

ii

43 orr,

v.

zzz\

V/.

'///A

tschraube

Kehlrinne in gerader eckiger Form, weniger empfehlenswert, wenn schon

sehr verbreitet.

Form ist es durchaus nicht nötig, daß sich das Holz dem Blech überall anschmiegt. Schmale Dachlatten, mit Schrauben befestigt (s. Fig. 53, 55, 56), genügen vollständig.

Fie. 55.

Menht.Bsenbl. g|g:

r5ćhraube mit j^W///.

W.

ischraube

w,

Die Kehlrinne aus Fig. 54 in verbesserter, viel haltbarer rundlicher Ausführung.

Fis. 56.

fèder

07/

\ SV

tir

\Rinne 33 cm Zuschnitt

^^bleô^/

Wassernase

•k

<ł

.B

Halbrunde Rinne mit Wassernase an einem Dachbruche.

%_____ ïm,"T/

VJ

'Jlwr>Verbleit

Uu

öandstem

////UL

Halbrunde Gesims-Rinne mit Sima aus Zinkblech.

Fig. 58. ²)

L aujirelt •» s RcjjeltlecK

HB

Hafter

Schiene V35

25c²rt

%-

Fig. 57.

Vi

0<

V²

Wf777777T]T77lTIT77777Tn777,

ill

::

W¹

F':

7/.

mMK

æil:\

<v>

4 u²⁴

/«ff v

iBsil

ftundl $cHeöl-Rinnä

iß

Xaoilai/ckVV? Rinne

Kehlrinne auf feuersicherem Dache. Rundliche Schedrinne und Knoblauch’sche Kehlrinne oder auch hinter Attika.

Wenn sonst möglich, sollte man die Rinnen lieber etwas weiter und weniger tief, als schmal und tief halten. Sie sind leichter zu reinigen und besser zu begehen.

Bei der vollständig halbrunden Form oder der sich nähernden rundlich ovalen braucht man natürlich keine besondere Lattenunterlage (s. Fig. 56—64). Es genügt das Einlegen in fest angeschraubte starke Rinneneisen (4—6 mm stark und 25—40 mm breit).

Fig. 59. ³)

H - Hajte-r

o°

%³■

O.-¹

lfO< Ce³'³

/j&ï,

,%y

H^l

o>

>g|

T

J)ocVpap p f

\\ vr

VN

DYj|aht

\\

IL

Attika-Rinne mit Wellblech-Attika.

Will man bei größeren Gebäuden eine leichte Begehbarkeit der Rinnen (Gesims- und Kehlrinnen) erreichen, so bringt man wohl auch besondere Laufbretter an. Einige Ausführungsarten sind in den Figuren 58 und 60 dargestellt. (Andere gute Konstruktionen, aufklappbar u. dergl., findet man in des Verfassers Spezialbuch der Rinnen - und Gesims-Konstruktionen, Fig. 28, 29 etc.)

Um einer auf dem Gesims aufliegenden sogenannten Gesims-Rinne vorn ein besseres Ansehen zu geben, wird sie eben vielfach gerade (eckig) gehalten (Kaste n rin n e). Man erreicht den gleichen Zweck eines geraden Abschlusses aber ebenso durch Anbringung eines sogenannten Vorstellbleches, auch Attika genannt. In den Figuren 59 und 60 sind zwei Gesims-Rinnen oder wohl auch Attika-Rinnen veranschaulicht.

Fig. 60.*)

0er

CO

Untelfleÿ.

/Platte

///

\\\

\w

Laujirett ç

H oft e r.

WelUl.-AUtKo

!w-u

Bandeisen -Bock

-nit

L au{ - Latten

\N v \\^

IP

^V\v\V\V

Runde Attika-Rinne mit Wellblech-Attika und Laufbrett.

