/•

IW

WYDZIAŁY POLITECHNICZNE KRAKÓW

•i

BIBLIOTEKA GŁÓWKA

iii

i ii

J

■ś

К '' \

V

i!

'

МШ i

1Ш1 '

s

:

i

Druk. U. J. Zam. 356. 10.000.

:

i?

iilMMl.

I

мтаамита

BI

i

lüi i » Щ шШ/штш

I

;

p:

:

i; i!¹:

m

I

Ł

_______

l;:—

Hochbautechnische

Bibliothek

aus

der Sammlung Göschen

Geologie von Dr. Edgar Dacqué.

I.    Allgemeine Geologie. Mit 75 Figuren.......Nr. 13

II.    Stratigraphie. Mit 56 Figuren und 7 Tafeln .... Nr. 846 Mineralogie von Prof. Dr. R. Brauns. Mit 132 Figuren . Nr. 29 Petrographie von hrof. Dr. W. Bruhns. Mit 15 Figuren . Nr. 173 Praktisches Zahlenrechnen von Professor Dr.-Ing.

P. Werkmeister. Mit 58 Figuren............

Technische Tabellen und Formeln von Dr.-Ing.

W. Müller. Mit 106 Figuren..............

Materialprüfungswesen. Einführung In die moderne Technik der Materialprüfung von Dipl.-Ing K. Memmler.

I.    Materialeigenschaften.— Festigkeitsversuche.— Hilfsmittel für Festigkeitsversuche. Mit 58 Figuren . . .

II.    Metallprüfung und Prüfung von Hilfsmaterialien des Maschinenbaues. — BaumateriaWüfung. — Papierprüfung. — Schmiermittelprüfung. — Einiges über Metallographie. Mit 31 Figuren .... • . . . .

Statik von Prof. W. Hauber.

I.    Die Grundlchre der Statik starrer Körper. Mit 82 Figuren Nr. 178

II.    Angewandte Statik. Mit 61 Figuren.........Nr. 179

Graphische Statik mit besonderer Berücksichtigung der

Einfluhlinien von Dipl.-Ing. Otto Henkel. 2 BSnde.

Mit 207 Figuren

Statische Berechnung des Bautechnikers von Dipl.-Ing. Walter Selckmann.

I.    Die statische Untersuchung der Bauteile des einfachen Wohnhauses. Mit 174 Figuren.......

II.    Die zusammengesetzte Festigkeit. Die statische Unter

suchung des eisernen Dachbinders. Die Standsicherheit. Mit 122 Figuren ...........

Festigkeitslehre von Prof. W. Hauber. Mit 56 Figuren. Nr. 288 Aufgabe!

sungen Hydraul Kinemat Elastiziti Allgeme Platten.

Max Eni

Biblioteka Politechniki Krakowskiej

100000298043

Nr. 405

Nr. 579

Nr. 311

Nr. 312

Nr. 603. 695

Nr. 784

Nr. 785

** I.ö-

. Nr. 491 . Nr. 397 sn Nr. 584

id

ie

g.

. Nr. 519

Geometrisches Zeichnen von H. Becker, neubearbeitet

Nr. 236

von Prof. J. Vonderlinn. Mit 290 Figuren und 23 Tafeln Nr. 58 SchattenKonstruKtionen von Prof. J. Vonderlinn. Mit

114 Figuren.....................

ParallelperspeKtive. Rechtwinklige und schiefwinklige Axonometrie von Prof. J. Vonderlinn. Mit 121 Figuren Nr. 260 Zentral-Perspektive von HansFreyberger, neubearbeitet

Nr. 57

von Prof. J. Vonderlinn. Mit 132 Figuren........

Nr. 142 Nr. 143

Darstellende Geometrie von Prof. Dr. Robert Haufener.

I.    Mit 110 Figuren.................

II.    Mit 88 Figuren..................

Die BaustofFkunde von Prof. H. Haberstroh. 3 Bände.

I.    Die Hauptbaustoffe. Mit 35 Abbildungen.....Nr. 506

II.    Die Baustoffe des Hochbaues. Mit 13 Abbildungen Nr. 853

III. Die Baustoffe des Tiefbaues. Mit 26 Abbildungen . Nr. 854

Vermessungskunde von Prof. Dipl.-Ing. P. Werkmeister.

I.    Stückvermessung und Nivellieren. Mit 146 Figuren . Nr. 468

II.    Messung von Horizontalwinkeln, Festlegung von Punkten im Koordinatensystem. Absteckungen. Mit 84Fig. Nr. 469

Nr. 862

III.    Trigonometr. und barometrische Höhenmessung. Tachymetrie u. Topographie. Mit 57 Figuren ...

Das Veranschlagen im Hochbau. Kurzgefabtes Handbuch über das Wesen des Kostenanschlages von Architekt

. Nr. 385

B. D. A. Emil Beutinger. Mit 16 Figuren......

Die Kostenberechnung im Ingenieurbau von Professor

E. Kuhlmann und Dr.-Ing. H. Nitzsche. Mit 5 Tafeln . . Nr. 750 Bauführung von Arch. B. D.A. Emil Beutinger. Mit20Fig. Nr. 399 Maurer- und Steinhauerarbeiten von Prof. Dipl.-ing.

W. Becker.

I.    Mauernu. Maueröffnungen; Fundamente. Mitl68Fig. Nr. 419

Nr. 420

II.    Gewölbe und Gurtbogen, Steinerne Fubböden u.

Treppen. Mit 185 Figuren...........

Nr. 421

III.    Putz- und Stückarbeiten, Wandbekleidungen u. Steingesimse. Mit 73 Figuren ............

Schlosseraroeiten von Prof. E. Viehweger. 2 Bände.

Mit zahlreichen Figuren............. Nr. 761, 762

Eisenkonstruktionen im Hochbau von Ing. Georg

. . Nr. 322

Janetzki. Mit 175 Abb............

Zimmerarbeiten von Prof. Carl Opitz.

Nr. 489

I.    Allgemeines, Balkenlagen, Zwischendecken u. Deckenbildungen, hölzerne Fubböden, Fachwerkswände,

Hänge- und Sprenge werke. Mit 169 Figuren ....

II.    Dächer, Wandbekleidungen, Simsschalungen, Block*,

Nr. 490

Bohlen- und Bretterwände, Zäune, Türen, Tore, Tribünen und Baugerüste. Mit 167 Figuren ....

Tischler- (Schreiner-) Arbeiten von Prof. E.Viehweger.

Nr. 502

I.    Materialien, Handwerkszeuge, Maschinen, Einzelver-bindungen, Fubböden, Fenster, Fensterladen,Treppen,

Aborte. Mit 628 Figuren auf 75 Tafeln.......

II.    Türen und Tore, Anordnung und Konstruktion,

Nr. 503

Haustüren, Tore, Balkontüren, Flurtüren. Mit 296 Figuren auf 105 Tafeln..............

III. Innere Türen, Pendeltüren, Schiebetüren, Drehtüren, Wandverkleidungen, Decken. Mit 323 Figuren Nr. 755

Der Eisenbetonbau von Regierungsbaumeister K. Rö&le.

Neubearbeitet von Dipl.-Ing. O. Henkel. Mit 77 Figuren. Nr. 349 Heizung und Lüftung von Ingenieur Johannes Körting.

I.    Das Wesen und die Berechnung der Heizungs- und

Löftungsanlagen. Mit 24 Figuren.........

II.    Ausführung der Heizungs- und Lüftungsanlagen.

Mit 172 Figuren..................

Entwässerung und Reinigung der Gebäude von

Dipl.-Ing. Wilhelm Schwaab. Mit 92 Figuren.....

Gas- und Wasserversorgung von Dipl.-Ing. W. Schwaab.

Mit 119 Figuren...................

Wohnhäuser von Reg.-Baumeister Kurt Gabriel.

I.    Anlage und Konstr. des Wohnhauses. Mit 91 Fig. Nr. 839

II.    Die Räume des Wohnhauses. Mit 44 Figuren ... Nr. 840

Nr. 342

Nr. 343

Nr. 822

Nr. 412

Gasthäuser und Hotels von Architekt Max Wohler. I. Die Bestandteile und die Einrichtung des Gasthauses. Mit 70 Figuren.............

