f-ł

r*V

•i

«V- ■

-î -

'V

%• i

:■

V*

[г®

[a

**

Hf £

**»

ШШ й

:*v

■*.<

, J⁵-

Л

i-Ä

l5St

'л'.;

Г>

¹    ‘ V-ч *

■I

r.w*;:/

-V

■я

• i&®/i

шш

ЯППИ

W\ r -

i s>

к*,

j»* ^ J* *

?Rd »

”5. /

<zW

Щк

fani

йИШ

ян

.„л-

%з

) i ■-• 'fo.

/-•

łif

Л %> i

ШКар

4'*'

* *■

ч&Л

Л* t4

«>

*>

» i-.

5. .sÄsä*

*9

“ł%.

%À

|П

Й2

LV

Т+*

A.

•‘i-

«*

9,

-Vł.

■“ \,'I

.- *

il»

i

Biblioteka Politechniki Krak

A?S\b

LA CONSTRUCTION

EN

CIMENT ЛИМЕ

APPLICATIONS GÉNÉRALES

THÉORIES ET SYSTÈMES DIVERS

PAR MM.

C. BERGER 9

V. GUILLERME »

ARCHITECTE .

INGÉNIEUR CIVIL

Préface de E. CANDLOT

NOUVEAU TIRAGE

PLANCHES

ëïïeRÜidien Aibeitea

yVE

PARIS (VIe)

CH. DUNOD, ÉDITEUR

49, QUAI DES GRANDS-AUGUSTINS, 49

1904

KRAKÓW

chnięi^s«

41305

TABLE DES PLANCHES

SYSTÈME COIGNET

PI. I. — Aqueduc d'Achères. — Galerie libre, de 3 mètres de diamètre. — Galerie elliptique, de 5m,16 d’ouverture. — Bâches de Gennevilliers et d’Achères. — Terrasse de la bâche d’Achères.

PI. II. — Réservoirs. — Réservoirs de 15 mètres cubes. — Réservoirs de 20 mètres cubes, avec tour eu ciment

armé.

PI. III. — Réservoirs. — Châteaux d'eau. — Réservoir de 500 mètres cubes, pour l’arsenal de la Marine, à Roche-fort. — Réservoir de 300 mètres cubes, au port de Lorient, chantier de Caudan.

PL IV. — Réservoirs de l'usine de MM. Sautter-Harfé et Cie.

PI. V. — Estocade sur la Seine.

PI. VI. — Magasins de la Société « Aux Classes laborieuses », à Paris. — Planchers. — Toiture.

PI. VII. — Châteaux d'eau de l'Exposition universelle de 1900. — Plan d’ensemble. — Plan des vasques. — Ensemble de la grande niche. — Cloisons sous le plancher du déversoir. — Coupes. — Armature des voiles de l’arc doubleau.

PI. VIII. — Château d'eau de l'Exposition universelle de 1900. — Mur de soutènement. — Contreforts. — Plancher des terrassses. —Plancher du déversoir.— Plan et détails des voiles sous les vasques.

PI. IX. — Château d'eau de l'Exposition universelle de 1900. — Détails des arcs de la grande niche.

SYSTÈME HENNEBIQUE

PI. X. — Pont de Chat elder ault. — Elévation. — Plans. — Coupes. — Contreforts des murs de tête.

PI. XI. —Travaux divers. —Canalisation d’eau (percement du tunnel du Simplon). —Reconstruction du Pont-Neuf, sur l’Arve, à Reignier (Haute-Savoie). — Encorbellement des trottoirs sur le chemin de fer de l’Ouest. — Mur de soutènement de la tranchée du quai de Billy.

SYSTÈME MATRAI

PI. XII. — Planchers et hourdis. — Type de planchers. — Attache de câbles. — Planchers d’essai au chemin de fer Métropolitain, à Paris. — Plancher d’essai, à Nice. — Plancher d’essai, à Edimbourg.

PL XIII. — Silos et planchers. — Silos de l’usine de Chantemelle. — Plancher de la maison d’éducation de la Légion d’honneur, à Saint-Denis. — Plancher des usines A. Lumière, à Lyon.

PL XIV. — Couverture de la tranchée du chemin de fer des Moulineaux. — Plan d’ensemble. — Coupes et détails. — Poteaux. — Travées d’expérience.

PI. XV. — Chemin de fer métropolitain de Paris, station de Vincennes. — Planchers des quais. — Planchers de la

station.

PL XVI. — Escaliers. — Cuve. — Escaliers suspendus du Palais des Manufactures nationales, à l’Exposition universelle de 1900. — Types divers d’escaliers. — Cuve de réservoir. •

PI. XVII. — Le Globe céleste à l'Exposition universelle de 1900. — Plans et coupes d’ensemble. — Planchers. — Escaliers.

SYSTÈME BONNA

PL XVIII. — Réservoirs. — Réservoir pour la commune de Puiseux-les-Louvres. — Réservoir de 150 mètres cubes, à Rochefort. — Réservoir d’équilibre de Gennevilliers, sur la conduite d’Achères.

PI. XIX. — Usine de la Compagnie Centrale des Emeris. — Elévation. — Plans et coupes d’ensemble. — Planchers. Toiture. — Réservoir de 60 mètres cubes.

PL XX. — Construction industrielle. — Cheminée. — Escalier.

Usine de MM. Sautter, Harlé et Cie. — Plans et coupes d’ensemble. — Soutes à charbon. —Cheminée de la distillerie de Conflans-Sainte-Honorine. — Escalier de l’aqueduc de l’Emissaire général à Chanteloup.

PL XXI. — Pont et canalisation. — Pont à Liancourt. — Canalisation pour le compte du Ministre de la Marine, à

Brest.

PL XXII. — Ponts. — Pont sur le canal du Midi, à Toulouse. — Pont sur le Grand-Morin, à Esbly, près

Meaux.

PI. XXIII. — Ponts. — Pont en arc, de 21 mètres d’ouverture, sur le Gers, à Auch. — Passerelle pour le chemin de la Belle-Croix.

SOCIÉTÉ J. ET A. PAVIN DE LAFARGE

PI. XXIV. — Travaux divers. — Pont-aqueduc de l’Oued-Kléba, à Masséna (Algérie). — Canaux du Chéliff (Algérie). — Bâches du Hamiz (Algérie). — Egouts de Maison-Carrée (Algérie). — Cheminée du bassin de radoub, à Alger. -- Maison éclusière de Jonage, sur le canal de dérivation des eaux du Rhône.

M. PIKETTY

PI. XXV. — Réservoirs. — Réservoirs de 30 mèlres cubes. — Réservoirs de 31 mètres cubes, en briques armées. — Réservoir sur pylône. — Cuves à huile et cuves revêtues de verre.

PI. XXVI. — Fondations. — Planchers. — Fondations sur mauvais terrain. — Plancher de cour, dans une construction industrielle.

PI. XXVII. — Ponts. — Passerelles. — Pont droit pour le passage supérieur d’un chemin vicinal. —Pont avec poutres de rives formant garde-corps. — Platelage en béton armé d’un pont métallique. — Renforcement en béton armé d’un ancien pont métallique. — Tablier en béton armé pour pont-route.

PI. XXVIII. — Ponts. — Pont en arc creux. — Pont de 20 mètres de portée et 4m,50 de flèche, pour chariot de 8 tonnes. — Pont en bow-string.

PI. XXIX. — Travaux divers. — Ponts à travées successives indépendantes, avec piles en briques armées. — Passerelle. — Appontement. — Bureau transportable.

PI. XXX. — Ponts et viaduc. — Ponts exécutés sous la direction de M. Harel de La Noë, ingénieur en chef des Ponts et Chaussées. — Pont droit, à trois travées, pour passage supérieur d’un chemin vicinal. — Élargissement du pont de Pontlieuc, sur FHuisne, au Mans. — Viaduc étroit, en maçonnerie armée.

SYSTÈME BOUSSIRON

PI. XXXI. — Réservoirs. — Réservoirs accouplés, de 1.000 mètres cubes, pour la ville de la Madeleine. — Cuves à vin accouplées.

PI. XXXII. — Réservoir de 800 mètres cubes, à Garches (service des eaux de Versailles).

PI. XXXIII. — Plancher.— Revêtement de digue. — École, rue des Brasseries, à Chàlons-sur-Marne.—Plancher des classes. — Réservoir de la Mouche, près Langres. — Écran protecteur des infiltrations.

PI. XXXIV. — Etablissement des Pupilles, à la Villeneuve (Finistère) — Planchers. — Encorbellements.

PL XXXV. — Couverture. — Planchers. — Société des Huiles, de Colombes (Seine). — Toiture. — Restaurant des Congrès, à l’Exposition universelle de 1900. — Planchers.

PI. XXXVI. — Pont au droit de ta rue Valette, à Perpignan. — Élévation. — Coupes d’ensemble. —Détails.

PI. XXXVII. — Pont au droit de la rue Valette, à Perpignan. — Détails. — Mur de soutènement. — Consoles

MM. GIROS ET LOUCHEUR

PI. XXXVIII. -- Canalisation. — Plancher. — Siphon pour la traversée de l’Oued-Isser (département d'Oran). — Conduite d’adduction d’eau, à Valence. — Conduites d’eau accouplées (usine du chemin de fer Métropolitain de Paris). — Type de plancher.

PI. XXXIX. — Réservoirs. — Réservoir de 200 mètres cubes, à Sidi-l.hassen (Algérie). — Réservoir de 50 mètres cubes, au Mellinet (Algérie). — Réservoirs accouplés, pour exploitation industrielle.

PI. XL. — Soutes à charbon. — Escalier. — Soutes à charbon pour l'usine électrique de Bercy (chemin de fer Métropolitain de Paris). — Escalier d’accès au collecteur Marceau (place de l’Etoile).

PI. XLI. — Le Triphasé. — Usine électrique cl'Asnières. — Soutes à charbon. — Réservoirs.

SOCIÉTÉ DES TRAVAUX EN CIMENT DE LA PLAINE-SAINT-DENIS

PI. XLIÎ. — Réservoirs. — Réservoir de 400 mètres cubes, sur murs en maçonnerie. — Réservoir pour la ville de Vimoutiers (Orne). — Cuves à vin, propriété de M. Fontan. — Citernes à vin, propriété de M. Félix Potin.

PI. XLIII. — Planchers. — Mur de soutènement. — Clôture. — Couverture des arcades de la Bièvre. — Mur d’enceinte des aciéries d’Anvers.

SOCIÉTÉ AMSTERDAMOISE (WITTENBURG)

PI. XLIV. — Planchers et poutres. — Caisse d’épargne d’Amsterdam.— Dalles des quais de Rotterdam. — Fabrique de margarine, à Osch. — Atelier de réparation des télégraphes de l’Etat. — Poutre supportant un mur de façade.

PI. XLV. —Radier de fondation. — Escalier. — Cave étanche de la Bourse d’Amsterdam. — Hôtel Mercurius à

La Haye.

SYSTÈME DEMAY FRÈRES

PI. XLVI. — Réservoirs. — Réservoir de 100 mètres cubes, à Arcis-en-Brie. - Réservoir de 1.000 mètres cubes, à Reims. — Réservoir de 7.000 mètres cubes, à Beauval (Somme).

SYSTÈME COULAROU

PI. XLVII. — Escalier. — Couverture. — Escalier à Angoulême. — Conditionnement privé de Roubaix-Tourcoing.

SYSTÈME DÈGON

PL XLVIII. — Travaux divers. — Cloisons et revêtements. — Poutres et planchers. — Hourdis de planchers sur solives en fer. — Colonnes et piliers. — Tuyaux.

SOCIÉTÉ DES CHAUX ET CIMENTS DE LA PORTE-DE-FRANCE

PL XLIX. — Lavoir public à Gy (Haute-Saône). — Réservoir à Fourcatier (Doubs). — Réservoir de 310 mètres cubes, pour la distribution d’eau de Belley (Ain). — Canalisation de Moutiers. — Planchers, à Grenoble et à Aix-les-Bains.

TOURS, IMPRIMERIE DESLIS FRÈRES, RUE GAMBETTA, 6.

Я

i

V

'

-

!

'

*

«

AO LUC DU C D ' AC HÈRES

Ingèti ietu*~Cbtbetrucé&us':    JÈ. C 01GHE T.

BÂCHES DE GENNEYILLIERS ET DACHERBS

■LONGITUDINALE

COUPE

j*

1.ЧОО-

»I

У/УУ

УУ

^ :l.: JET.^TEEf: |

feLg—

4-U-L-4-

j.

Adjeres j

'j л Д~.    ~ ъ !

e\

tó

— 5,000--__&J20O. __

y-«?—jri

ffjyyyyyïy'

yyyyyyyyyyy

ГУУУУУУУУУУУ

/.

rr

Is

-çyyyyyy.

ÿAo"

yjpyyyyy/y

coupee

/£

rl

/ «t>

/4

r~

VUE EN PLAN,

i-------

_ -A.Ią£q-___

----

X9i4

-цабА-

_. z.ooa —

----—

3“

---tzgt -

----c^3ß---

vu

-vi—î---1__к___A.__J__i__

__

i)

.1___ł _

aLfl—

__t_I

'V

Г*

T“

Si

;-t--

—-1-.

“t“

:T-

-в“

“+•

--U

‘l-:=

+*

,,-A-

JSnduit de 0,01*

! Fe^d* 0,07S

\Ferjde û,oS

I-

«+■

pym

■ZeA:

-yy

î,

rU

u»

<Ém

щ;

дав.

s:

“4

-~-h

COUPEd

-X

V.0£ peu* trvèt™

{Г

P

>T—

h,

Tk-nte de    j

•mèire

ÎBf

Fer cL IJ. aU do pe&asi t £ jkilffÿr.

%.

^-------L^SL__

'A

WF’

COUPE SUIVANT AB

COUPE SUR CH

CÜUPE SUR EF

cî a!

к---o.n---* I

U-----— ixL-----_jJ_

GALERIE TYPE №5

eJo

■4

яй777

~т

~H

___>?!^|ç⁰

уЩ i

5bo

o.o&o 0.500    o.o S о

Ш

■ COUPE- SUR AB

COUPE SUR CD

Ronde de /tf Tnt. ^ j

if

WÂ

J-ML 0--L

lÜiiii!

LU

L,

ШШTVW

II

_И._

Él.L.

ELEVATION

GALERIĘ LIBRE

COUPE LONGITUDINALE

----.Tl

ijL—üîk—;|f

iï-T-i

! <? /ü>nd ir    '■

§i

А-'О-Л^

yl/X'

±=fe=

Va

HcruŁ de H

GALERIE TYPE №3

VARIANTE A LA RENCONTRE DES CONDUITES D'EAU ETi DE GAZ

TLoruUdeff'

d#°

■Ы

iH-

CP

-i

S: lii iil I ij

„JjJlJLIJ!

Dj b!

VA

^}^^}^^^yyyy^A7y)zzzzzy)yyz

l!!|

|AÏ

d •

ii i

I.

iM

—t-v -fi— -Д-1Ж

i?

4____

COUPE T

SUR LA

TckjISVER3ALE

jDE LA VOUTE

----1-

m

/ Z/A/j ^

w.

ji

•il

Va

yÀ

VUE EN PLAN REPARTITION DES FERS GALE RIE № 3 -VARIANTE -

%-

PLAN

----U,2S) a------J.

1    PLAN

SL

(/y

fl

Va

Va

.Va

Y,

y,

AU DESSUS DE LA GALERIE jAUDESSOUSDE LA GALERIE

rEF**

i(k.

COUPEC

yÀ

Yy.

Y,

y,

-Д

Va

Va

Va

Va.

a5o_

1^лЗа-4

Vy.

“f4^7T-p--“==W

------Щ

—4- -X 1-41-4------Шл.

Z:

YV/

шл

yy

Va

Tint

•Hz.

Va

PH

Y/.

o,t5

VL

'A

—._3aL_

к_____LLfi

____— 4xoq___-

-—JC

coupe a

COUPE b

-M-

fr*me

CIMENT ARME V^Dunod Editeur

Imp. MONROCQ. - Paris

Planche I

I

4»

J

t

7

■

,

■ •

•;

.

;

'

RESERVOIRS

Jnjtmtür - Constructeur-. MrE G OIGNE T

t    M⁵

RESERVOIR de 15

AVEC CUVE EN CIMENT ARME

RESERVOIR de 20

AVEC TOUR EN CIMENT ARME

î.-'

r_i

jL.

9?

trop plan

5e .

.    O

.......-§L- 2J&Q-

___ JąI- иг

5c

5S*-----

___

2rf)<lo_______

iiooo______

- --+“4

: ♦---

I S !

JP

4---

I—!

i-y

Л__

Г!

(uOLTPE AB

C±l

Г!!

1"тж

""T

-g?

-A !

î—f *—-Ü\ ?—!

-cota

П"

ck    i

-f----i!

ronds de    « rnomüre

_ _До5о

I : Arrachement ■f montrant en élévation «. S l'ossature delàparoi i

to

DETAIL DE LA CEINTURE olu RE SERVOjRdf 15m5

a *

H~iî

" vi

-t-

§<v

ïtl

<*

‘J

#д

^_JTb:4

-I

•-b

'S

■ <4

■з-н

J-kte

t.

Iffÿ x

ÉT-fS

---

_L. J____

11

%.

VI г

■ ‘Пйм

h mP Il oi o*

iJoi

0>

0'

■5

ЛаЬЧ

i$

. [_ ДЙк_____

g _j5aoo___

o :

_v°

__ _тЬло___

! Г-~

RÉSERVOIR DE I5KAVEC TOUR j

EN CDMENT ARMÉ    ; S~

H ut mètre iutériaui-2SB

yJi£±&êjm

i:

-п

/ •omis de O ,n

;n⁵:

ï—

• ! fcl

Jt______

II

Id

ł--

«L

St

У/г

il

f--

TôiZdsdëb”%ieircii (aires

\T Arrachement

I montrant /'ossature de la paroi

—/vndsde ,x

СШru.

J""'i

T----i 6

i—i

•4

г—1 î

î—

Æ-—ij

î::j

b-i

Дг—

ronda

ścasdmmoed uorutAle

M⁵

RESERVOIR DE 20 AVEC

TOUR EN CIMENT ЛИМЕ

î;::

<4

■r~

«J '

tzz

-t-

__€2»

\t

I.

-ii i i —j i oi

o!

cC

■A T

[S

ł-

TTçry

!    Diamètre de 1л calotte Z,go

r '

--«O

5--

!|T

f.j;

emploie ment ;

|^| Ve lii нерпе d« fo

I:

гл!

m

fSI

r.

î:'

Ir

—CVOZZ--

>!

_jLb_5û

1 î i l T¹    ««s

î| i¹ I*"" I \ I \    ronds de &*%*ù'cu/aù

. \ArRACHEMĄNT l'oédeeUéNn.    7nuni J

mpmi'cmten Цеуфор\ ‘ h'sSt'ture dàh c\oim

i O

métro

оогаоам

|!

b-fi

ds de    '%

u,

St

Sea

—f

t rended« fà’ Tet^ |j altaeNs ivru/ede d т/о j[

aUac/uRS ronds dedmnv

ronds de 2. & m.

Ai

-i

f=-

-il

f-4 i

T--ж fa«⁵

i«.075

Ÿdjt/ùurG a f a/< ’LiäWc' «4^ ^

уУ7%

MiXSÉ ¹¹ I

........■!

WWm

ш

УУ'/'/УУУ'Л

9Щ

idu

x5ûû__

___J52ÜCL__

■Y

i * iâil

яямммЯир^

Ьр^⁷

m|

шш

AMÊ

loupe

fö

mmmm

ШШМ

-<

1 ul

tlcmt Ite g~H 12 w

n,mrffd«S~ ~Юdarnttre

Na

ШШ.

JsS diamètre da la calotte Zgo

--

rm

10.075

:^:c5

l!

13

я-

^ I conde dt О iL 7

нм—i tri

3 8 т~ "I4:i

О on dt Ое 10\/7ом-"/

ии т .

кх'Ч

!i

i¹

röndtdedpm.^7 otterJ

ctaiam de ooff d op "

%i

potepuotdo/5*20

ulso

Ü»!

§-«

PLAN

“i

Nota r*Des o chef tas de la tourt tu rweruoiretdupttifa sont eonstlfuaesr 'S1 par dôamp/pfants de So, loréueuspttr dos barreoMtr en tèr rvud do /0 os/лгало do 3oo "ym

il

fy ronde de & /■*. У^ЩвтШк attach** ronde dd d lAylllA tout /*« o./p    'Aliy

rontDded%èut,daS. rends dë/O "рпл idrtiaa

i- • RÉSERVQIR DE 15м*    4

PLAN

«

да

»-M

■aûL,

%,

potsaura cUlb'ZO /

attaches ronds de (№ алого/

rond«

ft.

Mota n* L eotie/te ecclcrtcare celle du. reservoir et du. putts saraoem paeèo de oumta/ds de dV/# réunis par des 6atreaux de/a espaces de

Zoo

«b

PLAN

LH-№

-i-

trop plein

WrnÉÈb

r-

YA

Ф;_1

VhXX

‘ m

-----T

даЦ

iûûfl

\ч

i-

II

(à3'”/<?du mur (remise de ô'onjHT

ronds de rayonruuit ronde de #*/ et*

4\

Si

ndnehos ront£s de &”*?*

4-

'/y,

■4

RESERVOIR DE 20 PLAN

ho/vds de

M³

Ui

! i 1

À.

ШГ:

_ç.i

n*n*Ut4? £^b(/2

cuom

rondr da б'Ут-^О cui tnA

ГУГ-У.--,-,

D____

•ner

+*î

fl ronds de &**//*,

.. u j y

\4 il

л->-*

У 3/

o»⁶ A

i%-

y/

il

u.j

VI

Ш/ША

iS

/-I

rends

/еъ

ч §/

'(A

I-

'.у .

шш

шшш

y Щ

fér/t dû potoau de id /i.

Oi

A^a&aeTisś ronds de 5 (oue Csa OJO

iii п

Ь?

rends eût 5 nt.

%;

distrtlution dit vole T

i;

ГлР^г"й''

w

tlfotc/tej ronds £2sé łon* [et Ojp

Jtonds c/e Zê'ZirL

DE TAILS DU PLAM DE LA CUVE RESERVOIR DE 20 M?

W-

fP>®

Planche П

.

> ■ mm

Y. Г. j

'

•л

&

*

-

-

0

л

■

#

'

\

- -, -

>4—-

--T-

-Tf-f---

--1_.

--i

Si

Г:

■ ЗД

----M*“

Нсш Cour U>t<

ft

IÎToE

r*—

iS!

3h

²1

:— — бф-ér

ю1

Sf

-0^5

X5y5

_30o_

*---

Jpû.

orb's--

-4,Xo_

S-т

s®

o.oe

X2ÆQ+. _

e.ofi__

7P*

'•&M.

-H

„ C0lTT3E d'ensemble

к-.—-?3да-

-I

xO

<*

RÉSERVOIRS-CHÂTEAUX D'EAU

RÉSERVOIR DE 500 - CHATEAU D'EAU

I#0*05*0,5

Лиг.r' Constructeur M?E. C OIGNE T

L-J.4.00

Kr do I2m/m

'À

/?

DETAIL :de la coupe

z¹5UR UNE GÉNÉRATRICE

ftkmdde/3 "Уль.

— TĘ

«!

□ Ql

I ipoo ! I*— --*r

¥vlz

t!

’TT

МММ

§r

-I

•j

il

—X-------b

Л-.^ас^лда-*

,5o^

&u 60.50,6

■a_

-jr-*---—-

U'j

-----i

o!

i.

■ rn

t ,

Ай»,

“i

8Î

■'U-A

genét\zfrheç<t U i

гшГ'ео--/pf

-.5

rft

UO. 20.

LO

Aoo

! $

jce<b^4%'Ś;

’____

-n-----i Д¹ TT--i-

——I_e|_l_â5p_l -

____ô,Jo___

____UîO_ ;___

----Ai

----4

-~-»4

=É

M⁵

s!

4-

M COUPE D'ENSEMBLE

№ RESERVOIR DE 500C CHANTIER DE CAUDAN

PORT DE LORIENT

•—»

37sV

il

COUPE. SUIVANT LE TROU D’HOMME

.--4

-_ф_5оо^ TUYAU DE DISTRIBUTION

eIt—

°o's[

ftUI

U "YnĆ^epace* de

1»)

ft

V-

-ÉIP^J⁴⁹"'

ïsÿZ* ibrnTröTSöTG

.--A

CD

h'nudi de /âУ

coU-P®

J£a‘

gad£

SCI

■çr77Z///2222

—» “%

"%.

ГС

-X-

-f

ai

i

L-

Я fin

h-

_xpa?_

il

+•

~b1 —

If- PlOVÎÈOLiSâ$0__Г _

Si

V

°l

“U

5oA

t__;

Д5В

I.

¹ *1

O¹

É--

- REPARTITION DES DIRECTRICES DE LA PAROI VERTICALE

-7-7-9.

-j

Ю| ' I

' Itiç.ôOxOO

ftcofL 5o*3qk

\A CU

T-

~Lj Söxtftt/f.

Aw ^ '//n. ayMUVff de 0,0ft cno.

.Oj    Lev par ot i'crlicaSe, du reacrooir evenftrend 5 %ône.r etifévude* :

' roruta

l- i

Ы

* *

o!

COUPE DULÄNTERNON

rond de ft"¹'оь.

Va

fiérU &0,30.<?

N!

'it

A 2 openera/rLcXe łf-O* /> eudrar-d?-L/ir „eut de IZ

_L7î___i----VM"_Ti{ ï ''V”    Л

_ _ _. .».L,»»-------C*_ J_____- _ ijo_________jL__

к-------Ш°-------i    \    ,

COUPE DE LA PAROI VERTICALE SUR UNE GENERATRICE

I Iśf----

S.o» ■*■-----1-4

Сош'оппе T Co 16'üxß

/Ж¹"

ОАЛ1$шт

■ ^ °° 24y

Xj

A

O «

<0. c 67 v

•L "w

V.

//

oitronne

.i

ho.S0.es !

2- dans Je

% ftter

___

~T-

On d

1(0,20.0₁

A4 'TAa

.N -s о

У\ г

i о

tlautaui loiaiiL Д<2й_ _

---^ Zone A -directrice* en Sao'e* de /errand, de 12 (djdieł^MjiriaLIes

u eó732'f 8 J- В--d‘-Я )л/.лг «.w.

l)i„/n /VfcÆ/7/р__^

utmćO-tJnićf iaur R₄~5o

I I

rô'morUunA i-i $S*ift*L

^ etjuldurłanha.

П Ö3 j Zones

Warabrt

Jtarres

.Sltl

lS

76

Diaznein Hauteur Espacements

dee des ----

bârrej Zoncc Minimum Mcuot/rtiwi

5» G» ÏS

w

Ъ97*

I'C'ttj

о,? klh

0,01(1

O.0kk

0,100

3L

(Ъито/ще uRo*5j

filOt <U //- m n. oe/Kzca* de/6 m r. rilbl.

C^ JJuwul de —^ćL&twile

5,000

Meridiane ot

nUde&r-^emm

0,03ent'ina/

Ь/Л,

U i\r

J. IU

гг

tK-

'oü/

'ï

ftckedle

7!vu </ /итл

mvo

//

•/

ÏÏ

\\

\,

Ч\

Fiona iU

/■

/■"

t-

de l euxur

-r-i-

4r-

-X A___L

Mr

- Л

W-rüSmmiiiiiiiiii

Т?:-^-Г1е1-А<Го-_____

___j____.ELAfloo__

PLAN DEL’OSSATURE

!' i

■’Svidanec

iV

■---—Lao Ti,2Q2 _i

----Zi_l6A_V_.₊

1Л

-Ut

3ok

OSSATURE DU RADIER

àlechelle de la, coupe-d'ensemble

Шйя^яяжмштшшшш

Couronna corn ,00.00.6.

/Ż

•'/

-T

e/riAt

A#

OSSATURE DE LA CALOTTE

J} I Tuyau, de tâtcccnde

ter U,

■

■

/

<*

.

.

i

■

t

/

■

%

/Аял

•k----

ДД2.

i.

.L

Il VT

iO au, m..)

RÉSERVOIR DE L’USINE DE MRS SAUTTER ET HARLÉ

b?r Constructeur :ЖЕ COIGN LT

5^4

(f

iStfad)

•А».

___Ш»__

Ą-

ià:

><

-3

-i

-i

EU

PLAN

DES POTEAUX et SEMELLES

^ Квпл |A /7.u.n,J

Vi a

horizentttux.

/tondra n,//n vertical**

_c

-î:

1!

№*75 ?

pzip A-ft-b

~%ry

S!

-1

L^_ _J$£L---* — - ÛLQ-

~T~----Ш,—

/ôxfaû

•e

|4>

lo

itD

22.Ä? J|?

-¥

/Sx fa O

Ï ,2?Д-

jo,7.<

“*i

SU*

Te

PLAN A LA HAUTEUR DES RESERVOIRS

____Ej_ _____-sjkk,________[H _    __1Д0 _

T*

PLAN VU DE DESSOUS LES RESERVOIRS

->!■

s!

Д---_5j

A_T

-----rA?a

a,fii _J<

"i

F*’

.1

--J—

Ю¹ A

?t &

*!

°i    It-

-i jàiUo i-‘

3-*=

JB

«O

M4fA«44—J-    Щ----,D,M&W-WM j

i -U MM = !!

ëî ,

g?»

~У:Щ

__4L__1

tO i

S!

t M⁵I

li y 4-«j js.iÆ

LA.....JL

~ÉcZl

Lo,8£_

Ъл^

PLANCHER VU DE DESSOUS

²ß^i*2iannaniU/iorÙ <i-/iuj-dorut-i S TM -(j <UA.ntJ.

Ж5й1

|j j : ! j    i roni, 2Ö\

^A^tacOe,r /tend de m

Kon<t Иг Ю^о ян-пП    TŚ^y

/lunc/s de t?n*~ //'rr'ettt пг \у

i!

ЦЦф41

5 Hondę Я/l m/n_

cd-. :з:

U~

Z*7Sтт^иГаггоЛ?"⁴* a'^^mnXt/a.fu,ntrs

li........'ll I

6'üniä'dex О, to

т-r

JU

H—1 —jy

T⁻-- 'i

rii'-J'

СШас/юл

/У/У/У/у//.

КУт.

'ГОП

dr 20

ł«i

о7Ш-Ж~у-п

ill

5H

5!

SHondsde bb. ~:/n

ASSEMBLAGE

i i    аа

cf ^    я у

I 3 Re fide 2,fa /«.

jj

&rpntù deńjZ

DES POTEAUX sur les SEMELLES et AVEC LE PLANCHER HAUT DU REZ-DE-CHAUSSEE

EcRelle

R3m, tour {*.10. to

0,5

[ M ^ °T °.? \ Y °?

lt ronds do Z/l

-S

CUtoehee Sm/m. tour les 0,/0

Srondelfo 20 /,orrruutł console ein très à l eWedinUr de ta гюи tre et relèves de OÓO dans /с

Г Jti

'УУУУ/УУ/УУУУ/У/УУУ9ШШУ

f/nuW.J

Я г о ruts'i.

\'A

c<

' llfjf-------1

Lorj    i

<624

_еда

XbZ.

if._b.oo_j ! !

-РД4-

____1 — :

-----₃;i —

»я

v°__

c4.-

I.

-o

zo'L

л 4л—

._u3.i4____j Jb€8_ - j— -k_U⁵-_

—f

Zji 2

j-

■4

• ■»I —

“»■тг

»1

łf-

l«~

I----*.

Rond do 26 n,‘m

*Vz5-

>f----

6ЛD.

~crçz

&34-

!■

ifl----♦_

T---*1

-ßalustrcidc

--T — Т.Г-1:

r-v r - - r_ Jrpmsl■ J ^

::

LU

■3

-----f—Y

1<—дйс----i._i4c_^___сДо___J

ß erp et' ot Giullorinc

-1

'/ Ronds оУ

ÄA

tfr№TH

irate

ÆliMÉm

md#ä±iL

.....

relevés et scellésdanslei    R-    к --Nj- -- Ji-..._-»l-— и---**.

paroi die reservoir de Cfâeuv. ' *“

Ronde de /ÿ% -    \*Я

(tO ант./    'Л

ЪтасЯйгЯа,*/

(/O tue nv.( f

!/

Л i ,*/

----

* I л

aoz__

айй-*_цо_

II

W‘"

Attach

,*<ue’n.

O au mètre ' -

fa fioruit et-4 2,0

:TT

i----44L_,—__4

mm

•fi

U-

г УУУУгУ1Ц\

_____:_ft5üL___4

|оЬ»_

Lj.qo_

_Л

V/.

■X..-

°ч

_4?С-___

Г’ЖХ

1 ■'TT"Fr4'

T~

щ.

II

Ул

6--    ' \ \4i g/| / yłpur/onnor co nr ote et,

л.“’    \ Л! //Tj /    yetęnrcaUemenć deine le/10/tan

} ■ t-й Л‘9*/\

tfi

If.ronds de Ö0fr/%,

HMi

Si

Æ»»W4i

^seront

iiddtK

Rond de

ïï

' 'J '

PLAN

«•

F.

14

;/

fFiTreRw/^S

Rnrns de nwe â°/(

Va

—-----*.

^ Rend datoVm. Rondsd* </l

i 7“— NlST! Ip

1 Retid, So’

_л_!

Ronde djyo m У

r/0<ui "ij/rc

У У

ASSEMBLAGE

DU CHEMIN DE SERVlCEf*'“''

,    \ç-------

AVEC LA PAROI DU RESERVOIR RÉFRIGÉRANT

Con-n’lè T,p njû    \ ^

Ö78

' ZJi

*K-~4i

• j Attaches^ Renddx deSm/

!i

■\ I

/t Ronds de 3<?

Oyft 07 Oß

COUPE SUIVANT MN

АХтЛЛзс’Ут.

: ÂC_ ;

___L___!_5j24.____

_|Aâ4_

-4

h4£4

T=gsat— в

S-SjJ

Echelle

« »Л 03    02    0,1    |0

АЫ ae la

nein

й? <Av mac/ibies

0.0

■а/аааа^ауУаУ'/а//уаауу>

мопдгиьс de *c/20

COUPE SUr/ANT CD

L----s>M------.Ltt&OL-

4#

Ff---1-----

SI

'A

ffl

7У77УШ

ST

mm.

tCau metre

3 ronds da 26

____cA___

-—4

З/torułs de 2<? /сгупапУ console eu dré^ à (ceci/'em tic de let/гои-tre et ne lever dc OÓO deist s /a

T3fdiLStra.de

>

■'>

ААААААЩЩУГ^-

да;    вй ■ У°-

^Sb c/ietle en/er

2 nn&btu

'riÂ¹™

;uvv

cf

у

w.

,Cяns O le • en Aoû Cpiussrnr O'/c

<- — -___L5a._____

„—5jP0__jL__S5°.— J,, (0

__lio___

PO 2ß0 _.

io

Console

ep.ojo

-.7-.7-S 10

' |i

_оД<э_

II

iiji

fit

::

‘S!

я > '

-<П7’гг

(i—i

Л*г«. fa rends de So / i

-DßO.

-L--_û&j---i_ _с4о_4___ois>____jL

tL/ f/e /,1

y'Ç I ГааСа;

/bu/ry <lf r^/Jr ^‘2.^'lï’K 'f.

3 i

>я |ГТ

:— j---ÎL.4.___j

non lie/ L/e ,ro//i • ,

interne heure JR).

•%

R¹

cqsa miernie-'rt irÜf.rmcduure ~ -4 и A f de r ive    t

H" ia/7f

Lc

Ś j

-------Jf-4------

--t

4J TT

1&0' lu ;fiOJ

rZ

-4,as

-4Ä.

тас/илсУ./.

A/A/A/A

-7*i?—j--:--

^ Len^rUtado 2tY₂o ^ f&teau de ^°/а\

УУУ'/У'у

iû

Ae la nouvelle salle il,v

уууууушушууу

rnae/iinc.r

'У/УУ/У;

jA>LiÊ0f

-4ФА

Nitleau (lii

uns >3

iy-.ULQr|

„ llÂfala;;

Ш 4»,

_.i

COUPE SUIVANT AB

COUPE SUIVANT EF

COUPE SUIVANT GH

Planche ÏV

„

■

;

*

■

'

к---

■I

-J-AUln-ii

! Si

ч.-

¹ bn

_G_i

-G—

Ie

Ifi

---—I___---

IT

ÏÏ

MM

fso

in гм/

-¥

311ШИ1Ю1РИ

- ■-=■—--.= !i;::::sKäSs

_ -Lßc

ias _i

r=

41

lD VUE EN ! ÉLÉVATION (PAC(E )

2tampon#tie f.OOuft.OO

-7.90

.N00-

Dfi

—EL

InjljL ]|: lÂtJ I f=H bś=4

EG

ju4

-A

Ибо», at

OJÜ«yk

-lae -н -2.9Ö

iOri.