In vielen Fällen wird dieses Vorstellblech mitsamt der Rinne recht vorteilhaft weiter vorgerückt, dem Charakter und Stil des ganzen Gesimses und Gebäudes entsprechend profiliert. Es führt dann den Namen Sima oder Karnies. Die Rinne selbst heißt wohl auch Sima- oder Karnie s-Rinne. Es sind dies sehr empfehlenswerte Konstruktionen. Der obere krönende Teil des Hauptgesimses wird auf diese Weise erspart. Die Figuren 51—53, ferner 57, 61, 62 und 64 zeigen einige derartige Formen. (Eine große Anzahl anderer bewährter Konstruktionen und viele andere wichtige Einzelheiten über Rinnen-Konstruktionen findet man in des Verfassers genanntem Buch.)

Bei allen diesen und ähnlichen Rinnen (Gesims- und Sima-Rinnen) ist natürlich streng darauf zu sehen, daß die Vorderkante recht gerade, wagrecht ist und auch so bleibt. Durch starke Wülsten, Winkel- oder Flachschienen erzielt man die nötige Standhaftigkeit. Die Rinnen selbst sind dann von ungleichem Querschnitt. Sie werden „nach Gefälle“ geschnitten. (Siehe des Verfassers „Rinnen- und Gesims-Konstruktionen“

S. 99 bis 108).

Fis. 61.?)

Rügener /<

Ł\ź

<tw.

,L L iw

f/.

J)ack oolio pt

V|f

SV

_2Zement-Keil (

JA

\>A

TZÎ

fei*'

är

% 6 <AYV

/Vi M

zvr/4    Æ

^__^

L.L

4M

Kt. LujtlöcK«

//

/''///

varn qej

n    n

1°    Pl

/'///

7/.

/%

Löt-Hajtey

$ch ht e fanq-Cottär

CE

[Ö

■««S'!*

______F

L°

Aufliegende Rinne mit Sima, alles aus Zinkblech; zwei Schneefänge.

0/s natürl. Größe.)

Karnies-Rinne aus verzinktem Eisenblech oder Zink mit angebogenem

Gefälle.

Um diese Vorderkante auch gegen Schneedruck gerade zu halten, das Aufbiegen von Rinneneisen oder Aussacken der Rinne

Oj

zu verhüten, ordnet man wohl besondere Zugeisen oderStreben an (s. Fig. 61, 64). Oder man legt (bei steilen Dächern) die Vorderkante so tief, daß der Schnee darüber hinweggleiten kann. Oder endlich bringt man besondere Schneefänge an (s. Fig. 61).

Fis. 62. *)

HÜ

T Träger

L ö citer

feoler

MÛ

Nase \ Q

Hafter

.‘DecKst-rf.

EfD

<Y

Lujt-Löcher

’J)achpap pe

W.H

]l

Sima-Rinne für ein feuerfestes Dach.

Daß man bei Gesimsrinnen und ähnlichen Konstruktionen alle Teile, wie Rinne, Gesimsabdeckung, Vorstoßblech, Traufblech so anbringt, daß jedes mit dem andern wohl fest verbunden ist, sich aber doch frei bewegen, spielen kann, ist nach den oben (im II. Abschnitt) gegebenen allgemeinen Konstruktionsbedingungen einleuchtend. Als grober Konstruktionsfehler ist es demnach anzusehen, wenn man (manchmal aus Bequemlichkeit, manchmal durch die vorhandenen Umstände gezwungen) Traufblech und Rinnen aus einem Stück herstellt, wie in Fig. 52 geschehen. Durch Auflage auf den Sparren könnte man aber sehr leicht die Traufkante etwas höher legen, sodaß dem stets zu beachtenden Grundsatz Rechnung getragen wird, nach welchem die Vorderkante einer Rinne stets tiefer liegen muß, als die Hinter- bezw. Traufkante.

Fis, 63. *)

//

/.

W* Hajter f- Feofer WH = vVulJ tUJter

.é

dcwillte

Jr-

Hk Upyi/aWm°.rt

gK<; %.

>*

vmkt CôenU.

v;

ïï

^    j^lfcK. Kna^çe) _

*3

/•

///

s £isertj>l

Ws

y.

Y/.

o;

'/A

7r

c*

ÉÊË

Y/

Metallgesims mit über der Simsabdeckung befindlichen Rinne. Vio natürl. Größe.