Nr. 525

II. Die verschiedenen Arten v. Gasthäusern. Mit 82 Fig. Nr. 526

Geschäfts- u. Warenhäuser von Baurat H.Schliepmann.

I.    Vom Laden zum „Grand Magasin". Mit 23 Figuren. Nr. 6^5

II.    Die weitere Entwicklung d. Kaufhäuser. Mit 39 Figuren. Nr. 656 Industrielle und gewerbliche Bauten (Speicher, Lagerhäuser und Fabriken) von Architekt Heinrich Salzmann.

I.    Allgemeines über Anlage und Konstruktion der Industriellen und gewerblichen Bauten

II,    Speicher und Lagerhäuser. Mit 121 Figuren . . . » Nr. 512 Ländliche Bauten von Baurat Ernst Kühn

I.    Kultus- und Gemeinde-Bauten. Mit 64 Figuren . . Nr. 758

II.    D v landwirtsch. Gehöft der Gegenwart. Mit 61 ł ig. Nr. 759

III.    Landhäuser, Ferienhäuser, Arbeiterwohnungen,

Gasthäuser und Wohnhäuser mit gewerblichen Anlagen. Mit 77 Figuren..............

Militärische Bauten von Regierungsbaumeister R. Lang.

I. Mit 59 Figuren..................

Die BauKunst des Schulhauses von Prof. Dr.-Ing.

Ernst Vetterlein.

I. Das Schulhaus. Mit 38 Figuren..........

II. Die Schulräume — Die Nebenanlagen. Mit 31 Figuren Nr. 444

Nr. 511

Nr. 760

Nr. 626

Nr. 443

MärKte und Markthallen für Lebensmittel von Städt. Baurat Richard Schachner.

I. Zweck und Bedeutung von Märkten und Markthallen, ihre Anlage und Ausgestaltung..........

Nr. 719

II. Markthallenbauten. Mit zahlreichen Figuren .... Nr. 720 Öffentliche Bade- und Schwimmanstalten von Geh.

Oberbaurat Dr. Carl Wolff. Mit 51 Figuren Sportanlagen von Prof. Dr. E. Schmitt. I. Mit 78 Figuren Nr. 684

Nr. 380

Weitere bände sind In Vorbereitung

Sammlung Göschen

Schlosser-Arbeiten

Bauwerkeisen mit Tabellen, Niete und Schrauben, Einzelverbindungen, Schjnuck-formen, Fenster, Verschiedenes

Von

Professor E. Viehweger

Architekt in Coin a. Rh.

Mit 662 Figuren auf 89 Tafeln

Durchgesehener Neudruck

Berlin und Leipzig

Vereinigung wissenschaftlicher Verleger

Walter de Gruyter & Co. vormals G. J. Göschen’sche Verlagshandlung

J. Guttentag, Verlags* # buchhandlung - Georg Reimer - Karl J. Trübner - Veit ft Comp.

1919

V orbemerkung.

Für den I. Abschnitt: „Bauwerkeisen“ ist zu beachten: Die Anfertigung der Quadrat- und Rundeisen Tabelle I S. 8, der TL-Eisen Tabelle VIII S. 24 und 25 und der Quadrateisen Tabelle XII S. 28 ist zur Zeit eingestellt.

Bei den Tabellen II—VI und X—XI ist die Anfertigung zur Zeit auf folgende Nummern beschränkt:

Tabelle II S. 9 : Breite 20, 25, 30, 35, 40, 45, 50, 55, 60 mm. Tabelle III S. 10—11: Profil Nr. 8, 10, 12, 14, 16, 18, 20, 22, 24, 26, 28, 30, 32, 36, 40, 45, 50, 55. Tabelle IV S. 0.4—15: Profil Nr. 6%, 8, 10, 12, 14, 16, 18, 20, 22, 26, 30.

Tabelle V S. 16—19: Profil Nr. 2 y₂, 3, 3y₂, 4, 4'/₂, 5, 6y₂, 6, 6У₂, 7, 8, 9, 10, 12, 13, 15, 16.

Tabelle VI S.20—21 : Profil Nr. 4/6, 6Q2/IO, 10/15, 8/16,10/20. Tabelle X S. 26: Profil Nr. 3/3, 4/4, 5/5, 6/6, 8/8, 10/10. Tabelle XI S. 27: Profil Nr. 8/4, 10/5, 16/8, 18/9, 20/10.

Alle Rechte, insbesondere das Übersetzungs* recht von der Verlagshandlung Vorbehalten.

Druck der Vereinigung wissenschaftlicher Verleger Walter de Gruyter & Co. Berlin W. 10.

Inhalt.

Seite

I. Abschnitt. Bauwerkeisen

§ 1. Stabeisen ...........................

§ 2. Bleche..............................

§ 3. Gelochte Bleche......................

§ 4. Wellbleche...........................

§ 5. Buckelplatten .......................

§ 6. Hänge- oder Tonnenbleche ...........

§ 7. Riffelbleche .........................

§ 8. Walzprofile..........................

II.    Abschnitt. Niete und Schrauben............

§ 9. Niete...............................

§ 10. Schrauben .........................

III.    Abschnitt. Einzelverbindungen..............

§ 11. Allgemeines ........................

§ 12. Beispiele für Verbindungen...........

IV.    Abschnitt. Schmuckformen.................

§ 13. Konstruktionsteile ..................

§ 14. Arbeiten des Mittelalters ............

§ 15. Arbeiten der Renaissance............

§ 16. Arbeiten der Barock- und Rokokozeit § 17. Arbeiten der Neuzeit.................

V. Abschnitt. Fenster........................

14

15

15

18

29

29

35

40

40

41

47

48

48

57

60

60

73

§ 18. Sprossenfenster § 19. Flügelfenster . § 20. Doppelfenster § 21. Schiebefenster § 22. Schaufenster .

75

95

100

100

100

VI. Abschnitt. Verschiedenes......................... .

§ 23. Windfahnen...............................

§ 24. Grabschildträger...........................

§ 25. Hilfsverbindungen für Mauern und Bauhölzer

126

126

126

OO

cn

sci-iiqssuiti

p-    —»p—    -*p

и,ъ 0

<TI

S«

Wer größere Kräfte durch Eigenkonstruktionen übertragen will, muß Maßverhältnisse und Verbindungsmittel der einzelnen Konstruktionsteile mit den Gesetzen der Statik (Festigkeitslehre) in Einklang bringen.

I. Abschnitt.

Bauwerkeisen.

(Taf. S. 6, 7, 12, 13.)

§ 1. Stabeisen.

Gebräuchlich sind :

Gleichseitiges Dreikanteisen (Fig. 1); Quadrateisen (Fig. 2); Rundeisen (Fig.3); Sechskanteisen (Fig. 4) und Achtkanteisen (Fig. 5). (Zu Fig. 2 und 3 s. Tabelle I.)

In rechteckigen Querschnittsformen werden Bandeisen, Flacheisen und Universaleisen (Fig. 6) hergestellt, Letztere eignen sich besonders zu Verbindungsblechen (Knotenblechen), weil sie beim Zuschneiden keinen oder den geringsten Abfall geben (Fig. 7, 8 u. 9). (Für Flacheisen gilt die Tabelle II.)

§ 2. Bleche.

Bleche unter 5 mm Stärke bezeichnet man als Feinbleche, über 5 mm als Grobbleche. Die Lagergrößen der Bleche betragen meistens 1000 auf 2000 mm.

§ 3. Gelochte Bleche.

Meistens Feinbleche, die nach verschiedenen Mustern gelocht sind. Es gibt gängige Größen bis 2500 mm Breite und 6000 mm Länge. Sie dienen als Zierbleche und sind mitunter vernickelt, bronziert usw.

§ 4. Wellbleche.