■4

!i

_JcEk!-::.JL-

~ч

ba/baca/ifes

'-а.оо.йоу

>.

=*

:JÖi_

CjöUPE LONĄlTUIjjJNA-LE ^UIVÄNT AB

_ 4(4-    - 44 —■—H- -²<&- - l^k»⁰⁹

r-:

A-I

^³-|- Ą»— Łaa--

[у

O й> ()>

»---Э [I

?-SsŁ|_ .

f-1

|И6 st4 ^Му jaj уДуУ >у    'b    ?    ,

ofcCjrçLseisaj-IS '^4-ий{ТадТ<Г»А L?LÎïâ9^Â?L-?9Àva-iftP^ »

' т —    - iw—- >v - -²«fi— h —^в- -H——»L

Г-Г--Е----------N21,11.---------- - A--

1Г «ü L* épine /hgßf (fOUPE fUIVANT C^H

Ae___T?_ -³E⁶_

/Л

Aft<*c/ies / m/tu fates te* ot

tuae croisement

2 r stufe de ßO\

lii

■К

at

II

l3z

мцрр

iiiiilfi

"И IRC

lir

■щ

Щ.

_ _ Qß О

^,!л»7*к___-V

77Uacłici'. Kaut* de л'"уяи

___2,0.2.

I-I-

У?

1=

DETAIL

DE^ ARMATURE^ 3

cjouPE Suivant gd

I —TÉ

*fcs

^4У.Т,Г'

■i

4

dy

“Ш*

Attache* <?■"/„ /7 nu "titre) './Z ■.

■ф,

У,

Ćoujotut èO*fnx fatty.

wp.

ШВА

3 ronds tie 2>о у

~ ЙЙ

И t

,1

ЕАГЛСАШЕ SUII LA SK LN К

C,; DU ^EĆTEUR ELEĆTRIQUE UE5 С|НЛМРЙ ÉLYSÉES

VUE EN ELEVATION _ AMONT

likn'i IE II П

Itli T'jl

j.J

ii

!->

^^'/J'/z'/77777

Ingénieur - Сопл-fr/retour; EU J OltyNET

DETAIL DE£ ARMATURES'

CjOUPE SUIVANT ЕГ

. _K__

h--

i—All uma da.

yyy//yyy/yffi

У#'В^Т

2.5a .

r-~4

2 /'ç>r*ds de ZO,u/nt^

2 /» о mi s de 20 /ПУ

i-,

---к

/A"'/,

Уго/uts de Я O ni/„t

AthuAcs 6""/л.

36cirt*es 3o

vi fîï

-fijQ____

il

-L

A..,

ipt

e'i

‘■H

-it---

ШШи

TT-Timu r от “"ТТРР ¹    ‘ ' '7 Т ----if “I

i i'll

w-------

-4-

\P'

Chàn?brT

hÂLj\

r----

3баггое 2 6'"Zn

ttl rî Я H ï

J 0Л

2а/

.5ло_

__2.75__

3ronds 26т/т.

>//

,/

■j

.1

_________i. ._

5.00

1-----Jn~w “

A ü^-T

4f

!!/ / A /

U.65    '

cJoupe Rivant jk

-fr-    <

w; vi/jFpF

- - O- - i- A«*- - - »j

----I^,iü---

---2 (ЦР---

f ouPE Suivant c|d

P — -6-eU4--->i

i    l Lcuu/ioa- de l.oo0 2.00

ЛЕТЯ

CJl4M*t£_

N »20J-

т*\, к

iips.boj

LJ B

Attache* 4"’/,, Croie e*ne*Us ~~

Z rotule 3 O *%tV

N

ZJforuU de f# /m    Uotirdis tr/Husxeur €j/0 /

a*“" " "TV.    /......

шдашмш»

TZY/Æ : vl;,_ /ÏÏÎlTv 4 T

Л1^- виг!    Л

3 по m/s tie 20 "Vni_

■A Hitches

3 rotu/e tie 2Ą

UtłU/USftr ó~00

3 г о tul* /З'У/п

»00

iA-

: -1

t7J_A__^ r

--pila---X -

__РЛО___

_____ _ бдл'Хпх ća.ć(*x'(A2 ЯО )

_ÉBllsi.—À

'I»i7Ł —кац.

qoupE Suivant ef

_. T.L

ьч

•л»

ip> й is £

V/

Ë!

Щ7

0.1éy tw^CüI__I ,

'0- h -tfśo ; y F

1— ■    ^L-

У^°/Уг.

'-А4-

Attaches <T%'

i?

àa>yüg8-/m

ъМЬижео I fa*m/s 0’'л/т

ГГ7

Hmtt'dis. Jÿpmssour QSQ

И

3 ron*&- "/rn_

\fltotudur€ I

Ли me ire t

3/vno/s

JnO/lds

?■

2 ro nets tie to*

3rtmtis fie 3/f. iir/tÿuettf 3rwuit de xF«i£a,ru*tt /J-.

A&et-cA^e Jürntir

—fÙhuU de fOm/m.

cu**x?.

"1

У5 яа ;<! fri ’ ; •

j\

N.

--

3Î

L'ikl 9Ł El

5T

lit

7

А /?< W

«H

Г*

---1* ¹ /

V. 2r7„^/t 4? 2Qm/m,

vT. i.

___'Aoj__I_____4 — -№ —

HouĄt/is 1 e/MUsseué* Of W ^ (/non /f /à ] Armaturę Jrorü/s <? pA. ) OU métré

; rrnł/f_£Om/m

АеьиА~т

ЦгоъЛ, zapżr

// V

'ééù

ДА

IéP

я S|

'H'I'HWI

— iC2ĄA__o.iłu.’_1_

-----|i.QSł<(

----o£? У

ггУгЖУУ    К?ШаИ&ЗУ"т

i

H|

3romtc de 3<? "ÿL

-9»

*0!

1,85__

l'Wl

il

*a&l J.

flPiS'i

mm

«■'

•ee

!*■

‘mt—

Aßo_

_Ł?o_

2 Bonds de

mm

M

—!Tf

45

. rpaiss</u*'

¥--• —

3rt**uU e/e 20п,/я.

2r»n<U ZO"/„_ If

iЪ remis 20"*/^.

3romZs 2Öf/am 2eÀtëü Zo^/m.

j:    г а у

Ÿ f пНп »fU

|U>,1 РЛ,

jf

AUcu/u* ffb/oi

Л гоги/ё de &S т/я.

TlitiWrJps t'onds 4?m'/n. — ~y4 \ ffettXüs cyJtiûysew 0,fO

ôror^ds 04- $2 ’"/ni

N. T ;

0>

\-

тД t/ftediee &m/*\ (ynu 'nèfa _/

(?011/on 30n,/£ {0,70 d*./on ifjs

^ rone/е de 30 т/^

L/

хУ^оплЫ

i'

■J-

2 ro,

__i

“Я

iff nt

-i ¹

гр> "А

4. ¹

i Tl

--к i JuacAf* <rym

Ф-2

si

V- iV

i У, К

■V/

Я ГГ

-2,7А

■f

ff

T~

t-

3l4>ru(s

If

o!

‘-t

ST

A.

2mnfr «je i

к*

-кг

I i

2 ronds /в "A .

V⁷—4-1

._Ï14

0^

JSS'

■aa

iiÉls

' 1'яиаши isiiniaii

•ЦМММ1

ш ai

m ■■■at

n-iBiaHi

«■■■ni

lojaiHBiBi

3 rttcids tie З2 m/L

--AiZdeh^r-y

3 /ttrres

_T_

A barres \2à'”t/6x

o|

4=4

3 г о tide 20' m/,L

---2^5- -

’«i

-4____il

2/V^    ^

(I

Ik.

t:4É

AUa^s_ó-%

ЛупУгУеЬj%j 3 *\v/*o/s fće Ś2 У

-A J1

ST

To

XJ

P&SB

l4ÉUI4n|

тишм. ■

üiiss

ШШля

ЩШЖЖЖс

7и:»'Ж шчмтА

щШ

A .    ! \ST|

IJhi

ÿroni/ts У* Ар I

O

РЦр^ y 'оп-г !

K* N;. /    j

ЩШ % il

PP. I li

A rende За 4.

.

■

. •

■Y

-

.

■

4»

■i

• .<■

&

&

- :v

'■T.

*

-♦j

MAGASIN DE LA SOCIETE «AUX CLASSES LABORIEUSES»

PLAN D'ENSEMBLE -"REZ-DE-CHAUSSEE

PROJECTION DU PLANCHER HAUT

\‘s\\

J;i^r Coodtrnetenr’ LT G0IGNEI

■¥> *FU‘W

10 au métré

* ; !!

tl! ri

f®

.ЩЩЬ

rrrrs ¹

! t [[fi]

t-

s jłłlrrH

! ! J i I > I

i

; ; м|

-- - -jf

J!

Rue du Faubourg S*Martin

_2JL£Î*

ТТГот t

____л««!

Wr3»

s.»

'ÀfSi JA U. J.N

---63 û- Lł

--

Ütjô

:S

.E.

Ronds de С "Ут.

I:

il

i?

l\

I ! ron <ls de o',n

Ла2. '° "/я

¹    \К~п</ dc24'Z~

1Ш

№i

Г4

WM

fe

f!

R-

------12P0&- —-

l^ąaa 4___345— ^---ŁJS5.

\Courette

ci

JA ЩПШД 4ДМ25^_

Courette

~3 rend« tie 2dĄ\’n/m.

Jj3

ЦЙЕШ

Sr

/5„So

I--Są?--1- -5Л/

-аз?Ц- - i— Д2?--

I - -7ЛО-----

^LS *ртРи*Х

jS 1 jj jj il

li I ![!

\\ I! Il ï \ j il jji

!Г1ТШ!

if j j Й 5 i «i

! ï I! H j j! iji H-TtH-’-H

\i ШЩШ il jt i! il ü ;! j

Ш:МШШ

/~

_0Æ>

Гг

oso

COUPE

ELEVATION

IL

<2m

(Istfchib

L-

Cheattredu c A assis -Hond R

Honsd c£c 2

т->

fU de 6"/m

Hands de JO m/m

• Rends de Ю т/м

Ronds de (("У*i

4

4.

r-----f

POUTRE A

AU DROIT DU HALL

POUTRE

Ш7

PORCHE

Chooiłre du chccj&är- ~~

»,

CV

yrRand da 10, TTîtZdrnStre/'/

Jr

ч?1

i)

•/

___*

■ł

ARMATURE

DU

TRW«

^-delS-/n

.irenrts

3 ronds de 20 "‘ m

WR

,S>

ftfl O.ö

dsdc 2>

jr«

г3Г«.^-2Г^*== ---4=“

ï.„

*’”1

- Ronds de 10 %| Issioi Ronds de Rm/m\teus les

As,

A.

'J

Г1

Rr‘i i ‘-?т

■i ы

•2

Road de    '/eue mètre    'I

07    0.6 °jb 0,4 03 ,0,2

COMBLE

Echelle

Im.

Û2L

—:---

COUPE

^ Ronds de20 m/o\

N..

ÉLÉVATION

2 rondt de 2

-r

Ronds dc Ю"'j„    Hands de (0~,„

Ronds de W Ą/n,

Sm¥?ïî

'Л

vm

\i

Hi

У

■ï

•i

HR

;i;i

"T

-f

!;

iiS

Л>Л*< jVo 7»    4(1n

S ronds de

ils i

i !

|f

!!

-H-

____Ш—

J___5£5l_______

iFbtecut n

V - ^ nnùjujv Sif. ids do 2Ö «Ł

ill

if

—t-—

A)~2à _ ч M4 ■- ЬггЬ._ i

---dA—

4eAH

II

Rondo dooO - ...

ii

-t

. оЗл

(W-H i ufe.A

jttHiiijJ:rjjwÀ'

Rond. \(s2e j jj (to’ot ~    ^

0.10

Ils

si!

tu

i:

%.

,jiîU2JL4! -aân_

WP.........j-R-C:

If PI

É A. __DA5__!Lj_ .Д2Е _.

cü

---------f—-

##

|@#

ASSEMBLAGE DU LIMON DE L’ESCALIER SUR LA POUTRE B

0,

\ il

! 1 j

" ntaSźM^eShd^doĄi^.-z

i—i-!4—^—

[___j I { _

II)

idditii

::

i ii | ю .

il ! il i

<(оЗо‘Ут

%.

W ; №

___.--JoLO_________

ii

-----H

_ _ —ï---н

" _L_

_à_

■Фщж-тш ш

I i ,a

—ĄntmtlĄłeZA /А_|    Д._ _

^ ^------Ш.еп шоующ,-------1fljE j,__

U-O30L _

Sol duoimeetaAe

.-jK-Q^CL--b

---1Д1---

■ą

~KanddLt W~ Ob

iSPf

Rends

Mm__L

----ia-IûT----

----u>]___

ÆLÛ.

:■

\М

111

Ronds ds32

l.J

PLAN DU COMBLE)

Ecłiell

LZX

wll.

i—i

йЬг

ARMÀTURE

D’UNE TRAVÉE DU PORCHE

COUPE

li:

lu----

Echelle

IN

____

—"trr⁻—

_____5iü?- __ _

----A-------Lfis__

|sq|44

il

PEjAN

ïaitrtiilD 3( Щ,

U7I17;

metiure

TÿSL

-434

—tt-

4M.

yjjPoitrailDSo.ór h,,„<,h2UL* Źzcryl,

“U

----4,05.__

,i

mi

ALU

Jawili

PoitmiL Ar&.

Armature î'ondsdoz

'    0-725 ffl 'to&Oft npUrnui/ureSrdtzl 1ЫОчЛ1 CjOsJf Ormaóiro

"уЦХ⁰^²⁵

-.--d

-5Л5_|

ЙШ

V .-0.725- J

urnuteure

JOlćail n i —*

trat/A drmalure

$ronels dr 20

S ronds de 28

3ronds de26^/m.

' isoftds de 20 *У<п,

Mur dAttxque

ШШ,

В erę/ er et OiUliermo - CIMENT ARMÉ \T? Dunod-Editeur

Planche VL

:•

V

9

■

ч

7

Jny Cons truc leur : M- E.CoiQNET

PLAM D’ENSEMBLE

m COUPE ; N DU PLAN

ENSEMBLE de la NICHE

PROJECTION DU FLANCHER HAUT DU REZ-DE-CHAUSSEE

F74

/7'

f-------------

I____5.75_ _

UJ_5.

Łl7i-

o!

------ME_----4

JJi

_E40__

__5.75.__L.

5J3

JL40 -¹

Э41

S

«l

JT-CP

U 3

•31$

¹ Ç_9.80

i-w- i

,о.г°

s!

' ■ 'są

1Г

ai.

.j—eK—

Sol dp fi* (fALE, J

f"

il

if:

Т-/ ! / X

.1

:Я

ЗП

T

' "Y

ЙЕЗЁ

! Mi i

rw*⁰ j

\\\

Uj

iA

!%

i 1Л „ L-U-LA^.

XX

#K-

ЭЛГ07ЛГ па sx у.

Axe deCù

i*2i

3-

K'

EL

OS',

H=

i- MI-

il

-4

L--^-

_A50__

<&/

>y L’.'/

ЕтГГ.-.-Хр

Déversoir. I

i7ÿ

UT

/1

'•‘.N

COMTRZFORTS JuMvKUe $OUTÉfîEMW y

n!

4L

_f_

TE

J/a mAh cp

tl

7,

__; //C-_

------rt

JXTÎX

Niveau щГщ

{CWER лес.

a Mette i

H-----f---А&Л

—*•

)-

Jxj97..

2.801

"T-

siîç

«1

3

<ol

tn

sss

s!

S;

"T

C.4

- -i

*!

Eçhelle des Flans

0    5    10

LL

Echelle des Elévations et Coupes 40 0 a 234    5 t 7    1 ' j 10

до

ю¹

S]

2.ooi_

. 7-7

lJ

PLAN des VASQUES

COUPE

ir H

si

~r

SUIVANT L’AXE

<2 i

DU CHAMP-DE-MARS

Li¹ jo I

liii

»    04

YoNeM

s

Ю,

—4

-p-

/а

'“t Г"

1__JfcM. _

Л,м_

'-4

.S ._iL.E—J IU_

-4-i—-f

-н-х —

léwnN\ I

VW

m

Ыш

Plane яеХ.

■г i

^Naissance JeuRic\

«>i

Si

fiLjÜH i

'! ^U~i'-i|ig,2^4l; : 3 J ? I lilii

VÊÂpOlX fif|

ai

—A

I--4

Mt№8

JJ

-J—-

-r

: VoiCe N‘i

, Av

YчЩс4 '

-f

/_ __ Ml3SANCE Ęly ^PpŹ/ГЕВ

-X-

\ VtufeNS

Voià№3

Si

-ore

-• -дк

sJ

M—"â

3!

ЕгУ.

si

ii

sJL

i ii ii i .

"Уг::рг

IIP

m

ii

coupe

ii

■§

:>p 0-2°

SUK¹

CD#

0,40

_2,oo.

■Ï

■ QC

:i

ii

iu

■f

¹ si

il ! j 1 li

m Uł\

p *№

I44-4«T-

li iii

Iii

ii

Si! i

Si!

si

_ _|___Axejpu ~Dausi.EAts

ЦЛ 0/

16

’Г—

__24.90 _ _

>8

assssd

4!

—-4'-

Уо&т

ГТР ij Г i l h.

- -.....- ■ И

:i.

-I-

"!

____ TIaivgrer puDeversoir.

S‘

(O

i.

i.

\ü

--4

-4

Si

”!

SI

GLOISOM5

345.

bzpr.—J

iii

a;_

Ö -.liii..-

li

№—*0A£-№-

Ш4=нЕ±

ЗЩ«

rfll----

_ГЛ|£ЛЙЙ

Mj^Vnä

’S

:,.Т4ЕЕ-н _____3.jZS_._

si

m SOUS LE PLANCHER DU DÉVERSOIR FOR M AN T_F ON D 4

DE LA GRANDE NICHE

U)

.£

n!

-5»

i-

Ç,

AH

^0,30^ COUPESUP. AB

__NAisbAfiCt. bfs_J^

■i

il

JL

-Л-

ARMATURE des VOILES;.de x'ÂRG DOUBLEAU

[jvtmavo^ \wBâVB

CEAlf

•D

Élévation: principale

COUPE sur l’AXE

Arypp rt GuMxrm, - CIMENT ARMÉ ~ VT'Dunod-Editéur

lmp. M(:Q- - Paris

PlancheYH

'

.

/

V

*

4

Constructeur : M- E.CoiGNE T

MUR M.SOUTENEMENT-CONTREFORTS

FLANCHER

DES

TERRASSES

Sot Ые fcc R

ШШ

щшт.

ddiïiuff. ol

> тят*—Ronds <$\

de Clnu-u.

ampe _ Penfe

HjSfej

Ue    °?par mé/re

4Ronds de 40miff

4Ron ot s de 4Gmiff.

-5! г

îî

---1]

<-OAU ! UC

Ronotb cle 38 mißt.

ój ! Ronds J? 42 mill. - À ! Ronds de 44mit?.

!ЙЙЙ

si

>> -

i____V53j _ J--,

oi— LcDfrz

X Voit rail j

i ©i. • '. • ' - ';4

т :: si c

±-R~-u-_rr

FOUTRE LEE]

- .    .....' Jfi

L Т-Т-Ттт t

l'POITRAIL Ш Г DE RIVE B ;Jtf

Ш&

WM//A

Tt

B -T j

— *■

иП

''-—SRonds de C4mill!

^-8 Ronds de 40miff.

Sp4r-~———    =--=■

:i

:r

'[

CC ,u POITRAIL m RIVE B

COUPE SUR UN POÎTRAiL

I S“

ts

ï\

rr

(édédZ&A

i d i d,* • <<r,Ą

COUPE

SUIVANT CD

bu Plan

Ronds de 10mi(f.\ »

a espacement varia/te P ~ suivant Pol/г oLiUeur

T "

Ronds de G mi fl³. I - -

espaces de 0,10 Г“’

Hr

-MX •

I

>Ьк:

"ЩГЖ

il î

\v

SV

F oi T RAIL

Ш' -

4X

■! i:

COUPE sur les POUTRELLES

arzuvsez^-z. =

■ ,’r

/:

’Si

5,9o

09'9

El?

“TC

“I T

drbr

!;

.U

-4

PLANCHER

DU

DEVERSOIR

Monds de R2’%l

H:

APPUI des POUTRES

|M0.È

■RoildS de Gmil?.

ejpacés de 10Relit.

VUdeDERBIEHE leWURbeSOUTENBMENT Arrachement montrant Pe (fri/Гаерe du Masque.

-2L 441зСЖ_ 4^415 Jp..

+?#

ET

-;î

ж*

'!

sP—;-V-

1£

»Ronds de dû nul?.

f-

(Щ

Im

|X

0t> Н--Г--Р'

'•jX

__ :

(n 7?g77p/ь de3û”Xtt

-4-

I₌₌₌₌=U

U il

oî

"ХХч! Ronds de

i! timid.

U__4_2:50-----4

. * »-74 i _ J-1G_ -L-^U

POUTRELLE p

d espacement variaSPe suivant foc JioucttccT

2 Ronds Je20 miff.

X4 Je ta. G a ferie

Kjl

(A

Ronds de Cmi?.

■<

,    / espacés de 0r 10

E-TzPiföLU

I Largeur ~puPuits j

!'j*.___:;I. Ponds de 30mill.

___Y/7//7//7//Zy,

2,jt0

707/

У////А Ancrage du Tirants

Z/ZtS    Pond de 31f.7u.ifP.

Ronds de lomill espacés de 12,5

.2

-2

^81

ï Ronds de 32 mit

Щ2?Щ    J

j I Àdc -fRRondb de JOmilĄ lit-ЙЩ espaeù de 0,10 \ -l-LL-i-1-йд Ronds de G mil

lUiÜlfim espacé» de 0,1û

i £ -l-м—{--p-*—l-ti-A

i V. * и t r‘ t’⁷ T*V \

|И:1-Н'4ттр\

% : -j-Vy;TT-;-U îp-r-f- :"Гi'-T-TV

-fjç/ ‘7 *"* * *' 7 --r--T y

L____A30

kuk

ЕП

I---

Alan d’Rau

¹ M—°E0__>i

T__VL0__4

PILE de la GALERIE

2 Ronds de 32 m/n.

i--

AI

Tili

si

• Ij

%.

L.

•4

G Äon cl s de. 30 *%

2Ronds de32”y>7t.

POTEAU C

ГТ

UjU

8Ronds oie 1 dOL

TTt

DEMI-PLAN

r*«

\ЩГ^\    L    T_____ _R/L____J

jb foulręffe 0-GRonds de 2C"/nc

POUTRELLE K

V48CU

U_i O

■?3

T»—i-

t Ronds cte32%.

f    ^ 2Ronds oie Ъ2и/»,

jjßh

SECTION ab

de Pa Routjv fie ft

sri

DEMI-PLAN des VOILES

PLAN

AU NIVEAU EF

ARRACHEMENT fe (jrillage dcfaPfate-Jonne

ft

iff- espacés dc. G, 10

-F

Ronds de 2 Omcff.

Ronds )e0,10 es/\oLcés

sui\

<3,90

I^ZRońjds de 30mR

■Ą-4-1 ■

COUPL

SUIVANT AB

du Plan

1    -T-4..piv\

^4.;.i.uLE4.;-HL

^    —[- -j - u- -r ......j ^ \

\ é-r T ⁴* ■'T

ICCccT-LCr-LiTi it H yi-i- -Li-lTU-FfV

4(j ç-j "i—j—1~n * j- -j-    —i—r -y.

VOILE №2

Ronds de 30,mif

■A.

kum xi -L« ш!

i*-!

PARTIE SUPPORTANT LES YASgUES

4.______ME_____*.

2.25_

*-

_ JA 5

Ronds de f 'llitf.

espacés de 0,10

Ronds,de G miff.

espacés dc 0,10

Ronds de 10/7/l/p espacés de. 0,10

Ronds de 32 miff.

ItffnTtrr

□спорнее

Li-г i--! -r -f-iL 'I'tT v-pl-C \ y !" ”,L " •" i " i* j * j * i ' y т⁻*|* ■ t * г* '

; i/ *'’"f ’"'i -!*•;■•!• •!*!• H- !—O

llniLiTinT-itTftL.

рР;тт-Нттт-г-г--и-;--[-^Д

•j */. ’*т T" ^ * 1 * T -r    -r 4-— L. ». . .» \

\ *“ T’-r -Г t    -ï—t—:—r "I-т-А'Д

j ^ ; “ г - i—t t⁻T "I - y-j--r-i---

rrif**T T-7-\

xucTîqTÇTÇAEH

iTpEf-^Tl-jM^T^-LEPirP I-i

J- —] I — L-    - J. T. .|. .'-Л

-JL65

I#

*3’/

____7.775 __

xp <7\ГС?М7*гп -dëlMarS

‘N

Jontrefoi

R,

Voife

-¹—-~4~ >-

■-Л&4

x<® ^

- 5^5 - j- _ -Д _ AML _ J ;

А А'лзе de t’a. ÿlaçonnen'e    fj|

—**k---

>£

Rnlrehibeî

dk

Шхе\Ые

a.

Ś?

\ XS’, i

_    k- -

а-лз

I-

f-i

-#—•«—i—ta*

.«»iiiü

!Ü

II

il:

SCC

ï Ro f de Pa (fa ferie

IШШШШ

-f-r-H-iÉVPN-iT-Xi-t-M

—i« Ц- —t— p——4 — *t—J- L - 4*L»L*L»Jm

.-j.4. ALLE J -LĘ ALf

Rond de 20"%

lu I

wm

c;

ЩШ.

jR>

IZ

■ч

Voife №3

~1

'A

Rondde 34 mi fl. -Ancrage dlsTirantâ

tSBm

rÆËiëSf'гк'фт T 4"! *L Р"!'⁻Г—î—<—'"T

атРВт1ТТТтТЕРРп

Шве!

Gond de 34-mil?.

ÉSjSj

°1r

Osi Vç/'.

■8

Rond ЫеЪ0т///1 J

ii

E Rondb de 3211

¹

-Je-*

entre ToisE к

tRféddLà i ĄWw-* ¹    \

<*еЖи

Ш TRETOÎSE e ENTIfETOiSE f

-5J5_ _

Berger ot ću*u*f'me -CIMENTARME — VTe Dimod-EditetiT'

Planche УШ

.

-

• л -

.

.

\

Л-.

■

'

V

Odd

|0.

-Ч--

t-20___

RJ5.

iE’i

ENTRE TOISE de la ÇRANDE NICHE

»Ronds Jek”An^~~' 2Ronds de20%t

ARC №• 4

Carrés de 20nidf \

Carres de20mi/f

E1J7___J40.1

~c- -S-v-j

IKend/ de bÿmiff.

£■ S'

V.'l '

M:

-,

Г” t

m.

f ’гЛ»яЛ deZOnUtt.

ï------------>,

Sä

1' '

,â :

cleSOnti

2F on clß de ROjnifR.

Ijtfare </e fa/LcÂe^

!

J iS

‘'Ûj SÂonds de ЮУт.

3*.

'Sÿs

«■i

о,

0.1

/2Ronds de 2С”Ут

2 Si

„L

llSü

■ " \2tnJzjC P’iI'LRL faxe dpA Fjf/e

Poteau

'!    o,11

ФЛ

«

'УУУУ

l.

SS

y*

in

il;

COUPE SUIVANT

AB I

Ух

S?

Ух

i

45/.

Sä

L*

Axe dufiDovBi.z.ALr

Rayon 11,90

ZnTRE TOISE -A Composée de 4Âoyjds JeOU

' лА

of

РШУ/.

5a i /

°S|

Xi

\v

*=:i

’ll

Naîssaatçe

]J

II

ill

ol

Ri

§;

__Ârç N-2

ï ÎP

1Ф-

h-c

!l

•I

ARMATURE DE L’ARC №l

V/y

LDI

dl

âi

Extrados ш l’arç;A/°2

4:й::-^фЙШ

v*-

d>

"Av

vo ,

T-5.

'тшт

Я 2Rouds de 20m/nu

GNÎI

Si !

AT

4.

■ô

ж

ex

хх m. ~

XVÈsT

■ x^

d> i

X\

li

«ł

«5!

ârc№-o

.1

Si

Ä-*

ЬяфтЁшшт

\»

il

Лам d'eau du Déversoir

wmmm

■T

o|

J--'SL-

m.

ft

■Я

xi

fi-------

§4! ■■

Qçsi

ы!

ÏS,

«<!

il

\ i i IA

\ Sn

*95

I/

— НЯ1 - T - -- -^

цт ¹

li

li

_S[_ Алыснея jdv DÉvpjCsoik.

|дР~, ~Г7С 2Fers pPals de 50*14

ni

шшж

2 2Fers pRah de 50 */4

УС Hi! iii'A

çT I li; !'jU%Äw*Ä de10m/m

llrlrvlf

J; I III I i

friiiil

три Unlv Ht

I ' il ¹ IX\ <«5*

1 ' ■•' ¹ iC\\ И!

^XMIÉLl WXJiiÜüAvf

Щ /// жШёг^^с^

Ф' il

lo

CT,

04

;ж

еЩ

Intrados de LAKÇ №2

2 Ronds de30”/éïi

IX

yFv,

ÇFJr'

(ćfz-jeF—

X..

C I * *\

iii

о ^

<;/

Wv-

—-r-.

rÀ

-«Î

i/

/I

v ‘“H

жЩ

/мЫие2ощЖ

tr:::i

шш

:M

Su?

sur

Ronds de îû’fm Щ

ARMATURES

?APFUI3 DE CHARPENTE

dUR le grand arc

; ~Pz z-z rr: r’v. :rr

Nn

0/

fi

^-5

'W-J

m/

У ""vi

ж f JR/

-, mdfïf £

if ;    >/

| |

я h'

ГЧ fi-,

fi a

ii FF // tfkh

/и;

X₄

/I

L»

î Si

П Cl

Й[В^В8Ш8

;ПГ“С

i®

14

id

k~

2Ronds de ЪС’%г Р/

2Ronds deZ0>,l/m /fi /2

T ?? 1

X~v

■Л//-

C'"

iÜ

gsr-'-f—

Ws

Yparrés de 20mi/P.

Ä-

ЩщШ \ \

__ \ # \ \ x Л

ч%\ i

\ш§

>v Carré de2№śćv%&

ОТХ®i    X «,

\ |%:n

/.

■*:

2Ronde, de 2)l)\im/R

\S

«2j

A

S!

Si

o.

s,

S5! •

---\-

>us

Si

S¹

toi

.4

J Rf,ndde 26 mi/2

sf^A*^o/r=^z/j!rj=?OS.-SŁ=-^J--=Ł=-.

/ Rond de COdüffr-

Z^ZSpÈznSZ—-=-r^L=.    =

il

; 'i 10

lili

*4

fzp//?7/Cy//

xc& ' 'vt '/ Ц:

P% % ■ % \

^ XV> '^.4

\ Rond de 30 milfc.\    Ss

^ \

PlANfiHER DUDÉvEESOjÎr .    \ -    \\ j

R\ V

Mi

IC

4\

''Лтсшл de& NiCEE

RLJ-

Шш

8,93

й

I 40'

ico/nri

_£y55___

-4

VAA

Xx

\\J\%j\

чяи_л

Nota-Le Rfourdis entre fes Enfrelpises el fes Airs est armé de Ronds de fO”Rn espacés deWciii.

'S

//FA

1i>.

/ '4^ /Ту //4.

,t«⁷

VA //// //> UV'⁷

ręfi/ .лет

МШя

и //

'Of

игр au j

2 Ronds de 1Cm/m

1 pu

iirfldi

Ш: '/Щ,

ъ*

,1.

у/.

ffpF-JĘ

y MF--fi

}t—\-4Jtonds de 50m/in

2 Fera p Cods, de 50X14

■Ą’ y/'

4.

fifil

'Ы

11,

■%

*8

Jim

'■ !ÊF

SS

Iшшш

ТЖ

- •!, ,

!

fi-fiłbmdi lifZO"/,. ; l!j| ;

[<4 '    '' 5 i!¹¹

LR__s ______

—«—r.—;---------------—Ł----

m^ê

! fi %-fii il

ш "fRa

ч . ć§ 7 jl Ci fi y/ 7

Ш èi

:?W

Г/ .

.<7

il

rit

2Rond? de 34m/,n

imtswrf

J4>,

i| .    ,1 Г ;

; : {/FfM _ /

2Ronds cle20 m/n-L

NS

ON

f*⁷""

Dj

Yfi

°Х~2Лоп&. de 20"’/m 4Ronds de 40m/m

POUTRELLE ш PLANCHER Recevant faLLicĄe droit de C'Ar' №4

au

U-M-0-У

ARMATURE

de-l’ENTRETOISE K

Siii

Sj

i .

y, i| Il ■    ¹

r ü ![ y.- -,-

УС' y fR

a •;

% Ш-fié fill

4 f ie:/ fil i

mrFF

A’'fié- fi " -^ттршШщё,

•    ¹ RKondb de^Ç‘%1-- j|p

Ц. LJ

I 5Rnnd$ de 4-0’/5

'sis

Y*

VA

И₀-Ж

» *J-P

-f \-Щ&

ъ|_сг

-TA

ЧЭ‘ О,

Ю4 <jl

d| dj

Ronds ЫеЗО'У/п

4rHh

COUPE sur CD

ARC H-

-т-A

;?TU,⁸V«A

DETAIL

DE LA RETOMBÉE DE L’ARC N«2

20-^4, qoWTREFiCHEM

Vow .-i (hüSernse СШ EXT ARMÉ-V^Dunod.Editeur

lmp. M -'Q- ‘ Par:s

Planche IX

.

■

'

* -

.

'

9

-

.

■

A’50_

2,50

/у

II

Ъ$У>$//7777*

.-■=h8>—-=

II

COUPE

SUIVANT CD

"T----

=1

m

%

Щ

1

PONT

_ JJO___

____м«_

SUR LA

VIENNE* CHATŁLLERAULT

ÉLÉVATION d'une PiUjL

gj—0+--+

I-

-•

>•

FP

Æ=SBa4a£j£^i

ESfesribrs

WÂ

«m

II

COUPE,

SUIVANT EF

A,

i-

)cr=r -Г-РёЙ

I—A«-i- fjf-

! S

t A

_ Ji8o_

г 25

2.J5

'с^ЬЯ

r-1

!•

!!-

II

li

ft

ai4_

COUPE

SUR. LAXE, Л

f==

fail

22

: :K

Si!

?/

Niveau CEoui

K-

vr--<

~гк5^а~5

__&L?? —

irr:

■--V

er---'

I-

^rr-X

tiA

5.24

A-sL'

cï^S

_    -r.

Ov

ЩШ

'•r

Г-'S^pp : —

iA_v_-.    —v_

7L7/r//v7w¥/ffî?///77ioÇ'77y77Wiw/AV&W75tyAVY,v7n

2râ

._-Мштш

i AAA AlCÄ| ’

Niveau du. M Лос/гег

тщш

VI

V7

M:

WËm

ШШж.

^'Xr/WV'SXs

JkÎAw-Arr-~5'-Ç— 5Ù■

mm

t_- ^ _r.

77}

штттш.

~t

I DEMI-PLAN

TROTTOIR ET TABLIER ENLEVÉS

DEMIE, ELEVATION GENERALE

_ 1?5

Dessin du trottoir

UDL|__—-)

zr//

ШШУШЩ

ic^

J    --fî!ig

('5.1З7)

(525₇

Î?1

i<

tôt

-    Д.

2UJ*ÊSL_,Î^

■ц

fortée_Lfàrc fp’Too

ftrfee_de_ lApr (entrai jloDoo

(44,4-2)

i &!

g'

Ko

tS

-Г

§1 I

’NT

•A

sN |

ON i '

SS

шть ;

(^^9)

[ 52,5o

oïl

?i

trt

00

yv;

S" U

Tente de 0,020 pur métré

Longueur “fötale du Popt i35foo

Pente de o, oiSâ par mètre

Y/

.jL

{/}

Шят

Ш//7,

?m=\

VA

I!

DEMI-PLAN d'LNSEMBLE

COUPE S UIVAMT GH

->t

ARMATURE des CONTREFORTS

DU MUR DL TÊTE,

Berye-t 6-ùUvm*- CIMKNT ARME - V^Dunod-Editeur

Planche X

■

i

.