Auch ist darauf zu sehen, daß besonders bei Attika- oder Kehl-rinnen, oder Rinnen hinter Attika, ferner bei Verwendungvon Schweißoder Schutzrinnen, genug allüberall da, wo sich innerhalb der abgeschlossenen Metallteile bei ruhender Luft Schweiß-wasser bilden kann, für geeignete Luftzirkulation gesorgt wird.

Diese verhütet am sichersten die Entstehung des dem Metalle wie Holze gleich gefährlichen Schweißwassers. (Luftlöcher in Sima,

Fis. 64. *)

' Hol *- Latten

S'po-'j''

r\ a

<2,

°f('r

^-L0c

‘"'—7

WuUt-H/tf

*H

rs—ö—;--*sc

Siuck ?yÿiiW?n    -ç n

iujt-Lochef

rrs

Luft .Lochet

wk

Mansarden-Gesimse mit und ohne Rinne.

Abstand des Attikableches durch Verwendung von Wulsthaftern nicht zu geringer Abstand der Schutzrinne von der Hauptrinne usw.).

ZL

Fis:. 65.

si

Schnitt erb

'jbergeschcb'lStreifen J

t ca'8-10 ca

öorn

Rinne

Rinnen Böcten.

Schiebenaht für von unten sichtbare Rinnen auf der höchsten Stelle.

z:

Fig:. 66. *)

UJ>geshobSt^

UW

■ mr c ⁴

«u

'--J|

Schiebenaht an der

"—tiefsten Stelle der Rinne.

*) Aus des Verfassers Buche : Konstruktionen“, S. 96.

Dr. Kallenberg, Zinkbleche ala ßaumatorial.

Bei größeren Längen der Rinnen sorgt man für entsprechende Ausdehnungsmöglichkeit der Länge nach. Man bringt sogenannte Schiebe nähte oder Zugverbindungen an, gewöhnlich auf dem Gefällbruch, also auf der höchsten Stelle der Rinne, manchmal aber auch auf der tiefsten.

Fis. 67.

Schiebenaht für breite Gesimsabdeckungen u. dergl. von beträchtlicher

Länge.

Eine solche Schiebenaht besteht aus zwei in der Rinne eingelöteten Böden mit breiter Abbiegung oben. Über diese greift ein mit entsprechend breitem Falz versehener Blechstreifen, ln der Fig. 65 ist eine solche Schiebenaht für den höchsten, in Fig. 66 eine solche für den tiefsten Punkt dargestellt.

Fis. 68. *)

<r

; Ab ge s«¹

——5-zXxmrr~ ~~~~

ptztef Streifen

'UL

Ülatter

li PL K

Cl e S imj Schiebenaht an Zinkgesimsen.

Eine solche Gefällstrecke beträgt gewöhnlich etwa an die 8—10 m. Auf 1 m Rinne rechnet man ungefähr ¹/₂ bis 1 cm Gefälle.

Die Größe der Rinne, d. h. ihr Querschnitt, richtet sich besonders nach der Menge, vor allem aber auch nach der Art und Weise des Zufließens von Regenwasser (Holzzement- oder Schiefer-u. dergl. Dach). Man nimmt für gewöhnlich 0,8—1 qcm Rinnenquerschnitt für jeden Quadratmeter der zu entwässernden Dachfläche, auf die Gebäudegrundfläche bezogen.

Um ein Verstopfen der Abfallrohre durch Laub, Äste, Lappen, Papier u. dergl. zu verhüten, bringt man an den Rinnenstutzen meist Rinnenseiher an (s.'Fig. 69).

Bei freiliegenden Rinnen verwendet man heute wieder gern die schon in früheren Zeiten beliebten Rinnen-Kessel. Sie machen einen gefälligen, zweckentsprechenden Eindruck, können dem Charakter des ganzen Gebäudes entsprechend gehalten werden und sichern der Rinne außerdem die nötige Bewegungsfreiheit in der Längsrichtung, ersetzen also eine Schiebenaht, ln den Figuren 70—72 sind einige derartige Rinnenkessel angeführt.

Fis, 70.