Für Dachdeckungen hat man flache Wellbleche (Fig. 10) von 650 bis 950 mm Plattenbreite und 2000 mm bis 3000 mm Plattenlänge. Für Deckenkonstruktionen

<XJ

Sè/UC&C'fyfat

krri °-

F g. 14

ОНИ

VU

С £ Ч- О - 50 mm

Fg. 18

с:

Wf

Cij

Ci

<£

éi

ЗДгШес&е

лк

hxÊ.M^U-

-1*4

Fg.2

ffiîtrwUV&&U :    & <Ç50 mm . £< Ç> mm

I 4-

1Ч i i

li

«-

!Îi :

€r

C -i

i}

~ ~ ~r

-----i_ -

it?e((êCecfi

~f

• i>

ьо

|4 ei

Ü 34

6,4

4--

c~\—

Fg.l

14

Fg. 6

i-

f-t

Fg.7

4t

i--

-tb.

Tup

4i-

Fg.19

ijrt

Bauwerkeisen.

>îl

C-Eisen, Normalprofile.

ь--------'ll

nr

VI

So

Fg.20 !

$~~n

R = t:

For b > .    r”

Profil 5S)i

/\ -г

1 \

/*

*4

Щ-----Ч;

*s.

"'V

к А..........f.....>-.y-i

>»•- --£—• Fg. 21    *

i--/

>-

LAFg. 23

.J

'•i

Normale,

gleichschenklige L*Eisen.

i    Normale,

f ungleichschenklige L-Eisen.

•Ł

il

i.

л,

i I__

If.....*

S* в

11 FUr Ъ> 100 mm j głlletrdhcn, abpi* i ÜÖfitenTeraetz,t.

a Nietreihen, bei • > ioomm; Nieten aber i

— i (da»x + dmie); J • ^

Fg.22

R - i (d^„ + «wi Fg.2i

-1

10

II

12

13

15

16

17

18

19

20

21

22

2З

24

25

26

27

28

29

ЗО

31

»32

33

34

35

36

37

38

39

40

Tabelle

Querschnitts- und Gewichtstabelle von Quadrat- und Rundeisen.

-d-

•ITo- I

0,25

0,36

0,49

0,64

0,81

1,00

1,21

1,44

1,69

1,96

2,25

2,56

2,89

3,24

3,6i

4,00

4,4i

4,84

-d*

>7

aï il

kg/m qcm

0,20

0,28

0,38

0,50

0,64

0,79

0,95

M3

1,33

1,54

1,77

2,01

2,27

2,54

2,83

3,4

âl I

kg/m mm

0,20 0,15

0,95 0,75 52 M3 0,89 54 i,33 1,04 56

i,54 1,21    58

i,77 i,39 60

3,46 3,46 3,8o 3,80

5,29 4,15 5,76 4,52

6,25 4,91

6,76 5,31 7,29 5,72

7,84

8,41

9,oo

6,15

6,60

7,07

il A*

qcm kglm

i! 4

qcm kg/m

1 o- Abmessungen

n ^ Quer-3 ' schnitt

kg/m

iî il

qcm kg/m

17,64    13,85    13,85    10,88    130    169,00132,67    132,73    104,2

19,36    15,20    15,21    11,94    135    182,25143,07    143,14    112,36

21,16    16,61    16,62    13,05    140    196,00153,86    153,04    120,84

23,04    18,09    18,10    14,21    145    210,25 165,05    165,13    129,63

25,00    19,63    19,64    15,41    150    225,00176,63    176,72    138,72

16,67 155    240,25

17,98 160    256,00

19,33 165    272,25

20,74 170    289,00

22,20 175    306,25

188,60 188,69 200,96 201,06 213,72 213,83 226,87 226,98 240,41 240,53

148,12

157.83

167,85

178,18

188,81

4,4

4,52

4,91

9,61

10,24

7.54    7,55 8,04 8,04

8.55    8,55 9,07 9,o8 9,62 9,62

5,93 92 6,31    94

6,71 96 7,13 98 7,55 100

23,70 180    324,00

25,25 185 342,25 26,86 190    361,00

28,51 195    380,25

30,21 200    400,00

254,34 254,47 268,66 268,80 283,39 283,53 298,50 298,65 314,00 314,16

199,76

211,01

222,57

31,96 205    420,25 329,90

33,76 210 441,00346,19 35,61 215    462,25362,87

37,51 220    484,00

39,46 225    506,25

379,94

397,40

330,06

346,36

363,05

380,13

397,6i

259,10

271,89

285,00

298,40

312,12

4M⁶ 230 529,00415,27 43,50 235    552,25 433,52

45,60 240    576,00452,16

47,74 245    600,25471,20

49,94 250 625,00490,63

52,18 260    676,00

54,48 270    729,00

56,82 280    784,00

59,21 290    841,00

61,65 300    900,00

530,66

572,27

615,44

660,19

706,50

415,48

433,74

452>39

471

,44 490,87

326,15

340,48

355,13

370,08

385.34

530,93

572,36

615,72

660,52

706,86

416,78

449,4'

483,37

518,5.

554,88 ,

10,17

lo,75

n,34

Ii,94

,56

10,18

10,75

ii,34 11,95 9,38 120 12,57 9,86 125

7,99 105 8,44 IIO

8,90 115

110.25    86,55    86,59

121,00    94,99    95,03

132.25    103,82 103,87 144,00 113,04 /113,10

156.25    122,66 122,72

67,97 310 961,00 74,60 320 1024,00 8i,54 ЗЗО 1089,00 88,78 340 1156,00 J96,33 35oji225,oo

754,39

803,84

854,87

907,46

961,63

754,77

804,25

855,30

907,92

962,11

592,49

631,34

671,41

712,72

755,20

Tabelle II.

100

80 i 85 f 90 1 95

2,933 3,140 3,729 3,925 4,474 4,710 5,220 5,495 5,966 6,28 6,712 7,065 7,457 7,850 8,203 8,635 8,949 9,420 9,695 10,20 10,44 10,99 11,19 U,77 11,93 12,56 12.68 13,34 13,42 14,13 14,17 14,91 14,92 15,70 15,661 16,485 16,407 17,27 17,152 18,055 17,898 18,84 18,644 19,625 19,39 80,41 20,135 21,195 20,881 21,98 21.627 22,765 22,373 23,55 26,101 27,475 29,83 31,40 30,028!31,783133,659 35,325

2,826

3,532

4,239

4,945

5,652

6,358

7,065

7,771

8,478

9,184

9,891

10,60

11,30

12,01

12,72

13,42

14,13

14,837

15,543

16.25 16,96 17,663 18,369 19,076 19,782 20,489 21,195 24,728

28.26

2,669

3,336

4,003

4.671 5,338 6,005

6.672

7.340 8,007 8,674

9.341 10,01 ! 10,68

11.34 12,01 12,68 13,345 14,012 14,68 15,347 16,014 16,681 17,349 18,016 18,683

19.35 20,018 23,354 26,690

Gewichtstabelle für Flacheisen.

Breite in ram

I 2,512 ! 3,140 3,768 4,396 5,024 5,652 6,280 6,908 7,536 8,164 8,792 9,420 10,05 10,68 11,30 11,93 12,56 13.186 13.816 14,444 15,072 15,70 16,328 16,956 17,584 18,212 18,84 21,98 25.12

2,198

2,747

3,297

3,846

4,396

4,945

5,495

6,044

6,594

7,143

7,693

8,242

8.792

9,341 10,01 9,891 10,60 10,44 11,19 10,99 11,775 11,54 12,364 12,089 12,953 12,639 13,541 13,188 14,13 13,738 14,719 14,287 15,308 14,837 15,896 15,386 16,485 15,936 17,074 16,486 17,663, 16,485117,859119,233 20,606

18,84 20,41 121,98 23,55 ,_____

21.195122,961 24,728 26.494i28.26

70 I 75 2,355 2,944 3,532 4,121 4,710 5,299 5,887 6,476 7,065 7,654 8,242 8,831 9,420

25 ) 30 I 35 ! 40 i 45 I 50 | 55 | 60 | 65

1,884 2,041 2,355 2,551 2,826 3,062 3,297 3,572 3,768 4,032 4,239 4,592 4,710 5,103 5,181 5,613 5,652 6,123 6,123 6,633 6,594 7,144 7,065 7,654 7,536 8,164 8,007 8,674 8,478 9,185 8,949 9,695 9,420 10,21 9,89110,715 10,362 11,226 10,833 11,736 11,304 12,246 11,775 12,756 12,246 13,267 12,717 13,777 13,188 14,287 13,659 14,797 14,13 15,308