.

hri

СЛ

PERCEMENT du TUNNEL du SIMIqN - (BANALISATION d'EAU

• -afc+z-Л___

о|

"ЯГ

~—'I -'5=« j^~^^"-^4l|^^4ifr^~-4i 4 ...I .-.»-§—■^ i--f>4L--ijjMS—jj ,^8-Щ >

=4~

.    *1    ”1    1 i ^~Т

•ito

Ад

V--

N- 4 50^/

LA50 _ J

it

___^0

P-.

: JOINT БЕ DILATATION

LES.

__1-90 _

i p*

,    Tovut lar 5ni. sur ’ lac appui*

Г#®

l/i

Joùit de refratł

ч\

:/

/'

\\s

Jhmide re Irait

од

j.

Чч

"'л!

//

ОДАМ» JL Ш.

0,20_ ,J),20

о»? 2p

A2A

°A°

OM.

J).O0

0/łp_ _ OjlO

A?

(V20_

Л-Ш MO-^ .Aïo

<yL°_, да°

010

_o. 2o_

ri<l д l,.

jr

K'; T

! !..

4- —

11

\<

-y

=<

I-

/p

ml

ol

• i.

ii___

L±tta

/1

ЬЛ

Attache

2.N0

“I

---H-

0A0

4.4-0

-I

RECONSTRUCTION bu PONT NEUF Jvi< L’ARVE

a mkJkier (haute-saoneJ

CjOUPE TKATSL^VE K^ALE

CjOUPE ^URIME CJON^OLE

_ôA£ _

;u~

~-ą--

ШеякШ

|OA ■ Г-----:---

P-----в*----

_Ъ flü.____

__ 2J?iL___

---UûL^

___.Gir _J ¹ -!

ci

■»

rrr

_r:

T®

ЯЙ

A Nv

A!

ill

■уул/у//

ТУИ

0/2

ii

•J

A'

b?

Il !.[ !    }]    tU""""''|-;

-------Д-----чэ----г ii ------А1^гУгДъу^-£Дт-:А^>-А^^^6г--------=£у^

IA'-'I,

il ü[

---•EF ----feçb---

yĄ

Vf

л p|

'À

Яке

/ 3--27— —c

^ _ 3S _A-2S-

T fis

ł--2}__

_ .35___Je —35—

JiM____

'CROUPE LOTStC^ITUDIKALE

^OUPE tmn/ïer^axe

ТА

\l7«sg

Otto— _

,A5~«3^

_A7P___,,|f___ЙУ^___"'Ч fib'?---

___ЗДо___

__Z&O -__

/л/

4-

У^/У^уууГ/Г^/Т/,    ТТ/АЛzU

!j    '■•    11    ;i    i

AA

k--4

\ i6 % % O

'&615о

__

цНЕМШ DE FER de-L’OUE^T

enCorbeillement

qouPE Ar le trottoir

Г PLATSL VUE ERL RE^OUß

IT

Г|1

Abi

4 isl5

-«• f»- ИЧУ.П !

: mSà- / Ш.-3&

у.

mm

Æf

«:

у/'\

35.36J

УЛУ/У'Шу/;

ELEVATION D’ENSEMBLE ■

тттщштщрщ.

>! ! :    ! I !i:

ir

_ L. _

(o_

8 't

___

______

_SJQ_

e./ù _

'!

00 TZ$Èü’' ^\\

'i

-7T~y

i:

У.

i—Lÿ

vv

B erga' et GuiZlotTixG

- CIMENT ARME VRDunod Editeur

lmp.

MOlQ- - Pari?

тшк

"« №kw

W&v „

; : i \ V*

LJU \ Д\ 4

« * \ ч 4 ■

r.tv.iîià""

îi

-jk-

ÔZ‘2

-,¹

441

\*

T”

ł~

Si

II

,    j ï)

THANf! НЕЕ DU j j

1-

ru \

■ ?, \

L-riT^rSi»

\ \

v-;

QUAI DE D1LLY |

MUE БЕ pOUTÈNEMEETj 1 ET ^OTITHEFORT .

WmS

mm

4-

>    .y-¹''.\

i J    -i

„L...«.it!ül л_

-T-

!!

vzxmr

■c„4-.aAW

■ !; Ii i:

-pH

л. ^ rii

%cq

...4--H

SSSîjjs"-'---»*™

THt“L^lä

T------b!=^'-==»--lf^

T"

il

zimzw.

__ЛгРО__

----H

i-

»TI

Т-

-=•1

i    ii'!' ;i

Ш1М

""al

____t

L_____--V25-------44

Planche XI

:•

ż

'

.

м

■Щ|

7\:

3SCГ7

"T-

4P

>?/

y)

■в—

/.

■' ;c

Vu

Mr

ter

te

Il ?

XV

te

te

te

te

te

te

te

te

te

te

TM

CPP

te

li

..

il

Pi?

te

tel

te

]4

4.

PLANCHER BT H OURDI S

Enfer'béton _

me MAT RAI

тштт

figl

Bê2

Zf

y.

te

imif

tete

te

GRiLLAGŁ DR PLANCHER

LL

I;

я

il

LÉt.'Éc

7УУ///////Х

SAE

:x

tete;

Ш1

te

XT

pg

ШЁЖ

Wh

te

il

Ш Ili

LL;

Pv

ej

>tete2lte^

GRILLE DE PLANCHER

li

Rte

tei

/%5

figà-

LL

fils %ÂCùy.

Ыт

i»

ELU

fc

111

te

te

LR

te

COUPE

V/

coupe E

sfi

i.

///уУуУУ/у'у

TS

*Sb

..

Irl

У/0У//уу/,#&,

Travée I

'S

Travée II

Travée III

Щт

WMc.

m.

si

XX

Щ1|||

--L

xxsar"

•X tu.-ix -.-a

{ЬЙС-Г--

5?â

'ШШШШ

ZZV

Mm

;r

7Щ.

WM

Travée IV

ХА Av -XteLsfL

I

Travée V

Ml.

ATI

0-5

Travée VI

--L.

;. о

î_

.ш

ШШ-

Di5POSÎTiON5 DIVERSES DES CABLES DIAGONAUX ETDES FIL0- DU GRILLAGE

mm

Щ6.

___ioo ___

______A⁰_°_L

3,0 O _ _

—X'

COUPE I

R-

шшвшвшшаЁШшашш

—---'“. . .... - ".. ...-У¹. !..¹ .,’.. .".y.—,..* .. ■'.. . i-.....;''. . •••. У '“•—•-'—-•■’    .•'•

---Л

CH

II

k-

; дàa _ i____к « лба. c

lü

______M0__.

-------V

АУЛ

îi

•у. у tef-j

te

утшжш

%.

г-Щч^г

CL

te

fc

//

6,3o______

«-li

;g

il!

rr

ШШ

QÎ

■ii

ii

п 3§3

i-*

..уТсТ

ШУШЖ%

sSx

xl

'T

W"

@Œ

COUPE SUR CD

И jfgp™

йШ

ЗйВАсЗ

Sii

Y*

РвЧи

teg

ХГ

NSS

iiaote

г.

•А

■AXAN

______Loa.__

i te

j---

é!

В_

:!

айй

■\

м-1

Ч. . V. ’    .

«

г: У:К->га \/Л

P!

У/.

____it

äs

li

GOUPEÎSURAB

X:

щщщ

At:

Ii

ni

~iiMŁĄ&

ii

_3,_ov

р Lan ci Cessai au CHEMIN DE MÉTROPOLITAIN ■

O'

PLANCHER D’ESSAI A NICE

ШШШ///Ш PLANCHER D'ESSAI'A EDIMBOURG

аШШ

уу-

Ber-gw cł OvùUemve - OÏMJSNT ÆR3yfE~\^v^ Dunod-E diteur

Planche XII

.

.

■

■

■

-

-

«

f

g!

h |g i

Os?*

Ä

L!

U_’

ZJJ—

и*---

—£+<щ

W?

fij

PLAN'

P OUTRAIS ON

щтшшж

Si

ij

il

i¹

*81

Iji

JSÜ

*!

G—

-D i

1ььао1г€

i!

;i

b!

SILOS

ET

planchers

En fer-béton - Système MaTRAI

MAIS ON D'ÉDUCATION

DE LA

LEGION D’HONNEUR a S-DENiS

"’A

__8_,|0_o____

--И

шммтшшттт

УЛ

pri±U

-H-Rg

Câble -3o fils de 5 %.

COUPE SUR CD

k-

— -i

COUPE SUR AB

PLANCHER des USINES Д-LIMERE A LYON

__AiQ_____

7//У/.

__M5___

sp§

ail

ïsi

7Z2Ż1

WF²¹

üi

VA

Si

COUPE SUR CD

COUPE SUR AB

GRILLAGE DU HOURDIS

MAISON D'ÉDUCATION DE LA LÉ GÉON D'HONNEUR

PLAN DU HOURDiS

“lïï

ATTACHE ш A

’    ~ И TtlMtmmrrü

tli!

TKW-

||| j A

4.

-•

ii

l il

il

._5a° _L

PH-*

•U

il

!!

aL

, •    Е-Л ..

ШшШ il li J3

щ

31

.. :

SILOS de L ' USINE de, CHANTÉMELLl

il

COUPE/ suIvant AB

PLAN, des SILOS

:

Efj

...

Г f~E

A Ë

CCA

PC

■ГчХкуР

là

T*    (3d/S 7 fits II

%.

Y/

I

§ "S>

Y ill

ÿA'

ho

9. CnhLcüAlilfi.Lv

ШшжШ

гсЩанЗ

A³

%?

//

GE M

S л

шш.

УУУУУУУ

a < %/>/*> < /7

7Л

N

cô

lO

Ę.

,3;

?L§

firldeioûxÔox^S

~ .LohyiACMT- 2.,&0

Orillacye

en

file d acier de 3 mill

L— Fer T do 3ooxi3o*u

-F_

8,83

ШШ

77/

T3L

T,

V/

yZ///\ Perde 8ok/t2*$

~~    c*nyuc4ir I, 6c

myy.

A⁰--T

7/

МУ/.

,• л.

zZE

Я8

yÆwÊÈ//Â

УУжш/ж

Y//

>*

*+ T»

COUPE DŁS SILOS suivant EF

-r—4-

GOUPE suivANT CD

-1-+-

7/

/-

щШш ysmm.

rH|

L'

rv

n

cf)

//

fils

i#

if

И--

y/yy/y/À

ЕЩШЙШШ

Щ1ШШ

-I

lY;

SJ

,__^г'гА

'S

ź;

/V!

2Д0

'I

ÉY§

ЯШ

Al

olj

Y;

VA

Çudtd

_Uo _

I-

it-O/SÇ. X

oïl

V/

:L

J..

a:

Щ]

уШУУ/}уу7уУУУУуШу7

4---------------------1

;

«

.

■

.

г

Yâ,

wmwA

21 З:

Ъ7

w.

06'0

famiwß 15flx!l5ox y

.-r"

il

COUVERTURE

DE LA

TRANCHEE DU CHEMIN de FER

PLAN DE LA COUVERTURE

DES

MOUL INEAUX

Enfermé ton — SvoUnu, Matrai

1Л¹

m'¹ Foicfre/Fe

Tou, irłffe

vj_ în! ---'àj

s?

;-5.-00

- hH

__

łoi 'treffe

Ml

,т^4д)о,ь4,о_о_

f Toil reffe

i.

in¹

МЧ

àmmmm

mm

V/.

w//

■7

7a

...

У/Ш

V/

4:

■V

I V Tr in\ie

28: 29:

OU

treffe

7/y

.SEE

епце

2!

-Щ

Trrr, lie

Ш//Ш,

mm

7/

7/,

PLAN DE LALOUVERTURE

Cole de-lac Seine _ Direction Та fYeuvffffîP

—---&rfiejjqblie nous /e Pedals des EokETS (Dxnorilton Universe/?? de 13Où)

37s i

Ш0Ш.

УЛ

(/ôté du ÇA amp - de -Mars

/ч

-î Г

' о!

-ja.

-CU =

•и —

/Travées de

1ШШР

5.00

y/

V/.

cd

Д°° T.^2 __

li-ë

44!^

-CT

—'*=*- ■ I

^ :    ;

ГЛ I    ¹

от

45

---«ff

IS Tr

ucvée£ de_5,«

TKgrçje"

GO.moo

m

\&

LO

04

ol

3

■=r

COUPE

ENTRE DEUX POUTRES PRINCIPALES I ^ъщтшо]йГз/5ш1^~~

ATTACHES DU TREILLAGE sur les fers

ymW'

//■

У/а

Tf5

.1

60*50*7

-7/,

5 .GS

*---

____1Z»50 _

11111

»1

w,

Dp

SffàJble/de 5fils de 5 niiÏÏT

___i    №54

ГГТРГШЗЕ____

TRAVÉE D'EXPÉRIENCE

ÉlÏI

__3.30^____

SŁ£

tn

CM

SSS!

si

no

N;

il

i..

VN

CWrpe

GO boo

'"'Шит,

54155!

TRAVEE D’EXPERIENCE

S!

Sa

• '/y

: ^ "...... (T)- > ■ ' -----T——

Si д V------—I—c— TVA?__

CM|'    —^---teres

T_

(П|

OS'S

IMHl

_l

il

s CT

$1

Çâlé de la Seine -Direction du. F/euvdm»,

68! G9! 70'

№£8 t;

TB

■(■кмр

PLAN

DU GRILLAGE ET DES CÂBLES

: | ЩЕ jx ° ЩЩ1.:. Ctpl

c>

ар

Ч-

4v

___________12,00____________ __,__

X COUPE TRANSVERSALE de la TRilHEE

____115___

s--

Л\. \f\

p

À

й5?//_flffdeSpiff.

-P

U-

S\

Ssi

///

>T;

i’M-

d. a. 1 ' Ł d.

A 7//

Щх

•'

5Й:

g

№

ï:

Dcartemmt des Го litreg

principales: 2,20 ci 5,00

Püïtèe des Du 1res principales ; 11,00 a 10, 00

c SÇâMe$ formés de 14/ilp

e^c Çmi ft.

ML

iz

ce

V . ' -V

U V⁷

y\

VN

'У\ЛЛУ/У/_/Ъ<>1 VA xts a -уу/т/

7;~V///

-V

4-

SAP

T: uv

''□cl

ïp:t

3;5чч

SSr

SËI

2!

Lpl

+/Л

V,

Гл

Ta

§§ H*:'

SssNN

■y

A-

yy

•VL

P

hD

NJ

T

'A

=î

feme fie

zxvx

У/Ж

Ileracr ci. OiuiUme _ СЦРЕЛГГ' АЛМЕ - VT*Duno<i-E dateur

DEMI-PliAN-DU

GRILLAGE de là SEMELLE-

a du

ëau

щщжмттжт

mmmmm

y//⁷. W»X\\\4\

XSNXN

rq

V/s

У//'

7//,

Ш t-

—f*--ŁLl—l J _L L LL LU _L i.___

SS

m-

aaz<

-1

i jLlT

Planche XIV

■

Hl

«

-

-

Е.

:__-2,57___

CHEMIN DE FER METROPOLITAN "STATION DE VINCENNES

En Terbeton -Système MAT RAI

i!

TF

S'

i.

’s⁷/

Y/

/м

X 6o% Ao, 5

iiii

Щь

w—

—44------1

--*---

\\

Г ")£ _//2

р///

L/ / / /

уф:

PU .

111

::

-1

Fer\j 55» 2/.S

1f~T

P    Ch.câble.ó fils

~r

iii

A&Al

ill

кк

mm

РЛ///

77/

Х7|_

7Л

iZ

р/и

///

mm

■шттмштж

___k&Q____

WWW

\Ww

•7 V

..

7А

2^7___

_____ -0.7-в_ V

-----

____Ą-___-ijlîi-____

^OzĄępai. peur,...

si i

___а»____„

.н,_а£5._

о.85

L.FL

77

ia

N\

\ Ч V

77

РШ

Ÿ%'/

К⁷//,

\К

)>

ЧлТГ

•JL

■Д

-ч

111111

mi:

ii

méplat 80.5

vti

Щ4

—i

COUPE SUR EF

—-—-t

ItJŃ. CwL

liii

æw

ii

7-

щшжт

-----i- -

- ! Р^~

_.ll

“'PLANCHERS

DES

QUAIS

Tu

___lilii_____i_____i5u_r_r__C .

(boche de bifuénr da o. o2 deriarssaur \

—

77

Couche de bilonie de 2 ccrtiunAb'es de/vaissc

COUPE SUR Ol

h—

o,teâ 4 o&jb^

----U —

,0§ф\

----*

PLAN AU NIVEAU OP

LEGENDE Plancher haut

■■

PEAN AU NIVEAU MN

(Voir la legen de J

—--U—

COUPE SUR GH

_-²А_____,______i°_Ą°_ ;p,4?.5;

€?5_i

щтут

DETAIL DE LA POUTRELLE P

n™II    * \I (5)te. ! f ,,

i ^i^frr^ł-³^-⁴

Uf-tt-4

diAfiéicn -

ЩЖШ шямшш.

VA

u/Ti

Ш:

ГР

-120 L

:-4

;;

Magasin \

:r:rsÄ=rjr!

i!

!<

4_.

■дgНЙДИДИИИ!

U-гЩЩг-

у-ЩЖ

_____^-2^5______

и_о_

-4

7-LX

Poutre U- 1 Arne/aoo.g Gorngogo.io&jtmAlUtгоо.8-3 саМлв chayiie tooJiU,

2    X fiowcres Jt.ame»to#Corn, ioo.icoio.(file joojaj càfiUj cA.v8JiU.

3    p. 160.7b.6 3 S cable* chtitfur Sfils.

Ą> p ilfo 66b. .5. я aàfile* rhcufae bfds.

Ърlbo.S6.lt 6.

d:

__Л_

Plancher bas

Poiltre П -1 .Am* mo*.y Cbm.70.70 H~2samc/la* 200,8~я caHas.ch-.&e/ile

d- 11 *12 Ante 5 o o. To.Cbrnpogo.u)~ % coble flä^ßls

d- XI* 3 Am« zie w.Corn go.ÿO-jû-» ecmalloe aSo.6_г «лйм cA So d- U?3 . Ameяю.ю.&гп too ioo.ia-2s«meUoo3oA/a. 2 câblas ch.noJIU d- П- 4 Am* xoo g .Corn go.go.to-2 semelles 3oo.6-.lcâll*. WO/lls d- П-S /Ьо.66*5.у-3 câblas cAomuv &/Us. d- Jïî6 /20.66,6g - 2 câbles oAacur, Ą/lls. d- Il -*7 /(to »66 >6.6-sans câble .

3! ; i it (2|

-!!;[•    \ i[ ЦГТ

(В:

f-л ¹

iHśh

Ml

Ui

—t—jSiU

! ik4Mr

i 2H \ lii

-i!

z. i...»а !^sj_jfcSŁifeaJ

• ••,ł L—Jl4„,4L..~3

mU I- \

Tiail tf? i I

VA к i

^    : e !

Ąxe_dĄlą &ą'freĄ_

ФА 7

21P_

7tail

Tlad Si

. iis!

Note - Bufi l d acier servant L_ à m am tenir Ica ponü'Cd cou - (VA chantes jurlcsinurspen - kzS clanl la façon du frflf<tÿe

if-V 4«*

I¹ 5;

4-Ar-4Ąk»-j. j-^-H

WÊËÉÉm

:t_B_

f=r=*

ш/АШШл

Æ.

TC

3 xi i

COUPE SUR.JM

ж_

LEGENDE

Grillade du plancher haut :

^ (Travée U;1 »ßl doubla tons les oi3-cui mtlû-a inif double tous Jesojt d -    Л-2 lf. double iou.de* 0.15- mirräAouwbßdouUl lout Ind o,3o

d- П-5 jfdouble tour la o.o fl-rat rrxiliai unf doubla loue UfO.16

Grillade du plancher bas

ivée YX-ldßdcublcfonsl 'so,1t-tut Tnilvru un.f doubla ion* las 022 -(i° 2rlf.doa.bU levas 1йОо?2 -oet milUtu un f doubla loue lad 0.2h.

Nixinnixxi \7-77?. NK ' i ^ ÔA

lU

I //

-is

Ol

COÜPE SÜIVANT CD

COUPE SUIVANT AB

Plancher haut

Pavée nS3

-4

//

'777

y У/7

AV|

SX Vf

ILTsX

Ä

mmm

0    f z ^14Шь

“•    ' UätsLZI

-.--K

,иАУ>у>7>/учi_P_

W, ' “i

;■

У'У77/М

<■

а _ь _

—’TUoT'⁻~ ~

- w- ------*

'^^уу'У'уу'утЩУУу'УУ^

il

ч\

x\

w\

•TT.

“* Plancher bas

Traoce n ■ 2

I.-ü

--Т--

\\

///

ил /А

7:

\\

VXXi

\N

LU

it

vS

MJ.

\\

NU

-,

II

....Щи

1    .J

.    ___J* ~ \l~L

V AiZLC

f—

,2-«'5j»№

,-aa-

//

k;

IM

ss

//

\\\4

\\\K

\\

H Plancher haut Ц

XééX/

XX<X\

//

Lpl

-F

7~‘

P' ■

X ;m, ^ и/Алл \\F ui

srvX уУ/Л УчУу //АЛ/У/У-Л

Ki,

s 57 гц

P"

S U\ O. \N

...

COUPES SUIVANT CD M AB MONTRANT les ARMATURE

Trajvêe n -a

Plancher haut

Travée n-j

Plancher bas

Trxuvée n?i

^/7У777/Т777Г7ТУГ/Т/7У'/77-77У^/У/7:УУ7У7УУ:!уу7УУУ7УУУУ7ТУ7ТГд7ТГУ'У^

-~r.j.........-U

J J/'U'/' ’D’’" J J

У'ГУУ'А/УУ

"/V/ ^SSS3SS2l

7777

*!P

2.<R5_

7"

_2.825

-i-

-L

i,

m.

7/AO

_UjdO

3.00

cOi

«T

8£0

У/.

»-ÖL-1

g;

"

UP

>0.;

L®°-

1-

il

‘Dasjue ciment (US,7/)_

Ai- (iS.74j

г-

4_°sJ

su

mW 'XWSWj

и HS/

mm

4----З.А7.5

2.7L_

IIL

----i

'—"T

(Berger et GuUltrme. СКЛСЕЛГГЛВМ(Е -Л-⁷^ Dunod Editeur

lmp. MO ^CQ - Paris

Planche XV

-

#

'

ф

••

-

D\

6^3=

-\

3Z

hl

ESCALimS^CIJVE

En/er bćtęn . Système MATRAI

_ ±5Л&2__

ззптхмт

! i -'-ferfct-fc

i : i :'T-r-i-

ktł

ШНХ'УР.

TU

" !. J- -r;

XX

TU

s шФШ .....

~X~

î^-l

iii

MU

5?-

{£-•

fis

j^'l

ESCALIER AVEC MARCHES ENTRE LIMONS

ту

\

> \ YUM V \ v\/\sAV**j

УЛ

/,

y//,

7/777777777777777777777?^

>*V

'Л/шЖ

УТЛ/.

AX\

7 'Jarches

S JR LIMONS

ix

-Z

"A

JLßää-

Хм

Шй

ESCALIER SANS LIMONS

XX

>U

'A,

r«»Â!

7177x777

r л -v ХМ-: pY - Y a

GRILLAGE DANS LES MARCHES

E-

Hf—►-

-i

AT

Pt

T----?

V

ЗТ+Нм-'

l=x = A ГЧ

Zim.

ШУШШ

тШ#р

УУуЛ/

, . ■ . , >11® л ⁴ ⁴ \ YYô

>C

Xu

•v'

//\T

ESCALIERS SUSPENDUS

EXPOSITION UNIVLbE de 1900 PALAIS DES MANUFACTURES NATIONALES

шШтш

'i

ils

--T

-i'

I_2d

ит-Х

-a1 j-r»

*-J-4

XX

aE-

Eli

U-i

-2.Ш

Tv;...../

щТи

шуш

РЩлш+i

шm

bâÿip

~ ' jij ' '.....

;РЙ1

тЩ;

±р-у/1^7^

ff

U-

U.

mu

XX

■Laao.

ц=

.! . и

МЩУуш

Л^УУ'-УУ/

штТШТ

//Уут    ту*

ЩщШш

ОШшШ

P'pHvXXltXX

v- шшш

Sip 'ilLL/Afjź./

У;

V'--. XU'*U

Xc'-Xy ^

/;-лсь.    г

~_ł"~

XPX

иХ

L,J

rj// //

7///

,'/

»v

TrjoSu j

CUVE DE RÉSERVOIR

COUPE

//

Y)

,v

-L-1

COUPE SUrVANIT AB

их.— шш

---TÈTTl..y.Z

tTT~::i-r=

¹ :~

X3J

L-rPp

il

---..-,------

Щй

1-

ЗЕЗ

7Z/ZZZZ.yffćĄ.

уШВ

AVf-¹

Ttva

COUPE SUIVANT CD

f-

--

w-

ÄJ.

SA___—J

Sä____1

-J

ÏI

ii

;/

///-/

\'\-

«Ol I 41

IA

IT

=Z-, is-

И./a X y

III

•’

/L/

■-AW¥

•U5XX

30,oz/

34 П

M-jy

as n

COUPE ЕГ

-    if.____

V'-'-

-V-

Tjtfe

FLAN

--A^joao ___

Berjrr ef Çtu/Urine. CJMENT АЛМ£ " Д/Лге Du nod -E di Lem*

Planche XVI

<

■

«

»

'

J

'

i

V

v;

/■A

2-° ÉTAGE

\ X/

Lii

m дцд

4l

=5

-y- —

.jm wm^r.

ешАш®

môlAALiiL|||É

......... -aj ■-1 Gfy L- ■.

ШЯШ

ra

T=ü

ХД1

n __-ï

B!

ESCALIERS

COUPE SUR AB

MONTRANT LA 12fF0SUn(Mj)EB CÂBLES ET X>U CEJLLACfE BAN0 LES ЕЛЕ O JS EOEMANT 0AEDE-CORPS

5|-йМ ^---

WÂ

AA

li

'A

*’/'/ У//'/'A

'/У У'/УУ V V y У’/y y sp*' rffyyi/1

VUE DE PAGE V

' LttrĄ.c,,,, j.

71

=11-

_ __

ter

tt=

z.

7«

-I

____Щ90_ _ _

Jetage

'yyyyyyyyyyyyyyyyyy/ y;

COUPE

TV

Inyêni

fl

Ш—Ш

p/A U УУ'/УГУУУ&У*j

Mńź

Mi

II

eiu

Constructeur : M- MATRAÎ

A

fX/

—-j

,;T

•I A

-\ie.en,ieui

MB

Vestiaire

I T °SS

|a

fel ! . tîrinotxs I «?    'I

C4|

iß

PLAN

COUPE SUR GH

de /Z dis j

■S

<i;

'S

*5

“A----

А\'~

— -к -

__414?

li

-S---

_АШ_

-§

'S

Jc-cLùLp, de /5Ah

___5Jt67- - J

-s

1 Î

* *

I É

I $

-\

./-

\.

(i_A-----1

V/,

_i

4!

-ä|

COUPE SUR CD

-аМ

j[ /câble de

45Ails

---_Vl

/cdb/e dc

4S/i/i

grr_ 3L&

__ ia'U

•I

L-.-4-éfL____Ą

r?

41 <§

RM

'I

SS

■s

__ _ -3.U___

1 câble de 3ofils

iccLùle de botdb

■§

£%Л

\<ЗГ'

CABLER ET 'GRILLAGE

PREMIEk ÉTAGE

.üü

----f-

_ _ цнв_

fcâile delofils

•T;

тяж

“7

b/Wm

5!

4'

//

_ JSo___,

___ LZS_ _

sue

ШрШш!

mm

faulte A/ils J

Jcâile de 9Ails

câêles de ?'Ab

/cixlic. /OAls

"M

тщтщтшззтшжттж

fcâlfc 5Ah

- Icailc de 9fils

/ci Sic de Щ Ails

V'

cäUes de /S f/ fs

W/d

4>l

'»i

f.

.'5

m\

/cd C/е dc Л 5 /с/s

/cd b/c etc AS f/*

3.U7

-R

--y

K J foie de 2ûo*8

Cornière 6oxCo

TROISIÈME ÉTAGE

__OdSjf_ _

^Zp«Û/ar8”u. COUPE-POUTRE №l

l/ouss'el iysdtsseur â"fa

càllcô de Ą fi/s

ST~ i

ss

\<" ç, 'SbXYÆ-A

cilles de âûlih

ЩШ

~ЯМ

I Æl

ailes de /5 Als

__6ą3A- 4

чП

TYPES de POUTRES

'S

|3

?>

'4

318

■s

ći6/eó сСе Э fi /s .

RÉ

l____

— r - -

'-i

il

POUTRE DU PREMIER ÉTAOE-K“!

о)в ^Æ>3 //// _^ JJÎS    1//JL JdZf _£»8_ M9_^U^ja>i£ /Oif_jĄ.

; i i    I

>•

._ш_

юЫаГЭАЬ

495.

câbles dc JSJils

fcdxMc dc 2.5fils

_ AM _

f%\

i® i    Jcâb/e de 26/t/s•

. Jjï__Л У5. - -

ûâéiJM.

I fertile de j+Ais

//

ILL

ДП

В ! cille de J, ft Is $Ц «5    "*

1 câble de 25 fi/t

1cd//e de dfi fs

зг-

_ * dA3C

_ _■ .____434-1 _

■%

'S

тгт

----re s г

““Г

4=

саб/a de /5fils

italic de 12A Is

*"■АШтт ALïî г__________

Cl-Axes aUs pouircb et poutre//es sassemd/ant Jur fa poutre \

FOUTRE DU PREMIER ÉTACE -N⁽-i3

'Hauteur IdaJe О, &5C Haul- Iters cornières 0, (il#

Are de fa/roulrelle

Ш“

fććiblc Clili

S 3 ^

lcilU 6Ą/s    hälle dc 6 fils

CJ5-

‘A—tjzk

-t&LĄ

— ii

к---

1------Д

ßesyer el ÇuiUej-me. CIMENT ARME. V^Dunod,Editeur.

lmp. M 3CQ. . Paris

Planche XVII

■

' у)МУу.Ш

RÉSERVOIR POUR LA COMMUNE UE РГ1<Е1Х1.К< un i RKS lîllЩ

1Wm.

_r._.

\ iLEYATION

% c|oupe

Pi

JcJboH

-J

VS!

I " - %«

lo.15

³t-

-■-4--el &*&--

LO.D&

$

•1!

iфУягйятл

« o.l 3

■V

TT

£!

*j «

11

R»’«*- i*u7m,

fer U jafc to«îo«5

I    LAN TERN ON

Fer U 6o«5o ж 5

-Si

?!

Rond de 12"/-

*i i

Fl

0.3c

__2,200. ---

Ronde. de S ’%,

Hond, de W

4i

CornÀAn-e Go* 0o*6'

fte,

ii

d* s z

1!

i¹

y/.

CorïtTç~7&ô7

ч-|

"Шк ?

Rend, do fo

7lo,U d, вт/..

Y/a

FLAN

ARMATURE UE LA (jOUPOLR

DÉ tail te la Coupe

HE3PRV0IRS

Ingénieur-Constructeur . МГ А. В ON N А

réservoikD'Équilibre de gennevillier^ sur la conduite dachères

ARMATURE^ DU PLAHCjHTETl HAUT

it !5<Ю et h./в '

___' «>

ELEVATION.

Mil

⁶4°

-M

Ш-/u. _ ,j

DETAIL D'UN PILIER

SOUPES

—T~“T—

t 2«.!/ * ⁴

■Ml¹;

IR

il s

* ’ '

; I,

N?

fW'

Dfu

jî“

NÎ>>

À

X I*.__HL

,F

FF?'

■4",H

LV

il

ig

ЩХ

— -gpp*sr

--~0(7JO--

Y.

20

Pùisuduu * 3/. Sû

УУУУУу1к7/УУУ?У/УУУУУУуУУЩ

---

i_b«6

COUPE cd

ri—--т-4—

ifc

_ MS-____^___P--2ÜP____

WM

JL

■ï

In

F"

f SC-

F"

ray.

V/

i,

[JLmenhmU de$mi/ten /1rs i de 20x1£

i/5xfo de 2 en 2 î/ûtfO

de 2 en 2

fcrtde 2o»l4

77?.

'i

7772

\ Fer> f de 6tC dur iou/c U A tuteur efujoi/fer

■‘tdtSoiU

'Ш/УЛУЛ

штж

\ide£*£ ”

/ji*_______.__

c----M/utmèire 4.2e ~~ —

ЧЛ i de 4e•22

dû'IS têtus c/o ÜIO0

i-

û/0    ***+>*МП(Г

---p

~+ —

coupe ef

Coupe ab

]    .^Jpers+de 201 /4    !

i \ ‘ fus’ toute là hauteuA Jxc /гHies*

Г”

Jz CÎOUPE TRANSVERSALE

RÉSERVOIR DE 150 M“ A R0CHE|)RT

DETAIL^ DE LA (J-oi

Vr-

!F

-t

lfpt-4

¹RtrTde à’o, de. Çd

Fer T (ÙC GO я

-to

t До. /<Г

DETAIL

|Г

PARTIE D

ht

f'i

«81

♦----

Q Aw •ftU/SifO

F°<4i<i* /л, m

Va

Ре

C/tevcrhistse ù, sF3

if

■T" "Tl

PrasruUSr# ~ 1,2 ZQ__

Dia/ybri/’e 1,22 O

___У\У&/УУ^ :

I -    ;    ‘6

ч¹ i

г I

'Л

/■

•j

,§t

■3:

fforUasiĄ+bo*s

Й8-

i:

V/

/y

Deneioppeenfiti Ztffîfi

*----W2«------

PARUE В

<41-

/2

7/.

\\

fi

’S x°

/V*.

\ :æ /

Gtndmirtrcs en +// dxtS/jQ 35 dusissonx

\ D t ree/nies* terĄr de 20я

is

Ж-/Л

fr

J’ort do ИГ. /А

--

f!

ss

aïi/г<,г г<и в>е‘ â°’£F-b! С-

щ

I “Т

«i

I!

? ^ MAmotey^

/>d Г/ 7)*ш/о[ф*тлп£ Oy5г а y/ctua o/x ij fitste us’s бои А

/.3eS

Uauteiu' totale 6'250

As

II

tS

"3 res’A de 20,

Й 1!

fi I <\

'I

!-

i-

Jfoftłststl ł lU о Оя 22

^ <Uuut Le pds'ltnd/s’e

DETAIL

-Ш_-|1

li

ig

i»

ł'

I.

Й

tl*3

IS

~X~

p-

ü!

is-1

fr«

IS ⁺

■"TF

fis

I&+

Tl

Mo/vfusit Fa/Arta be* 22

<----

___3&20-.. ___

---*

--JPijcm tèü:c ui/aridusl gALüdOil —

<--25--*--л^724__ ^----. J^'25 _ ^--0J^łŁ_;

Fer+ de Зол /à’

\0\

4.

ü!

Ч¹

%?- :_vSo-

-i-1— L-

Łe

D    \F^'Tde du,do j

•1

21.100.

22? 67.

____6 7 Lti__

i-

<*as

mmc

7\ Afaridtr/urs* rcbcoordatić л I ' g ■ Mredrd* -..l W- pùdSedd. '. 00

i (2 ;- f?1лгf,^ùàre inA*,•ijetĄd' y, OVO *

^ pUutemOyFdS-Pevelopjoeme г/

PARTIE A IÉ

ш F‘u2~~*

Pert de    22^- У/У'\

12'ùisis U\jùruru j^lMl 2Л

Г ' 7/7?--I---V 77?

7er* de 20, /à

/ytrruystd 2f!pY>4-

II; ä# m |ii ет ill

!i

i >i

AMS<”

,6

Soupe yertiqale sltr un pilier

PŁoidt iMfirS’ tle 0 (?(/_

t.

ШЛ

Ferr t de 2o,

Fers t cte \t5r W ^

et de lOttode d *ux (n déux

Pû'o fbtotrttrrp //

-+~~

II

§1

'îl

«i

v|

T'

z 4s

h

Л/vt^ 201 /4

ii

/3 diu is v&fts c/e 0,0 3

й----f

- ^__Jftdmefre 3J9

«nil

^.#:Ä IW If IB ill i (

ig-фр

1s.<9

<L7P _ __

II

il

f A dits ь sits cire c/e O, y O

CfÜUPE VERTICALE SUR LA PAAOI

'аЧ.

/i

ii yi il

'i!

-f-

L- -

— jr

Y⁷//

---tnz~

-1@<L

^    ^ /ÙeMtedj DeyeUgprfn,,U г^ув/е

YS üianè/re &tÿft    I

mw

I¹ Li

«il

ÿ!

11

I!

11

«si

/i

/i

il

/i

'!

Ld

г/Ш

ТПТТ

±_i

Hf

_&Jaa-

—l!__

'4.