Z/

.'flusgehauen

0B□ Q ÖLIG OG

\d1~DC3E CEK30

Fig. 69.

Ul

Vorn

5eite

Rinnenseiher.

Rinnenkessel.

Fiff. 71.

__11

Zl

mööi

Fis. 72.

if

ff

i'9 /

Æ.

11

u r-

Rinnenkessel.*)

*) Eine Anzahl anderer Formen findet man in der größeren Broschüre: „Das Zinkblech und seine Verwendung im Baufache“.

VIII.

Die Herstellung der Zinkbleche.

Das Metall Zink wird aus den Zinkerzen Galmei und Zinkblende hergestellt und findet als Rohzink eine weitgehende Verwendung. Sofern das Rohzink aus Erzen hergestellt wird, welche eisen- und bleihaltig sind, weist es meistenteils Blei und geringe Mengen Eisen auf, was seine Verwendung zu gewissen technischen Zwecken, z. B. zum Walzbetriebe, beeinträchtigt. Solches Zink wird daher vor seiner Verwalzung einem Raffinationsprozeß unterworfen, welcher darin besteht, daß größere Mengen Rohzink in einem Flammofen eingeschmolzen werden, wobei das spezifisch schwerere Blei sich auf dem Boden des Ofens ansammelt und abgeschöpft wird. Das raffinierte Zink enthält dann nur noch Spuren oder solche geringe Mengen von Blei und Eisen, daß seine Verwendungsfähigkeit nicht beeinträchtigt wird.

Zum Zwecke der Verwendung im Walzbetrieb wird das Zink in Flammöfen umgeschmolzen, wobei der Gehalt an Blei und Eisen auf das überhaupt mögliche Maß reduziert wird. Das Zink wird aus den Flammöfen mittels kalibrierter Schöpfkellen an der Oberfläche des Zinkbades abgeschöpft und in Form von bestimmten Abmessungen gegossen, sodaß die durch Abkühlung entstehenden Zinkbarren nach Gewicht und Maß denjenigen Anforderungen entsprechen, welche für das daraus herzustellende Walzzink die günstigsten Vorbedingungen bieten. Die Zinkbarren läßt man bis zu derjenigen Temperatur erkalten, welche erfahrungsgemäß für den Walzprozeß die günstigste ist, d. h., bei welcher das Zink seine größte Geschmeidigkeit (Duktilität) hat. Es ist dies eine Temperatur von 150—155° C, und es wird bei dem folgenden Walzprozeß darauf geachtet, daß diese Temperatur nach Möglichkeit während des ganzen Verlaufs des Walzprozesses beibehalten wird.

Der Walzprozeß selbst erfolgt in zwei getrennten Perioden, dem Vorstrecken und dem Fertigwalzen. Esterer Vorgang besteht in dem Auswalzen der Barren nach einer Richtung bis zu einer gewissen Länge, letzterer in dem weiteren, bis zum Fertigzustande fortgesetzten Auswalzen der paketierten, vorgestreckten Tafeln nach der anderen Richtung, sodaß also die in beiden Prozessen erzeugte Walzfaser im fertigen Blech über Kreuz liegt.

Zwischen beiden Walzprozessen erfolgt ein vorläufiges Beschneiden der vorgestreckten Tafeln und ein Abwiegen (Kalibrieren) derselben behufs tunlichst genauer Erzielung der vorgeschriebenen Stärke und des Gewichtes. Beim Fertigwalzen wird eine nach der Stärke der zu erzeugenden Bleche verschiedene Anzahl von vorgestreckten Tafeln zu einem Paket vereinigt, und so lange durch die Walzen geschoben, bis ein bestimmtes Längsmaß durch allmähliches Verengen des Walzenspaltes erreicht ist.

Die fertig gewalzten Bleche werden zur Entfernung der zackigen und ungleich starken Ränder auf fixes Maß beschnitten, mit Werk-und Nummerstempel versehen und dem Magazinraum zugeführt. Hier erfolgt durch ein geschultes Sortiererpersonal eine nochmalige genaue Prüfung jeder einzelnen Tafel und Zurückweisung derjenigen, welche irgendwelche Fehler zeigen. Die abgenommenen Bleche werden auf besonders zuverlässigen Wagen verwogen und gelangen entweder in losem Zustande teils flachliegend, teils gerollt, oder- in der jeweilig vorgeschriebenen Verpackung zum Versandt.