ШШ QT

чт

1 10 f 15 1 20    ____

0,314 0,471(0,628 0,785|    0,942    1,099|    1,25б|    1,413|    1,570    1,727

0,393 0,589 0,785    0,981    1,177    1,374    1,570    1,766    1,962    2,159

0,471 0,707 0,942    1,178    1,413    1,649    1,884    2,120    2,355    2,591

0,550 0,824 1,099    1,374    1,648    1,923    2,198    2,473    2,747    3,022

0,628 0,942 1,256    1,570    1,884    2,198    2,512    2,826    3,140    3,454

0,7071,0601,4131,766 2,119 2,473 2,826 3,179 3,532 3,886 0,7851,1781,5701,963 2,355 2,748 3,140 3,533 3,925 4,318 0,8641,2951,727 2,159    2,590    3,022    3,454    3,886    4,317    4,749

0,9421,4131,884 2,355    2,826    3,297    3,768    4,239    4,710    5,181

1,021 1,531 2,041    2,551    3,061    3,572    4,082    4,592    5,102    5,613

1,0991,649 2,198 2,748    3,297    3,847    4,396    4,946    5;495    6,045

1,1781,766 2,355 2,944    3,532    4,121    4,710    5,299    5,887    6,476

1.2561.884    2,512 3,140    3,768    4,396    5,024    5,652    6,280    6.908

1,335 2,002 2,669    3,336    4,003    4,671    5,338    6,005 6,672    7,340

1,413 2,120 2,826    3,533    4,239    4,946    5,652    6,359 7,065    7,772

1,492 2,237 2,983    3,729    4,474    5,220    5,968    6,712 7,457    8,203

1,570 2,355 3,140    3,925    4,710    5,495    6,280    7,065 7,850    8,635

1,649 2,473 3,297    4,121    4,946    5,770    6,594    7,418 8,243    9,067

1,727 2,591 3,454    4,318    5,181    6,045    6,908    7,772 8,635    9,499

1,806 2,708 3,611    4,518    5,417    6,319    7,222    8,125 9,028    9,930

1.884    2,826 3,768    4,710    5,652    6,594    7,536    8.478 9,42010,352

1,963 2,944 3,925    4,905    5,888    6,889    7,850    8,8$1 9,81310,794

2,041 3,062 4,082    5.103    6,123    7,144    8,164    9,185 10,21    11,228

2,120 3,179 4,239    5,299    6,359    7,418    8,478    9,538 10,598    11,657

2,198 3,297 4,396    5,495    6,594    7,693    8,792    9,891 10,99    12,089

2,277 3,415 4,553    5,691    6,830    7,968    9,106    10,244 11,383    12,521

2,355 3,533 4,710    5,888    7,065    8,243    9,420    10,598 11,775    12,953

2,748 4,121 5,495    6,869    8,243    9,616    10.990    12.364 13,738    15,111

3,140 4,710 6,280    7,850    9,420 10,990    12,560    14.130 15,70    17,27

3,533 5,299 7,065    8,831 10,598 12.364!    14,130    15,896 17.663    19.43

Abmessungen

Pro

fil

Quer

schnitt

Nr.

mm mm mm mm

qcm

10

11

12

13

14

15

16

17

18

19

20

21

22

23

24

25

26

27

28

29

30

32

34

36

38

40

42 У₂

45

47 У₂

50

55

60

ооошоетоооооооооооооооооооооооооооо

200

215

3,9 5,9

12.2    18,3 13,0 19,5 13,7 20,5 14,4 21,6

15.3    23,0 16,2 24,3 17,1 25,6 18,0 27,0 19,0 30,0

21.6    32,4

7,58

9,00

10,6

12,3

14,2

16,1

18,3

20,4

22,8

25,2

27,9

30,6

33,5

36,4

39,6

42,7

4M

49,7

53,4

57,2

61,1

64,9

69,1

77,8

86,8

97,1

107

118

132

147

163

180

213

254

I. Abschnitt.

Ge- Wur-wicht zelmaß

kg/m mm

5,95

7,07

8,32

9,66

11,15

12,64

14,37

16,01

17.90 19,78

21.90 24,02 26,30 28,57 31,09 33,52 36,19 39,01 41,92

44.90 47,96 50,95 54,24 61,07 68,14 76,22 84,00 92,63

103,62

115.40 127,96 141,30 167,21

199.40

I. Träger (Normalprofile).

Größter Niet-° durchmesser im Flansch di

Jx

Wx

Jy

WV

00 00 00 00

OiOSOłCłOłGłWCOCOOOOOOOOOCSCSCictoiWCOWWOSOOO

cm⁴

77,8

117

171

239

328

436

573

735

935

1166

1446

1763

2142

2563

3060

3607

4246

4966

5744

6626

7587

8636

9800

12510

15695

19605

24012

29213

36973

45852

56481

68738

99184

138957

cm³

19,5

26,0

34,2

43,5

54,7

67,1

81,9

98,0

117

137

161

186

214

244

278

314

354

397

442

491

542

596

653

782

923

1089

1264

1461

1740

2037

2378

2750

3607

4632

cm⁴

cm³

6,29    3,0

8,78    3,82

12,2

16,2

21,5

27,5

35,2

43,9

54,7

66,6

81,3

97,4

117

138

162

189

221

256

288

326

364

406

451

555

674

818

975

1158

1437

1725

2088

2478

13488

4668

4,88

6,00

7,41

8,87

10,7

12,5

14,8

17,1

19,8

22,7

26,0

29,4

33,1

37,1

41,7

46,5

51,0

56,2

61,2

66,6

72,2

84,7

98,7

114

131

149

176

203

235

268

349

434

cm

WZ=2.WX

Ja=Jz    W

=2 Jx    wa

cm⁴    cm³

6,2    155,6

70

Längen von Anschluß Winkel und Nietabstände vom Flansch. (Siehe Fig. 19.) Randabstand vom Winkeleisen 1,5 d

zu l ist e bei d =*

zu Zj, ist ex bei d ~

mm

10 13

16 20

23

26

22

10 113 116 I 20

28 ! 26

25

7,0

234

80

7,8

342

90

8,5

478

98

9,4

656

108

10,0

872

118

10,8    1146

128

11,6

1470

136

12,4

1870

146

13,2

2332

156

14,0

2892

261

164

14,8

3526

301

174

15,6

4284

348

182

16,4

5126

397

192

17,0

6120

460

200

18,0

7214

512

210

18,8

8492

578

220

19,5

9932

651

229

20,2

21,0

21,8

22,5

23,4

24,8

26,4

27,8

29,5

30,8

32,8

34,8

36,5

38,5

42,5

45,2

11488

13252

15174

17272

19600

25020

31390

39210

48024

58426

73946

91704

112962

137476

198368

277914

729

813

900

995

1092

1320

1566

1863

2163

2524

3012

3541

4161

4824

6348

8333

238

247

256

265

274

292

312

330

348

366

389

412

435

456

550

545

24

27

30 35 40 —

32    37 42 —

33    38 43 48

33    38 43 48

34    39 44 49

35    40 45 50

36    41 46 51

37    42 47 52

38    43 48 53

48

50

50

51

52

53

53

55

55

56

57

58

59

60

61

63

65

67

68

71

73

53

55

55

56

57

58

58

60

60

61

62

63

64

65

66

68

70

53

72

73

76

78

54

55

56

57

58

58

60

60

61

62

63

63

65

65

66

67

68

69

70

71

73

75

77

78

81

83

76 81 86 78 83 88 83 88 93 88 93 98

t"'

‘v

+<

Nr

I!

f— гегд.-Г

ÀV''

TV-Belag-Eisen. Fg,29

u

Ш* •

V⁴

F g. 27

T-Eisen 7.

«V-

Breitflanschige

— o.Jjh + 3omm. d — 0,035 bt jmm

1-Eisen.

Hocbstegige T-Eisen f

* Fg

,eder Seite dee Steges

.1

tfrnung ^ ber* h; lg im Fuß »%; »n

tu

hv*—■*-4/-

' H b.