— »•

с»_Д4<Т__^йо---L

L CtTAFT A Hż*d3nJr£*L z~ -

FlLtL OJsddTt.«Мм*.7<f- ~

L⁵»Ä

/1

/I

li

/1

li

/,

I,

il

fff

\\

Yż

lu

/6 c/tssisiMPis c/a ooô’S

SSn4vn>

U.tM

/,

.i

1.

Zdt

_____.Ł

; i "'t!

:Jj|

I":

g onervt/s'iced b/’s+ds* ?5я /о

Berger et (hUUerme ( IA/Ä Л T Alt&fE — ~\7S D ЦП O Æ E ÜtSUP

Planche ХУШ

V

, ■

У

*

■

:

'

■

■I

//

■u

ТГТТПГР

SI

/*

1er Etage

i.

DEZj

□ EU

□ EU

TH

>~cô 55

r:i

ЛГ

\\

- -ь-ш- 4

«i i

__ _Je-6D_i

//■et I

lj\

-0.35

-I—Г

SoL •

_ ipç_

----^

Л-OS.___

5i<0.IC    _

к * ! ■

T⁵"—

___&op__

FRAGMENT БЕ FACADE

ШРЕ TRATSt^YER^ALÏ DAM^ l! PLANCjHER INTERMEDIAIRE

Soue-

daiTPE LONGITUDINALE

'iii

--7ЪТр?7Г~ЪТП*Ор-П1? 0£ //

хТл

*----

--JÜ-SS.--

OJ} ,,

! ! i !

iil”!

i j ■ i. i. ¹ ! * t B i

I ; i ; rt i î ' ‘ i

ut ! t T

il i

<4 OUTPE TRANSVERSALE DANS iE RADIER. GÉNÉRAL '

Li^r--—.-f⁻¹

Äp

-А

A±

f T~'"-

! il !

14=

ra

»Æ

-3

Goûte of

iLui

PLAN DE Ь'ЕТАцЕ

“Th

—i—-! t~ np

\    ! ijß

!i⁺

!!♦

7 ^OUPEEF

I

1 W

__

JLfk

USi

“T

Surcharge

18ooJCV]».in-*

--‘Тат'т

,_L|ÜAi5 ¹

ал

-h-F

-F

y;

loj!

• JJ Trecreee c/e 4.00 - 140-oc__

PLAN DU REEDE CHAULÉE

A—]

—i&sĄ

îo>ic

li

___-i

i.

î)!

Lis

«!

a& gf; iWi g Ay-R--:

7/ *oz *PI Ч-/0/0/-о/y

ARMATURE

deC Cloi^orG

I Щ

,-ŚfM i Щ

T—M—

N¹.

K"L

R--

ELEVATION

A4

II

RÉ$ERYOIRmxTT$IKE Capacité 6oMi

ai

ü!

!A_ /'xTÀi;

Ą д»4|

£o*Li>'5

ЭД-

Vf

4»

]r

\->utûneSe/i

--U;

——*-4.oo

' .f-m * i %\ i m

! 4

*-4

>{ <0-2<j- I ¹ >1 'f»-2e ■ e

—* U- — XL — -j — J — —    .

fSfa

---->-----

if.*?.*.________J

I:*⁰⁷

“il

o'

+.

Goupeb

ГА?

J JS

PLANCHER bitI^ETAÔ

A G ßEMBLÄ G E a D’TJl POITRAIL ^UR UN 1 PILIER GÉNTRAL 1

FAÎTAGE

ę>.

D-JflJ.l

Лои$к”Ш'Е|1Г"

//П. ш/о forstc/e d>Qy1<3

TU

lonl

o25

FERME ET POITRAIL EU 2®-eETA(ąE

v4pA

IL-t-Ü

стар

LT-

xU'-.

Ло •*£(>* 5

iv-v4 I

xv₄

Г"

i Щ A4 fT4 mpdJ

—Eh si m

_ •__: J**HŹ*L4JL !!*>££- lAEL __

AA

PLAN

!-^ -i;

AśLl

^'i=44l4

Or-Щ £

%1—Ш.

Il tЫе2о*И

I-

fe/еЗок/С.

•Л>.

7)

//>

— Ly

I (ГП Г " i г

j*. щ

т rjf -Т"Я['•'t'T*"“; г"

I 1 ■! *: Ir

_2 "0

___LZsl__

T. 7c, it

il

__о

It JiSfl У ifSiaikiàMjft /St~o5

?!

ÎÏ

'■f

A⁻

■■■ ■ ’i m

^0.

--” ~~ ‘Yr---- -

____àSiM-/

T'

i.

Liffi

_ _?7!_ ^

2c x£-

Y\

- -t---

25-25

LotjLo

Mt

1о*Ло

2.5

ТФ

A4/

o-p.

.ojz.

:u

_    4_i--ft»i---4

________2ОЖ-0О-__L

Tl

25f25

i-5

--_»AÜ_____i___

îL

+!

Coupe ab

‘J

---H!

A-f-

QOUPE CjD

AT TAC} HE    PIL R

!'t

U-

1-

ЬЛ1

Легкое- et GiulUrrrie -C/ÆfKJSlT"xl7\3f JîJ_'yrv-e Dtmo<1 Éditeur

V-

L

---crjt-

----A— Tf---

?| Й JtLzt.3S.4

t 1Г    r.r^

1 •!    J_ai_L , \¥

--if⁻!“

Tbru/s tie/2 !

ü,t rp I

^4

"TEü::'lMLÿ- L^trlLH uni

oil... 4T L/Yf N TR____\ï ?jw__ 4 _ :---/Гм---1Щ

_____ Sur faxe JL5jl_______

COUPE LONCITUr)IHALE DÉTAIL

Pu

% Ш i i Щ

i Щ i JET

Il III V§4>

(Шк щ-

j ^1 //,,//У/////s/У/

!c

SLA

-_Li_

Tmp. MO 3C0. - Paris

U---

_l_4

-k

!D

Il

m ?»

л 'r’¹

p/a.1 3o<5

_ L5â___

/2

"25 Щ

m

4L-

ж

tf'/i

_____ iAA ^

5ok4-

I-

“1st

tl i_wi_ JlB⁻

I 0. r-Sm/UeleJO гЖ

f7.    Lrx.gv'.^C--fX,⁷L-2

' r7*a^ 4ûi36 ^

' T" §

j fiat lód

■t-3aUĆ

>7 -

/о. 8

О.ЗСО

V-

'U

Л-Огб

»!—

►!

4-hS

0-3^

. _SurJ'axe 66o

Е1ГЕТЕ

■    o⁷</>/!>

^25

Planche ХП

m-.'

-,

ж

-w

USINE DE M M ”⁵ SAIT T K R- HA RLE ET С”¹

PLAN D'ENSEMBLE

•Tl

Heurdii Q-0C

'NrA

fZM

-TJ

Lv

pAvô

%.

! !i

4P

-4>

—G-

©-■

-®--------

e-

-:4-

li

j »I « ₍-njicner^ del •

I : iSjMécainiqde ^énériale |

! ! " ! - i    i    ! A

Ф <^>    ^ ■ <S) Ф ф è Ф (j)

iei-Aeoj.4³ ]    3t<> 3 jLt‘L|*-î— L«U

i    I    -i i    i i#

TZZęZMzĄpL

I Älterer de

Ptiiîjlur^

A____«-те.---4

E^rî^ de/* moteur^ à pétrole

Urinoir

V"T

i \ in • \    \ A \ - Л- -

\    \ w \    \    \ \Мг"Л ,

Lir'^'iV'V

A«*\\

Y ÉfdA

Év-'A

-4’

fer

s.!

i if-

i¹«____

•o.i6

4 «e.2e ]

—j|t____/bfł<aLeftfej

si

|£4|»1яе___

I !

ю2о

'U

*ЫЛ

éourUn в-0JS-

?!

! iV

Ä=s

*00в

? “"Й

■V iB~^t

C.I5-’ " »fcao

-0.15

U~ ЙI

ОРЩШ

Atelier de?(

Moteurs

Atelier A électricité

il

Щ]

W.CL

° J tu \

\ ®

\ * O \

V

Ш.

«»Г

Coupe transversale

ATELIER^ DES E S pAIp

f-)jr

--—

-I---

i!

Coupe de la

Salle tes Chaudières

Réservoir Go ml

Ti

jT^~7“/w

^ - 4*    \ i

il

ГТ7

Лезепмнг réfrij/érent _____£.2lû___

T“

I    Л A'A'A'- [eujrmenf^ 21 .сооК_?_ _ ^

. .Aï»—.

7777

TT

*5ar </еи c poutres

Char j/e

Tenne5

2IÎT'⁴

I i^ïieî

Uü

si

Si

Vi|

---I---—

/. I

|:“

⁸-‘-

S'JU>UAW^W\\\W'¹J U

-^rtn</w ; I Ancien soi    % /

,7/77/7/////)г/77//777У7/У7У77У'/77\

A\

_ _Z_5y?o____

•?,    ? FoubtreUti

sîrtrrin

<V4C

-RP£_

Sol oies Cii sud i er. s

УуСуууу/ууууууууууууууУуууууУуу',

1J]TT

-j

т-

-TL - -zfAA:

1Ш

> P-²“

. rt.!5

--W7/

i o*l5

/{ourdit o.QJ2 /    *^û.o8

3;. I *11 P-1

UOIâ] I.QI4||.P1A

ÈSKS

ej- "I

Ci‘±“t    Ui_rouleinfnf_ —

|4

li *«• ■

).2o

I-

: co.oC

f.

:3S

Coupe ’j : 2 TRANSmgjl |CiÜES АТЕЕТщ : de PEINTURE

L4-

!.

⁵i

LU

'7s.

(0.2G

,5.

snu

) tO.20

ma™

LU

□□□IDG

_§ŁtL _ I__A-îi.: _ _ ---jJiS«.---

i T :__G

Li

:0.2C

,-ko.î(. §|

Ue____i

0.26

- ‘1>.26^

,___Т|3'АР —, -A.4gj>

r~ïï

!"

4-J4Ï

if⁰¹²

i!

.<! о Ь -cr

M E-i DI и

___Ъ$оо____

ri

-+

Д“»>

.J

fH

,vN

(Coupe ъомфтишкАРЕ

Coupe tram^verêalè ßURLEß ATE LIE RÉ DE MECANIQUE

«h*

ÉOUVEPTUPE DEÉ ^OjJTE^ A CjHARBON - DETAIL^

poitrails Alt B poutfelleI cloison au droit

J Pf-fl    Jtondde £"J6,fouai DU DOSSEKET

mmmmm ШШШШШШШЖШШ

ШШШЩ

/ 3o«5

35«1»

!d

l:ï:T

Cornières Ab *é6

фа-fe

k Aoxll

J ihkÂ

LT

Us de C"X* \ 7?o/rdi de /2”Ут // au mëTre

J ям m ter*

■■ I

3o*5

UE

Nh

Foil rail Л 3o et fo ntl FoilrallsB 35et JLo* Ut

PLAN j 1Г

SouteS a Charbon

' Coupe Suivant efghij.

sS

'“TÜ—i гйгтргп ш. u.\mx >-m La p

“»-*---

^;:p.vru

li!

-ri

lii

l! !,4Si

POUTRE LLt-3

Явги/си/2. /Lut me

Г?

mcémm 11

■i îâilfin«

. Fond de J5 -

in-A5j-T м-гф—-—M7

ILTV *    '

3oet5oĄ - Ыкг

ТА

?ÜÄ

P

K il

Jte

s !;#

At-------¹-⁴------

PÈA—---^⁸-°-----#4-

Ц

'Щур--

HAUT

Honda

OŁ

I f-

ТЗзм /ЗзЕ, Jß3L,

O T,__2*2^1 12с2С

C.G5 /fa

Cornières Ü.L5

Зо.Ь

ri

Lil

.0 ¥_

Cheminée de

LA DISTILLERIE DE CONFLAA$ HONORINE

DÉTAIL

Coupe Suklaparoi

igpi

Irk-

I DÉTAIL

Coupe Sur un Contrefort

СпгШагпьс СIМКЪТТ A /( ME — V'- Dun о d. E di te ur

шдаид

Ml

:о.У2

_A

jB

лпЛ.ЦМ

DÉTAIL

tête de la Cheminée

1*1

Aeiert $o*lC

Convert So<iv, T

1,

Aeiert 2e*lt

REqARD

POUTRELLES C-C’ ni'T КопЩА

MfApr

35*18

МЕШЖ in гИ j É

W;l r

î.

«-N !| U

J il il T

р|Щ .t

йМиЕрУ жШЖр1и

Cornière $о*Ъс

vM2._₊

G "tin.

mm

1È1

лщА

'Ууу,. - CtcnUro. iri^i-S

ç_

_ 4oe

B.

plan des SouteS

1ПГ

4m

2Щ

ЧГ|-“^й.4 i    a é

_3/sJ— . t —^opZ_eL

5süëAï

Æ-i»,

E"r

u.

,___Ш.

З-0 7 !

:ЬАА'

^Зх/г-

1Ш

ma

w~*

№

—łfio

FlÄTtCOUPEAB I VUE TE DESSUS

4=

Pilier ZC.Z i

ь.

» äfif

j B-ź V. УтУ7У/У<£'~7,

BA5Z

4L

limlUe i oJW/ »

ГО.Ц

--?!—

_25j££ 4

г,

\Jfaiiier /о/ers de Зли mfü

-—

Foci/erJ ; 1?Ж/2у ‘

4i ESCALIER de lAQUEDUC

Métal déployé

Mm

•/

UE L’

ÉMISSAIRE GÉNÉRAL a ĆHANTELOUP

t~Trr

ii

il

-I

ił-

-Щ

•m

•Ы

i§§ę£?->

С / lormferm Zo*Â& \

;Г

l!

!!

JîÂÆHAP

;    Tl ^

У™

.U-

iwTj&iÿ

T‘

ASSEMBLAGE D'UNE

MARCHE ÉURLIMONC

ÉLÉVATION

r%L

'Ź

LIMON

Fo/rcl c/r /&

fl'//Here i-ę./Ce ■•_ / ■ / /''

4 УчАА

So.5 1

/ /L*|---

■=*

/К

\'"Л

/г

+ лyS*- +

4—.;

in.5

3o*5

fe#3

Свгбеаи

S Sc.5\

---*.

i®. 4

-I

«I

Loupe

Jfé’lcd déployé    j

au

Tcr'Y 3o*1G

•44- + )

-li_I.lt:

PLATE-FORME DE DEPAR T

Г”

\йеиИсеАог1.‘-

FornioroSo.Se

!\

yÂ

isÜZI I    П) : ; .

LT 1--«W5-------Ł-4&---f— J

---------- J—I A4«------!—T /л

1-------------i - 4('—ĄI

<    -—----H] A--C

4t

I'

//

/

M

jeüüdssj.

у/ Cornière io.io

3

VUE DE PE O ĘJL    j. j

CORDEAU 40Uß\ LIMONC

Cornière 3o.ia    -

i it

!.Ü

11

■f

Métal с \ wleyé

-y----

wl

PLAN

!

■

\

i

щщ

PA⁵-£

Хок

•I

--—г

S.

и;

.ł-t

ay

Y?

lAi^l+25| J

Ж‘4 3

1 ^ 1

4A

XX

~n-f.Ś00- ~

E Julmnj- —

Zbn

'/

У'/'Л

ШЩЁШ

*ЩЁпЁг

MX

COUPE SUR AB

ür —

le---

L,

-И

P O NT ET (AXAI 4 S AT ION

PONT A LIANCOURT

PRORIETD DE M- HAJAC

£> Ś<? ж Зол 8

ługcfU-ctŁr-Gontrłruclctu': MF BONNA

—j*

m_L

Tf

fr-1.

r. 3о* Зо

20* 4

tD

i25ô__

гр

ELEVATION

1___7-lso__

У^^У^УУ^/ТУУУ/УУУ/

У/У'/

A4 raco

VUE DEVANT UN GRAND POITRAIL

Longueur U5.t"äTe~l3T5o

!    / z /1,о,йд.ь^ ____i__/

'Mirier de /Ом /О

“1-

is

iXLXi X X~y

¥ f-t

II

Ą-.

__-J——

,уХм&4 У^--г"аЧ

г!

'А

X//.

■4'

A,

\Л

4 7?XT,àôe

ууууууУУ/'.

"TT'/

Z'y

XX

XV

COUPE SUIVANT (HT

/ c. &ê*6i$r

ZJ-.TI.r.T

20Д

4-

<?Оя

__^5а_ _

*-

fr-

!/>

_£jSj_6L

I/.

X-.V

ЧЧЛт

У//////У

_G___

COUPE CD^I

GRAND POITRAIL

Тъо/ъа

~7ZT- /2, eue rrbàfne _j

г.

MX

"Зол34<3

ft

H*

XT«¹*

J!

_.LL

С. Зоя So ж 3

/SÔ73ÔT3

4- ~-j---J — !--2Доо_ —

Ч"    ßl~ i--*

:    '4 Ч

2QÛ _

---N

t-!-V-

PtA

■4

г*!    !

VA

COUPE INTEitlEUI

- 4--

. T-R--

Хч

_4

-f-j-—w-

Ч'-"' ~Г~' : -уДр—г—-_-):--[-;-J-_-    -------------------------1

АА1Ч4т§ТХГ X xUrj

DEMI-COUPE GH

I—Г !|%4-

I I '

&|яаэд

Ч

4.

Lj —ÿ

Цл

*P

»5

с

•X

-7.&Q

; р>

------4 ч—4

Axe de_la _сщ] ее_____

--i— + .

--L-J-

-и

да

DEMI-COUPE TRANSVERSALE mil ......^_____j/_Kç‘<y de /^?X4~T

rta

-------ч

A⁻'

—ha

*-м------

_j. __ Partie cireiée £Уя# — J---- —

С‘. ói, io, 5

A U---

xC i

сПк

ЬоХ^

_L

sXs

'к

_.i

р|

1

J о, О

_5SS__

.-лк--*-----

i.

10>10

1140,43 ZbÀb ,

L-

"Т

doiW

Z' ЗохЗом3

_ -Aie& Ulf JbfTT__

_ ₄ J/ct uleu.- Ubre_ JLPÔ.__

4_.

VUE DEVANT UN PE TIT POITRAIL

ЗОмд

...j

s?

x;

C. Ha, 4<?,ó

t--

|Wf^

5Ш

=Zö/ 26\3f

Хи Зо* ЗояЗ

i:

K~

y~3ós if О * 3

___

Го_

42?P_

Ł92A-

i!

5,

7ГТ

Corn Ъо ,ЪоЛ

at

_А_.

—---La^flüL___

in t г *

# i i

4P

Corn. 3o*3ox3t

kL В._

im

h--

§    I

я    «1

rJÖ

u-—a.-

___;____1L_._

-~k~—'-----s

ЗйТЗоТЗ

"i

'S

ха

С.Зо 7~cV3

Kooèérieuf dit Utr/att i*rie.rcetcr de lu- Ъам/ие i ^jj

\À

--

___4j

----

! i

c. ôo,iSo, j "-ы:

_ _    ¹—t

rf~

"H

î—r~ -

-----*u

-25a.

Аде

/7PZ073Ï73

fi

XX—4—

-tf--i--

il!

[Д5о_____

_ - ï. !___j_____jŁafcCL..__

Ti

ÏS

-X

_5Лоа_____4X

+8on----

___1,дад _

j----

r- Bo mÓO m 8f

ii

C. 3o{ Зон 0

__&,5a£! 1_.

i___:

_iT4P3lL

èv-

-------------*

i!

t.

COUPE SUĘ. LA NERVURE    ELEVATIONdu TUYAU

ч/'7/

=4

CAISUSATrON A BREST

LONGUEUR 42 0,Л

fe SUR.LE ТШГАР

с-----у{4_

.j

■Д

:i

'•

X^ûôàf^sL

r"l¥"

f3e>, i ff"

DETAIL DE LA NERVURE FORMANT SUPPORT

-U

coupe sur ef

'8ÉjH

DÉTAIL des COUPES BAG UE et sub le TUYAU

P.1—O    i    —jfN.'

4 X

SUR LJŁ

COUPE SURIABAGUE

li-

T25

I,

Z^fl. <20

|IL    'аДД8_-^

Ь-тг i

2ц.а

in

Uioa.

_e._

4? -et-

LDOÛ ---

Л.С_

f: !

ii

---onqT g- —

II

,?u

⁴%

J^aüj T

■+. I Ц^>4.е&

w-^

11

f l'Or/в

-Jtjoxio

/10 au me ire + 20* Ut '"fO ,xu neutre

j

' fio.ia-g p \ fde cAnÿue rêlS

,''ß; i Af i

te

дар-

1_оДйа

m\

-ßA5o-i

л^ВЗА _

L

2i<t-

T/O * to

tO ли, >ггеЬ’б

hi

i-u f

--iLłi

-L—

ii

т:

Ь4

* To, <o

Ł-

■I.l

C.

ШШШ,

____0,54a----->j-

.4^4

Ÿ !<}, Ю .

ii

-40

4ŁŁ--

_оД4о--1—>3,54P—4

Ayecrf <?n,iUrmn CIMKjVT ARAfE-\—Ошго(1 Editeur

lmp. °CQ- -

Paris

Planche XXI

I

-

I

Г\ АЛ

r\

r\

ААЛЛЛП

r\

AA

CI

r\

WWW

-U

vL U vuu

VJ¹ \J 'V/ VA

VU

d*

Li

-1-----

~~r:

— —4-г^ь2йг

L _ 4Л12<2--T--

i----

l4,U2ći

___-Я ooo

—A-

ууууя"//"': ■;"';-уЦЩ

■1!

PONTS

Ingénieur-Conefrucłcttr : MI B 0NNÄ

DEMI-ELEVATION ET demi-coupe longitudinale

____i_-

-----L

---A-

---iltf<Zi2L

y//.

AT

OVW/

Уу/л/,

Y//

__ÜQûÜ >

XOQQ.

CO

---1^/300*.

v777y

W/,

--

ir

7777777ЯГ,

^/7//Ą'/Ąj777?,

AT

V/é

y..

■//

:-D

__l,2LÛi3____

p 1,2 fin__

tr

asg

V/

j.

TzA

■/

V,

DEMI-COUPE TRANSVERSALE j;

JLofiO._____

--L

---].Ш__

,//

.:zv

r_ _

__(Loan__

'Л

'У/

Va

уА у^/^Ч/О/ /

jgf

У/УЛ////Л

'У//'///, z /У/У'Л,

тгм

TUT

/-.-U

Y/,

il

.1

- A ;I I

I **

La'jl'lv'--

V/

DETAIL DE

LA COUPE TRANSVERSALE

DU PONT DE TOULOUSE

---r

FONT SUR LE CANAL DU MIDI — A TOULOUSE

(projet.)

PLAN    I

V>

K///

Uêq j

Au-,

A,

J,

mmmm.

уу<туу/шу,я^ууууууууууууууу^/ууд^

I шЩйУУУУ/УУУУрУУУУУ/УУУУУУУУ!

1. s

11

\\

i-8F-

mm

r—

fHA⁷

A‘r:i"

Г Tj~

;Т--Ц

.......TI........ ¹

JD.___

Jr⁻

uU---il!

....._L..........J I i........

i....... i,[:........n

! -kU-jc--i-iAi» I

• IU

гт|;:.-т

rr>

„j

--гдоо___

-ч=—

Saa_—-,

—f _r=

-ZO£L □

__ i^iû______

Г252Г

i.

■~3—

epUUtto, /g

4-

Hü

'—; “t’i'

agyy.

ifl

Ni

Ije/ui- do S    _ Sù fûрш- nyetrc

-V/-----2JlDÜ— I___

____ÎZZI

...........А.........'.

.”Ltcz:LZ.7ćm3 -4-—

WM

-■ -5;

V!

■r

U-----T.........irt

...TT..’..”⁷'’    ^

.si..

..........Ü

-----r-------------...................

.......j—j

рЖМ.~:.77+.\

fin«._____J.

ш

Ml

Ш:

O

Г5

щт

oomS__

SpLat4ti0,/g

НШЯШРI

wy y y/,//. S/V.    , y// ■ ."//s. >    '//// . ■/// 'y t    &'/''ÿy'//    ■'

Tv7 ' Y -    T-T¹- •■' ■/■•'f y-,- ;7гУУ-Уу/у»*-

?7У7у, . у VI '/У/у PZ уту?У, / у Я?У / /zt-tTU/N:’/ ^

• А ?

7/>bxA><U2s*,ß    ;;Ц,.

у/

<?/3ÙUs Же, /jf у

2-6. , ^ ^

plai 26t /ÿ tou* les /.Sjo cnoir^i^ esUtyt cos- pUOs / ci* '6ж 30

ХЛ

■#»

~~Ь~

si

1!

4-

I----

—V___

C OUPS TRANSVERSALE DU

PONT SUR LE GRAND-MORIN A ESBI.Y près MEAUX

■r

£2

<r

■—t.

■*Г‘

Ks'

1.......

иг и: u

.... ~l

jv

---NpflJÛ. -T = :

•i

L_

i.

r1P~

rHi

A - z.

:Efe:

ZE Zrl "Д

“1

usi

; ■ X|й|

•~NI..

t yr. '| J»

yjTD

LZ

lu

•*■—7

_____

sT>

,-E— ' .    "-Ż

ГГÏ

I-

' ; ■■

ТГ-fi.........

ï7fa7=e

HÜ

У)

VUE PERSPECTIVE

z;

Vide entre les culées *10 mètre s

L-

fût

Of

îv.......:-è-..............^ ■..............I...

...J

!'

)>'■

ЗЙ

-ÜSïŒliï

ж fi

"i

U G«Oi.„ne . CIMENT ARMÉ -    Du nod EMëâr

■i

£

Л

V

■

■

..

я

I

.

■

e

f---

__- 3, ППЛ _ _

_v

Ron Ci de !2 "2 (l

&OS-A

Г.

\,

3 - 4 о и to

.MX

PONTS

Ingenieur- Constructeur: M- BON U A

PONT DE 21“ D’OUVERTURE SUR LE GERS A AUCH

____Longueur totale àe l'ouvrage Z^ooo

_ _____Tarifa <UJjarc 2l'*OM

.Ц _6Śe_

^^fîs^fîïifiïSfïH

_n

i m\üsj;T° i

_B

1П—— ¹ 1

НоШпСоМГ/и /

ESS4-

fiot/v/uU d* 72 (Sft.motrv

■СО,

II

---5,&aü-__

---I*Mb---

L----®⁰-»--JÄ-J.

—LL

il

=ç

ИЗ

.4b—J:—г ‘"T

î/2 RfadS 3y*8    ■'

^тД1ИДрямаш8ЖШ:8аиж

' d-

'/777777//

ndtd*,

*àu. rf

•i

----i_

;

p o,Sno A l.oaa_____ _!_

j,---1ДЛС

IV и

T7.<üZo7i~c> §

ôtr»)

'fl

■*!

SI

$i

к---—ZJWa------^

COUPE

HORIZONTALE SWY^.AB^j

— t-

TUT

---oçor

cj

«j

~PR37~$ô

'ÇZZZZZZ2Z2Z&?.

Ronds de /2ÿ (ÿaiomdtrsj U PRU de5S*é^^iÇ

_L-------\L______i__--- JL,----_jf__

__t______if_4

J Дал

P.    t ńAn ,    ^ rna/i

—i___|Дш’___jj^_ ___i£aa

f- дэд - ^---

Г1

ЦКШ4

I 000

■f

:--.Sî 'S)__ç

---ijSpi----

_5!

-oti----L

& enue corde de / arc 70,50

COUPE LONGITUDINALE SUIVANT L'AXE DU PONT

y /~7Ч^йё&й2*е ЗЦ0я ft

14

I Д \ I

i-

il

_^ j J- Axe de la culée

fS’l ¹

1РГ

---AT-

=*.

DEMI-COUPE TRANSVERSALE A LA CLEE

PONT suk Lr OSAS

;;

y tende <te <^ /«с? лгчт mèàr'cj

I Lu' Р&Ш 1£с>я70

l_'TEjT .

ii

DÉTAIL DU JOINT DES ARCS

"TrHür"'-

!L---

TP

ii

_.A

AJ

=Urv

Ż-

JÔ7J

PASSERELLE POUR LE CHEMIN DE LA BELLE-CROIX

LIGNE DE PROVINS A ESTERNAV

_-ÎL--

4—

----Ц

----i-~

---

-f----L-l

---ЭДла___

__65o_

--*--

ЗШбмПОГ

<?L

------L,5oci___

--—r —t*

7Jla£àOgff

----:r—

tes

1Ш4

/ r-ture a» ooie

’:^^&ШШШЯЙВёЁЁЁ

TîcncU /2 y pS ćUb mjćr* 7**tećnfcn 6 couples rofbcte /ô /m

Ttäia'06,/d

’4 •

\,ï

TfWnfr'Ta

if

F+-

-4-543

r+4

VVJ

I _-ййа_ i _Mo

.N

’t

Voile

Tl

2,7;-

УЛ

!| i!;! ü:|

I

L|j!_4

il I

m-

fî if

il i i ii I si

iii

Mi

RLatfààxH

li

III

1 5,120 V

4_J‘

ÉLÉVATION I

-p~ J4,55b

ry

SL..

ri

L-----'

'!'! ilil *'•'

i t! t fl !

i ? m iiiii

____ilTP__

"if¹

; к

li

I I :

II! ï , ,м

l+f

I

Il llll

4-

COUPE TRAN5VXRSALE --1

_____I-ÎL---

ÇUSsL

У/

-4L

,Æ_

-3

Ш1

L - -4iO.---J

Plaute ôOg N

DIAGRAMME

-2.

.3.

K—

e-

.5.

DETAIL m la COUPE ГК ANSVER SALE

_______-y/jBètoMLjfaJra&L —__Jjÿ'd,*, /У!ШУ<ИЯЫ- _____

“ '    ~    ZTOQ    ~ — T—    -    ^ I

ÉiÉêL

4 4.50

/⁷

JEntreÙ0 A

DIAGRAMME

МЖШЖ,

ЙИ

дОд-

J«

7-

_4tû_ _

11

4o*a#

Vcdle

7/,.

czx

Rvrult da /tf'Vn. Honda <US7n ____ l,5t>o___,___

___Y

DEMI COUPE TRANSVERSALE A LA RETOMBEE

PONT sux LE CERS

lmp. MON$CQ. . parjs

-

'

*

(

■

-

.

i

'

I

-

ÉLÉVATION

COUPE LONGITUDINALE

j—T_

COUPE,

i transversale

COUPE TRANSVERSALE

COUPE LONGITUDINALE

.„1

SI

Фц-i

"T ‘

W/,

W//Ä

f5\.oo

<27

V/,

V/,

i!

-4-——■2d5’Ä-__L _j_лл-____L-

PI

IL

___l____ОАО___

JJ.

PONT AQUEDUC DE L'OUED-KLEBA

A MA55ÉNA - ALGÉRIE

At*

f;

'é

PLAN - VUÎj, DE DESSU5

Ferlde $c»ï9

4.5

JJ

Г“"

PLAN - VUE -DE DEBÉOU^-

l®li 11 !I®1

7*

GOUPE HORIZONTALE

C(ANAUX DU UHÈLIFF

§ VUE DE DESSUS

шшшшт

_A5£05.

<22

PLAN

RETOMBÉE DUR LES APPUIS

ÉLÉVATION

GOURE TRAMGVER^g.

—-n

I r-

_ о 5605_

_ Oj/iû6_ _

k-

__o%__

fir T de 60 X 39* 4,5

o? F

__,0,25

•H

6-

_L__

Traverses, de lm.oe de large lous lep lûOjn.

Al5û_

<p.

fin dc 6’ I espaces dt

E(iOUT« DE MAI^O’S CARREE .ALGÉRIE

TETE^AVAL DE L'EQOUT COLLECTEUR

^EC^TION DE^ ÉGOUTS ^EGONDAIRE^ élévation

COUPE £

Tirs de Ll

g.--

o.ob\

е1/РаСе-^4£

0.04

- -А —

*!

к----'-*1*----H

rt

W///Æ

-л

To5o'

VA

JJfA

*90

BACHEES DU HAMIZ

>!--

COUPE HORIZONS

VUE DE DESSUS

‘g

o‘

фП-к-sJS—

__iQO_ __

02J.

/‘&-Ç _

Mtr

*£»_}

-A$<L__

Tîpndp

Hile

D|

!B

i.f

Chain

2'

•vj!

LÉT

S.

Л/г

Ulfe

wll

fl M

Lwç M

k--

TREILLl^ DU PLAFOND

5'

I -Л/А.1 J _o±o'_

*“.— 74---§4'**---:--

Г ГГ—'—4=...... ■ T

_A<l!_____j,. i

5ч---

Coupe Aß ! jcoupe CD

I*"“

____/

ZL-l

it---'£& —

COUPE LONGITUDINALE Щ

I

-ZZÎ I-ЕЕ

РИЧ

Г'А

!î1

! . fiends

i;

рА°'рШ, I ~»flonddc2l

!-—Ц°—----

Л.

' floriddelOm.

-Y

osT

ÉCOUTÉ FiVLNCïl’AUX

VUE DE PROFIL cjOUPE-TRANSVERSALE GROUPE-LONGITUDINALE

L\---T

штШ

АС

*%

9Щ

«О

м

-P-1É

£srp

•I

3i

I-

j—:_ä&—:_

floods dÀ Э{’%.

'r^flond Lx

Si

'*1

MAISON ÉGLUSJÈRE DE JOM AGE

CANAL DE DÉRIVATION.-FORCES MOTRICE# DU RHÔNE

/1

л i

СЬащЬтеЧ i

-r-

H»

b-

COUPE D’UM PILIER

__Ł

2g

5.So_

■N-, i

1 su

VUE DE PROFIL

Écjout Collecteur

COUPE T

■RjM^VER^

ALE

---ж

COUPE LONdlTUDINALE

'XutSlILf

СКлтЬгс

en

il

«f

lîà

Гт

i|‘!

!l

AX

/É

IJ

«i j!

; ч1

7.Г,TZ:»)

londsde û, ûoS \

ZLFkir"'""

8!

CROUPE DE LA POUTRE i Carrelacw

Пf®4.    |J

!«i!

öi I

trxilli^ d'Une poutre

é.....Г    j f“p j|f

тг/шш/л w^/ap/aW/M/ //Ж

Й y///X////r7/}ÿ/7.

CHAINAGE-PLjV'

____foalrc _ dc_ р/алЖг

ĘgHjdf 2$et\ •

pour cJiâTr-ctgrW

'“t

фЕМШЕЕ

RU ВА^#Ш jœ RAD OUB

A ALCjER

f!

__ IAC.6

ç So___

.i

■1

! *2!

тштЁшёжщж

±2Z

■;i

Mfiifajrij’iiiJ,

ÿsùktkcun J/oad de 2on%.

/о«дГ- О бе

Ff r de 6 У™

-i:

*•!

OsSL L

ooS

ma\

il.

*-&Ure <6*pfa/TcÂer

/___1

f¹

5a

гч

sr

hwin r J

»

.

■

.

-

; ;

'

-

'AA

/LE

'""’Pi

Ai

P£4---ей«----

failli

=■=j—    t--- = jj р'Щ;

[j

COUPE AU DROJT DU TROU D'HOMME

Êoetcis /àisa/ié leiàur d'un f силе

Г“Т"

::

rTi

CUVES REVÊTUES EN VERRE

RESERVOIR DE 31М?

ER BRIQUES ARMÉES

СОШ?Е AB

;,    }    . SI

jiCOUPË, ENRAYANT PU JrROU;;DTHOMME ii Ж

i i j j j- j.....I_____jj

h .......-41

i!

Il

i;

:■

=- —А---------ЧЧ------

—i.—--4-—'”.-/----?■■■■—j--

f ' : j ■ s

“4*=•=■»“==*=■ “-j----⁻--

:;    ; j ‘ i; i s

rlpŁłis -=.=4»----.= Ä =-= = --||i----- -

oâ.

Eimfrzr

IX

-t

I-

mm

DISP

OSlTI F DU

^----

«îi

öl

^MEMT dé verres

|д I

SXN

Ш

У/:

<V3

1-1

§&

Ajv

Щ£Ь/Ш/УШ/Ш

'matures transversales se romontunt de 0-20ел/псиел/к.

dans /es petrcfS isertica/es

7/7

l;

PLAN T)U HOURDIß DU "PLAFOND

RÉSERVOIR DE 30 Ml

COUPE

If

il

o-So___

RÉSERVOIR

SUR PYLONE

JL

77/,

WAs

K-

-4

-мг i i i шг

~H~r I UZTI

-UL Ш — 344 _ .1*0

J    f- ^.,3^

X

EEZJ

XX

-f

II $!