Alle für die Ausfuhr über See bestimmten Zinkbleche in Stärken bis Nr. 16 werden in gerolltem Zustande in Holzfässer verpackt und außerdem in wasserdicht verlöteten Zinkblechhülsen, sogenannten Silos, eingeschlossen. Auch Verpackung in Holzrahmen und ganz geschlossenen Kisten kommt besonders für stärkere Tafeln und Qualitätsbleche in Anwendung.

Die auf der Rückseite des Umschlags befindliche Abbildung gibt die Innenansicht eines Zinkwalzwerks mit der Anordnung der Walzenstraßen.

Gewichtstabelle der für Bauarbeiten hauptsächlich in Frage kommenden glatten Zinkbleche Nr. 9 — 16.

Nr.d.Tafeln

Annähernde Stärke der Taf. in mm

I-* u-'

.y \_2 0.65X2m = l,3qm

kg aul?50hg & g I af ca.

^-o

D 3

ca

Annäherndes Gewicht der Tafeln

lX2 m = 2 qm

k    auf250 kü

g- raf. ca

0,8X2m = l,6qm

kg auf 250 kg g. Taf ca.

Nr.d.Tf.

1X2,5 m — 2;5 am

Vcr auf 250 ksr g. Taf. ca.

Q5Ul.fr.CQtO>— OCO

— 000 oobö

'o'co 00X1 05 Uc Cn fr. 00UCN0fr.O5G0OCJi

O O OOP000

j~4 05 Or Ut jfr^fr. CJJQ bn o> -q o. "o bn ~— aiuifrooMoow

CO OO -4 P 05JJ1 fr.^fr. "oo 05 fr. '-j'o'to 01 o

fr. 05 CO O -4 Uc P ÜU0 4^05 000Ui

to

30

61

55

47

42

37

33

29

Oiuifr CO to — O CO

O CO

ggg

jjl CO j— _0 P 00 J~4 CT) — CO .fr- CO tO —1 WOOOOlfrtO

o o o o o ■_

‘tOtOtOOJCO^ ^CDt04^--l — 0)0

t'-’ 00 o~ —r cvf rf co“ af

loooooomp MniominiOMO OOt-.— 100500(005

•—‘ — to to to co

CO OT CD tO Ol CD tO

¹

Aus des Verfassers Buch: „Der praktische Klempner“, II. Aufl., S. 112.

²

Aus des Verfassers Buche: „Rinnen- und Gesims-Konst r u k t i 0 n e n    S. 59.

³

Aus des Verfassers Buche: „Rinnen- und Gesims-Konstruktionen“, S. 32.

IX.

Kosten der Bedachungen und sonstigen Ver= Wahrungen mit Zinkblech im Vergleich zu anderen

Materialien.

Um bei Vergleich der Kosten der verschiedenen Materialien zu einem richtigen Maßstabe zu gelangen, sind folgende Gesichtspunkte zu berücksichtigen:

1)    Wie hoch stellt sich der Neuherstellungspreis?

2)    Wie hoch belaufen sich die Reparaturen durchschnittlich jährlich?

3)    Wie groß ist die Lebensdauer der Bedachungen bezw. Verwahrungen?

4)    BeiZierbauten sind dann zur Auswahl des Bedachungsmaterials noch künstlerische und ästhetische Rücksichten maßgebend, die natürlich bei reinen Zweck- und Nutzbauten mehr oder weniger zurücktreten oder wohl auch gar nicht gelten.

Es ist hiernach gar nicht so leicht und einfach, ja wegen der verschiedenen Qualitäten und Ausführungen ein und desselben Materials überhaupt kaum möglich, ein für allemal ein allgemein gültiges Urteil darüber abzugeben, welches Material nun wirklich das beste und billigste sei, vorausgesetzt, daß man mit Rücksicht auf Dachneigung, künstlerische Wirkung u. dergl. m. überhaupt die Wahl zwischen ganz verschiedenen Materialien hat.