Quadrant-Eisen.

~ LlJI !

i' *

il

If

jeder Seite dee Street i%

Neigung im'Fnfl »•/.;

F g. 26

it

rr

EV

I-Eisen, breitflanschige Spezialprofile

Oreytrâger.

1Ь

Ul

"T

IÛ

120

'X

---т Х- -

No 5515

X-

No. 5427

*«. 10.12

qcm

g— 7.96 kg(m Jx—303 cm*

t- » 9.32 «cm J-- 7.33 kg;m ■Jx =

Wx = 34.l7cm* Jy= 13.06

206.04 cm*

No. 5516

43.3

14.2

т.1

p = 10.92 qcrr g*- 8.59 kg/it» Jx 414.96 cm* Wx-51.87 qm» Jy — 15.3

60

r*,37

Y ïg- 86

r-----

Fg.36

——*-8--

ШТ

----£

fill ¹ '

'H

'40

No. 5097

ÏÏ

Nr. 5428

—X-

ii

--

Pi-*.__д

i>

'    F= 9.28 «cm

I    I« 7.28 kg/m

> Jx —281 cm* =37.3.cm* Jy-18.68 cm*

ill

F*.89

Fg.36

pLÂè

f-    #0

UVEisen (Normalproflle).

Niete und Schrauben.

§|PP

ïïtTl

UVEisen (Normalproflle).

Profil

Abmessungen Querschnitt

Ge-

Nr.

Wur-zel-maß

wicht

Niet-

durch-

Fluß-eisen c

messer

Jx Wx Jy Wy

dt

mm mm

mm mm qcm

kg/m mm

mm

cm⁴ cm³ cm⁴ cm³

30

40

50

65

80

10

100

12

120

14

140

16

160

18

180

20

200

22

220

24

240

26

260

5,0 7,0 5,0 7,0 5,0 7,0

5.5    7,5 6,0 8,0 6,0 8,5 7,0 9,0 7,0 10,0

7.5    10,5

8,0 11,0

8.5    11,5 9,0 12,5

9.5    13,0

5,44

6,21

7,12

9,03

11,0

13,5

17,0

20,4

24,0

28,0

32,2

37,4

42,3

28

280

10,0

14,0

48,3

30

300

10,0

15,0

53,3

100 10,0

16,0

58,8

10

10

13

13

16

16

20

20

20

23

23

23

23

26

2,68

3,08

3,75

5,07

6,36

8,49

ИД

wendet man Träger Wellbleche (Fig. 11) von 450 bis 900 mm Baubreite und 3000 bis 4000 mm Plattenlänge an. Die Wellenhöhe h reicht bei ersteren von 30 bis 100 mm, bei letzteren von 40 bis 120 mm. Eine Abart bilden Knud-sons Doppelbleche (Fig. 12) bzw. Tripelbleche, die eine Welle mehr haben.

§ 5. Buckelplatten.

Sie haben Vio bis Vis Stich ; Bandbreite c— 40 bis 80 mm (Fig. 13). Den Bietdurchmesser wählt man 13 bis 20 mm. Eine trapezförmige Buckelplatte zeigt Fig. 14. (Herstellung in Gesenken.)

Abstände

Anschlußwinkellängen und Nietabstände vom Flansch.

Randabstand vom Winkeleisen 1,5 d zu I ist e bei d = zu Zx ist ex bei d =

Siehe Figur 20

Jal=Ja₂ Wax wa₂ «i «2 cm⁴ cm³ cm³ cm cm

Ii

mm

8 10 13 16 20 23 26 8 10 13 16 20 23 26

12,8

28,2

52,8

13,2

0,4

115

23,0

1,6

212

35,9

412

2,8

58,0

79,2

728

1210

88,2

1850

2708

3822

•    5380

7196

9646

12552

16052

128.7 174,5 230,4

296.2

384.3

473.4

591.8 717,3 863,0

121,3

172,8

238,7

314,9

406,6

522,3

639,6

803,8

965,5

1146,5

g g s в „§ s s s: s _й s

*o 'о'оспсаЪоьзспОО**'-

!3KSSSgSS£BoS

W si QO O O » M os rf*. СП Oi

CO    CO    CO    CO    CO    Tpt    ^    TP    TP    rr    Щ

O'CJ СО О Ю t» O) O N ^ N CO    CO    CO    W    СО    И    И    тР    тР    tP    TP

ONCOiO'iOßNOOONiO лО ЮЧОЮЮЮцОЮОСРФ ifttr-OOOOOfNTłłiftOO©

ONMlOaiONOOONiO ^    тР    тР    TP    Tj<    TjH    -TH    Tft    Ю    UO    Ю

iftt-aoooodTłPiocg©

со    СО    CO    TP    ^    TP    tP    Tf    тР    тР    Ю

ONCOiniOiONCOONlû CO    CO    CO    CO - СО    СО    СО    СО    тР    тУ    ^

tot^aoooocaTjpinoo© яямсоисососоясо^

MWNNWWMWWWW

о    <i    сл    со    to    о    оо    оо    а»    en    со    I

CTMOOOMOIWMH    О    00    I

•aoeoesewwwoi I I ©    СП    CO    to    О    00    CO    fl)    CT    I    I

<i    -с»    ®    ©    о    œ    Ф    о    I

cnt0©00*acn<»09l-k0 I I

§ 6. Hänge- oder Tonnenbleche.

Sie haben Vs bis Vi2 Stich; Bandbreite c= 60 bis 80 mm (Fig. 15). Vernietung meist mit 16 mm Niete bei 60 bis 100 mm Teilung (Fig. 16).

§ 7. Riffelbleche.

Sie sind auf einer Seite mit geradlinigen sich kreuzenden 1,5 bis 3,0 mm hohen, 4 bis 5 mm breiten Riffeln versehen und werden in Stärken von 4 bis 25 mm (einschl. Riffel) gewalzt. Sie dienen zu Belagzwecken, zu Treppenstufen usw. (Fig. 17 u. 18).

Profil

Nr.

äs

w to to to

Т#1

;г

<1

<2

00

Abmes

sungen

Normale gleichschenklige Winkeleisen*

Quer- Ge- Wurzelschnitt wicht maß

mm mm qcm kg/m

mm

max.

Niet

durch

messer

di

mm

Abstände der Hauptachsen und des Schwerpunktes

м    w    w    to    to    м

о    ©    о    ©    о    ©

МММ

о-a М о <1 о со cs ©Goes © <i © фчо' ос © м © м © м мог м w м w

мм мм мм м ммо to о со to О 00 м

Is 2-S зз S& §§ SSI з^з ззз SS®-    ^    ««ч®.

Ог-( пН г-(тН (М СО (Мес CO^irj М © 1> М © 00 О 00 О ФОН 00 О СО © М tSI Н ^ (О NöN Ю 03 Н

тН    iH гНтН ММ МММ МММ ММ С-1

ooo ой м    2c 22 Й    oothco conh оюю t- go m

о о" о*гч мм rin eîrf ci cc 3 333 333 3-35 353 333 335 333 333 535

_ _ гЧ    тН тНгН гНгЧтЧгНтН

Ю    М    М    М

О    ©    М    tO    00

to

to

to

©

cs ©

00    00 . о    о

łH    —i

ос

«о

woo WOO WOO о

1,06

1,41

1,77

2,12

2,47

2,83

3,18

3,54

3,89

4,24

4,60

4,95

5,30

5,66

6,36

ïï IS II II II SIS SB Bï BS 151 su Я5 33S Ш 515 Il II II û S3 IIS SB m SK- »11515IS S3} 353151

cm⁴ - cm⁴

cm⁴

cm⁴

Jx — Jy I WX — wy

0,34

0,46

0,79

1,08

1,55

2,07

3,60

5,50

5,63

8,65

7,09    1,86

9,98    2,67

8,34

12,8

12,4

3,38

17,4

50    îO    (O    îO    O    00

O    O    O    O    O    O

2,60

3,52

5,20

7,04

.    9,20

12,3

20,1

30,7

29,9

46,0

46,4

71,2

97,0

12,4

3,25

14,9

16,4

4,39

21,2

19,8

5,40

27,8

oû

79,9

114

150

17,4

4,59

20,4

23,1

6,02

29,1

28,1

7,67

37,9

00

106

152

198

27,4

7,24

32,7

34,8

9,35

166

44,2

225

41,4    11,27

56,1

286

36.1    * 9,43

46.1    12,1

55.1    14,6

42,5

212

57;4

72,7

286

364

53,0

13,8

63,2

326

65,4    17,2

76,8    20,7

82,2

422

101,0

524

67,1

17,6

78,8

399

83,1    22,0

97,6    26,0

103

127

520

643

Viehweger,

116

138

158

111

140

170

135

170

206

216

266

317

s- s

Schlosserarbeiten. I.