Ж

ï^q. a°l Æ-J-

-,с^Ц-4ц

iriE

jpcènijb t/c

_Û.£C

■i

II

i]

PLAN

I -%

i *3

l-4-=

■inmnüi

PLAN

>..4

PTTZTL

ф?4А-~-

».

pi-jf-i'j-L

Ev

JÂL___

Tn/re/oises

-Л

PL,

§u~1

__î__

II

■:

JL

ii

::

-Z9IL-

i.

i¹

AA

-4 -

I ii¹!

o.<?5

il

-t-

_A_.

•: / a

=t

ii

\A

-l

II

I¹

Ij

II

il

ij

i;

i l¹

A-

✓LA,

i:

/de A x4,

У eie2,0xG

L.-'/*

J/a.

/3______W-& —

.Еле/л itde/6"У*.

.Crêpé dtK”/^

Н-г

i ОЛЗ,

oc5

JL._

' vl

Г"

-+ i

—Чр ч

-+

!!• '

ïf f

!i

- |a

II

■i

i _ ШтЬ Сп(еасис/щ__ '/ ~ TreUii mctil/escie\p./0    |    —г

PILASTRES

VUE EEUEë5U5

A-%

Oil

QOUPB Ç2? /--Ą

/У-К

ij

0.0Ô

Ii

>Mp

- &зг---- «ji3

--- луо----

У//А7АУ//АаАААААА7/ААААУА,

Si

m~t

Ш%А

/ _ Ado. _ u,__Ш__4^-__loa_ L

CUVE3 A HUILE,

COUPE LONGITUDINALE,

"и ""и

Ш™|

-к

4L--«"

COUPE SUR

LA FOSSE DE DÉCANTATION

______

Nt f’puu du /<j/

Wm

-Л

M»

____ UL___

-A---

АШШЖ

/Ae

fbtuji ctu caniveau _^ _

7/ ■

•i    i¹ ii ‘ J! ■ |i I!'    ■;!

kfc-_ — -:"-4F~-~— ~5-^i —- ——- .-=.=.•^ryS.r-jrŁ-a.-Ł^ fc bSŁŁ-S^jt.TA-J*.“^ -r’-~ i

! ii i: -i ’ L • ij ii S ■

i-i sis : •*    [

frj~n

Щ-~/-4.

iHXf

y/z

-J

il

■:

Ą \----

__271/L___

GOUPE LONGITUDINALE

!!

L    "    'Lie

i' ii 1| ii \ ' \ y

IP'tttНт°~рН”°p""" 1H t i

gg4 »    j    11 1

JJ

;

.

.

-

" ■

°'7

0,1., -4з,а4.>

Ecuries

_3o2_

М;

«7°

*__M__Jîr£Z3j=ü^-

-łlf

25«L

o.yôj]

i.7⁵i

ff

0.7 ât

•4

■4

ud

0.78

id

PLAN D'ENSEMBLE

'S

175 Ißi : *Э

■

0.781

4Й

. А

Magasins 1,7 51 °

к⁰⁰

kl

Mur d rn crinde

L>4__t_ _4"2_

—f-ХЧ-

J, sä^ i

АЙ

ffi

Г»

фг

0.835

сил

+L

wr*

М1Л

■a

I < INI 1. VII ON g - IM..\.\( III ER g

MUR$ DU MACHIN MUR D'ENCEINTE

Inffcnieiir-Coibfiructeiir'M:° PIKE Tl'Y

W//7///ä

'УУУУУУУУЛ

7УУУУ/УУ 7777%.

/у/////////////

VÙ

____Ii5n_

.3

-ДМ,

.Jt 4

~ 'aR-

1-

I-o

ф-

411

Ч~

d!

A, A

Je-----D./b---.>1

ii

•i

z~rr

ШЯЯШАшштх

— JjU---

fondation du MUR. CD

"У/Ууу T

■o!

§A

Xi

Il

1!

^==-^=|j=====r.---

ИГ"””'

il

чХ

il

*X---

II

Hi--—!r--

IV

ii

i! ■

£±р—-г^——-г-- _rXz. Г-Гтгт—_Г

;i

i!

%==

wÿr

:'i

---S—P

———фиалке^

=н=н*

i!

t-

—si*

«Н*

н*

7/

|j-—    —-Г = a-^rrr-T ~J|

ii

li

II

Xi?=г---Нр —Х-м^-

...1    . i«. ..i. i

ЩШ

---оД5____

Il

ША

“=ï*

ii

pRTTi

LXJLJLJ

Xs

УУУУ/УУ/

*---0Ь5_ _

|gpÉf

"A

-ч

IA

FONDATION/ sur MAUVAIS terrain

u.

....................

утууууууууууууууушШшшууууууЩу,

У/.

Va

F ONDATIOM du MUR АБ

.FONDATION DE/ É CURIE^

k---- — j,ai

FONDATION/ /OU/ COLONNE/

->i

1>0

FONDATION/ DES' MUR/ AÉ et CE

V/y

'DETAIL DF LA POUTRE 2№1

///y/y///VĄ

ул 5

Ш%1

{////&

fu

0./З

Li

,т

•fi

АР"

pii

Uf :: |x. k|0ł: ;i

Ai! ,

pxi

±0Л

«

4J

_ _ ±UJL__

ГТ

__2,01.__!

4_____Petit CAässib_

i I

*----*HW<k___l-oo__

!ю

^---1-r —

„ Д38 t

- ₍o.5o

).. *.o.3o

tQ.3o

, -<.o.3o

r---

____UJ_____

___Grany/ (YkäUCs___

__1- 1Ł__

---T

G.

"O

JsIF

DETAIL DE LA POU TRI c2 •

DÉTAIL DE LA POUTRELLE N-3

IÜÉ

ЩШГ.

“⁷ T '

Ł —    '-'J ' У\ - ~

lii

ai

i:

ШЩ

mm

Xplr;-f-F-

аЕГСй

Éj

It

У/УУу/.

ЯШ ûisi

__I-iii.

Ж-

__Ш

—j4łL

~~ТП

--IAI1LV---R3___,^0.25^

/о-LO-l 0.-45 _i__

К----l— ■

___4M___

»i®

да

I__i.

I

--Ln _

PLAM.

PLANCHER de COUR

ЪАЩ UNE dOKSTRliqUON INDUSTRIELLE 1

COUPE TRANSVERSALE DES POl № 5

DÉTAIL DE LA POUTRELLE ff5

LfZeif'LCÂatSi^i

о>Г U I

: i J 2 J M' wl Й 4

A

AT

7У7777/

УУУУУУ^

ы.

4й

i⁵'¹

__vil

COUPE D'UN GRAND C[HA//i/ Suivant ab

ULijj_ ___JJ3__b_4iOLlt_ .

__U1__\

DETAIL DE LA POUTRÎ

L--

U^oJ_0A»M--,»A7_ Jojc^_____u7_____aio 1

k--------— ___3^.o________;___    ^    ^

DÉTAIL DE LA POUTRE № 7

A4» _

'/ĄvX‘,

k--------^

PILIER^ F

41

7\%

УУ//.УУ⁷--.

TL

2.53

iTL«-___j

L«4

1,42

H ■?**=»

COUPE D’UN CRAND CHASSIS Suivant cd

DÉTAIL DE LA POUTRE №6

ЦЖ ■

<=»=*=Ь: *3 I

I -■ ч ¹

—LŁL± V----^---4-

____2.00 _

---I— <bJ« 1

DÉTAIL DE LA POUTRE № 8

Iippil 1 il|!iIJ

-■ J ■    ——

______

COUPÉ D’UN PETIT CHAS/lS SUIVANT. EF

■И—г~хщ§

--1А1Ц-

Berger et GuiHemee CJJSBJSJSTT A /i А/ /Ć — Л^'Т Uunod Edit SUD

Planche Ш

%

»

■

\

'

%-

,25 O.JO 25 '"Tt—T—I*⁻ —

т7тШщ> + 11 ⁷

-_Ai5___

___LS?

» . ю|

'M----4-'^

AV

-À-

Ji.

'h

//>

L--aü_4 -

4-4

3jio_

ЗА®..

_i

F—ь®_ 4

/А

<7

PONTS. - passerelle y>.

ELEVATION

---iV-----LA-----^⁵— T----^yJ-A

PONT DROIT POUR LE PASSAGE SUTffilEUR D'UN ÇHEMIN VICINAL

DEMIE-COUPE LONGITUDINALE

Ingénieur-Conetrueteur : MT-PIKE T T У

Sc___

2/25

— -Æ

il!

__J15__

---AL-

— I 4L------A.j4____J_; 35 < .

--4£p-----L- I---

---1--h|_

____AJ5____

___i,5o___

46o _j I

-'“^5

-1

Ai

T

— Ö77---

u_

5.20

5JŁ

{//

:£

____-y«___

II

if

о,

Г 007

*4' ₊

L.

fyf/r/r/rhzzyftr/złm

>|- JA«-4

_-i_44®__

_r-

"iS

----0|---J -

_8.o75

wi

:Jj>i

V-

ki

Coupe horizontale ab

•m

oag_

--i--------ŁLo----_    4,

¥à—ffl

■L

Ö

, ,    -, IT

L----------ii.:—Si—1_. J_________i_Nr

*    HU

Ui

M_?A7A_4ą^.._

____Li '

!U

It-4-344—f I if-

TU

li

li

•i

plan Supérieur

FONT DROIT avec POUTRES de K1VE$ FORMANT GARDE-CORPS

ÉLÉVATION

3.25

1=1

K)¹

■si

11 m—-xVrrrffli-L

Ö i    le- —

öl I    r

t⁻1

___

----£

*- - ■    -V Fît'-;} r ÉS1-

fl i 11

14

fb---

к---

^ 1 jAktoł-jr.—

__«}_■_. 4i __X— J¹

T! f ;y

I IpFi

; Ü--!—^

l

k-

ii

ii

rTl

___4i5___

__45 o____

---qIh

---«-

LVlvuA

___Entre fl.etrrfe-eor/»S ArE°.__

___________JA°___

JZ-Sl: r    tSą tj-JT⁼~    ' -W*»

_____

__li Qi ____

___4!Z»__

--V

demie Coupe transversale Sur l'axe

-t

080

-t~-

4>

Г>х

SA

~ t—9 го —1

Femelle бune Col onne

__4a°__

__Ала__

ЩШmI

_ L(9o

идиш.

3|3o

— V-

УА

av

0.G0

ol

Oj

■faCe d’une Culée

RENFORCEMENT EN BETONARME D UN PONT MÉTALLIQUE

ÉLÉVATION

■JA

'ém

ъ-'Ш

Coupe transversale

_ _J4-i3L §1

----•!

_ ДД2___

-с---7-

--514__________§.Jâ_8

0.25

fb i

Il I

-T

|____5J>4___

fntiTriftnrntmfrrmnip^^

“PLATT ^UpÉrîŒUR

^ PLAN    LE H OURDIR

йай______j[

T3

i 00,

TSElR

г.

i-él

II

il

"si---

A _o.83.

_Entre Garde-Corps j.go_

___2.3/___

—f—

к— Pii _4

4-°H

ШЩЩ

■щ

ligature T " Jj;

KL-r-a; ;«_3/ À

Coupe Cuivant«*^

U------!i2a_____*__

____L2o__

//////A

CondrucUon и

W7/I

tv fl le

51

T7f7Tfo

II

M

044

DEMIE-COUPE TRANSVERSALE DU TABLIER

COUPE TRANSVERSALE beÆNTRETOIFEF

L51

un

Ф,

1.35

'i

V.

•V

i-f

___MS

---t

L 4 j -«i«

III-

Ш'

T"*

i 2¹

tQ

ШШщ_____

Щ-Ш- -

---*r

Js

___L2o_

r^²-F—

-£-Щ

F°42_^_4

г.----"тГ-Г-ТУ

---C-^²-4

o!5_ ^__

__1,125___

-----ï

PLATE LAGE EN BETON ARMÉ D UN PONT METALLIQUE

TABLIER EN BETON ARMÉ POUR PONT-ROUTE

БЕШЕ COULE TRANSVERSALE DLT TABLIfclc \é— ---fi-M_____.____Chaussée Z,5o_______J__ ^

Coupe ef

COUPE CD

ELEVATION

DEMIE c OUPE H OR 12 OKTALE ßUIYAKT AB

ТГЯ1

^тШШШ

PLAM

литр

тт--

-li-----4__

_____

/ты

ĘP

,-³⁵-t_________RV

^    r-Béton

a-

o!

?!

<__mĄc^mzrj ucu

'    lĄjtoutt____|0|. . __

■Щ

__4?li-

I T

///^//77//y Ą

4|

°l

j-b

155

g! T’ÇLfffiV-'T®

z<i z:.

xc

Л-

li

уишжи

8.10

-4-

Лerу <н' at GuiU^f'rrt* .

-Yv-e Dunod-Editeur

Imp. MON^CQ. . Paris

it.

4*

\

- g

v;

il

DT

ÏÏ

i:

.и

:i

lu

ELEVATLON COTE AMONT

-DĄL--

VUE PAR DEÉÉU^

"TTT!~ Г?

y :: j

II

*'У

ШШШ

LE cjARDE-CfORP/ENLEVE

PONT EN ARC CREUX

ÏEÊ

:_т.'т=Г

.i.

ммшш

COUPEjÉUR L'AXEDELACjHAU^ÉE

[-ПТГПТIIIUIIII )W

4=

Dp

• 1?;г‘• ¹

II

"Г

PLAlR

у/

q-

Lia

frT^T

II

Tf

!!•

il

É~i    —il—-■■ —

LŁ TROTTOIR ET -LA CHAUSSÉE. ENLEVES'

'L

//f

4ГТ7.

-R?

rgi ; П

4 j i >'    ■ •

4/

LE TABLIER ENLEVE,

COUPES'

фиге/UR LE TROTTOIR

&

COUPE LONGITUDINALE ^UIVANT L AXA DU PONT

---e- -ЗД45- -зц- ,—2j /,3 *, jl,iAA j4 __ 2,t4o -*j_

-i 111 i n: iliT ПпШштттш

-WJ¹

ST

ii

I'I

l ?::::

1Ч

;■

ei

1Ш

-»^ko.3ô j

4--

Й.

ÉLÉVATION D'UNE PILE

f“⁴

ab j Suivant cd

—L---£&-w i

L.

mm

/Л®, -läiSi--US—»

r—

•T; A

¹ _v! ЩV;:

SI

■ ‘T.-

,oÿ

Hü

'O

r

. —ГГ, ~ -Г-É

34 ™

di

«ï

; V,

Cf

__fir/ée de l ’ягс '^Л,5о____

______rzr-^ÿiAÎS---

_ __ Sunu oie la.: culée àl’axe de [a fille 15,oo __

ЛToUsa ante

_ J&disgmee___ _

Аф'

al

•*1

"LЯШ

Шт. к

\ f

__..__Ibqwj'tu.i •a^lxAi ïl /Д '^2 ----

й - î|_1---TLaxe aiii-OJcà- {Ь£.рйе*Лв&га—

AST

Pii5

R---*^5.---jj

\-SłAŁ

дсяьцк-дя    Tu

|^.^₎2СрД

:A

vj

‘ L

<25 Ы

гГИ

vN

AL

т;

21

Ä// >

-y

:oil5

JJ 5___

ssää

ТТЛ III-

p г-

Comten

TT

..

■■

fe

ir

А=*и-Е-гфe-_"4t-U- ml

JL

DETAIL DE LA COUPE LONG¹^

4P,

+C5-f

4,

f,

Uvoa--4

V/,

mmmm

±±

Silage Ц

.Lui i.,i.

UJ

LJ

ir^i----4|3------

I-Я

ЯРЕ* ä|

мШ

ЯШ- "I «I ИЙ»-' dl S

Mai

si i

DETAIL DE A PILE - CULÉE

LM /тех

L    У £i?o _i«45*

J---«iä- __ł

-jr¹'

i--9-Щ— JLA3/jfc

PONT EN AUC DE 20M DE PORTEE ET 4M50 DE PLÈCjHE

TTReTFfP

pour Charrtot DE 8 TONNER

CjoUPE^

PONT EN BOW-^TKING,

ÉLÉVATION D ' ENSEMBLE

COUPE/ TRAM

^UR L'AXE

IÉVER^ALE

DUPONT

i.

LL_|

t—-w—

L b~

--T-

gg

1^31

[Г;

ЩШЖ

A-al A

Ууу/У/

LLuiT

---2Ulü_

—jjâu-----M. _

---UÖJÖ_____Jaû

T?

\ *Rail setter

mmmm

DETAILS

ГТ

l—«

{*.ft5a_,,jLa^»ii..-------süjû __

.НИ—VQ

A —v-j,,:    : :r-_:

ГТ

i.

лДа.

-inbQ-jj.

! N ,

кад

k-

_A&il---,LOf____зДл__

<ED_i,ß<re

:f

TCZr

Jûjc---IÖ.0--^20Jt _ J.au___

ELEVATI ON

■ffa-*/ <gç<r/- I /formant ent fr.--”.-

лгА>*'л<?

ТГТ

ItSdj

y//.

тИ

Ш.

si

___ÖDU---

-—4

si

.Lv

140.33

4f-

-Luj i

».------3,45 LX--------

i ¹

°-7Д — ^-----2Дл_ _|------oyce.

Ł3S1

<-

ji

-t

ЬЧг—

___—И/Ла__j

•A

il :!! il ni

1.1

-i

il ü Ü

-i

I    I    I    I    K'    ¹    «ghMjgfo

-S-¹⁰---*- —Vq---* — сЗ.тп _ _j[--3,to--^ — здо----i----Заа---i--Здо__^____3j<e

-------- ------Tl cux:e-44U xsæ&^ <zkre арулшг^Ь в <l_______________^ ^

---ûfLjjxi^ ails z/<4l d&s’ji ilß<r-2/hLü~_ ___

<■---

ÉLÉVATION

C(OUPE LONGITUDINALE

>A&L,

IAcnL.

3 prefer et Çlu lier me. CIMENT ARMÉ ~ V-eDunod. Editeur

Planche ХХУШ

■

\

ф

%3-->

Ц-

OjO

7У//УУ/л

'r—-Л&—-. к--------

__1__a™.___

J)

N. >

\\

PONT À TRAVÉES SUCCESSIVES INDÉPENDANTES AVEC PILES EN BRIQUES ARMÉES.

GÜUPE TRANSVERSALE

____________________

__________^ Loa_________—-

UT

Śilśc______id__

____IM _

____JJŁ__

---f-—----

txxltll;

'-/À

’Jatte'

-A

_JL

f'

ETC

"iC

ÉLÉVATION

-4~

o.Jç

----+

m

t==

JP-Ä5___J

L IH2 zl :. '_.

; iJZ

* I I ["" » ' * ~т~ N

|г--~

5,

«I

г*

Wk

Jalte

Jl-

ARMATURE D'UNE DALLE

~"t"

PLAN. D’UNE PILE

11}__JM__

y__(L 5i?—_*< .

lt<^^ Hj

T-

AzffcL

j/а

-am—

^ Xk.    _4~" ^г:

.1

____/32.

pz

~r* i.....

zn:

/7777/

ELEVATION

—4f---'4?--i _ &> _ _i_ _j?£_    к_#£_,И€_*й jjL+iLjMjêd

____2’Se.___

___i. /0.00

COUPE LONGITUDINALE

---Ą

zif-Lir

«ÿ 1 S !

__5- — — — __(&£°____

______ r

>*frf >

passerelle

PLAN

____ISUL°______

__:__iê.o/L--

WF

si

'/Z"

\\*Ымщя

COUPE AU DROIT d'unlPILE

ÉE=3

;⁻

Xffl-S <fe| Couraiflt^ /// Passer eaux

Ç -^4

! S+-MU

_/О-оо____

__/42

-Ł~ I

i

~Ln

_5-86_

+Ą

51

__i_x

zrx:

nrpiiz

"i

T³—

ira

xr

T-

49 I ®OI

3!

k-

У/УУУУУ/У'/УУУУ'/УУУУУУ'/УУ^

Moo

jĄ-OO— _■_

_ U-OJL__

.J.l

Г%7'/'Л

\ Jatte

i.

Jf I

ELEVATION D’ENSEMBLE

/777/77'

4l

2?l

jyty____

I-

/у

7y.

-    fljfnzrrrnririlPr: Afo- p-jjE-n-ir-rr тт-пг -n- tr

..........--..Tl......hX

Г1ПГТ1ПППТ

t/Wo_

COUPE SUIVANT âb

'~ЛК~

---A-

'"T±±j

-Il—IL    J;_______

"N

ML0ŚL

"!

PLAN D’ENSEMBLE

V'

i~zr-Tjxzzzy-

3!

K-

'I

'//УУ/УУУУУУУУХУУУУУУГУУУУУУЛ&

g;

łctn

ЙР

CL «

—i~r

£=ï

«ol

:■ ■ .

ШГШ

IZL^LL

»Atólr

TtNtEü

T42S_ 14L_4

’-.J-

APPONTEMENT

SEMELLE DES POTEAUX 1

PLAN - HOUR DIS» ENLEVÉ

‘--м,---

yw. !°°

_let.

\i

\r

“T“*»

COUPE

MM

COUPE

BUREAU TRANSPORTABLE

“ «C?

R7

ЭДгН

f|L. -Ф«-

_ 4W>.₊, / i- <£«- > IL-W«. î

5

>*

:■

'ууууууууУууу:;yy/yÿ'W/y'/'/V/yj Ц ^

l?'. * ^

1|

liWi

к---ь

777'

dh

____ts

%-

M*

AÖ T

Tejiće ooo5

&£о.

vwmW7x Wn

1Ж.е£*Ш. eJ'du !&Ä.lj|.üfeib .Dr Ше—— Sr—X

1É!

Iff-¹

:L§|

fl

-аЗсо—1с

кл

\

-4

-т

(jouitiéres

Gouttière

ПГГ

7er U I

I-

Ai

PLAN

; 'ос5

Fer d U

IâU

i_ i/£_

f- ZA

»-

U6—\JKi

t-

1-16. - J ÜL»

•S

•DÉTAILS

FOTEAUX POUTRES PRINC¹*-⁵-⁶ POUTRELLES.

T

loi

«ni

г.Зо

1?

51

*5?

AT 2

•3

-2,

----

=#ni

• -к —

T.

<La

!!

L-Æiô

SEMELLE FOTEAUX 2’*

5¹

_A_ ;

ÂJtL

J.B_

:_y

l-L

--->

Г-L

____i»«___

'LTä/ÄLT

-6-ee_

}JÆ V

COUPE LONGITUDINALE

iü

jj--Oj£o— 4c    * i

PQUTTÆ PRINCIPALE H

__ÿ

i ffrcoue&r en П

Porte à faux JJ le

Al 61 '    , ^

VUE CO TE DE LA FENÊTRE ypj^le_

У Лги

JH

5!

N----Щ—}-

----•>

VUE COTÉ de LA'PORTE

»“S

*Л

22T,³

r-

-Д____

L-___pjo_\_l t

Cornière formant seuil

y.

o.oS'.

MyiÀa/uJIs

LU —

- ł----

: Axe___

"r* ^(juichel

i *■

li

.m

COUPE SUIVANT AB

-----t-

У)

fi

УУУУ-

U!

/.

JO

ên pbrSrd/Miy----

pi OURDIS

-hL-^t-â.

en porte a jccujc

Ш.А

Lvc-k

POUTRELLES!

dos

PLAŃ-

5

QOUPEAB !

Ara U

1 ~szv°~

«I

Q|

,±

FLAN

__«

T Jfclfe :

т&шя

<0.06

ft

Si

o.â5> ^---— Si?_

“ГГ

moS-

ià

1er à V /

Aj

7d

S

„f.

COUPE C D A TRAVERS LE GUICHET

TR

L>?_

• ■z

WL

R----ß^-L-4

vt.

Гепкге

ÏI

3e raer et Quitter.

. CIMENT ~Ж1Ш1Г- VöDunod.Kditeul-

lmp. mTQ- - Paris

Planche XXIX

1

%

;

/

-

.

'

-Ч-

II

Eg

PONT DROIT A TROIS TRAVEE $

pour passage Supérieur run chemin vicinal

впшп

V,

H- -a-ôT^i

(h

\~Ąib

----rX

iA---âASL--

_v»«—4

I rt-ÜR-Û

aL-

-SÆ5

_ _> (3! «----3.85----

fr-----^---4

i-i

I

L--—4

XX

4-ДДо- .4.

A-V

*A

ELEVATION

C|0UPE HORIZONTALE AB

--— _ -,---З-З^Ь- _

___3,8x5 _»__

PLAN SUPERIEUR

—л------

__

t-Ш

Li

5uj ‘ 4p

I i»5£r ’ ¹

^ 4

'“Г

«--х5о_->

„i

---ä-----

rH j

-IsT-i

-Ж

u 4<—

J3

—f

R“

— SU3&________.ye&L:

rff

i-i I

jUJ

lD3N--5jg

mr----0<r^----TW

C<OUPE LONGITUDINALE ^UR L'AXE I EA^E D’UNE COULEE

у/У'/'/уУУ;

ушу.

—-х-т-

‘"t

“TT

Г........... !

U--470-—->

*-f-    +_ -—

i I |<___

-x

--Sjia.------> =

--2,5x1 ----*2§E

■Щ/Жу/уЩу/Ш/Л

— —4,00---:--

-ад5_ _ —

--2,001

c--J.ssi. •_ ^

.â.

ШМ

ï.

_3.5s__ ___,

rftfioi 4-230____ 0.Ö0-; _

HP ШШ

cfO UPE TRANSVERSALE

V/лШ/у

7Ул

Шшш

4<M«L---■*>№--------4------оД5. - -<

у/.

|c - -flL&g—-4

f. o,S5o—

-Д74

-a,'T

b25 r>m-

PONTX et viaduc!

;    Ingénieur : M - HARE L

Ingénieur en chef des Ponts цЬаи^^ее^ ie uSarthe ûniflruoleus'■'M^F.PIKEjT TY

m la

NOE •

ELARGISSEMENT du PONT ю. PONTLIEUE » l-HUISNE - VILLE

DU

MANS

h-

Zjlh--

-■ -i--i,. .L

Ä.

a3o-

— 4---    ___^__3,52 —    --2ИЗ-----f —

— _Ł8o

=T4

_3.20-

Li

T-j~*

—2jaü__

- if-

_‘2bi3__

Мшйт

==•- -

--y--2a>Ł _:    ^ _ х,оЛ_ __    --2,oi--* _ _ła3---

=LZTI 13—

Ii! liii

---

-2Л0__

■'

to

ELEVATION

-ftOO-

---*e

-    dOUPE£ TRAN^VER^ALE^

/й? UNE PILE    _    ßUR UNE VOUTE

Bî

■t

W/

y//.

bo

(Л

ELEVATION DU

ł—

CLAUDE - C^ORP^

ET

«1

DE^ TYMPANE

1,015 ~___/

=m

—4

MAN-GOURARTE

au milieu de Gradue voûte

i pNc

j A^EMBLAĄE

--3£&___

НЕ 1Л

- dOUPE LONGITUDINALE deG voûtée

9^°—>

23b

XL2254- _

i.

---1.ÎUÛ4V

E-

_3L5o.

ШЗ T

Кл

lii

-É-0.90

-fc-

tetSSÉ

LtË

ŁU>5xi_

МЖ/////Ш.

— 1400—

Ee*ite._

<te-40&Ą

-jjjOo

-4 —ojŁoo_ i J

-r—

-A

.-=4

Г/

/V

/V /

Àr /

/ÆJ‘/ ENSEMBLE

W / d'ume Gondole

Go UPE £UR

<0UPE L ONGI TUDIRALE DU фЙШЕ - d ORP^ UN. MONTANT

■—■1

'яг

г-4

j?<

0Д15—>

0,225 j —0,0

-4

,3sr;Jk3r

------4-s+lo—Ь

_____o^ob-__

'I MII

]01 n 11111

L-----1,015--

-i

о57_.

-2Z0|.C

Шаттфвв¹^ •——=A-

ÉlÉVATIO|D'ENSEMBLE

f:

- lu

⁼T

шшш

mmmm

5-1-51

* «I «    ..-w Ж.    I',

уу^ууу^УУ^УУ/у/у11^у^уТ1иуУу^ууу^уу!иу^ЖУ/^/2УлУ^1

VIADUĆ ÉTROIT EN MAÇONNERIE ARMEE. (hrojłt)

wyyyyyr

—

i B ü й g н T avy

ууУ^У/УУууУУУ/УУ^УУГ/У'/У!^^''

1*.--

=4

?•

àmî I I

®®И|уТххЖЖУУ/УУУУУ'У^

___ I fint »irtaltcgriie 36,n

f i T.l '

-в-—- L

020,---

NN,

PJa20

[10,50.

*•

___3£о___

---«.aal__

К---LM--4

@'ТЙ

уУ^УУУЖЖУ'УЖУТ/УУУУУУУЕУр/^М

I----—.tLfiO-----4

i*. —2^0----;

i^too

byĄ

Ш1

Sesesrs

LL

41 Ч 4§ 13»

|РЧ"Т i

.4—

i*

Al

'Т

4/

PLAN D’ENSEMBLE

-A

i.s*

''L-

4 -2ДЙЛ_ 4- ŁÓ52-4

--A38R___^6.ł4

ф 1 [Ши.....1, fife

^,:    ■" Xlia— Ajpîr!L+

PLAN AU-D.E^'OITl DLIvoÙTLd EN BRIQUE^ JDAPté LA PARTE d IR CUL AIRE DE' 5 0 O M. DE. RAYON

ûi'2

4-

i.

-Ч.:

__ _f^acta-L

Н=|Хв®

-'1А

Aa '

\1)аШ en,bć.

ш'пъе'

-iBaÉHRÜiii

NU

/ A w

Wuxfjv ,u г“.¹'

(Щрё

kf- —

Tt

J IЩ7г

У/'/уУи^ ; !    I-,—i-..—-------+L® .......--------

а. д02__I,⁻*    ₍    L j JÉ

ELEVAT I ON DE LA &JLEE DE GAuGHEDU PONT STALLI QUE

/Ж

Й1

;_Т’ '

S:§

LjT.U

ni

в,-«

-=-----»-----i-э

W-%

^Ууу/ууЖ/У-V'y ’/àyyy'/    *n *<&>»■ ) ЩЩ/ШЬ-

ЗШЩ

DETAILDE

LA QOUPE TRAN ÖVE? AJB-^D

,3t

//

--4-

iii

.l/icirzbiß-

i=-i

/у/// /игу.

1.^__1£а>;шЫс__4

/У/'/у/У'/Уу tył

VA/'//// _L

^T^T.VrT^

н,---

Goupe tranGy^ ab.Gd

V---Ł44---4

---4Ä>---

GOUPE TRANiVi? EF

J-«

---*

/»(’/Y/PU rP GuNtar'me _

_ V^Duno d .Editeur

т

.

RÉSERVOIRS

Jnyênœur vMIBOUSSIRON £n/repreneur i M- ÛRANJE -L 'PoST

RÉSERVOIRS ACCOUPLÉS м IOOOM?

IVILLE DE LA MADELEINE

74

J ЙЁЮЁ

-4

«g

Г",

\i<oy/.amàpCs/*spZea

/Л

d>K:

-_.j

\.

a*

7 '** /Л! \ У/л

f|p-y

/\ÿj:агЫ\

LAl4.0CO__:|

its

\\

\ЖА

! '/■ Ж%

!    /    лч

T¹#:¹

тул

.tr

_.ÏL

RR

К; м

Isis

i*

•I '

'I

YŹ

VA

---!--UCŹ

bai я aaX\ Ußoo

tuyau formant s ; p/la

- JD

ij «ri

i«

tuyau, formant

4\

va

■25iia^i>o^:;5o

;4

hs

ча

V"

tpin/yp fars p/toĘ I fhp.n m ft ancres dp z5 l - 4 <K- 4

II

II

PLAN- COUPE HORIZONTALE

PLAN. DE LA MAÇONNÉ RIE

I    COUPE AB

__В

; jImĄotU

=ж

^rfc; =

гшгяШгъ

cJiapcau en, tàia ga/ranta^a

t/vapoau Vb tola giUtaiusrr ^

x\/

: i ikt ! i ■

¹ I ■

pi___4p?4-.^

:i

fîcucte-ur au - dosons daZśol f/lto

/7'

v’/vy\y

YYYYYYYYYYYYY'ZYYY '

ту у Я'/'/Y*

jièo^ze

АЖ

I !

NB > ±щ

ïers rerulccU tj (5р.п4Л

AA

LÄ й___-

43

f—

' Diamètre içact -'>,/во $• S7L

—=^“1-‘^И0Й

Zers ry/idś.y*

ûv.

diasnoire

rt'L

Яг

ZYУ.

'MrtZ/Ł* ■/' Audi XY: Y^'/^Y /жрт

Ш~А

vast

I yhaùuiffe Lw.ifPr

7Г

Г-

.LII

«N

LÔGucl

L_i_

Ot*OÇ spypty

J Edi)___V__5lDû

AS

—--1-

--r*t

Fers ronds de S

Fers ronds de d^/m.

Firs rond* de &    /,

ï ronds de łĄ. armant le дои set

II¹

s-

Z ronds de /fa armant le go is$et

CUVES ACCOUPLEES

t“7

Fers ronds de S espacés do. fi о

JOINT bES FRETTESNN3

Boulons de /%    couvre -joi

' lr

\ i !

jJl_

^tëiuUoXd 3ï><!

k5u

•>

Лба

ГМ d* 00,10 .    ,

/jXlSXjC

Fdrd мпАе de 10

•-'r

_Ą5S_ _

_L_

44

t"

Ugatw'C

rand^da ff (j p.rnj

____ztsib ._ _

ff/'S

TA-

Son. 'S

Uv nas da Vtyp. nj

Y/

•A

y,

Pr’opriéte de M-J. a Ponteilla

noruts de ô(8p.m.J

’ roncU de&[вр.т)

—" -%

i li

й;

L    —...--

tbrs ronds do 12

ООО.

DES FRET TES DUPONT B0MK£ Lj.-jj,

Boulons <U tfi

^Zcouvfejoüilayo.S |^7 Г'_шщее/гу_ —i ~ i, j jj

Fers ronds de J2

L-Üa_t-So

!rl

7Щ

FLAN

DU POTEAU

*r+

Tens ronds de/fa

j!

-4-,

U-l

I JOINT' DE S PERS PLAT S №-T8-lf)

~ ^4---i ' ■ ■—

fiieàbxfi

d enduit 2 о

il

il

ls

IS

N/

~oÿb

IS

IrS

ßoutonada /в

■fl

%    Fers ronds de Jd

S ! i!

h-

PAROIS du RESERVOIR et des

VANNES

CHAMBRE,

X    V/ опдилси *

iotżiZa    !--

--

'/>

Л-8/SpM)

■8

coUpe

SUIVANT AB CD

•î

-8

ronds de /2 (Sp/nJ

JxpQ—

UÇ1

<2

----- 2.6$

УЛ

JEnduit t/armMr

XV,

-J

ronds rie ÿ(âp m.

__i

II

80a.

Fers ronds de/fi i Fers ronds dé/о] л

unie

Enduit 20

Ш.

7e/'s ronds de (f fSp.mJ

/7rrZronds d* /O

si

tf&'norid-H /Forg

-t-

ceinture an ters p

de y о xtS _V

ж*

y.

■anai Pal/ 1 parti,!

8« < 2

'y

ii

I

VYj\

ronds dêt? ronds de JZ/Sp-tnJ lE

mmmmmm

нТшШ

Шж

( dp oi.J

ronds de d (&f>. mj

ronds de d /'Bp. m j

~Ж/уу/.

i't

il

ronds

de d ( S /> i<n .J

Y/У/Г/

4Jj«T

iKâ tftoâda de Z S espaces t/a ’2.3 P

---2.q|sL-----fXL.----->4 -b

~Zplati <U Ь'Ожб

___Ł$0q__

-----f

ВД

P-'

<!

fit

ronds àa 8 (dp n\

ronds dr 12 ( S par m.J

-1

ronds (Ce d (dparm.J

'ronds de/2 /d/oarm^    j

Etriers Зол/    !

Xstrten# $Ost

k-44ô-4

rJ

** jj⁴

jj

ййа__

Ferneres do 2 6

f- i

JOINT DES ARMATURES DES PAROIS VERTICALES I

g _

л    ronds de J2/dpm J

thainaye - IVal i/t J0*11 j

GO|JPE

SULVANT. LL DIAMETRE ■

1Т-ГГ77Ж__7

/tiTC <y». /I/ dp fkr

Â-A- J _

---yi

. a So

: й;

шштшщ

■-

4-l-W

---Al

i-i

‘f—■>

ЙЙ

Ls--

----2,fg~

--2,

4Ф

Ül

■ï

!..

V/,

'ronds de /Z (dpm*.J

”T'

Ш№//М

4t

7(dp./nĄ

rro/bdnle8 {6p./n.)