Nehmen wir zunächst die verschiedenen Hauptbedachungen her. Das Pappdach mit 1—2 Mk. pro qm stellt sich ja zunächst am billigsten. Man übersehe aber nicht, daß die öfter zu wiederholenden Teerungen es nicht unerheblich verteuern.

Auch das Holzzementdach steht mit etwa 2—2,50 Mk. pro qm nur wenig über dem Pappdach. Aber abgesehen von der ungeheuren Belastung des besonders stark zu konstruierenden, also auch entsprechend teureren Dachgespärres, Schalung usw., sind Reparaturen eine recht unangenehme, oft nicht leicht auszuführende und kostspielige Sache.

Daß Schiefer- und Ziegelbedachungen auch ihre Mucken haben — mancher Schiefer, vom entsetzlichen Geklapper ganz abgesehen, bald verwittert, unglasierte Ziegeln und manche Zementsteine nicht selten jahrelang nässen, glasierte aber durch Frost gerne zerbröckeln —, weiß jeder Baumeister. Der Durchschnittspreis von 3 Mk. bis 3,80 Mk. pro qm steht ja nicht viel über demjenigen des Holzzementdaches.

Von den Metallbedachungen stellt sich ja diejenige mit verzinktem oder verbleitem Einsenblech mit 4—4,80 Mk. pro qm (Nr. 22) auf den ersten Blick am billigsten, während man für Zink von entsprechender Stärke (Nr. 12) ja auf etwa 5 Mk. bis 5,50 Mk. kommt, bei Kupfer (0,6 mm) auf etwa 15 Mk., also rund dreimal höher, als bei Zink.

Von den drei angeführten Metallbedachungen hat ja Kupfer zweifellos die größte Lebensdauer, das verzinkte und verbleite Eisenblech hingegen die geringste. Nimmt man aber auch an, eine Bedachung aus Kupfer halte drei- bis viermal so lange, als eine solche aus Zink — gewiß eine respektable Zeit —, so käme sie, mit Berücksichtigung der ständig darauf lastenden hohen Verzinsungsquote, eben doch weit teurer, als eine solche aus Zink, die vielleicht (in modernen Rußstädten wenigstens) nach 30 Jahren erneuert werden muß.

niedriger, als für Zink.

Ein Vergleich des Zinkes mit verzinktem und verbleitem Eisenblech dürfte ebenfalls entschieden zugunsten des Zinkes ausfallen. Die Herstellungskosten sind nur wenig, etwa ¹/₅ bis Dafür ist aber die Lebensdauer, wenn nicht ganz besonders günstige Bedingungen, wie besonders reine Luft (in Gebirgen, wo keine Industrie ist) u. dergl. vorhanden sind, im allgemeinen knapp halb so groß, oft noch geringer. Und dann ist ja, wie oben bereits erwähnt, derWert desAltmetalles bei verzinktem und verbleitem Eisenblech gleich Null, bei Zink hingegen 40°/₀ reichlich.

Dasselbe gilt für alle Blechverwahrungen, wie alle Einbindungen, Mauer- und Gesimsabdeckungen, Dachrinnen, Abfallrohre u. dgl. m.

Legt man bei den Vergleichen der verschiedenen Metalle die Preise für 100 kg zugrunde, so darf man nicht übersehen, daß ja Zinkblech infolge seines geringen spezifischen Gewichtes, wie Seite 23 dargetan, eine das Kupfer um x/₄ übersteigende Deckungsfähigkeit besitzt. D. h. bei gleicher Stärke deckt man mit 100 kg Zink stets x/₄ mehr als mit Kupfer. Ein Umstand, der also bei Preisvergleichen wohl zu beachten ist.

liSUDTEKA POUiUihOM

KRAKÓW

——sad-.