554

700

850

664

837

1016

1068

1328

1580

Profil

Nr.

Abmes

sungen

Quer

schnitt

Ge-

wicht

Wurzel-

maß

Gr

max.

Niet

durch

messer

Abstände der Hauptachsen und des Schwerpunktes

mm mm qcm

kg/m

mm

äi

mm

*** §

15,07

17,82

20,57

16.64 19,70 22,75 19,94 23,31 26,61 23,55

45,14

§ 8. Walzprofile.

Die wichtigsten im Hochbau zur Verwendung gelangenden Walz-Eisen sind folgende:

1.    Die I -Eisen (Normalprofile ). (Fig. 19 und Tabelle III. )

2.    Die C-Eisen (Normalprofile ). (Fig. 20 und Tabelle IV. )

3.    Die gleichschenkligen L-Eisen. (Fig. 21 und 22 und Tabelle V.)

4.    Die ungleichschenkligen l_ -Eisen. (Fig. 23 und 24 und Tabelle VI.)

5.    Die breitflanschigen Differdinger Spezial -x - Eisen. (Fig. 25 und 26 und Tabelle VII.)

6.    Die 1-Eisen. (Fig. 27 und 28 und Tabelle VIII.)

7.    Die Belag-Eisen. (Fig. 29 und Tabelle IX.)

10 100

11 110

12 120

13    130

14    140

15    150

16 160

sif Ш Шп liS- S-S-S- S-&3 S2-S

rH (N    (N CO COCOCO CO ^ ^

55

g .g; »

c₂

25

30

§88 888 888 888 8

7,07

7,78

8,48

9,19

9,90

10,6

11,3

3,99

4,10

4,21

4,34

4,45

4,54

4,75

4,86

4,96

5,15

5,26

5,37

5,54

5,66

5,77

5,95

6,07

6,17

6,35

6,46

6,58

Tabelle V.

Jx

Jy

Jx — J'S,

Jb

om⁴

cm⁴

cm⁴

cm⁴

Jx=Jy

Wx — Wy

280

328

73,3

86 2

177

372

98,3

207

235

329

398

468

1,2

1600

1940

2280

151

. 183

215

379

444

98,6

239

116

505

133

280

439

319

529

618

1.2

2100

2520

2960

181

218

255

541

625

140

705

162

186

341

394

627

446

745

863

1,2

2960

3520

4070

235

279

323

750

857

194

959

223

472

251

540

870

605

1020

1173

1,5

4200

4930

5680

305

359

413

1014

1148

262

1276

298

638

334

723

805

1176

1363

1554

1,5

5600

6500

7420

380

441

503

1343

1507

347

1665

391

845

949

1556

438

1052

1794

2039

1,5

7330

8460

9620

465

537

611

1745

2033

2322

453

9080 10840 10980

8.    Die hochstegigen 1-Eisen. (Fig. 30 und 31 und Tabelle X.)

9.    Die breitflanschigen _l-Eisen. (Fig. 32 und 33 und Tabelle XI.)

10.    Die Quadranteisen. (Fig. 34 und Tabelle XII.)

11.    Dünnwandige I-Eisen der Mannstädt-Werke A. G. in Troisdorf bei Coin. (Fig. 35, 36 und 37.)

12.    Dünnwandige C-Eisen der Mannstädt-Werke. (Fig.38.)

13.    Dünnwandige -E -Eisen der Mannstädt-Werke. (Fig. 39.)

Die letzten .drei Nummern eignen sich besonders zu Türgewänden, Fenstergewänden und zu Fachwerksmauer-Aussteifungen, Stilen usw.

1945

2137

506

558

1099

1226

1348

2564

1,5

542

647

715

2*

Profil

Nr.

Normale ungleichschenklige Winkeleisen.

Abmes

sungen

b, Quer-⁴ schnitt

Ge-

^ wicht

Wurzel

maße

Cl С2

mm mm mm

qcm kg/m

mm mm mm

B Nietdurch-3 messer

des

der

tg (p

cm

cm

2/3    20    30

3    1,42 1,11

4    1,85    1,45

18

3/47₂    30    45

4    2,87    2,25 —

5    3,53    2,77 —

25    —    13

0,99    0,49    0,4216

1,03    0,54    0,4214

1,48    0,74    0,4334

1,52    0,78    0,4288

4/6    40    60

5 4,79 3,76 7 6,55 5,14

35

1,95    0,97    0,4319

2,04    1,05    0,4275

5/7 V*

50    75

672/10

65 100

S l'ts

20

20

0,4304

0,4272

0,4101

0,4074

8/12 .80 120

10 19,1    14,99

12 22,7    17,82

45    50    30

20 3,92 1,95 0,4348 23 4,00 2,02 0,4304

10/15 100 150

12 28’7    22’⁵³    55    60    50

14 33,2    26,06

23 4,89 2,42 0,4361 26 4,97 2,50 0,4339

Normale ungleichsclienklige Winkeleisen,

2/4

20    40

3    1,72    1,35

4    2,25    1,77

22

1,43    0,44    0,2575

1,47    0,48    0,2528

3/6

30    60

5 4,29 3,37 7 5,85 4,59

35

4/8

40    80

6 6,89 5,41 — 8 9,01 7,07 T-

45

2,15    0,68    0,2544

2,24    0,76    0,2479

2,85    0,88    0,2568

2,94    0,96    0,2518    ,

20

5/10    50 100

8 11,5 9,03 10 14,1 11,07

55

3,59 1,12 0,2665 3,67 1,20 0,2658

6/4/13

130

18,6

22,1

14,60

17,35

50

40

20

20

4,65

1,45

4,75

1,53

0,2569

0,2549

8/16 80 160

12 27,5 21,59 14 31,8 24,96    °

23 5,72 1,77 0,2686 26 5,81 1,85 0,2679

10/20 100 200

14 40,3    31,64

16 45,7    35,87

55    60    95    26

7Д2 2,18 0,2608 7,20 2,26 0,2586

— = YTT» Normallängen 4 Ms 12 m.

ci 172

Tabelle VI.

Hauptachsen und Punktes S₀

Trägheitsmomente

Ab-

stand

it

cm

cm

f    Jx Jy Jrj    л

cm cm⁴ cm⁴ cm⁴ cm⁴ mm

cm⁴

Ю (O 1Û (O

4 4 o 4

O O N N

ąąis ą

1H г-Г ю «O

00    1Й. w

но Гм M

2,50

3,20

11,54

13,98

19,8

26,3

*1 ^ CO lÄ

ю о

160

189

317

370

34,6

45,6

92,6

114,4

280

334

552

646

10,2    7,51    4,18    747    134    232

10,2    7,55    4,27    854    153    264

3, з-

1298

1488

12,8    19,6

14,6    23,5

2,80

3,58

CO

5,62

7,16

15.6    21,2

20.7    19,1

31,2

41,2

89,8

115,0

232

282

8,45 5,76    2,56 339

8,38 5,83    2,65 395

35,4 54,2 320 46,6 41,3 62,9 373    44,4

640

748

10,4    7,10    3,14    762    79,4    122

10,3    7,20    3,29    875    86    139

719    57,8

822    55,7

1438

1644

13,0    8,86    3,91    1754    182    283

13,0    8,90    3,99    1973    205    316

1653    73,1

1862    71,2

3308

3726

Breitflanschige Differdinger Spezialprofile I (dickstegige).