I ronds <ü>

ro/vcU de 6S{ Bp/d -Sûoj

ronds de /2 fSp/nJ

PEAN

COUPE suivant ЕЕ

Berger et OuiiSu^ie • CIMENT ARMÉ    lRmod.Editeur

Imp. MOI CQ. - Paris

.

'

qi

Ci

*77777777777777771

te—

/1

^Eg-^ I —^==1'

.....т"Ит

îfl

mm

LÈà

SERVICE DES EAUX DE VERSAILLES

т«ГС

i. 30.0-4

'T

---L-ontfueuc J hć ™Л&Г§С\___

i'.....--I4-----

I¹

wm

COUPE SUIVANT AB CD

it . i—=

!?«

Ł-—rti-

il!

li

“J--4 iru-

—Ił4~

i r«

,_L.

-3760-—-i

COUPE LONGITUDINALE

PLAN

_C

-t

i!

Вт

I i~r i-T

âk!

D’ENSEMBLE

j Rond, de 7

fi

Honda d* i

toud Le pou

?/

f л*/-

urur

Pte>

i—

«H

-ffia

ГГ-т

I.

--LsmuedC. TUŹrictu-odil.ĆiL ^

й-----

j*

-RÉSERVOIR I)E 8oow

A G ARCHES

JetuUards de ùo,2 / A'°51J ■

Vj.

ШШШ'

]nçènieur - Cfnertrlecteur-MI BÛ.USSIRON

"ТГ

”~1Y”

—frY"-!! \

-------|-i-T----Ti'S------V,

---1

il—

!ii

W \W % si i ^^~frf'⁼⁼⁼r^=^-

Tjondo do 7. ,o parny 23-2 6

ШШШРшшт,

Rondo do 7. w par,n. N a50

V,

y\

Tf

П ; \\

ii u

!!

Lf

ij-i-lL

V. I i!

!!

---*—&---nt- -Sf-

—

-r~k-------i-----3?----4---25--

-------fartée- Jtftce- _j_ 33(L______Ll._____

___RnŹr.lcucM. 3ffó(L __ _

COUPE SUIVANT KL

h—“—1

ШМ

\J

y^Ą

-----« I

H4- )

I I <1

UH

ТП

fit

H4-

II

ai

M

im

-л

—±

^^PeuUtcvzcU de ZO»f Л °//l

PLAN DU: POTEAU

P.

Kg

4----------------------m

J'

_LG

77

ti

Li

peaiZlanuzo,: espacés dfMŚ» {i j

iw    j J I

4 Hands do /б'Л“/<5'

==-

îh'ii

JLiH

ARMATURĘ

ива

CCHBHKłRTS

1133

=1

//

*K»U.»lF3i£____

irtondsde rcr Ai 4 \ 2 Kenru t!e w JT ,

HonAs de "7 //оpar-/fh.J

>°''Л

zKcruù de //l Jl/°3Z

Hond de 3oN-

CO.UPE

Rond* do Ю №6

!L

-U

7Ыt/Ouur*entané act/oiaoJy,30

I Head de 3Ć>

I.

=R==-=—

N: ! C

'3.

/Л

g!

ДМ

PLAN

— -fr-----

Г-

ШсьНгУ-с6' (

aecouvrerndAu nujoird tVb

2 Ronde de /7 Ml R2

Hotxds de y eópaoóo de Z [

LorrnjUHu^i/dertcus'" 2

По

/'

/-

PLAN

|C Chavlhite L

i il!

u=

‘ailvz-гра: фк

------i -----'Ll-----i---1 longutp^ b 'iuje d$_ LeUÿke2l6?__

з ! J I ¹ ' I !

- x& * —-f t ~ з    Г Г-----ф----

•^|1 ГГ'Ц^

тЛк    \JL-r—i---zÆf,wf4,-|?Æ/j2-----А-

jrjj    . |1    i I j^- KondęjUjOop^

; Щ—

Т-Т

Hecouv

W/4/L    /

\Jumi au Joint d}^#

У/л

ЗУ,

4;

jddncjjd °28

---гЛопА da

Üi3

!!!

i___

- 5L#

0/

-f—A-i-------i

Ьр-Г-1

._._L

L!i

■U

Ronde dej(/opdPrrU “26

vyu-

iii

i!l

;. R-RdJpopar-n Ą LY "26

Rende de 7 /(Jarun //‘30

//

[Ronde de- /6 №3 _    J

ïjecouoromorvt au,joint apâ,

\.

//    Honda do t8№2. /

ji    HetcuoremOfd шз-joinp 0,(fy _

Ronda de vf jpar'm./llN ° 7

d' lonjuouo4 £0 • i

3 Rondo de 30 M°ô

aSl

A -

2 Hemu cle /б"'Ж4s2536

/Zr/r 3 //Cn/oJVdl

/.

_2j3JS_

'S

-.и

VA

VA

г-

i-

/'

11

iteCïîSr.’STnSîüTrS

s:ïsrsss;r.îsïsîlcsî=rs=3

⁴v

//

Rondo de 20 23-2

TŁeoouoremeeiS

acojoLno О.

-ffo -

cO

_ 2,5£_ _

—j- !i

__15л _ _

-i

'O-

⁴    iV''

de 7 popomJJd."2J

\.77

-L2JL.

\tj-i

ШЙ

Peton, de cuntiU:

O?

-iM.

Remis da d inter ca^re t * 2 J on

-F

ß a ton, do cùneRt Ronde do

RtntoeceUcï [o 2^00

m' P

‘■’25-

/1/

>-V

ÈJ

11

{;«

VF'

v\

cl

Л.

шштт

“Hi-----

il

COUPE SUIVANT ef

COUPE

SUrVANTgb.

>e/yeref G un

y

■

t

t

■

■

)

'

.

.

. '

nr*

PLANCHER

REVÊTEMENT

DE

DIGUE

Ingénieur - ConstrurAw/'-' MrBOUSSIRON Eittrepreneur ; M- Jj£MONNi£H

ÉCOLE RUE DES BRASSERIES .châlons y marne

PLANCHER DES CLASSES

RESERVOIR, de la MOUCHE . près lancres

EORÄN PROTECTEUR des INFILTRATIONS

7fôi

ШШШ

4? л

Ni--

dessus du mur de cligue

4 i!

__\

il

ж_Л

i.

Tf---!

LonfrUMir^tot,

LM

ïîlâ 5 I!

— н-----H

zŁ

cj 7 rends de 6'lto/tarmy

y///////////////777/yAw///У/1////////////Е?дУ//У/{////////

v/ßy/Jv//

ill

“"UT

Ys

'.U V

ii

.S........ . j.

__iatTc

ronde de d (ópas

l< f~(N:5J

4 i

i I -АД J

- — - -iß

i!

. I I : Iruji

r---

_ _ Cue _ —

////7 ДЦ /^//»yyyy^ATbyy/////7 S/r.'/r/S/TA

ronds de ć (ZOpmJ ^"/z^ronde doff

___б.ОП__:

’VT/Y/y/r/s/JS/e/ //7/

rdde)^ %, feop.mj

rends de ć?(2nr m. J

! if

i;

PLAN DE LA PARTIE INFÉRIEURE

rond, de g

Ш

IT

i-4-

ïj<—üs4?__

JL -+ -3.94i-

; *J

шутят.

7x1/.

-^4?

'рл?'/ il

—rLa^gai

-A—

тШЖТ/щШШт/УШу/тУШТщшш/Ш,

PLAN DU FLANCHER

DETAIL DU POITRAIL P

FondédoiS

si

:uu—/1

■>rùü de tz /./.f

‘/ЩфЯЯ7. ’i

fient'/larda dc/toz/X ronds de (?/Spar/nJ j ronds de d (g parnt ,J

d 'V* Ænfir'aoefe des    -L

й;

_t_

FeuiUsi, Ff i/o, Ъ l. 0.6

laf гропзвп âoes J^s /, < t/yaces deSo I”< —-—

I rond, de 28 t 6-.20

I ~-m N i ’    ’ i    i —:-r

*_шД F- -ZÄ- L ^4—il -ZJ- A- ^7— L -2â_    — L -2Ö — xh

____________________1. łfioźzj&e faded. 2ĄÓŻ2-----

—Ą.—L - -55_

--^7----

_kaJ.d/t5o

-T-

ШШ

FLAN DES ARMATURES SUPÉRIEURES

"longueur- ~d une ar/tiodura 2 mSo environ

+-

r-

|Щ

-4-

florid de id ^

trond did l • //,20

il

LM.

DÉTAILS DE LA SOLIVE S

—'До—

ronds do 1

lÿo

j lrond <Ui Ä l" tßo

~T~ 1

'ШШ. ШШШтШу

-je0O.rsar.fM.

■ii

i;ŁJ

i----4,-ДД--*-2г- 419.S49

!    ^__tajd<£. ù/ce. SSÜ.7-.— -а

ÜUiL

COUPE AB

'7/

ii

WÊ:-

V.

ftuxÜabrda de 3o* £l espace e de &,&/>

?r

-

'Sj

„LL-lNi-liUN-J

"Й:Щ±Н

___hćfcii&jtTTi

- - =j~f - = 4- : = ^==T

......

! F:—-----&>“---

Ri-

éb!l

-!c

ronds de 72

JC À

nnmstfc ZB i *6,20

J—+-J—^

— N----vi- ---1-

-4

--->

FaudlarcUSt! espaces de 0,/>0

«DÉTAILS DE LA SOLIVE EXTRÊME T

F/nuJlas-d 6jO,z -I-ąSo

iśetśel

!#-—^-00-----

'O

■Ц

^ i----[LI_P_5ö *—За.

Torf со Hire cnf/'è~lc rut ditpoidrdU et /4 nufi 2 ronds de f<7 l • 1/ 20

nd- de (FCppaspriJ faiu Ugnd de £.47* 2 I - O.âd

1ШШ

ттшМтшшж,

шш

vmv/

mucTje    *

ronds de (f

PU de Z =*£

ronds de 6 (20tpeu

NN

J ronds de S f/vparmj (2oparmJ

41

i II

urde

•J!

4a

i-

■«I

mm

_L

c.

ÉLÉVATION DE LA PARTIE INE*? - DÉ TAIL DE LA COUPE

EABTIE INFÉBIEURE

dorsus du paj'Ofiet

dessus du. пъиг de digue

~T T

.4)1

'I

«r

■5!

Ч!-

*]

sj

il

COUPE D'ENSEMBLE

mi

■*-

i-L.u-M-Di-lll.LJ_l L1 Uiiii

il:li ilî liliîli II ÏU

r~1

.1

;t

~T r

fi

191    -Д7- -*_й^__4_/-лк.а

I и⁻-4    TééüEMris^m -    y--L—.

____i-    / rvridFc zßl -

/ P.1..JJ---<r.l

c rp&cei de 0,00

rond* ярю

/■%

ЩШЯ

I__t _L

f ronds de fit Ô

_»--5й_

■ЙШ

III! 1| j |l l| il

LJ i

ni T

'S i

—A

tiunpo/uv en lots de ą[в £ * ^    nouer

dans /еь solive .formant,point d/a/ hudbe pour' te pta/o/uvage.

COUPE D'UNE SOLIVES

j rond d/s d fgpt

УГ/гл

m

/ronds de /2 il- f/ïoj

ж.

".

//

i!

il

li

I.

I P rorut rie T2 (■ C

V/7%

r.

do ttp// <i rp ares de 50 e.

* 13

&ШШ . T"!

^FoudLarde tir /40*2 /*f.2Q

___JL2----

«---

Feuii

Ni

7/

ronds de

W7*t,So

/rond de 2 fl l'1,8O

lards 3m 1 espaces de $0 ńrendi deùo /■ я£о

/liuütie to/’à.20

№ IL

D'UNE SOLLE EXTRÊME T COUPE0 DU PLAN

о j >0

lu

lil

li

L4-

LJ

II

i li

ip⁻

Il t ł

‘4> [4s î

^ I-ilL ,

U! >L-

.'1

*4

ii

li

!i

ii I ï Î M I i s

mu ü !

rTTiT'Ti i ? i

i j ii j t s s

l!

li

a о =1 о

S §

L '-э

il j il ü i

Il Ml»

ill!4^-f-f-tp.l_Lil_i_LI_lNT#4É?5ï*~Hi I m ! I î. ! ftrrfi !- f ü f i! M i

..III mtr Ili î t H ! SS i I

iirilJJ.iiliJJJJ.JJ'*'1 ? ! “ ! ........

“1“

—!c

Г4

Ars.

7УУ?УрУУуУУур/7уУууу/уУууУ/'/уууу7уУуууууууууууу'//ууУ/уууууууур/у'/ууууУр/'/?///у'/,

VUE DE FACE DISPOSITION DES ARMATURES

.

;

.. .

■

■ ••

■

.

- .

-

. *

» '

'

"

, ».

\

■

Escalier

;0,(8

-a - 50.18

Rend j-iopa. *,

>n№Z

\УШо

2 de 52

>■

Rond do ; 'toparm.

\___

Rond de

JRT

m. .10 Rond de

MINISTÈRE DE LA MARINE . ETABLA DES P UP ILL JUS de LA VILLENEUVE - FINISTÈRE

In/fé/ueus- Constructeur M¹" B0U5SIRÖN

LongueurUrlale dune

auu/re

£fSS

•->

s - 50,18

.50,18

^ Çf£7

-50,18

A«e

щш,

+ \ ФГ]

-> ■ eO,l8

fUt

50.18

40,16

127

-a -50,18

WÂ

yy.

4)-to,i6

'%anddon j -

opafrai .tt-J

Rondj-foрог/ г.11-3

Kond j-'toparm. Y°3

Ror

',j ^lopa 'm.N?5

Ron

Te'J' оpa^m .11~3

__Ahô__

Rondi

r r* w pi ^ m.N-5

II

Ron

7 "T

iL

cJ

ZcuS3~>\

M|

% de З2

% de 56

2 de, fa

\de36

%de3S

/ *3 de 4-0

2 de 86

acûèn

2de$t'

2 de 4-0

ale /.O

!-----

i----2,i45—I---V45- -\--24U5---

уу/о//уу//Уу////1ПА//,-у/у

VZZZZZZZZüL

'r'SSJV/SSS/SSSSS/\'SSS/SSSSSS/S/SS/ * rssssssssj.rsssssA

i ///////////////У 4 W////////////A щ УАУ////Л //////1

22

rssss/rsAfsssA

fSSS/S/4. / /y//J

У/////л,|///Л|

Rond de y -17 oarm.

ir-\ I

arm, !

-----4*,-2D)---:---4<---

DEMI-PLAN

T-

si!

L.

FRAGMENT D ÉLÉVATION gahde-corp? en ciment arme

ST

SOLIVES SOUS CLOISONS H et L

2 ronds de l6U-9

FcuMards do» /9№2,8 I

2ronds de ре 11° 12

.2 Но/ids de 20 Al?J A

I®

’s

L24L2£,54_3a_ 4 -З7- -i_45--1--55--i_5£j.--

Ш////Ш,    y///Ą//ziiS^//, y/ШУ/////. 7////Ш. TZfô.

1    1 I IA

ей

/    Ь Ronds de 56M2,7 $

L FetuUards 3 0*1 espaces de 0.5O    J

' scellés dons U mut'177°2£>J

2 Rotule de l611°ô

\^roads de fad 23 Solive*!/

V/üwm* eu $6N*2l

Z ronds

SOLIVES COUTANTES Gét M

frS

Й-

2 Ronds de г S № 9

ГЛ

li

rD

14

DÉTAIL P

4У////АМИЯ7&,

Ąeuillards 4 ûxJ Ll °-2 &

2 Ronds de 2 O U-J2

Fouillgrds 2Рл1 /1-2,4-

У/АУ/Л

S/Щ

Wf

~ж

's

2.ronds do 2o№/U

-•

\^2 Ronda cicöoAI°22 5 o lives G 2 Ronds de 'Ó2f/?/9 Solives Af

2 Ronds do /4 №3

.2 Ro/kUcU 16' fZ °8

f-

P/:3yyyyyzyyy/yyyyyyyyyyyyyyyyy}yyyy')yyy/yyyy^//^z^yyyj^yy'/yyy}fyy//yyy

PLAN. DE L ARMATURE SUPERIEURE

f assay,, litre /,jS___^

COUPE DE Ijl SOLIVE H

+e-

-4

S-ooles 4,0* 4>2

Poitou de ЗА » 36

-3J2,

2 Ronds de 20N "13

DETAILS DU POITRAIL DE LA FAÇADE

/êtu/lards Ad*l l\l°29

г ronds do 20 №-13

Щ}¥ЩЩ/УШУ^УУШУЩ

-г

IA

'1

VA

Vg3'

wL

2 ronds de 2 oU °]2

-V

A Ronds de/6

-É,

U—2^-

ЧУУоТУ'УЗ

-Ул 4    ^ si.Łd/щХ 20 J. M-i iv ЦП

K3Ro~U<U3gW21 \ i /    \u .

; /    S Hände da 56

Fait'axes

—T —4.^—L 35—L5l LzTDûT?

к-zi

des ^toiecuex 1/-.2Q________

Pu»4liÉ4- 54-

%----

ijŚ4_L74^jT-24 i -ATI

о Ronds de 56 Al°22

Al

!    2 Honda cU^№13    fiuidlanü âo./M\25

JffïïlTTTTif^-

VA

*'Lt'

/ ffrnuù- da 20 M-13

Ф-

• CONSOLES EXTREMES K

2 ronds de lâ Ml 10    .

2 И о rids de /fr fil°iï i Ronds de /4. №13

₄    ' Fcuillards 1/^24-

2 Ronds de llf. M°5.

CONSOLE ET SOLIVE M

'УУ/ииМапй № °25

/ COUPE DES! SOLIVES G etM

----<T—^

—>{

Fair noces des^ poteau*, IfjQ

_ i-J4-    4 33 S-'&UÉ-i iSïî*^ - -af - ' bvfyâik

Ni f

ixfi+*ÿSi-2à- JhSL-jI

i

Ф/ууууууууУуууууууууууууууууууу?УУУууууууууууу7777777777>71Т/Я7777777777$к1Щ'/'/У7у AA Ai Am

УУ/УЛ---V-\yy/y    (M’ZZbtW)

% C OUPE DE LA S OLIVE L esLaliehs

i---4—-g

-*x-f:

21-onds de lû N ° Il    FemUards /jO./N-2 7    | г Hands da /fi/l-71    ^

"A m ~ Æil. : i

*-2^1 iL-i-sà—1-34- 4-42^I_24rb$î^i 2Ą-32-l-|

3rands da loll -J11    ''' ' '

_ rnir ajces yüs poteaujc S, S8

Щ SOLIVES HETL-GETM

SOLIVES Het L

4. jfi_4 lS.

Ti Г

-T-¹

CIAIEJVT ARME н VI'Dimod-Editeur

-42

—\~

2 ronk de /6‘ J/l9

2 ronds de 201/-12/

.A

•—fT

inc relie.

I PLAN DE L'ARMATURE SUPERr-=

PLAN DE L'ARMATURE SUPERS⁶

y,

----■>

k-—4a.

'i

Kl

k-F-

2 roncù da JtO/Ry3~

Planche Ш№

-

.

.

'

s.

-f

A/O

4:::

20-,

40:

"t

; 0,/tf "Ms.

«0

ks

X.

ß.S2_

„.T.jL.

PLAN

-------4-— 4--------1—

1Щ

7ШЯ7а

“_з4г~

«/2р--]г|й— X

XXL

ALA

o.!5~,

T⁻

Tzr

4L_

^0<

-А--

2.32

—r

А .92

-4

iG

uddazzazz*

№dÆBSSM

. BJLO_______

\⁵

Si

фиРВ LONGITUDINALE

Ц

ЖШ'

É Jtonds de 4"i/~

i/~Jau méére\    la>

/01

'»l

0,!5i

<№ \

— â-Ж-

si

MP

-T

_ doiugucy

"IcïaJc de la ioâure /6,2/ j Longueur dcwcœurre /4- ,0'j \ _

T " j i ,

СГ*77У’Г/т/у/У?'/77 i У77?У7'/У7/:.

:l

1---T

ID !

AT—

■•■À

__î___i

3r-

2JŁ-

SOCIÉTÉ DES HUILE< DE COLOMBES. (SEINE)

r~-

COUPE TRANSVERSALE

-p-

i--

£â<L_

Ronds de 6 7m espacés de 0,£0

Ж

%—

УЖТк

%.

coLpe suivant CR

Scuil/ardi Se/ 2 j/dipacé: de O,/50

«I----r~

H----¹—

3 —

•o'

^:::n:p=Sfe

JLeuIom de LS’"/n

~~b

щттттттттттщт^

Ч⁻'

__ï

2 Sends de 32

2 Ronde, de 2.0 %

Vu

_____j______;.i_.    !

^__I__j_ longueur totale dais aeurre 2.0, /0

5k/ids de G’i- Ronds de Ci* /Rends Je S'"/**

'/y<g*tfié£^e    j gttugnèlrc    '^tLU ddtre ~|T

_A

---i-

Rends de C\y*i 7ctu młtre

---h— -Ф

I Rone* , de 5 "Ум */ у ли mille

Г    /fondideS’S 1«ï-

{_    fjgn- m être I

z°J

'■I

X-

/о I

•ni

--f-

S¹

130

11

/ей/dard: de 30/2 e/pocca de oß о

dond de /6'7m

,/lpletli b à 6O *12

VUE EN PLAN.

DÉTAIL DES ARMATURES-qOUPE

SS/omieres de JùtfottO

ÿ

e!

il

Roads de 6”/*' jfcuimêire I

VUE DE COTÉ DEL EEUIELARDSB

2/londi de 32%

j-p-

I 071

TsC-dj

R' V ' ' ^ ^ ^ ßßc/Lds de 52’%, aplati:

V-'"    [aujccleujcJ5oufr> iur une

j longueur de 0,85    .

dJ2t*

i ^WrA

<е&Л5'£££5%Ше2.

3/

_oJ5

. ч'~.

55-

*dZ2,-£'

*1

TL

..k

07)

*yf

шм

2 Ло/idi de 32 "Im

\°ж

Tlondi de 6"/ 7uu metre

Лondoie/5”7n

SJboulons. dą /с %

1ЯИр

77s

■i

■4.

di.

.\V

TALLIN *

EXPOSITION UNIVERSELLE-ив 1900 ^ RESTAURANT

DES

CONGRÈS

7S~77Z<Zlrm

ç Coupe transversale du -hourdis

^Йь^~/З^ТЙКг<5Г/ ZCIÎt

зшт

чи

Ноги/:, de22"%~ Mtullarcls 2/0*45

K- ~

COUPE LONGITUDINALE

---r

Ж-ï ,

Jet - ~²— »Lï?»®

ЩГТ

jfOjsctr metre

_____Z-Og.__3

\ 2 Ho noli de 35

2ox2o

г*»«

?|C/2o,

Surcharge dooX- p.M.

__ÄÖ?____v

Lfo~ *-

; _s.o£.

5l

25*25

5ûd$

5e*/5

41

!!

5n,/*5 Jksddr-

/Surcharge 6eoK‘?£-M

^35

'«I

25*25 \

u*_zg_

ZOf

COUPE TRANSVERSALE

■ ^ ^-

л LA?^ Y~-^

i------2^ê_----—-îftiV

'O-ZS    j    ~ 0.255.

,0.1*5

COUPE DU POITRAIL 8Sends de/5

:________UJI AltL______-

-k-\

itr,

*4£V----

_ Л-оо________j_____Л ян----

555. 55555555 555555Ä 5Z/I- 5555$ Sé 55t 55Ż. 55. p ^ Pj

,4.J 1 |~*

ггГНгАгУ

T-

yluâ/qjvÇs    j

POITRAIL ■

PLAN DES PERS SUPÉRIEURS

i i i ftonets de /5%\ ! i

IU

|.

jjj.

Trif

*r~

--0-45

PLAN DU POTEAU'

Sends de 22 ’/>>,

7/,

d32x\

13

AÆLi“

......    TiT

u.«*4h---ыа—4J——im

' ''■'_________iiI4___

ЖТ.Г

4+4 —

; : ;

_ JZdO__

ni

PI

.. д-гвр

Да?4

«-4—а»--

2 Tfcncù> de /$*%.

33

COUPE SUIVANT AB

Jeuil/aj-ds 4o*/,5 __ Л-ßo.

276>nds <Je JS '%.

Ł2JL

- >1

4    i___USA.___Я

POTEAUX ET FLANCHER'HAUT DU

REZ-DE-CHAUSSÉE

PREMIER ÉTAGE

LI

iT-TSTГ,£Е1~^ШГЛ2-£Гш~1ГГ~~7&Г----É ^ЖГАААТ^АТГГЕР:

■аг.агЗ 3o,3ôÀ    ■ ■• ^ к ■ ■■ ■ - ■■ ^    I    ^s-¹ SL.

£0x20

A'Jr2Z

S'

«vii

\5o*45

,8o*/*5

\ЩйГ~

AhU5.AiL3[ f

Й&--

--4fe--irrrÉ3-"

____

_£&>_;___

ХЖш?/5%*М''уШ ___Jj&É___________+ 5P-]—

___Î43___.__ Mo_ 4__ L ...

diJ-"    ~"

___?!&-+ +

__Aæ«_L*

ч!

■!|

Лг.гг

__B

=*--*

,25*25

4 Heads de/5%i

Âl'JZ

• ii!

I!

27(oncU (/c?5%ff

PLAN DES jfERS SUPÉRIEURS

I.

!----

r~

L-.

==r:::::v

—------- —j

i.

35,35 J N

Лг*гг

Si

/2,22 ^

I.

=4,

-i-t

±4

^лЩИ‘.......i'

m:r.tiaie:

ï>

■

'• •- , V

:

'

......

TT^yy.

■vyyvy,

TF-

+*--

_i£-

Dr?

Гр#¹

-|

ai 1—-----

_.5.flOQ..|__

-Jj

4-

_5æo

LI___

fel

/A-

о*-

PONT AU DROIT DE LA RUE VALE T TE _ a Perpignan

Ingénieur-Constructeur : Mr B OUSSIRON Entrepreneur' М^СА^ЕРОМ^

4e

Л-IO /ЗОр.т./

ÆTi

УУУ;

feudlar'eù 5o* 'l/r'

7-°7*-4

ЗГЕ

■bt

Д Зоя— L

L_4_2oû— - l-^Soû-

d*l'0(2OpmJ

-4—1

Advcau. despkes hauieo' eaux S.JÛ .

rt,~ d

Vi

r"JEE

"Т/

UEK__

~F2

im

COUPE LONGITUDINALE DÉTAIL

li

T-

Lx

jyy^/yy/yyyy^

I«----2ДХ1_|_

______£лоа____

^/yyyyyyyyyyyy/r/'/}’/'^

-t

73RÄ ~ :---"--------- T^J L

.............7УУУУУУ'/УУУУУУУУУУУУУУУуУ//УУУУУУ/УУУ^^УУ^/У/У'/'/?У9У

! ELEVATION

y/yyy/y/y,

-H

”i

!.

4.

|ДЗ^___J

/4^-

...J

--r —---f-

.-GMO.

_Longueur totale rte ( Quorate 3y, Sffo

"+

Ï—1-

~~Dyäöce en aoct des </arete-co/'ps łО,/oo ~Largeur<te; c^uutssJe y^bo

1---

—Г-Р--

R'-'

t=â

T“

VUE EXTERIEURE DU FONT

U-f ---

cj

Fl

'W

й рз

B&ia-----^---

::fc-

71

li

-,

ID

I |T T

1-T

11

г¹

14

?S

NE

er

!j

— liL.

----JL

TT

•j

____Xc|Dq£aes_____

-jho.—F ——r—e£ha- ^

dJuaĄ

d-öa—

dtąo4

-£Ąast.&-.

4—1

r'

f.sUxA

;-4

i_i

iJ_L

"I r

7У.    ^^^/Уу1^^У22УУ},^^УУУ//УУ/У77УУ^^^^АУ^УУс/уЖуЖууУуИ^/2ЩУ^

гтЗг    @r 3 ËEiBÈTEEEEÊr    1

it---***—4

ïl

F-p-—4

?• I

i T

'ą

Ш1:

T

1 4 »

i.

ft

|<——4

j.

j__%___

“T

■ê

COUPE TRANSVERSALE

rii

ШШ1,

PROFIL D’UN FIXIER

VUE EN PLAN DU MUR EN AILE

~/F~

f

y///////Æ//Z%%(/ !

fi

XL-iX

«Я

^J£q5^=

La^LL

---trçfrrC

ti

4 ! t~\~

(|4u)n^----trgzT~

¹ ' '—I-----7Г

t    .!    ]

T⁻^h

I-I    I    I

Й—

I    \    !

4--тпТг{-7

4

ДА.

--4 2

% GOURE LONGITUDINALE SUE LAXE DU PONT

Лепил euoartw'e Titre du,pr>nl Г/*У Son

(t: U)

N"26-27.23-26

ettj (MpmJ

ft (/oprn.jA

.j ÏL§

'°2i

;    ' d = 6'f/0p.rtl.J 1Ÿ

5(,OfunJll*5o

"22

/Ш70

et- &f/O paring №2^

'ММЖ. i

(> (ropann) №/^2-

IQO

---!7^-e--

/ d~ /O (zoparrn..) /V-l JdëmCdeüêZmeïmeiûl de 7â.~7iIrv~nêbUêo de t'aoco d.odci ^

L;

DÉTAIL 1

jf-ûlîCU.

__j,bax>_____

J^-ŃłO-; ----

i Д л / et* 6/TÔparnt 2 L; '

DU

T_

na

H^oan____

Е*ДЬ_

CTi

PILIER

^/| о a

d *6 yoparm.Jtt а22

^5ûo_L_

__LfiSfl__

I-

ж

т

§ Ш.

te4j3i

I •.

chc lot là !

.0«

OP__

•T

«*Чс

—>

d’Ó f/dpar,

-№S.

,vii <. •?-' .4s 'i „'. • ‘(j. / • y , (;- ■ . -»: .    •* ■'    :'t'-!./..Äjij

MÉK^^ÉilÉlËÊ

transt/er's'al

Af

(Ш1. ji    ■ —- ÎT, ь-or Лт~- ^    — =rj i.

J DIAGRAMME DE DISTRIBUTION DES FERS

Borger et GuiUerme ■ CIMENT ARME '*'YVS DuTlod. Editeur

4

i

*

■

.

Ï

• •

>;■

■ л.

PONT AU DROIT DE TA RUE VALETTE a Perpignan

Ingénieur ćbnetmctvur;\A5BOUSSIRÖKL Entrepreneur :M? ÇASSP025CE

"T----[f jr-COUPE TRANSVERSALE AU DROIT DE LA CLEF¹,

I

j{:---j^Sxl----js-----

■ 5лхе- er axe rhs> gara^~corps ~ЩГ5Р

Tïargeardelà- сИацоУее Jppoo ’

----------

-----f---i'55q-____t

COUPES -TRANSVERSALES

DU PONT

AI

t-10(20 a

/Пу

'45

rfTrfT

-т^^^ууу^7!ф7У77У7771\

«    ^ hd'Oi'iepm.j b

ET DU MURRE SOUTENEMENT

УуУУШ>/У/УУ/тУУ7Г?}, / c/yyyyy/yç/yyyyj^'"/^^™^

<(• /2 №23

Л rends de 7o N°

UutlecrAs S O Ą5

; m°2o

DETAIL DES ARCS DU MUR DE SOUTENEMENT

/ !

fV°5o

tttèérej

p&j

f---------

!*—IM05----Ш

Ш

T~~

"* ___8^clT"

---h

il-------T~X

^__L ons/ueux Mw№de^ łś“ppą$e £0fp_______

__ ^-ÆÇodff -^lc____Zflûa___

---»4

-k.

le-

-4

m.y d - wfSopm.y

, fou.i-UarclsZ>o*ir5 d * Ó ('оp ’S de SOdajvrht sert*----~fr^â

^и

Шшг

-ЗпПр:!!:    ! I i'j ! i I i

Жциодшд......UülLli---i

j_W//A У    I _LJ    -^totHihrrnrrt-rtHrtrr4-»,,.....

]xT..;.J_-_______________L *    T^li--------i-----a

------TVfra^c*

■J—

a.

•4

А-ó (tepctrrri.J j№°3o

1Ж_1 ;¹

HliSe

af

fes*

p—i

i-iHiiüüi

LuiiÄMpAift!

"оёрйрйд

il

41

rr— . E._

-s

IL

—^------1-

J0>,2ißa____

~crzg jiï7p ml N °22 ({• 5 (łOp~JhJ N ° 30

d-/2 5Г⁴.

«г./г 5‘’55 <L - S (lopm.J №'25

d - 6; 70pm j №50    ^

/[X^rpSp7h.JX*£2

___J.

ff

I

⁷i§-

Х^0^^/У/77У7У7/У77^7

*€? <

<1

____²-,^° _

|-L----------

*T

-44

--------ijr------j

K---

__Al-----_4___â,5üû__

____al--

L___A

COUPE

d - 5 ( top. mj    j

£UR CH

DETAIL

»e-

.1&U2___

l«6-----2jlâû--

__1__L

Л-

Y/

d~e (/орту $?3O

’5

DETAIL D’UNE CONSOLE

*d‘S/7(7p nr J

ШВШш

d • 6'(юр nU

d'^Wzó

-i

TT~~

--

k-

d- 6(юр/п.уЛУ22

d’à" {n>p nj А/ **/â'

-JT ~A~ ~

ci

МЖМ

il

2 ro/tda de ! в TC "Il

d- Ю fi "LJ

"ШШШ

jßjcfl_

_l&5q---

ГЧ

ifii

_ł__.

=0=

4>

ill

N>

r ronds de /8 Ai-JO

">4

\\

U- _25o__

'S

!!

⁴X

чх

2 ronds d »fß

<>

x''

Xs

sN

.Ршш.

COUTE DE LA CONSOLE SUIVANT AB

ÉCHELLE RÉDUITE DE MOITIE

COUPE

2 rvruùs (te /O

7?%r

oi.

oi

r^F

—r~

•■r-

A-j-----L.

f*N

N’Ji

--I---

—4

Tus

d • &' (yp.m.)?i?2l    NC

O-

SUIVANT GD

L_

7R-

------4—Ł----

d-6yio/>.m.j№5(? I V. у (юр nj №2.5 COUPE • SUR'EF

rJ-

T-

---1

Ie---

L -i

__sL35û-

.tli

v\

Je

лл&Ь.

ч\ч

чХ

Сч

2reńdsd-~rtN"ll

Хх

чч

D/

з4

PROJECTION HORIZONTALE

чЧ

чХ

чЧ

т?

по |5о_

11

чЧ

/X

ЧЧ

___fi nfin__

__А&ЙЙ___

---1⁵4 , l°⁰ I

J|ronde d -/â

trior

’^=4^'-4XX^4=4Z-Jh i ü i XaUv

sTTAI/////////. '/y//A/7///7s/7/K&7i{////'//7/ ' <#УЛ4&44

d-ôy fop- trvjIV °2

VV'AAiA.'T-AV TBZZlZZSŻZZŹSZZEk

(oopn^/V⁰^

V // /// / /////-*77/

<t~ /о

PLAN DE, LA CULÉE

vm.

ШШЛ.

•:

::

'ixtdes 5o,t5 №20

<fpctoei<f Av 3o Aevevs -----LongU-ucüruvL .

I!

ii

ij

c/

ХА4Т7/ГТ

B«y*r 'ëtOuiiUnn*-CIATENT ARMÉ — V^Diuiod Editeur

Imp. MÖNROCO. - Paris

Planche ШУП ane

,

...... \

*

.*

.

.

V

■

'S

-J-i

C ANAL 1 SATION - PLAN CH E R

SIPHON POUR LA TRAVERSÉE UE L ’ OUED r-ISSER DEPARTEMENT D’OIUN

PROTIL EN LONG DE LA PARTIE BASSE DU SIPHON me'gazufi*^

'/77777777?-

-*

/г1^Ап1е/еу,е^'(пт)гге(е'иеУеееу1.-}А.Ы.01Т\05 ET LOUGHEUR

•I

•8

*y.

Tumu DANS LA Æf < ! PARTIĘ EN PLAINE PRESSION 12М.

уд^аБау_____5, ano

LÜIééJ I)ттм

Ér5jÜI i Ег^ i

—ri I

2_ 'I

___P ooflüj

Л àsUX. ;J

-o

X ON Gl TUP IN ALE

----

Ж\

щж'У$Ж i

ШШУ

yy~

I yV777777777777777$, !