Im Verlag der Illustrierten Zeitung für Blechindustrie F. Stoll j r. (E. Otto Wilhelmy’s Erben), Le i pzig-R., From-mannstr. 6, sind folgende Bücher erschienen und von dort zu beziehen :

Dr. otto Kallenberg: Projektions- und BercchnuhoslehPB für den

UleehaFbeiter, umfassend Theorie und Praxis vom Aufreiften, Zuschneiden und Berechnen der mannigfaltigsten, im gesamten Blecharbeitergewerbe vorkommenden Körper und Gegenstände. I. Band: Theoretisch-praktischer Teil. II. Aufl. Preis gebd. Mk. 12,—. Der II. Band ist in Vorbereitung.

Dr. otto Kallenberg: Das Zuschneiden von gedrückten und ge-zogtnen Gegenständen, auf neue, einfache Weise. Preis Mk. 1,20.

wohl als auch nach dem Gesamtinhalt, nach neuem, höchst einfachen Verfahren. Preis Mk. 1,80.

Dr. otto Kallenberg: Bas üergrößcrn und Verkleinern von beliebig Bn Gefäßen und Gegenständen nach Länge, Breite und Höhe so-

Dr. Otto Kallenberg: DBF Klempner- Und InStallatBUF-LehFling bei

seiner Vorbereitung zur Gesellenprüfung; auch bei der Vorbereitung zur Meisterprüfung mit Vorteil zu benutzen. Herausgegeben vom Verbände Deutscher Klempner- und Installateur - Innungen. III. Auflage. Preis gebd. Mk. 2,25.

Dr. otto Kallenberg: Rinnen- und 6esimsknnstPUhtionen

mit besonderer Rücksicht auf die praktische Ausführung. Preis gebd. Mk 2,75.

Außerdem sind durch denselben Verlag zu beziehen:

Dr. otto Kallenberg: Modellbuck für den GlBtliaFbeitep.

mehite Auflage. Pieis Mk. 3,50.

Dr. otto Kallenberg: Der praktische Klempner.

V. ver-

Ein Leitfaden und

Hilfsbuch für jeden Btecharbeiter etc. Verlag von E. H. Moritz, Stuttgart. II. Aufl. Preis eleg. gebd. Mk. 4,—.

Das Buch bietet einen Gesamtüberblick über die ganze Klempnerei. Es eignet sich vorzüglich auch zu Geschenken, Prämien u. dergl.

Dr. otto Kallenberg: Praktische Natur- und Materiallekre für

gewerbliche Fortbildungs-, Innungs- und Fachschulen. Ein

ausführlicher, methodischer Lehrgang des Unterrichts in Natur-, Material-, Werkzeug-und Maschinenlehre für Metallarbeiter im allgemeinen und Klempner und Installateure im besonderen. Verlag von E. H. Moritz, Stuttgart 1910. Preis gebd. Mk. 7,50.

Dr. Otto Kallenberg: LOQärithmCIltQfCln nebst ausführlichen Erläuterungen, sowie ihrer wichtigen Anwendung auf Zinseszins- und Rentenrechnung. Veilag von C. M. Gärtner, Schwarzenberg i. Erzgeb. Preis gebd. Mk. 1,50.

Dr. otto Kallenberg: Das Zinkblech und seine Verwendung im

GnUfaChe. 1V. verm, und verbess. Auflage. Herausgegeben vom Ver-bande Deutscher Zinkwalzwerke, Berlin NW., Albrechtstr. 11.

(Diese, wie die vorliegende Broschüre versendet der Verband Deutscher Zinkwalzwerke allen Interessenten kostenlos.)

S-96

% ^

•'Jł

’M,{Lès

r ĘS&m

... ' • !

.13»

PI

• ‘ --Ï . *    «&&

: «• • •

S

f AM»

twm

I

■fl mm' ■

»*»S U'*

:• •»*

fi

i*.’-

■ *-ï-ï£ÊÊ

•iS

' €ï ; pr ljsM T i ^ Ąmiś&

''A; ?

* -S-V * .

1    ‘ -i#

", i^-S&    -

-if * 'Jâg*

mp» : 'IgjS

?.. »S*5

* * -..

Biblioteka Politechniki Krakowskiej

100000297365