Abmessungen

Profil

Quer

schnitt

Gewicht

Nr.

mm

mm

mm

mm

mm

qcm

kg/m

18 В 20 В 22 В 24 В

180

180

200

200

220

220

240

240

25    В

26    В

250

250

260

260

27 В

270

270

28    В

29    В

280

290

280

290

30 В

300

300

32 В

320

300

34 В

340

300

36 В

360

300

38 В

40 В 42¹/г В 45 В

477₂ В

50 В

380

400

425

450

475

500

300

300

300

300

300

300

55 В

550

300

60 В

600

300

65 В

650

300

70 В

700

300

75 В

750

300

80 В

800

300

85 В

850

300

90 В

900

300

95 В

950

300

100 В

1000

300

ШШШ«8р|^гргр|рш«

1Ш^ШШ1р1ШрШгрг§

z Q î H ą i: B 'i ï ï z g |    i l -ï

59,9    47,0

70,4

82,6

96,8

105.1

115.6

123.2

131.8

141.1

152.1

160.7

167.4

181.5

191.2

203.6

213.9

229.3 242,0

261.8 288,0

300.6

314.5

325.2

335.7

354.9

365.6

376.4

396.2

407.2

55,3

64,8

76,0

82,5

90,7

96,7

103.4

110,8

119.4 126,2

131.4

142.5

150.1

159.8

167.9 180,0 190,0

205.5

226.1 236,0

246.9

255.3

263.4

278.6 287,0

295.5 311,0

319.7

Normallängen 4 bis einschl. 12 m. Tabelle VII.

Wurzelmaße

Niet

durch

messer

Cl

di

WV

mm

mm

mm

cm⁴

cm³

ggsssssgss

23

26

26

26

26

26

3512

5171

7379

10260 12066 14352 16529 19052 21866 25201 30119 35241 42479 49496 57834 68249 80887 94811 111283 145957 179303 . 217402 258106 302560 360486 414887 473964 550974 621287

390

517

671

855

965

1104

1224

1361

1508

1680

1882

2073

2360

2605

2892

3212

3595

3992

4451

5308

5977

6690

7374

8068

9012

9762

10533

11600

12425

1073

1568

2216

3043

3575

4261

4920

5671

6417

7494

7867

8097

8793

9175

9721

10078

10668

11142

11718

12582

12672

12814

12818

12823

13269

13274

13279

13727

13732

1-Eisen (Normalprofile)

Profil Nr.

>*

Abmessungen

Quer- Ge-schnitt wicht

er¹

Wur- Niet- Lage

zel- durch- TTder, Hauptachse di T—Y

Abstand V. d.

X—X

maß messer

qcm kg/m mm mm tg a

I f

I <?

з i?

6    60 8 80

10 100 12 120 14 140 16 160 18 180 20 200

“assssssoo®

о о _® 00 -л „в о> ет ет *. *.

О Ol «Л    СЛ    «Л

сл ai

ОЛ    0Л

О 00 -4 05

О H (M СО

rH тН rH r-ł

ą ą й ą к ą ą s ą a ą

M^vOeOOHrfNHOO

1—t тН I—I <M (M со

N « N И

«г ^    °t. ч ‘a ю t» ь.

oooocvSwSGoo

тНтНООООООООО

ё §    -S    “    -3    -S    -£    Ł    £    t    «

(О 00    ^    Oi    w    W    м    м    ы    С

w ^    w    w    w    w    cs    м    а    н    a

s ą s s ą ą s ą ą g c

w м ^ sit ю о" t> аГ оГ оГ н

Belag-Eisen (Normalprofile).

Abmessungen

Pro- _

fil

Quer- Ge-sehnitt wicht

Nr.

R    ,d~rj r₂

r₄

mm mm mm mm mm mm mm mm mm

qcm kg/m

05    СЛ    tfb    05    05

05    05    СЛ    00    05

О    О    СЛ    О    О

05    05    to    to    tO

©    05    00    rf*    Ь*

о    о    а«    о    o

to О 00 -4 05 О О On О О

5,0

2,5

3,0

3,5

4,0

4,5

Normalläugen 4 bis einschl. 10 m.

Tabelle VIII

Hauptachsen Trägheits- u. Widerstandsmomente für die Biegungsachsen Y—Y

Y—Y

X—X

rj—rj

_£_i «=* I I I

W

vv X

Jy.

= mm. WV cm³ cm⁴ cm³ cm⁴

Wi Jn

cm³ cm⁴ cm³

0,87 0,58 1,19 0,91 1,49 1,24 1,76 1,51 2,25 2,02 2,65 2,43 3,02 2,80

3.39    3,18 3,72 3,51 4,08 3,86

4.39    4,17

1759

164

1,11

1,83

2,76

3,73

6,44

9,26

12,5

16,6

21,4

27,0

5,96

13,5

26,3

44,7

109,3

222

402

676

1053

1599

мой^мимам P Г» Я -Г* Я Р <г Ъ

œoi^woci№4

2509

213

33,4

2299

оо о со

ГЧ (М

Normallängen 4 bis einschl. 8 m.

Tabelle IX.

Momente fur die Biegungsachsen

Schwerpunkts

abstände

X— X

Y—Y

So

Verhält

Wx=

nis

Momente für die Achse к—к

Jx

,!x

wv=

cm⁴

cm³

4 -«г-

Jy

b/2

Cm³

•J* g

I «°

WV

Jk

*k

wk-h

cm⁴

cm³

23,3

4/,3

107

207

420

N. H. H. ®.

оГ ю oo 'S ю

H л m N

2,47

0,64

64,4

12,9

2,96

0,67

129

21,5

3,69

0,69

287

38,3

4,50

5,47

0,71

0,72

571

1144

63,4

104

Tabelle X. g

₈UI0

cm⁴

00 l> CO i-l CO

H N CO lO

h?Us

₈rao

T-Eisen (Normalprofile); Normallängen 4 bis 12 m.

N    5    S N    00 Й »    ®    N N    N    ©    Ф    S

O    O    O H    H N СО    Ю    oo" N    M    ■#    h    rf

H H W ^ O

b 1

Hochstegige: T ⁼ T

II

Jx

Schwerpunktsabstände S₀

Niet-

durch-

messer

Ge- Wur-wicht zelmaß

Quer

schnitt

Abmessungen

Profil

■ “s

о

e*

°x

di

b=h d=R

Nr.

cm⁴

cm

cm

mm

mm

kg/m

mm i mm I qcm

CD O N' CO H lû H

§• Э S- S- 5 2- 5    S- S- S- S-

H M CO ^ CO

M 00 t; H N H i-l 00 Ю l>

o o h со ю co N со r)T «

t—I (N r* l>

cm

rH I>

O os «O O

rt N CO CO i-H rH CO «O

h h eî N « (W » tjT u) io ® N oo" d

юьда§нмм®ом00,#00С1 о o d d h h h и” h m" n n со” со”

со со со go

O CO CO «o «o o

îH rH 1—1 rH rH CM

I I I I MMM«5*Sîûb«

§8 8 £ co g o SS w S $ ą Ą 8

о H H N N CO* ^ eo 00 O CO oo co rH

nnmm§^S®°§®onS

^    ^    ^    O CM -te

CM    CO    Tje

i*,

Tabelle XI.

S*lo*

II

cm³

2,87

4,31

7,13

10,2

13,5

22,8

36,9

52,8

74,4

100

h«    ® н„ 4 h ь

g 00 iO 00 ÎO l> о    гн <n ^ to

Ъ 2

Breitflanschige T-Eisen ^- = y; Normallängen 4 bis 12 m.

(Min.)

*/

Schwerpunkts-

Abstände

li

cm³

1,11

1,65

2,50

3,63

4,78

8,09

12,6

18,6

26,2

35,2

Wex = —

°x

₈uio

3,85

5,83

. 8,88

12,7

17,2

29,2

45,6

68,0

95,9

129,5

Jx

cm⁴

2,58

4,49

7,81

12,7

18,7

38,0

68,9

117

185

277

em

2,33

2,73

3,12

3,50

3,91

4,70

5,49

6,28

7,07

7,86

So

°*

cm

0,67

0,77

0,88

1,00

1,09

1,30

1,51

1,72

1,93

2,14

losseui

-цошр

Wur-

zel-

maß

Ge-

wicht

Quer

schnitt

Abmessungen

ff=Pi Ч Я.