HoruU d* 0 (70 Ж

>/

\N'0

f/V/

5,8л---z.— 5,йо --5,ik>—л. -S.&O . »u ALa —>i«--

___ L _____I__20.000 J_______!_____>L

_ ^J,(2aa____

ïjzi*

I'    REGARD DE VISITE

|-|=. I COUPE CD

REGARD DE VIDANGE COUPEE Г

_ -----5л°^- -Ь.оао *Д|Юл.^

REGARD DE SORTIE COUPE E

11 :

Hoads de S ’"/m

тттш|

COUPE TRANSVERSALE

DETAILS DES TUYAUX

jjlnil /| I.л[)7|/ц.п ЛТ1 /[y

à 7„

RsOfuts dé 0.00S.

COUPE SUR LE BOURRELET

4o^24

”70,020

—«t

wyyyyy/У'УУл

■^1

уУ'УУУУУ'

ÎË

^Г77У77777г

A°-

{MF

/у

ШУУУУУУ,

7У//р71УУ'

Qio

1 ¹

In

■5A Г--

‘Ш .

ł liii !

.“j.iSBi

ШШ

UfljUl

L_pA<lj4

7---»1

^----

-7

ТШАО DANS LA PARTIE EN SIPHON PRESSION 30M.

-----t\v.

ri

----—

И

ч>

--.o

~Vr

ад

Шт.

_вДа_

ysm

^vrsAr.z^rrzzr. : Z

Stl

-4

r\

W' \

yyX

V/

i-y.vlïs

i*

--jb

- r.- : гг-.-.

ASt

ÏS

4 —wed.-^j

Ił

Jr - г r.r ï .-.V. -- : -4 -- -

m±|

i    l-p

Уу'/У/У/л

«L_Aei4i

У---JH

УУ/УУУУ/УУ/.

—i

Й"

A--

U.

K/Zc.

COUPE TRANSVERSALE

Ttousir dc O 00 6

Lß,r.i?

PLAN

PLAN

PLAN

COUPE

И—°{

О- -*1 ÉLÉVATION

.Rends dt б™/.

Hondo (Ce ffm/nb

COUPE 5Ш LA BAGUE

CONDUITE D’ADDUCTION A VALENCE

Ro/ids de Qm/nn- ОоЪо. —

Ronds de 5 m/n-

2 atmosphères de pression

COUPE ! , b -у\ УУ/УУ. L ... $ "''A /1 .

ßaqut du,

-t ELEVATION

Улк?7УУУА

COUPE TRANSVERSALE

CóUPE SUR LA BAGUE

W.

USINE DU CHEMIN DE FER METROPOLITAIN

(Juai de la Rappée

CONDUITES D’EAU ACCOUPLÉES

Y/

ronds de 7 m/m.

«%

-%

/y

<—__ДаШ2___

r~~"

I« >1

- -i—

TU

■I

________lNL

2—

_____Il

rdf//

«SS

ri:

i ^

'A':-:.....-

-и-

i----

:/

-.-TT-”

•ruts de o.ot/ÔÇ ^У'/ionds de i«Й»

VA

Уу.

ттгштшж'уштштшт

/////. /✓//>///ЛЛУУУУУ/ ///Л/. 7/Л - À »-гжжж\    жжжш УжжгХ жжт

JL_

-/-A lA'jl/CYĆj/ajL/^/ui

jfX0&2 ÿ___JcO n fi 3.5

^ül

-УУ/УУ

Шу

УУУУУУУУУ/.

Hondę de ó yV

nnù: de 7m/m.

!*■

__Z^Q___

ШЖ

7£/ J? orvdu/d’

IrernUs fié O, 00S

Arujnéand orv /ittMcu*cù

Vs.

////////

УУ77

шшшш

-<----1Д21

HvnxU de 5 fa ‘

L____д|554__

Ą/////////////77?rf777///^/////////^ fcuMi/'d,

Y7777777,

-3—

У7

ЯЯшш

ееееееееееееееег'ежеееееегжежеел

rV

m.

уУ^уууууаауууууууа.

У7‘г?///////?У//ж'У///'У7

/S/S/Z/s /.

|Д2Х1_

Л/ de О. О (У 5

^ZUo.

COUPE SUR AB

Vv- Dunod -E àteui'

УЖО?,

II

'л

ronde de f>00&

Ж“

_l62P_:

---

'A

Lüûja-

и -    Æ^ï«5~~    3*~ ■    ?    --71---А.— АУ(Уа----*1

COUPE SUR CD

PLANCHER

"~Т

А.

5 24

AM

- -Эг

Planche ШШ

■

-

■

■

■

Л

.

'

-

ï

'4

Tampons on. cimaritarmé liX ||&, .

Echelons ronds 00*00 de 2t yr Sjoßn._______rri

щ Ç_L'è°°__ss

Ecbindyt

9,

ÀL\ .

do 0.12* 0.12 enscêobet&xgnze

c fermant mcrùcuds d'ôchoZio

iic-Y-

==Ш

ętistrihudcorb

FütâhÿS

4^ о j\T

у'Н^УУУ/УУУ

RÉSERVOIRS

tX4~~<5yyga-----

_ ₅ 'is>&vdud> compris

Tuyau, +rt -fcrUe y. avec robinet d orrai

I*~_.__

j|5ą^______Ann

~ж

Татро'ъ en c.ûtbosd аппье

Tampon

:—sjOijLjm^lioo

en cunv'Lt v, '

armé Xi |j 4.

+■

ol

L.

r-J

,i2û_c

■A

Tin ode act&r de 20"/^

4r

t--Uâao--* (âa

V///

'A

4.

\accés Uvon \

Echelons roads auer20”^

. T*

rtüer Me /omicèrU,

0,12*0.72

mentant

en ein t d'dot

amie

ERff—-- -.Xr JS- ;

COUPE

Mondant d ccAet ciment armé de

lui

V-

₎ Tonde eteten dejïO ^/n.

-l-

RESERVOIR

RÉSERVOIR de Smi-LHASSEN - Departement d-ORAN-ALGERIE

N? 1_ CONTENANCE 2ooM³

COUPE RS

’Г~

! b&uÄr^4*~~

'АУУУГТ

^    ^ Ч ГЧГ

ŁŁ75

-±,2^0.

-4.'-

Ti

R—V/

—где. _

fa-rs ci T pesant_

metre courcmć fer à T pesant pf le 4^ mètre coure ’

•“4

\\\V4

I \t

REPARTITION DES

H-

V/

TV \ \ x

SPIRES DE E 'ARMATURE RESERVOIR № 1

Si

ii

Î!

A*/

II

! LU

I ГГ1

I Ti ! ?SM

♦Ц->4

ij:@.

! !а

2.

4-

”o|

fçx\

¹ -\ Н ч

“V_T_V

\ 1 \ V

u-AtV-

\i \ ч . _

--É,-----\|——\—--V- i— -—

VI'

1*

/L_

₄,,Mjjt //#

\Mś§

У/

il «к

•Ш-

Vvt

■'XTS

f

"%

r-

\4

чг

о;

11

\i

PLAN DU RÉSERVOIR № 3

9 // Spu'&s s//г* URL

■Q.

¹ \ê

L:ï

i- V

iC

U.-—r~

t--\--T —

GêïUs’ahrice Jn. Ą T/in.

*-—\—[-\----:r

-4---- A—-

\ I \    \ . '

LT

---A---\

il

il

T

'I

il

I--y-: [ —4f- -

T-4-

1-4-

1- Vt- -1—i- —(A-1—i - -t- -i—t\

_A

I-

\l

~è----—

Honda ds 6nv/m.

/5---

___-V__

Génératrice en. G m'/m

XJ—:

41

1Г-Г--тх^:

Zi.ZyZ.ZZZ.X-LZ2

y/dv////d///r,M

j, гда.    2oc — j гаа _j;_даа _I

*^%T77?77777'.

_„, ji

1 r/yyyyyyyr

^ *)00 enduit остр ris

8c, t_ûao?S t5c.

Ы^;тжУУМШШ

IST“® G OU PE

DE

MP2LLIKET- Departement d’ORAN^ALGERIE

№2 CONTENANCE 5oM³.

ARMATURE DE ! LA VOUTE

j U---;---2.2hû-----*_____ЛЛЪо__

I I    r    1

j I«----M2b---#--D,lÜ —. —K— -*J*5--.—*--Uzfi--

limpide б¹*/'*    I ■__ L 5fi5 j,' Rfln j

I i V V \! \ ⁴    ^    1    1

k?00_

zzl

___i>&L°___

Xf-²““-*------U-2-oa-----------*|

-Ą- -X--iAà5---₄----M»dfi----<f.--1.4Ł5 — _ 4

j —l*âü -f-    4-4-°-f АДд i| 4Ao ц4дп ^.41Д_>-4дд    yJßJsE

._A

PiST

r    >U2ü-ir    i

DETAIL S виВЕ^АЕБ de la G 0 UP OLE et de ь'Е CHELLE PLMt

Tto.bcU d* enYm

Hoods (/0 Tin

ItéS generadricdzs de Uc coupole ее /его-longent pour devenir les gorcércvO'Lee* -verticales du ' rêe-erooir et lesgénArairicce hcri/t 0/ itcUdhs cUv ncutter

RÉSERVjOIR N?3

Vanettes nécessaires

DEMI⁴- GROUPE ABCD

7 ■> ; <P.'⁵

—T

D tf* a m a

IP

4~

bQOÛi _

fers à T pesant @Лд. le mitre courant

DEMLELEVATION

Tour conduites de O. Off. ....................k.0,/6..

.....-......................Ш..0.20.

Total..........

—4

Ter d T pesant P K4 FL* mitre aoLu’ani,

■»-

:4

I! .

Ще\

h \ d i

Cl

:::!; i

dsJ

Fœ

É‘

\//7,

4 / //

;■

II'

SIU

a l.i

POUTRES A

! ; K!! :

3......1

a cr □

Ч i

с| r zz^jzj ; i

[Щ i

4; :

H| : fdj ! d!. il

ZZJ-É

P IT i

—Л

Я1

УУЩ^ШУУУШШШУ^ЩУУ/'

I i dj j

l”l I h vxi :

»■'° ; ; IAT

. i "j! i

iiâi ! i 4 !

!il j

J.3 „L

pUnTLj

&Ш ЦП

>1 -UlQU---1*

1Ц

i m\

car г

t--V-

Hi ! !¹

г—шМ N

ШЩ

t\$\

щ и

■ÄH

il

T'i

Ticruisde 37 "Уос

"ÉirrjШ

■—%

/2

POUTRES В

Komis ds 6 ,f/'i

!</«wu d* го

~r

'»III I

m'PiJ

4M i

T

il

Go/ulrîüru* sa,enftc

!ï

цл±\

adr de 0'у'-,,. a^-girUss исвЧт.. \ I I

---А---i-----¹²1

DETAILS

DU RÉSERVOIR N-5

CLOISONS INTÉRIEURES ET EXTÉRIEURES

Composition, de 4z> cloison ditptuscird

Jl

_/22-КдУикГ—бви 6,T/m~

I -I

__ix ^

i-aaa_jt адд _гад. ^

REPARTITION DES SPIRES DE L 'ARMATURE RÉ SERŸOÏR N? 2

POUTRE C

lionets de 24/%^h\

TT-

-MB.

--рт —

i».

s?-*----i-

ÉT7_

• .

«

.

_AÜ>

ML. 1—156—

jfc.

IA

i a0,1

a¹.

11!

lJi

a¹

*2*

SOUTES a CHARBON - ESCALIER

CHEMIN DE FER MÉTROPOLITAIN DE PARIS - USINE GENERALE DE BERCY

PLAN D’ENSEMBLE DES SOUTES' A CHARBON

—3/0— —À /о. H _ J/0—

b,/C

si/d-

_i,/JŁ__:    З./о . •    3/0 S/o

,_Д.^а

Д5У

Sdo

i/o

_3/0

Д^а

_ДЗ£_

___7<f5___^__ (.So___jj.____(Bo

]||'|l

hrfH¹

ж

E L E VAT LÜ N-FAÇADES

Ш ff

ш

\ûtu

l i! !

H!-

'•hi

441

iPjed-^Pd/rd

Ml1 4 M !

aii!ii,,

mè * il

ndb i III! 11

-1НЙ “] !

m

:iü

■ł-

(■So

(Jo__

—i-ÂS.___je __Ł/S__.... je,.

I

_£J£____к____Ш____i----fiS---\ — — 5Fo_

-FAÇADES    ELEVATION-CLOISONS

T~ÏT ПГ

Lü

!|

Ił

DE/ TAILS

t/e 3 a 5ni. Ct. 0./O Fonds cte/2"ym de / ci 5 m. CL. o/о Fonds </*//'%. de 5d£,l5 cz. 0/0 Fonds de S*/m.

un

Fond de/2/^

.H

ai

<2i

a'

3L

Fe.r tJ

Г“¹

de 2m. ЫЗт. a, 0/0 Fonds </e72'n/m

cteôm- djm. ОС . О,/о Fouets de/0m/m

deArrt a 5m, CL. O/O Fonds de S'Ym si| cte5m à6,/5 U. 0/0 Fouets cte J'”/ni

41

ßol

= /2

1П

X-

_ Д_

-4

Ю1

SI

Si

- ■+

> N/12

ni

ikl

/11

/.S3

j(_    1 -JiŁ-jl-ttŁ. -4

QOUPE DU'RADIER

\3ondd/2rU'

fiondsde/Ft,

ke

'■Si

■■.13

/i.

j*4 =

i:

Fondde J2m/nt-/ Jusqu’à.3m. / >

i!

.SI

-20

H"

in

i-i

tl

! i-

Г7!

i:t

-'Ж~"

-i:»o

■ '.il

Fond

:K

f?:äSEöb:

Fond de // %- V

I____y__FiCf/sd lahauteid . ^

!    !    Ytmd/e

—I__SI___T&ifdSL&oaz -

!

Л»*!

P4

■#

*ou/e ftiJujuileur

Fond de//’X У

GOUPEAB

X--i~

_Æ-

:—si-F

COUPES-PILIERS

Lx

V?'X

-ir

i*

tx--=

Fond de/2 >lU B Fond de/F    H¹

Xs__•

Fond de/2mL.

f,

fr—Mir

-.i____j-

ESCALIER D’ACCÈS AU COLLECTEUR MARCEAU - PLACE DE L’ÉTOILE

FLAM DE L’ARMATURE

y/y Петь la.partie droite (ßtzA 23 marche* de, 0,/585x0,2£7

Mil!

a 1er

(57,39)

_=4,

_ Ht:

<a» 1 %

.US

ШтжжШШ)

§V

X

%,

“'УШввЯЁЯЯШШ'

|< _o.3oo_ _J J ШуШМуУ    ■'шШШш H

j 0рк*ж&***&А

«i ci

ESCALIER-COURB.E

de F'T.

uS-.......i

S-

(1,3.30

^ v/ss/s/№SSs////1//yz77e

тшт/

-----

a>⁵

⁴v

''X

'f

I «I .

¹ KjjEU iSi "Sj I

Fonds de AT/..

Fond cte /0”У„.

Beads ciel"'/™

un

DH

rmmêmm

ESCALIER DROIT S ЙКГГХ

_-4fe s- ?

y/).

W/y

ENSEMBLE DE L’OUVRAGE

■ il

Ю!

^1

тмтУШ*гх-%

ćżdS^__V____л__i

L'ffiTr - Tfond de Jo

Palier

VUE SUIVANT Л В

'С

>|-F

Y. V/.

Cornière Зо*Ъс

-Łis.___

Rond de /7..

\Vs\\V\\\V

=t=st

>²L

* FU *cddeJâ5L ^\v f Tiond "de Aa

Fond ete A. JL

___, L o/o ~ T'X

Щ=г

y y yj-

'/Л

7Л

'A

ic

mfj

Al

:•

i. _tër—- Ж

y--^2dd^yyslicdds/ryJsœsJ'SjJjJPddli*U    Kvлгл!011^/.

ftonddt /ûnZ~

'm

PLAN DE L’ESCALIER

•/

"me

i

■■

л

i

,

Ö

-

■

'

/

/

/

'

-■twgf*

■ .•

;

L.

• 1L-»

Uj~.

₃ i------&-P*------

гХ"

Mj-

lr.:

■#-*&

CfmoutnÙM^tru.

-1—

11-

4—

r-i---

iii

L-i,

>p5a.

(O

Lk*

Ltt:_______

I*---:--k3£*--

LE TRIPHASÉ - USINE ÉLECTRIQUE D ASNIERES

COUPE SUIVANT AB A⁵*

г——fifi

fi5ow-L*<roe

Tli ! 'гЪч&г

~—£

le

-c

—<i

Л f tonde ąLe

r/7^3łuis eU3o "Z*.

/ьо/uio d* S yi

7ù>nJ iie l3 /«

=3

ii

fc:::

COUPR SUIVANT CDE r**-r-—j

&

......укама —ju

- - - ^ _6^aa - -

Id

•i

1.

.1

IOO__

-r>

i I.

«0.20

»»•

4?-a

г 0.100 $£0

. с 02 оо

Ч-.

■1

I«---. -8*000-----i-----' ^,i£d------}l

PLAN- D’ENSEMBLE

___Aîf. sLsZ‘SU!fP'£oZ. *£J. 30''S. _</x_f fr______^----—

-f - r dU’i-ïû»™ - ijaRi

'J

i!

IH

U#

irLA

* H R------

3«r

Vi.

II

~fr~" L il . •

fc>

--- -A—

.1

ГГРг^ГП V

! 1 jjæu. ⁴

pu:)=bid

; k^^d [ i Ц,^~ г

I le-ir-цгг.___!___if

1 9 1«иЫ

pi

fT________L

_б.вол _

-----

Hond*

fioruU ~Z tô m/m,

ft»n*U d* /5 "/'rn, .

ii

Ol

“1

.x‘.°a. i

-i«N

-îll

DI r‘

i-A-j

s >И<

П-

'S

T-l

rn

SL-.

A-i

Rri

_L!

'РИ— ‘

lisiotA. - _J

fcj

li

dl

TT

---1*

ttuUdefa 7f

Ho/ućs do d?

llLl

J' COUPE SUIVANT.ab y L AŁITao ł L

s:—t

fi

al_.

V/

ff

le

m-Ш .

~s

■i

«-

XL.

IrPMi

I .!«Ur--—:

|D

Lb

4”

!f *

:| .

>»л^ <<«» Зо

u^r ЛА?'/^. JùuuLuùtSo’Ki

Ц---—5aû__

dl

SWaW,?!"^ hiaj/a^. УНУоУУ

a-.-U-fe’

3___I J 7&пУГУУЪо /it

COUPE SUIVANT de iii -

coupe sunu

7?T/!

<5%

HlL -,

gL

*QJO

IŁCO.

" i-f

_/_é5ü----{-к

1-KsJkOO.-^ V

Tionjü dp /О т/я.

COUPE SlWANTCd ftg

fâond* cio 3o m/m

"ШШ.

C 0IJPE 'Suivant d e

(aî*„bduiüA

%.

Ar

«“Ił

gin;

1шиШ7/^оиш c’d

7&oiut 3ù y,„ ' Tf„„Wj^ (J 7*,

Ëb

PLAN D’ENSEMBLE DES RE SERY OILS - 2 SEMBLABLES

Tf 1.1 i

'Ш

Yi-ipt L

¹ ] mi

1L

Hpi H“- 4^

14-1-

io_X

:f-f-

II !|- il

; iVSpsjîæajjf

—îi--1; — li—iHj—i- Hi⁻i

IV

“T

Ltxf

V- J

«!    ! i

. lOfl-Lû. Zßß ^ _.

zoa-M

SI

II

COUPE

suivant e f

COUPE SUIVANTe'f'

CLOISONS ET ESCALIER . DETAILS

"⁵

2110-

I.

«iti:

•Srł

П1ТЗ

'i±Ji

ä

oety    i У

TT

-----=■

rair/ \

fto/uU <ar#"Vm

u3

улУуЛЩ

jQû.fJQO^

ГШУШШУ'МУУУУУУКУ

!■

llZrcłotće* ro/uis 20 **/*.

,-t“rii i ł u i

; jjtr~T j G'

. - i - J U - J.    ^ „LL-I

Loao-l

crç

ELEVATION DES RESERVOIRS

___|_ßÄoa _I____*__

KoivcL lU

Яеп<1<и30*/<п.

PLAN SUPERIEUR'

.. _. ÎL1VEAU-HH

-łOP. i iPQJl Lflfl JU»

шш"

£.1200-^

:i

--19.5cÀ--ztT|

•-

ci

гш

i-l-

ГТ

L,

4,.^а-----5t-,

ТШДГ. V

|»<пг"Т

___

_ rVTL IpfliL IUOO— - ijĘcTZ

IL

rHf

7#

¹ I-¹

ft

.1

ГГ !

<2

-A

mo/

l5i _ L

-4

hü

'Timon

i.

^ a VuiL -JJ2IU ..(ÙL {tfa _

+х i i

¹ 7Г2~2й7&iw~iZr3fr<£'W.

¹ Д

d# f8o я0о    I У

COUPE LOljlGIJrUDINALE

J V. ndi

7i™;n

/3

■«*

Ti

VUE SOUS LE .RAMPANT

)ton*A <da /О Гг»

Hoad de 30%.

Г/777Г7,

~7£0~гйГИи f3‘

^ 3<2 ,^7*

CJOUPE' SUIVANT XŸ

У/УЛ

/Eon4^d+26

i

у/ \ton*o-<će

-U-

I,

L*fc

g---roç*z —

SO

y-L

i -,

^0,125

NNv'

NV'C

h|

I.

:kj2-

—i.9°o - - —

h*

^-jir^XUL

Hotui*

12 <УП

:■

3f

уу/ууу:у

COUPE TRANSVERSALE DES RESERVOIRE

шш.

mm¹

2ßy£____

M-br

/Vo/1-d* rlo 2p

Roruis iWvff

. 1Г«д^> «fg-jgy-

X**<i*-

5:

+=--

Л..-

~ъ

__j5o

'~7Ł /uüwù < c A Л

-c

D0UBLF

W

FJ^-j

"LTEX

I iWIKo, но'

Ir*

s;

1.1.

Jj._

t уУУ '/У {/У-УУл - i NERVUReI i-MV;

L'A N QL E    ъШЖ

¹ Лй» -----

Nh

“HH“

' r, ,

ÛOO____

H

•0:

j Hondf et* 2 łif    \\j£~ ^jy///^ ^ ^ !

— - R*> i.tj

1йл _

H07&7ZÏ

bJ5_____—A

i ^

¹ t

-Ł j ЛДЫЗ-

4___Сол____^__’daa---^—ßaa — D

L.âfiü.ji

PLAN-COUPE MN

COUPE TRANSVERSALE ET ELEVATION INTERIEURE

.

•î. ,

«к

.

P

*>

■

;

;

.

.

*

BE SERVO IR ne 400 AUsv-r MURS ЕЫ MAÇONNERIE

10TJPE TRANSVERSALE. ^SUIVANT Ж N

Le? 8

RÉSERVOIRS

-4L

___D

t/àffe </o О.Ул

"t-

■|

pontre^ p ^îtuée^ a.uxsLngle^ ont la, meme jśąctioi^ que la. partis verticale ded poutre^ P ( Voir coupe cd ). poutrc/S p? ont réunie^ епЪа^ et au p onim et pox de^tiraçÿUT Le? poutre? p ont réunie^ enЪa^ et au. p опг.ч ' etpar' d.4 tirantsT L e? tirant? T du Ъа? ?ont Ona.dun en rond de 2 5 L e?“tircUit?T du haut bout chacun en rond de l5 Le? tirant p duh a? ?ant ôh a cuti w rond de 2 5 L e ? tir ant.?T, duliavd «»ont de? poutre? à pection ef

ARMATURE

DF, LA UALĘRIE

'tfocrtsh uf” аир fir,- de * p/utie t>artiuüôd<4.rco-

ELEVATION DES MEMBRURES -D ÇJNE POUTRE P

■\ (I aattéSrt

=: Wm

4s

ł_.L

1rs ff

o,jÎ;L.o,₇.d^c

Ma«___

E_.

it"

_F

. COUPE AB

COUPE ÇD EF

'Yes ' /17 e taf’o ' -y    oca /'/res

<l<i Ju‘oo V ‘‘une 4 l (title

e.

f    S,

гЧг^ш^тУ'///Аы^шоес.у//У'--тштш^/туЯ _

Ш1

L4

Ф-

⁴1 P

4 i

---

- M'.

СШ:

vIlJ¹

in

---1T_

I.

jsî_

--(-Х

#■

ф — 4-

---A:

э-

la

3 Ш ♦"f -I

44

c(oupr rim

’ л r^gM

pi

Fers (Hub seul тпт YeaU

__Lan

Tianés tUĄ|g .

,,ß/ÜC~ilsclc22,

j/

12

|Ь

DALLE DE TOND

k-    алО_^_.х_ _»(.

22

7/777777*

iiliiłiiMg

У//У'){/сУ///У'7777Г/УУ///У'//////. -УЩ

delt

(Nv.

#■-

F letters o/v rond dë

V\N

L-

Асс7ч>с7ш0е (шов lira    _

Л\.

NN

mm\

i_

KTtrt

JLeS Л rc

desptè.rrs se .'\ T-NxM * г/оы-jv:-' ■>/ et,tewte bois ) N

Ut"

:___i

f-^²⁰

In

⁴ 'Фз Ш

4—*

\Ń

t-—L“—-*—;—

___pc______

Щ

— —4---г, au- _4

■■

-1N—,y. V^-,

iъ=ёЛ/о

^ t, étrier,, en ...,. / de 57', -¹-Tmearti'e,tient /шее lie eu.

!    ⁴ , ¹ ’■ met* tie i>n:e et, 17

'    /- /oń" i ! f о tse

II

Æ ulr de liais ort a i i ce/desj ;rt4T c?7^

Cuve?a vin

PROPRIETE DE MIFONTAN

CjOUEE

COUPE H0raZ4ED'UNE. РАКШ VERTIKALE

Citerne? a vin

PROPRIÉTÉ de ЛГ FÉLDC POTIN

TU ARMENT DE PLAN

--2X& _

_2i5__

M?

мш

■ ’ЛУТ''’

!â

i Сг&гкаМесе on г mds de f -£Т T'écartésde 2û4enf la. i/ud/iettif. g- Eî>£ de 6.0 dans 1л тп/п&в sup ’ "

■3

гЛЬ-

. Rondes d# Ji

Г"?о

уГ/7777т7У' VU

It—

Aj

ТЕ

уУУУУУУУ7У7УГ/'/У'' S) (S

OÇBOÇïïMe te? ter?

p PAROJ? irERTTC^p^

COUPE MX

^гг.

’zzzÆizzz.

Elan:

Tl

is? :

Sau

M,!fE

</.{

N9“---

iłiÓL—.Jr_ _3t.yu-

-igo —

JJ

"~T

. i JSs.

:у • ••

-feż

I*-------

----З5л»4и

-T

~ИгЫ ita r-onimxmira/ion.

I!

RADIETl й— ^ *d- f

У /у

ж:

“1

CjOI/TE TT? AN?VEP ? ALE

'Щ/'/МоЩ/, У v/ey/pfs/ßff-'.- t’Z?.

Ą Mt

Yf~

-ууут^^гту ; 'т

cl

li '

Çavep

С/уииЬчИаде enraiuls lie T"/,,,

_5 POUTRE A

■■/А

®4;

e€Oł*4S (te OJ о

ЯтЫв/сЭ*:..

Mbs _ g_

Щ*:

if!

_2U)ü--

Л/ri n i ronids de ?% écartes de O/2 et 0.2t,

$п

о>

— ъ.&>~

I'

h fia- -

ш^Ьт

Si

0,1 ’(i,¹7>ét.’>. </*' dt,wee 0

Coupe yertiCale tu plaf ont

TjuTbci its О

V-04fl-^.JUe_4-

У/У/УУУУйУс V/A/////e2//Xiï&yji ti

’onctetc9?~

DISPOSITION TE? PER? AUX OUVERTURE?

TALLE Dü EOTTD

⁷>7Щ0.

У/.

W.

Kr.

t:----2J3-^---J

j?,in. ллц JH

lüou. .«Uüi

Oji)

У.

■Hi

у:'У^уу?уу.-у///////7/7рШ/}^

A 7tmut* tt*#

HunOj-iUcUttl *n '"'W -> ■ écartée <0 te.10

РОЕТЕ ГР. NETTOmQF CtOTJPE AB

DALLE DE COUVERTURE

PLÄNE DU PLÆF OND

v A %nde cts ■

. 27?om/b dc 5’%.

, L 0 O de io/iquéur de Cfr аир ic cot* dc 7aparoi :sottM /fonds

J^a/ute ctvrtUchotM

' v lluisantla ^/r⁴«^

M-N, r

114

■ Orénuu/térej е/i mut ал 7 . "étarf/êit* it, eU5g[

//At

/Traverse

fR; '

iââd

XA

i i!

-г

_SL.3t2___

*L L----1

J=S~S4i.

K b Т-Аг'л* <гл.

II

\ i! i

iöH

U'ci’seni

фЗ

xdc'ervv!

źli

H-

i. » I

£Ju

,«« Mes fers vffy //cos t a/s,. II! r parois sires r< cfont ;||

lit tzÈ2&nrr*3l

-•

i i! I ' O

t Ï ь -Щ"

j_iLLł=-bA.

!j i o«p*t

4 :,' A*

/4

fłrnds de 2 O7uf/•/ HôtUnucc

EAR OT? TERTIALE? aa,

( r zutsZft'v vt rvrutS*7 /varias de ■faut fosUUKii* inf * et *0 tie 0.20 tdawbcrwr/ic sąj/'У £.* I

Ш&

// ^ГДЯ^«ЦЛ4А^1 y/Ronds dc 2<¹vc.7'Oxxu*jc

ою

MONIER.

ßyp}

Iiiqeturtiir (bnotructenr .'Sodiete de,s iravaax ев oiineat

delà. Tleunr S'oint Déni J

Vi-e

COUPE ef    DÉ TAIL ce DA PAROI

COUPE ab coupe cd

ш ÏWM

'iaYA. -i L л

V/

(.* eU TQcXf bt

:• / N

V/

V/c

■/

UBép. —m —

/triers dc /cas-tes aei

de A m3 у/.

dt/ŚSfi} fry

I /Triers de 7% ! écartés de D ii

¹ЧШШГ'

7/

/11! ^

7/-Z

^ k-Xia-4

tSvina/Uere , JnéteSJiar/ci dc

i>/5et 0./.5

VA

DALLE de COUVERTURE

Je -asc. nio_^_

ШшЩ'с

УТ'’7Л‘-'/.'//.

Reuи/ de О-УУ

шЖк

t-

dOUFE HORIZ^belaCALERIEio; POURTOUR

Щ1 ;:

*y§-*Y025 /02£^ ,

dans

«o -4>

1-ït

/0

ух//,

■ UlNöK

-КшьЯГЪiTFZf^

ti

я*

I PILIER SOUTENANT LE -FOND

211 PAROI VERTICALE 1*т|4 T_ RÉSERVOIR

î f/À. m/s de lEaeéra dè к6 foi i/des Щ O. 2ÔY |

4.4,44

^    Jcic/c .-.t en tcicS et* ,~5

dé djy cmxU*Us de •'

ТТГТ

. <i U Ą

Remets O* 27”/

\тс%

M/T

\\

PIUER SOUTENANT LE PLAFOND

<3    2iru*sete 7

téceirtèe dé

ШшШ

0.20

y^jfes/fonds. 0soutiennent t/ fa niemfrrurc inferieure des poutres de tond.

.Les deux, ronds JF des piliers sotUenanè le rond sc prolonged vfak    dans - Apiliers

¹ ^Soutenant le plaft

Ot.fi

»•

RESERVOIR

POUR LA VILLE 37E VlMOUTIERî^ (ORNE )

dOUPE ^UR LA PAROI

TfïuuLriZftuoo <t/f T'o/edr/te 0.006’ eoeu'tcs de 0,00    . .

CROUPE AB

mots de 0.2/

Ж⁻^-;

O/o/rds de О.еч

\4,

tf

ix

к ai

Ш/

to ronds de 0 02

'Л

■#

----.1 Âxtf}./_____-j|r

''ШШШ

’ qouPE

^UR UNE POUTRE

-if <

W'3.

<a

гУУШУШ . — __:

~ f ^

- I J 4â.....f- .

PLAN

A_l

Tf

Jl

é/o I

с/ w

Y I

⁴ У/'/Р?УУУугУу.УУ/

УШУ.

R OUTRE a

Ronds de ooo6'**oi

Va

Uc! f 1 CJ<4- U -ms lie OM«7 ec.Ti/e* de.О

*• J / '. ' к 'I I doits los p m rts cuUr/hnaa ctu^ ^ Y    3 O^odans’Ica 2 anéres (/iut/лЫ

q* y. '/VA ^    V/

Л ce ' ir./\ Tien,te t/e ,/.022

Л У. ШГ\

PLAN? БЕ LA PARCI ЕТ-БУ FEIER

’/Ц(А 'щ\1оTïon/is do RoItY^Ą ~ § _    JL'irierv de 0,007 /cartes de О JO

//vYr    ы)уЛ s'    dan < far yn/irtt ejctr’èinnset dcTy^

if J    tcbVy    Q5o dan-v la* 2 ижф'ШО ÿujtirés • -\

■

ш д Eæfeu"

-О*

Ш-Х 4-Д“— fc

tin,lits l/e 0.02/

*ШУ

M:

(f ccrc/cs piece* liens r* hauteur-lie/а fe'Te. ot relies andre cu-xrpar das pires

ti/ШЖ |i

ЩШ}

tm

Ус

Ci

—ćryoe уг ù /ces en- rv//dY\ünz4re ситро ^cé dU*2i\?ri ■ '$ l'/rV./ t/martes de OJû    de 2d dManés do/^%.

d are en aare

-Ч

Щщшш

У//с'///А

■■■    111§§Р

'SÂârîsassÂÿb^^^Pi

ÙC

ШШ

■

«

;

#

PLAXCIIIOKS -МГН DK SOUTKNKMENT^CLOTURb

Système MONIER

/преоГ-lbnaif . Sociéte des irav'eai cmient arme

R rie deb

О)

h---

— —Zappa___ !_

__J___fudsloé* eopactf^dc 2 (TCOC___

;C

GJU

,4

" ШтШШШШШМтШтШтшжШтмттшЁ$.

COUPE LONGITUDINALE

D'ENSEMBLE

wo

<Л

IP

щр

O,.

-Ew

iA

Ш.

COUVERTURE DES ARCADES DE LA BIEVRE

IP

S4§

'U

y/,.

p*

m.

///,

SA

ft

УУ/.

il

УГ

-9i

_ lßo___

It— -t&C-

ЭЕ

V/

ЩШ

V/,

J-7L _2,aa_j

С- ад<М_

ä^Licoa _) угол 14

•f

s.

fb/dULCL.

,±р

•k

_____3U?S_

iß

ж%.

•4

_t_

■ ii

—4~

Sk

ШШ

ЖИЖ

iS

ffikyOłl^afĄailĄfiah,

wmm

Л)

PLAN D’UL^E DALLE EMPLACEMENT DES ETRIERS

4- -

4-

COUPE LONGITUDINALE

Etrier

Ronds dé IjSSde

Э-.

r""TT

t-

-4-

3.*& dé tor.or

Inny de 4 ry,jbe Z>*- <LeW4 de / % de D dc«M

<Uo.o4.    ■    ' de 4“/L

/тогюе de

-f\-A

4-

.yNLnL

COUPE TRANSVERSALE svr тага ARCHE Й—- — -⁴—--ж----

COUPE SULYÄN.T АБ

___£JL»_ _.

___ovS_

:---Я-

штт

ТШ

ЛЦ

Sf-i

-I

'A

I-

E’

"Ÿ

n«~i s C/L

lilii

si

гав

В’

4,

в 1|е

!M^--

_ I--l.coo _

--A

__ J, 000 ________TOPaiT

___ J.u>_______________L⁴!

ELEVATION. D'UNE POUTRELLE RÉPARTITION DES ETRIERS

в’

<*1

//

■pn./ i Ligature de* rends tie ^fèondt ci* /6CL    Nen<U <&~/â ”}P

^    ^ ?<? eit rcndt de Z 'N,

COUPE ENTREMN COUPÉ ENTRE MM’

ETRIERS E

'A%.

Kj

il

ftaiiSe de <■£>’ 4* _ "blonde de /3”/^ >'ЯопЯьЖв~%&"Ytti,

-4.-4-

'IPJ

J^O.25 /, 0,25 i 0,25 ^1Яjùvisufri* tie 02,/>

t'*V - Г

iC

й-t-¹---^

jZirLeee cn i'v/iiif titr L

!À

Cl

E TRIERS E

POUTRELLES

S,54,U5^<b8E 4<l5s{h&^

SECTION AB DE LÄPQUTRE * ETRIERS E’

237.?»

_ MOL_

--t

ЧП.

tn ' <u

®5

<U

si

u.

,p ■

-J-

J.

TT

NJ

,e4

-4

roi

si

~ôçT~

v!

tfi

t__

V)

eu

TU

II

m

-zrm/n

тШшШ

1 нтттттггг^

E I I Bï IIP fc I

—y- h--— -—■—^e- —.....—4 iß

<bl/urtxoM ли

DISPOSITION DES FERS DANS LA POUTRE MAITRESSE répartition: des dtrjers

JSßv?e_ MoU'èrne

fcSfi

gft i : m

ETE'в r F/ k ri я

H'

w

•<DJ

T3

■Hr4?

m

fU

:d

JSdriere /L

Hcrut6 <te ze "iź/

WMA.

yiàheft &* :c&rn'/n.

».imL -j<

-Гп-^п³

ZZq

POUTRE MAI TSE SSL AU DROIT D'UN. POTEAU

o!

<D

ß:

FRAGMENTS DU PLAN D’ENSEMBLE

HLж

jt54.^S2H|-j8i-ra245;!4l

SECTIONED DE LA POUTRE ETRÎBRSE’

PS

Ui

Etriers______

ceas'tée de Ct30^

Tl

"■+

^.5AL4-ßA _U>sSlL SECTION GH DE LA POUTRE

E TRIERS E

o' '

3

0(

^o,%d.âez6X

î4

ТТГ

Eirvers rendis de.

L--a4n.'_,4

4-

+4

4>

if- —

“T

COUPE D’ENSEMBLE 1 "MUR DE SOUTÈNEMENT ! 1 ETRE CLOTURE I

MUR D’ENCEINTE

DES ACIÉRIES D A.W CUS

USINÉ ïy HOBOKEN

I;

Not Ii ~ Lep contre fortp du

__Zi.55 n/,___

LI

ki

COUPE SUr/ANT cd

11 iMfcüzM/c

ib

mur

sont esp&ced de 2 mètre/.

Ls d^stslice entre Im (frèma tHère s m en croissant jpartir des

çontrefitrh,entre deux contreforts consécutifs

COUPE SUIVANT ab

Тыпиглле Ю

4B

W

w-A

PLAN GENERAL DE L'ENCEINTE

,A

v>

----+

RôncU de Z 6"

i-

Si

SsL

Etrier romt a+ 0,07

Éli»«

ßdi Z S 7n

Ke/icCdc

Etriet's ronds do V ftorvoU de 2<У \    '

i__

h aut do 2â

Ф¹“

v:

Г-Е

^~MZr

EscaulÉ (flea

U-0^5-

4L

шШш

Ш

JûJSijIk

o.o2 ⁰⁰?5^    j

JV oł& —Le fer B edt bouformo kyjj Aur la. tête des pieux .Le fer f.f A S'sccroche ли fer B

‘■gCHtrier du ciuiù’cibri Ц.^1о,о4 :    « rond de j.

LM

Massif tie Helen, enjeuraevt la. \4lUL^^ doe /к«« d.lo. o;S6» о. 8S

EMJUîLuiS?r

7 Lfassit' èn béton ehto^uant Les ; t*tes df pUuec Z.lspfbMto.ćd;

hoiids de tS >

nttr.

it cbe. ÿ.$5 en rapist.

3/assit ’ cil béton

ARMATURES DES-CONTREFORTÉ

CIMENT AB3fÉ-Vv-eVvmod.Editeur

'X —

-~y-o4-    }„~>

D’UN POTEAU ELEVATIONs-imPOTEAU - -

__7

PLAN

/DÉTAIL DE LA COUPE MUR DE SOUTÈNEMENT

'(pStnauotreten nwi ,aiüy<u5.U 5y ff

Wm

\\\4>

I-Qû.

ûK

"к---

I PIAN DES FONDATIONS ^ MASSIF SOUS LES CONTREFORTS'

j3ctüena~de ZS/Eoyion* de 2o ^

;0.o43

-Д

---2A2û___

r !3/l8

le.---

0pniYiPtfćiv5r?tfr^/ix/.f dc S ocartimdt o,!26 et de 0,26

HonfyecLeJo

•I

DT

-4-

•t-

r0ü4-3

Hcridfde /0

f ïie de ÏMUiSotb <ш fr dca/tec de. O/Zf

DETAIL DE LA-COUPE MUR DE CLOTURE I

_c'Ac;

y.

„..JM

.

.

ш

о

\

'

'

'

ix_

ffo/ids do S "’An.

iü

IIP

я»

Li:

COUPE AB

/Г

COUPE CD

125_

__Pt Ł5

0E

/fonds de 8 mAt .

mm

/! Uru

«i

I®

i

ыа га аз га rq

łrł

D=

£c/ieZ/<?

|.

'LL

2 3*56 7 89]°

fluoUtiu

PLAN DU BATIMENT

A

A coheres

|J

a/inet De toilette

- W.C

CouAtni* *

II

Ca/ibrud

id

Directeur

l/ftt

Service e t fédij/uvw Duvet ou

Jbrtce/-

PLANCHERS et POUTRES

CAISSE D’EPARGNE D’AMSTERDAM

ifi

'У/Л'У/.

j/?/,

’"Ж.

Constructeur-: A'odiété WITTENBURG

VOUTE AU DESSUS DE LASALLE DES COMPTES "COURANTES

M»

22*⁵³

O'

_____Porte* entre murs =■ Gin.oo

/fonds c/e /Sf%e

Ronds de A*L    /fonds dê ÔmL Rond de A^A»

тушшшшшт^^рт^уупщут^ШР

•"-- - ;Ы^,жХ lull - ^-~r

'WiwTüff

Rond de /6'Уггх.

fluids deb"is

FXlXXXl

UPÎP

ARMATURE DE LA VOÛTE

ШШ.

(a/e осе l

■ Ct-

tt/de

< nora*

d-p

а>л

с....

6’jo Serowe ’ é/AphonA    t/e- Ut r

t'iit/iĄye.<S CenifiUdUide

"r

Cfurf J <й? U onpUukà. ■

/fonds dé А 4r

tbrryjl

:à._. JP_

Sx

U/

Sous -dtroc/ели'

DETAILS PLANCHERS ET POUTRES

/fond de 8 ,nL

'Щжтттё

fluids

fluids de С"}.

Rondele 6"%,

__

,__

У/У,

y/yy/cv.

J5_

тжт

2ZZZ

;VJ%.

-'i

L-AL25_j

• L_____-ш____

Rond de У "Л.

-I

Ronds dc /С %

Ronds ле П‘%1

flondsrte 6"X,    Hond de /6"Z.

шщ&ф

Tsî^P m

a#

TL

/fonds de S’"/*»

JL

72

Xff

I ;| Pond deG^/m

fc

floods de A % ^\flondsde/£%

/faillis de ßУт.

_i

/fond deA'%, ^X. Ronds de l8mAn

td

mm

ШШ1

шИ

-, ‘ * bud de <?"%.

Rond de/l '%,

4Й7

mm

M-

y\

фЩ

\ \ÆL^//t

x/fo/ul cU A mA /fond oie AnVm.

DETAILS

DU

PLANCHER ET PONDA T IONS

Ш)

« #р

УуУууу/УА

PLANCHER EN SOUS-SOL

vÆ

\ Rond de /£ "!U.    \ flond.de ArK

i Rond de    js.éClSjOMS Rond dr/0 "A

■У/,

УА

^W/r/JfWry.

|B

%/zyy/r/y. Xfil

ojicLdc A

%?/^?//УЛ//7Ц/У/Я//*//УЛ\ ■ A/-\Rû/idcte8r%. \7fonot de /0 X,

DALLES DUqUAl DE ROTTERDAM

. COUPE TRANSVERSALE

--rilM'V^LYlV-I^VVlVJ4,'S(,AiiVVll+ył4 N<L+__Ä-4I___h

FABRIQUE DF MARGARINE A OSCH

PLANCHER/ ET POUTRES

ATELIERS DE REPARATION^ DEgl TELEGRAPHES DE LETAT

A LA BAYE

_ _ 1?A _

Ifc

TT⁻

----------

____i___I___№.

-r—

___LZA

FFI 1.1

|n

Rends de. JG"/*,

aiqra

d.

ХЖхГ

s!

1Ш

та:

COUPE LONGITUDINALE

flood dc О- oG

fluid de o. o S

;i Ш1

-tJsm\    —»

4 ■** J MONTRANT LES ARMATURES

COUPE

Г (fonds c/eUn'U

IR

т-i.

X/FXc/5 cteb'Y-

U4

¹    ~?7П "armature/ de/ FTLIEk/ ET POUTRE/

ШШ

SL

■ |.V[

7;

шш§

|г---j__Site- _ __ .oje

fl<aid de /2'Х.

L___°Pl

fl!

iii

PLAN DE EA FABRIQUE

tu

Ц’

.A?⁵_____,_5IüA_;_____«Ее.__.|__ÊCe______SCO___    3.75 ,

A-o±___

IU

II¹ -il ii 4«|j._L?e_|.V-Eep

Si

f::

UlillJl!

-г:т'!л—

ВДР

lEUIlTI

XXnp:Uri:qin:rHxiil _t xqii Txx гifraxr.

xX

•pain

<i ri^_,ci;l3lrili.xr.tr,a.T;3E Sj:Tt-'LUtL-n:t: L : : : -I-< У¹'

I ГХГШт FFluX ,a

TrxiXXOTXXFIXXPr:

le

---ITX)

■ г:|га :т1ш.

Xnxitn:Lj:iT'i|uxiX:

SwHUlo.iiLliiiir Tej

иищгцг

!—.—î~

4—.'-—*--1 —

хтга:

IZLLJ

рТГТПХГ X UUl uXi-FlX-L-ШтИТ иПХттЬт

тнхппйтХ

ЛХЦ¹'

rrrrr

Si!

lü

II!

ji

it«ï_ i|_ Ł5o_

2.50

т-

_45о_

ä*-

IJ-

ii

5!

up

iE

V/.

~РРУУР7у7УУУУРУ77У7У77Р7УУУ7уУУ77У7777УУ7УУУУ777УуУ7УУ77’,

edUPE D'ENSEMBLE,

Ronds de 20'"/...

i! О

If

_L — ifti£4—

jj3j ВрШХ;

ЩЛ

Ir

ж

fi

It

----*-j-

IL

tell . -У'Ш

Il a

>-3

Уууууу/ууу'/}

УУ777777У7УУ77777777777777У77У7У7777777У777777777777777У7777У77У/ ~~\У‘УУУ/

Ш4

ЛгхиГ.гЕ . POUTRE VUE EN PLAIN ц_ o-L⁰-,)

Л Rends de О.К    J>ù®_ -Ą

COUPLAB S

mmm

Шжу

ill

I COUPE CD M

POUTRE SUPPORTANT j UN MUR БЕ FAÇADE I DANS UNE

CUISINE POPULAIRE *l

si-

il

fa

Ronds c/e 8 У*

Il

i-

lii

Rontu dem

V. r-У/у '

Te2û'’A.

ШШ/

I    ¹

fcL_U,3o._lT

lids dè l%

Rond de A*i>

ßerpor ot (хиШере-гплА

(f.1МВЛТ ЛПМК _VV-P Dimod.Editeur

<>

.

:

■ l

«

■

&

.

«

VA

,35t..

I.

-млЦ-

I Ff

Slll

2?l4'o___

M. i

fvvAAAl t

fi i,; ii i:: ai

liil

■i

—ц-

___deuten. *

Um tmnatensethmn

1'

,J

mm

"8

оДЗ*

лцЬаЛ

PLAN DES CAVES

УУуШлуУШУууУ/.

ÔÉÜ

—|"XI1

,1

■i

tn

_ L^o_

XIII

°!

V5i

XI

О*?* y łSJ/]fl

7*sRée»pe.

PLAN. DE L'ESCALIER

COUPE

SUR

EËÂîjj

ir-xa

Li

SJ

Trtrrno/V-.

ТУ’Г’А

RADIER DE EONDATION-ESCALIER

cave étanche de la bourse d’amsterdam

efj* 7 /У7У/

/ OYISJ,

Constructeur: SOCIÉTÉ WIT TENBURG

ЯПГ

o!

s¹

je__;rc£>______É&2

4-

G OUPE T RANS VE R S AEE

ARMATURES DU RADIER

FileM

-7T°

-A-

i55o

4 <*.

Mil

PLAN

EU

:    14-%

.wwww

“T

Rends. do /0 /m_ со a ctcd$ ~2łe~Z o o \ Rondo der. /0    \

XII

iO"Vm.

^ COUPE "

^otw <üio”/*t.

'Rends de /0 espacés de 200

JL

» «

TE

-.10'

------Ma-—

—тМо- ЛДц.-

10'%.

”! i

_çJ43fe

мл,.

ши

l'H

w* ISO

Ttcnds de d'yirt-

-—« PLAN ET C OUPE

Ronde de ///

A es/J ctcsle dé So

mm

iii

Шл

MASSIF SOUS LA PILE M

DETAIL DE L’ARMATURE

—. .A

Ш1ШТ

IpLw

Ro/uio de 30. Rervdô de //f. csptvce'e do lâôT I

УУУ/У/С.

Trends de /// i espacés de 1ÖO

HOTEL

ME R CU RI US-A LA HAYE

i.

ii

m j; ■

COUPE SUR CD

Rond do /0

Ronde de /// */*_.

V//Zv//7a

у////р/У/р///Ур.

У,///////?А///////////^///////л

У/Л

////////7///////////т///^//////7//Ач(У///}пу////////л*/2^

Rond dc 8 "/en.

COUPE SUR GH

Hond, <U Ю M.,

А/

W//A

^____8üû S__* H|

Rond- da łO "У/...

• UV

i.

JÜJ

îi

G!

rarappaaEgą# Ł ii ^

;•

-w

idU

COUPE SUR AB

KoruLsteJS"/«.

{////■'Z7777?Z7ź77a

&У«.

Tbs&jbjo^UCOUPE SURE^"^"-

\уУ//У//^/р/У//А/УУ//У/₁^////УУ/////^//А^/////СУ///>

Шшштштшшш"’

ршжздшшшжш#.

Ÿ//////?//////r////{iï////Â/7K/f////Av///iï/////?^

⁴ Rond de /0

lia

L’ESCALIER

COUPE D'ENSEMBLE

TLchelle

1 '    '    1    1 ’ Jo Alètr e 9

* -Ауууу Уу УУ-у ‘/“S‘ syr 7 ’/ O/y*/ У

77^

yrp    Щ

/А

-LU*1WT4

ЙШ*

яр

üti

...

ИГ

i i н

mm

■ШшШ

ttr-l

Х|Н

te

2SS

-I

LP

[SIE

mm

DISPOSITION

БЕ

L ■'ARMATURE

imm.

ù.

lilii!

:-Трс__иТ.

=^55æ=T

ljis§

libtif

ippip

Äs

DÊRNIERE REVOLUTION DE L'ESCALIER

Rende de 3 "/nv

Kt^SÎIrl

\£ïîi

Щ ii

M-

-M- !

Palier №XII

Ronde de !3 nlA

DETAILS DE LA COUPE SUR CD

Ronde tie R rn/oi. оераоее de bo ”/L

ее расе 6 de ÔO '

Rends de

espaces de /do "V^

JAonds iio A "Ут.    '

елрпссй tie i do ”'/™ .

l^erids de S”'/**-, j oopcLeęti d* 5o

-Rende do R *%.

eeyctees de‘dû

Palier №XI

Rétull cU 19 4m

Ronde de /l m'/m

VT

Ronds de З'^/ny' e-S/nccds de SO /т .

Ronds de //_ п^/т— espaces de /00 "У/п.

v>

es

II

ШФ

iss

lilll

il

!

ill!

mm.

ÏÎZ%

.B__

Palier N°XI

Re/tds de 3 m/m-.

Kend do /O

Hondo dts4.*/t.

У//

|D

Rond, de 8 '%..-' Rond et' A '"-A

DETAILS DE

/tends ds

w,

LA COUPE SUR AB

Palier MX

s/A

COUPE SUIVAtSLT AB

wß

ЖД Recule de В- 'У>*.

Rends de

î 'V

'

ч

-V-

■

.

,

'

о

i =0.0 f

„5,40__

4 З.Г.

CarnY^cu'O Lsolan/e /Щи** de ÆÀv,

RESERVOIR

---->

0 OJ

AARCIS - EN - BRIE CAPACITÉ 100 M ?

(jarriuus'e isolante ort brioueo de t/ègr

tO.IO

UOÖ--

0.10

i I)

450____

°L-N

4

-A

fe-

А?

ELEVATION ET COUPE

PLAN

. Шшшшттштштттш

с//////////У////////////W7/////////////A

MAISON

И,

h Hi

!lA

:i

' /и<

Ул

\\

/■/><

\N

'VA\

■' '-V \ I

fh

v\i

kt

x'

\ï

/7

-c'

X-'

ЛК

l'V.

/ AC

,7

/,'

. 'чч

\₄

N,

V.

\.l

'•Ч

/^у^у///уУ//Уууу/у//уууУ/УУгуу0>ууУууу^

RESERVOIRS

К- ---

.5Jo

„!

aur,s -

Constru-cłcwó .'MU DE MAY FRÈRE S

0.1 o_,

-I

■ ?!

*.__1-lL

_*L

= 1

J COUPE SUIVANT CD . TABLIER DT BASSIN DÉ СЖТЕШ ’

-u

PLAN

а/ ;

i!

/у ! / .!

3.75

USINE SAINT FRERES A BEAUVÄL- SOMME RESERVOIR de 7-OOOM³

V\

■i’C

o.ia A

7ï.

5o.'oo

OSSATURE D'UN PILIER

W⁶ POMMERYbT C¹? A REIMS

RESERVOIR DE loooM³

COUTE D'UNE POUTRE MAITRESSE

tzzsszzszzzzł

Z~ ypyyyyf

/^'/11уУ/У////уу/у/у>/У/УУ/УУУУ/УУУУУУ/Ууууууу/уу$уууууууУ/)?УУУУУУУУ;У?Ууууууууу//УУУУУУуУ'

COUPE

ь?1 I- -ч

////У/Уу/

G OUPE DU RADIER ET DE LA PAROI

*2Z/2ZZZZ2k

0.35

i/i

7Z,

⁷YYZ-

Wa

ft-

Y////У//У///У/А

/ À'

'ч

'^Уууууу^уууууууууу^ууууу'уууууууууу/Ууу'^у^'^^ухууу/Ту/^УУУУУУУУУУУУ'УУУУУУУ'УУУ'УУУУ^

I    П    7I\- 28,G5

\ sJfatnUaą,

ll

■t

'/y

BL3

____i

JfPLM

A.

ftii

kl

y//

I

ушк

*--ł2|j----Ц--М5___

А

>---4-Z5

Уууууууу/

yiï^y?7Pffityffiyyyyyyyyyyyyyffl7!7ÿfflfffîvy'/

COUPE LONGITUDINALE et fLańde la poutraison

vyyyyy,

•:!

•!

l.j

\\

E";ï\ V.

l-~~o

-V

Vt

/R.

•I

x-^

ШууАууЖ

/V

I-

5i

_1Z5 _

i|

[I

ШЩуЖ 1

СОХГРЕ

xi Un contrefort SUTUÄNT AB

N4 •

\\

jZTjA

CLOISON SEPARATIVE TU MILIEU

2.6 5

g'

//

>4.

//

\v

11

■c

Ш J.-5L

Li'.

LSI, _L4L.

4=

-|£²Uj

: !

MZ5.

iFl

/и;

/7

/<-

! :

y. il

O.fto

A.

1.

ЬМ--175__

I ■■

___A-75__

Ś4C

шМШшшмт.

2;

Si

ji

!«

ii

»S

ARMATURE DU RADIER DES CONTREFORTS ET DU PLANCHER

Planche ХЩ

-•

.

:

.

1.

*

Foutre J\t - 12barres X

- +'

cd

FV

■i

X-

ГГП

« ^ i Г> А,

ESCALIER - g O UVXK TURĘ

Jitgcnićur Cv/idtrurCeiir : MR doULAROU

Ź terrât лир la /toućre At 4- 20 i • 2&0

sfeg/L/ / Ш

--J.oa__

- HK—

”7*45

⁷ ь

с,

/X..

--Ы

____1аш>___

о.аС

2 barrofinJ' PTt/a la /инЛпЛ-у

J.Ô l.iSo.    I

//%Ч.

-Limen УУ

у?

?о

4$    \У. . , .

УУ] et .в t-b.2k

J.J l.b.ew

J/unon/B’.

V------Pïrz 4

V.-aJ /Pi

Rond Ые2Ъ

*r-№—2

3Ü-

4 barret d- 6’ I .<7.20

-V

—£3c—

Fiiberjy.

bo----Л-2-7---j!*

>-

•PUlerJR

?-

COUPE у

•/> l>/%5o teuer (л* za

I /Ч </ /

'■A,

aCtf¹ l-i/,20 lout las zo ~

Sarnau inf*V* c/и, UnuNb. rt-23

bat'rt, SUfJ T d^Ł luiVOlle £С‘в I'/f-rOO

X/

4N

J • У T-r^oo    ^    /с-, y ;iv

tn/Vr'ieüeee dii lueum jC / .    u

i-JJa    A / 2bctrreiX

.2 Aac're*

ic

z4

7/7

V/

4;

V.    «»

X/

/>

d-jG

-.V

p’

p.

. i fir»

\e/• Ć? /•&,&<?

-V---iüQjû___

Jt/mon Bf-föharreti

p\

fpppillид.

^fffxsgSl

/5jarres Je C± \ Corres Ые(.’Х.,апГ1м ШШШ

Longe C.5o    уЯТу'ГГ

tongT 1,0»

p*

ÉbÉ.VATION

ESCALIER

Propriété de M. M“ LAROCHE-JOUBERT

A ANCOULÈME

PLAN

<2^*V /л/С70

/loud de 20

\f--23--

r'.

^l§

±rt

1Ш

: \£:\.

Шу

X.

*6

XX

X.

zu

.coupeIhi

C'

ćoupl) Suivant cd

I    /Ч/А

barres X

XX

y-,

N*

Tiher’ 2?‘

-Limea -ЗСbar res

V-

/4

СЧ

X'

/х

Xv ,,5«⁵

X,,

%C""

/■

100

Ь-25—Ц

БГЩ I ШЙ {

гщп

У1 ! iX

к-

JkVL__

4-

Sba/rvt d./O i.a.uR

s4>arraa J.M У Ft/S

ŻCMEILE^PILIER^

SST

■T

^ éiarresde € "I,

Чопд.г4.2о

7U

~T

:«

_L

P1LIERP

8Ш1Ш11И1;шТиЩ]л

F IP1

* J ф io Ну/foo 4    ^ iongrVoo ^    ^    UncfV

'щшк

oi^3

'S

LWL

а. Ю

PILIER Pi PILIERdrtP’ POUTRE D

ix»

J./2

d-8

Шс

'Pi

si

dsjy

POUTREC C

___'-UL<r___

1ГЖ

УУУУУУУУУУУУУ

d ~ ty

ТгУ**-

\-.-i

Ш

L-jA-X

COUPE DE^ POUTRE/ B2B3

1--'ff®—f

vN

d-<? У/?;20 tout e/о larreeiti/er X'-3o l-S.fro

(/•ф' С */ 00

n4 у

=4А

fy

/\d-d i - e.zo -l    Л1ШС.......

ci-# t -J.oo

7irrwr>_ />

Hcruis <4e 3(7.

coups yh

Cl $

ах;

XX /

“Г

«J

%/

ЧС"

JLimonJb-23Jtar.

xx"

4x

7Mî

__LCP__

----±

zz&z==d====ä£~

qiyaTBfr.    Ы    I

' fai |0.[. Ь‘

I ДХ.*н;!1|я' ! its! Is. 's

х^Шй^шй^7/г:н||;в| на¹. •-*-M-*4i^i4dJU^W»t:^]ahiaS-T нГ|:P r “-BliiH ! ai ;b< ;a

ffbyy-t't

UUX.c,Xa.

IpiliEl! i-iiai SS|!

fHNiN -ri :~

lai!«в!¹ Sia! \я\ iв

. i Y i

Jârdm

-4-

:Ą

ï:

TT

?!

K,j

PLAN' (JENERAŁ

Bzvçcr 4/ OuiZlenrn*,

Cour»

!B

-i—*

Conditionnement privé de

R O UBAIX -T O U RC OINGj

~]f~U.....—}{ s

ЩУУ/У/УУУУУУУуЩуууууууууууууу^\

I tU, , ..

EE3.

V///////

dOUPEMK

y. Z-,

>ч

: ; ууууфууфуууфууфу/ууууУуу^ТУУУт^ФуУ/ЛФт’ФуУУуфуууфу'у

Coupe transversale

■I-1

PP

JEEL

F=T

JEEL

F=l

\?ЛуууууууУУуууууууууууууу'/уууууууууууууууууууууу?ууууу)1уууууууууууУуууу>/уууу>/уЬ/ууууууууу>фууууууу>/у\\

COUPE LONGITUDINALE

u>!

4-

jM

Ces barret s* retour

t>tr[e*n-dUu tairenunt dans Lol

1 barre Je 8 %    /*w ‘“P"*“” J* °, bo

■i.    _ -Ç

mrmuS '

^-4

“i

!    ч4-^-4-чм(~й-2 _

I Ыа-144-i. 444ASXi44î]

*яшйш trrttt|&

\tsSXJ-

/41

'УУ/У/У/А

JtonJ JeJefe

1 barre de 17"/

22 barret Je 8%. Pony'3.2о 13 barm JeS"/,„. ïûпа(.Ло

~^%36arm de 87* long, J,Jo CJtarres Je8mAm /акт. f.P о

(o.n8

5.00

5,00 _

Barres cleß ,%i

ir*.

Jiarres de 8"%*-

А.-Л

----

3jarres Je8K. lonir.3. 7» А/    * Wyté

G barres Je8%> long. f.2ol

*Нг

’Шф^ LANTERKEÄUXbt? mäSäSin

4l/|, POUTRE g

Г^< Berra'S de /Z'%>

®* Лопс/s c/e 2.0 "'A».

Rem/de 10 У..

COLIVE £

„    Ш/У/У/УЖУ^/////,

лоне/de in*/* ™ya a

Уст/tie Ъо^У.J

1Л¹

W|

’—Vrv- Duno d - E dit euin

*

.

)

)

■

%

».

ф-

*=

^7%

TYPE А

Ligature

7:

ft

=s

•V>гуу

liiga/ure

У//

ARMATURE VUE DE PROFIL

Ш

<Шхл

//

SEP

//

an^ra^e dan£ le$ mur^

.Ill

ШЖ

Ligature Ligature

TtT

VUE DE PROFIL

POUTRE^ ET PLANCHERS

VY$TÈML № 2

TYPE a

TYPE Ь

Ber с ridule '

Ly

Jsigature

VUES PERSPECTIVE^ w

Fer ondula

0,

'(taris le haar etie

ГШ

ЖШЖЩ -J\

//у

ШШ

УШШ

Ał

• iffahtrę

J^riga/urp

TRAVAUX DIVERS

CLOISONS TS,T REVETEMENTS

TYPE В

Coupe

fl,igaài -e

PLAN

Barres formant f Ugo tu j e

System# IDE G ON

'4K

7//Ш

у/'.

V:

Vil..

\Г

ШЮЛ^Ж

' в.

JL

J3

4-

77;

W№âSÈ(£4-

7*7

;Cv

11111

А*

У///УХ

■иая

i:

TYPE О

POUTRES ET PLANCHERS SYSTEME №1

TYPE D

BARRER EU HOURDI0 FORMAITĘTRIENT

■Ц

V"

Zitfahuv

У/

Ж/Ж

Ш /#

ж

N4

№3

«7    W

Ligature X-s.

VUE PERSPECTIVE

W«M®

TYFE£ DE LiqATURE^

Jt

'■л

Harras du Hoi

TYPES DE LIGATURE £

il n

/>

Ж.

û\

//'Ligotui ‘e

LIGATURE ШЗ VUE PERSPECTIVE

, Al

Ж1 \u '

пr

/У

7-

Ax

/Barre oiututée

TUYAUX

Ligature

4*

И?

//Ъ awes ^ P#wtre

V Barre» orututées

(Lists ta /lourdes

№6

(fil

№5

№7

(P

%t)

•it'

VUE, PERSPECTIVE

•ÿ

Ht

jh

É|

IP

ri

POUR

CANALISATIONS Щ

i J3arre o/idu*

ï\

«Liai

II

■i

ŸA

//Ligature

TYPEA.

TYPE B

TYPE d

VUE DE L'ARMATURE

JBcu'rc du hour des

^Ligature

I.

ESS

H OURDIS DE PLANCHERS

Sur ^oliveS en fers

COUPE LONGITUDINALE

tAgature

77}

\SSl

LOUPE LONGITUDINALE

Colonnes

ШШ

ШШШШа

2S?I

TYPE №1

et

'Vs.

V/Æ

WA

Tl

agraffes

agryffe

Coupe transversale

mm

m*

У07У>.

77./W-

W//.

ТГР1И № 2

COUPE TRANSVERSALE.

У//.

Va

il

PILIERS

COFFRAGE

ELEVATION

(7

Va

Z/

PLANS

\N

NU

ШШШШ

//

vm

ш

V/

у777У////Л///7/Уау/0//у}///7777/

t LTu.Ty

2)tu > V ondule*

V/raf/b

agra/ft

larr-eson aUs/ees

Berger «ê OuMerme .CfMETNT A f{ ME _ M“* Dun о d Editeur

Planche ХШП

:•

ç

?

>

¹¹

3,55

r T-

I li

'Ś

■*

il u

! 'г|.

/AU

'^nsoseessmSeeséâ№

У/7'У

7 "/УУУУУГУ^Ууу'/уу’/'/ууу'/7>Уу>уУ>/

уу

TRAVAUX DMCRS

Constructeur' •' ß о diet e de^ Ciment^ de la Porte de Tranche

RESERVOIR A E0URCAT1ER. (DOUBS)

'/

'S fi Z/lrie /fltK    \Y

COUPE SUR LE TROU D HOMME

-~r-

V '/”/у У'/'/ '/угуу < 'У с'ууу'yfp '' у*    уууу^АуууУу'У'У,УУ‘,У'

Jlo/ićts dc û.ôo5

Va COUPE

LAVOIR PUBLIC a GY-OUJ¹ jSAÔJMR.)

PLĄMS

Tfcncts cU8*%^&

Vz ELEVATION

fe.rsT de /57m

Г"

T>

6<E

Щг-- pH

Л)

WW0K-___-

Ш МГ i

H?

F'. 7

‘•I

'ł

у?

«

i«

O*

)|ЛД'

! /_A

U1

-4

У--rl

SECTION DE LA COUVERTURE

-—У

ïïl

K-r=

ГЖ

Tç/l'_25j25j}

III

hi

■ /t

ToiW нога z Wtale i -k PLj

L-J-

PLAN

COUPE

DELA

C0UVE^TtMU4

_ _ <UL---1

ETLTTP

У7

V'

7 /\

///

POUTRE-LINTEAU

ËÆTË

Ml

_ J/üOdesir Ortade SJO-

>m;

jy Heads de 0.006 ó -Far à fdejO.ZS*///*

7: Pends ci» d/fiUainie* ^iW.

\<eus\K

Й SECTION DE LA PAROI

;-S*

'Жъ,

7%/..

/,„ KL

уз // %

Д \ ' !

\YY II!

V \ T

SjL

Y/

uw

II

iî

/₍

•/

4.

I S

%. % mi / / ⁷

NV vàvJ '    /

^Г;.-

ЧУ'

₀ъУ

(èmiirv tieUMiâoisZ

шХк

A A 7/7////, '// /// 7////У/ / / //////777/ 777

у//////7/77/7777//7//7У/У/7У77/777У7/У/7У//л ^ У///////////////////////////////////////

■ Ronds Uc 0.006    \ \\

Cî

¹__У

ri

~r

ЩУшУ

fcr.r X Je 16 "У™ ■

,<ï

:y;

yy

yA

T'i

\'

У/': У

I;

\ x Ronds deO.005 // :

\. -A

ШРШ

RÿLLLiirx •: zi.

Spire* on ronde dc 5,л/т.

Vers à T de j£*f&<4

RÉSERVOIR A DEUX COMPARTIMENTS - RAPACITE : 510 M?

DISTRIBUTION D’EAU DD DELLE Y

TZotvd* tùü JÙ2, "/ntt,

7Щ

on J s rie 10Z \

■г7УУУУ7У77⁷Ш_

A Cornière* de J O* 60* 5 d* £'*%*-

JONCTlONsuRADlEIU

ET DE TA PAROI ^

Ы

Пгпл «i

V;

bp|

[_ î> C5 I je o5

' 75

.ад

%.

Ferro/ui- /O ^Mèptat d* fjffOtS'

-У

; vv , '

•'/)

~=L

Perà-UJU /ta*

fi.

///

V-

\ X.

■V

II

У'

N.

NS

Щ.‘ l/cïdoivne de 03 hi. béton afn

PLAN DE LA

COUVERTURE

w/мщ

C-OUPE. SUR LAXD

I-

7Zvnda de]Om/n-^ Sor a, U cU    6

COURONNR

SOMMIER

COURONNE DU TROU D'HOMME 'ftofuicto /&,n/m^    %!УуУу~~7777Л

-Ronds de    УУ^^У/Ą

'4

NSi

%.

///

PLAN Ш .RADIER

У/

PLANCHER DR LA BRASSERIE DELA FRISE À GRENOBLE

COUPE LONGITUDINALE D'UNE POUTRR

Cornière M 7OtrfO**

_giśe

■Mm

ł "УЩ

or

TYPE DE LA CANALISADON ÉTABLIE A MOdTIERS

-Ń

<>^2èo mon/tuds en rend* ci* ^m/f7V

!2fars en. Ude bo* 20* S

«il

'’/i.vr-LI'

s!

COUPE SUIVANT CD ET EF

fioiuU tt«7"‘/-^ dj| frr dYcU ZC,20.//

P. COUPE/ GH

ЛошУ de S'%, flends dcâVm

7Z/2T.

it

УЛ

PLAN-COUPE/ SUIVANT AB

0,027

Remis de 5 У**

VÛT/Zy?

YZiïHT/.

yyj

TUYAUX

POUR CANALISATION

7 -4M!

Z,.

Reuilfard de 2od TtoneL do VVih.

Rendde?%

Per T dcSvrSStS

..жШВ

F_

ftoo?

•и

!i|

!!i

!»i

iii

il;

Hi

HI

I iii

0.O..O7

Hi

\MmkJUarid. ite/ЯаИ TÂT

|D

io52

lîi

:ii

I>1

:;1

ü!

>/

iii

!'l

1!'

ni

и*

A50.

I

ü:

Si

У/.

!'!

H*

i₍ i

]■:

'i.

in

l'i

l'i

h.oiL.

HJ

I¹!

fl

COUPE TRANSVERSALE

il;

Tir à Tde /di/6* 2#

! H i 1

.1'! i ül

Ül

!"

in

.и

i* ' l'i

Ü!

l!i

!•!

iji    J

I    1

ji: il:

>1

PLANCHER DU GRAND HÔTEL BERNÄSCON A A1X-LE$-BAIA'S

c COUPE LONaiTUDINALE suivant AB    ^

I~rri ü i~r~rtT—11—ir-rïili_i Т7Г„Ш-.1-д:. aeft Pond d* yÿm    __V ^,J    |A    ______

Per à Tde i/ô, riva

Petul/ord de i fS*l

1.1

У//Х///Л

У/УУУ

77*

LJ

7?muC(t*7"'/in-

wmzzm.

I¹!

u|

Тту

Jiitraëure - fil <ie Sèrfin- ■ Perd f de jo*2Q* 3

WM

о.вй

Хопфьеиг du. tuyau- ],So_

77

GOUPE, TRANSVERSALE

COUPE. LONGITUDINALE

COUPE LONGITUDINALE

z>

Y/

'///л DETAIL-Wi Vi GRANDEUR

7___адбА__{g jf----am---

COUPE SUIVANT CD

jT5<trg*r et GiiuMii

ivive-

Te~VY? Dun о d-E diteur

lmp. MONROCQ. - Paris

Planche XLK

l

f

■

S.

A

*' «'

'

TE*

-

KRAKÓW

*

*

S. 61

О-

'

w

-»    • ч.

и. ■■

с

\

:*

■

т

$

:»•

\гл

Г:

i'"

f 1

k-

f*

ft

vfL

>*1

НЕ вшитя

ёнШхМ

WYDZIAŁY FOLITECHNICZN

ШИТ ТПТР1Г A Rł.

Biblioteka Politechniki Krakowskiej

111-17905

toru u. J. Zair 356. 10.5b:

PPI

гЩ

Biblioteka Politechniki Kiakowskiei

100000300705