£ O 05 05 05 O O O 05 05 tO g    I—li—11—It—trHrHC<l<MC\l(N

ШШ

kg/m

3,64

4,66

6,21

8,01

9,42

13,35

17,90

23,16

29,05

35,64

qcm

4,64

5,94

7,91

10,2

12,0

17,0

22,8

29,5

37,0

45,4

5 vn «' b OD 00 O H cc -f Щ Й    т-1 rH TH rH tH

S    ОЮО >0 000000

g    еом^'Фюсьоооо

£    oooooooooo

й    o*>oooo(Mtj>oooo

C    rH ri 1-H rH тН (M

Profil

Nr.

^    O

» w    й ob oo a h

c^ooœocî^oæo

r-l rH rH rH т-t <N

Tabelle XII.

Quadranteisen (Normalprofile). Normallängen 1 bis einschl. 10 m.

Abmessungen

Für ein Quadranteisen

Pro

fil

Nr. В

Quer-^ schnitt

Ge-

Ab-

. , . stand wicht £ür Si

Wurzelmaß

Niet

durchmesser

Trägheits

momente

Jx

mm

mm

mm

mm

mm

qcm kg/m mm

cm⁴

cm⁴ cm⁴

min.

max.

7V₂

min.

max.

10

min.

100

10

max. 12 % min. 12 ft max.

100

125

125

s s; è ё g g

00

CÄ

00

oo а

oo

6    7,44    5,84 3,46

6    12,00    9,42 3,47

9    13,7    10,75 4,95

3,59

6,37

7,69

110 144

159 227

360 517

15

min.

150

15

max.

150

От    СЛ    Ol    Ol

w    Ol    о    о

о    о    Oi    Ci

М    г-ł    т-1    TH

МММ -Ï    М

9    20,0

12 22,0

12    30,0

15    32,2

15    42,2

18    44,6

18 62,6

15,70 4,97

13,3    479

745

17,27

23,55

25,28

33,13

6,43

6,49

8,02

8,00

35,01 9,51

49,14 9,54

16,5

25,1

37,5

909 1366

1144 1870

1876 3039

49,2 2386 3945

73,2 3549

5909

104    4633

8079

II. Abschnitt:

Niete und Schrauben.

(Tal. S. 30, 31, 34, 36-38.)

§ 9. Niete.

Eisenkonstruktionen, die nicht mehr auseinandergenommen werden sollen, vernietet man; andernfalls, oder wenn die Vernietung nicht möglich ist, wendet man Schrauben an. Niete sollen nur auf Abscheren und nie auf Zug beansprucht werden. Man hat Normal niete (Fig. 1) und ganz versenkte Niete (Fig. 2). Selten kommen halb versenkte Niete vor. Die Summe der zu vernietenden Blechstärken darf höchstens das 4 bis 4% fache des Nietdurchmessers betragen. Zu Kraftnietungen verwendet man 13 bis 26 mm dicken Niete (Fig. 3 bis 7). In der Draufsicht zeichnet man einen Niet durch einen Kreis mit dem Nietdurchmesser (Fig. 8) in der Seitensicht durch einen Halbkreis von 1% fachem Nietdurchmesser, wobei etwas tiefer angesetzt wird (Fig. 9). Fig. 10 und 11 zeigen einen beiderseits versenkten, Fig 12 einen unten versenkten, Fig. 13 einen oben versenkten Niet. Statt der Kreise und Halbkreise kann man auch Kreuze und Mittelpunktslinien anwenden (Fig. 14). Zeigen die Kreise Doppellinien, so mögen Schrauben gedacht werden (Fig. 15). Auf der Baustelle zu schlagende Niete kann man nach Fig. 16 darstellen. (Dasselbe gilt von Schrauben.)

Nietlöcher werden gestanzt, besser gebohrt. Zur Anfertigung des Schließkopfes aus dem rotglühenden Niet bedient man sich eines Döppers (Fig. 17 u. 18). Als Gegenhalter dient ein schwerer Hammer oder ein Niet-stock (Fig. 19). (Größere Betriebe haben Bohrer und

со

Ж /Ж

\a

ob

fc<

81 '3d

OtUbUlt

6I-3J

L 0 -_*L_

* 4-

Еч '

-Q

J-©

-Ж-HV

>2ф

Fg. 17

уГъб

Fg. 7

1ф

i€

Fg.ll

J2T 23 Fg. 6

фгф

9*3л

OZyf

•tS

Fg. 8

-tr

W5

-w ⁰¹

rS-ьЬ

■$-

jfyó

Fg. 4

Г4ЛЖ

Fg. 1

-•я.

*J*40S

JÄH»

Fg. 3

? Ь-i

+-[

j 1, Bd

-4JU

Tf

СО

I -**-

1,6d

,    i- ł>6d

—i-------i-p-o- ][ 3d b

j l,6d

■i—f-

d 3d

■f

/""Л

F g . 20

4-» Р

ff

4-

Fg. 23

____J----

V7

/■

(U (N

РФ

ÄtVV

<*>

Iwevjf

ФФЧ5

-• 2d 4-

>сч

Z)

л^-v^

s' ' '

Fg 24

\ШШ 1ШД

- ^;.1и

vT⁷ v~

Я-

Tabelle XIII. w

LC

oder einer Schraube.

Tragkraft in Tonnen (1000 kg)

auf Lochwanddruck bei einer Beanspruchung von

2000

kg/cma

2,08

2,60

3,12

3,64

3,90

4,16

4,68

5,20

2,56

3,20

3,84

4,48

4,80

5,12

5,76

6,40

1600*

kg/cm®

1,66

2,08

2,50

2,91

3,12

3,32

3,74

4,16

2,05

2,56

3,07

3,58

3.84

4,10

I9V

5,12

1200

kg/cm⁸

1,25

1,56

1,87

2,18

2,34

2,50

2,81

3,12

1,54

1,92

2,30

2,69

2,88

3,07

3,46

3,84

Blech-

stärke

in

m/m

oo

00

•il

1000

800*

II

% t

*3 K

kg/cm² kg/cm²

хкздшцэв

-I8AiZ

Signups

-Щ0

oiąąiuijos

-I9AVZ

ïlr'44iUTps

-ЩЭ

2,65

4,02

1,33

1,06

2,12

2,01

1,61

3,22

kg/om²

ЯЭДШЦЭБ

-WAVS

fM'4'ĄmtTos

•Ш0

9‘X

hvz

0,8

1,21

Niet oder Schraube

Gewicht

von

100 Stück Niet-köpfen

Quer

schnitt

Durch

messer

kg

1,7

2,75

stuo

1,327

2,01

mm

13

<*">

16

(%")

3,20

4,00

4,80

5,60

6,00

6,40

7,20

8,00

3,68

4,60

5,52

6,44

6,90

7,36

8,28

9,20

4,16

5,20

6,24

7,28

7,80

8,32

9,36

10,40

2,56

3,20

3,84

4,48

4,80

5,12

5,76

6,40

2,94

3,68

4,42

5,15

5,52

5,89

6,62

7,36

3,33

4,16

4,22

5.82

6,24

6,66

7,49

8,32

1,92

2,40

2,88

3,36

3,60

3,84

4,32

4,80

2,21

2,76

3,31

3,86

4,14

‘4,42

4,97

5,52

2,50

3,12

3,75

4,37

4,68

4,99

5,62

6,24

10

12

14

15

16

18

20

10

12

14

15

16

18

20

10

12

14

15

16

18

20

6,28

8,30

10,62

3,14

4,15

5,31

5,02

6,64

8,501

2,51

3,32

4,25

3,76

4,98

6,38

1,88

2,49

3,19

5,1

7,7

4,155

5,31    12,0

со

<м

26

<l")

*) Für Schrauben gilt 800 kg/qcm bzw. 1600 kg/qcm.

Viehweger, Schlosserarbeiten. I.

CO

ńf-

л⁵-

+ 8-4d + 2d|w.-

-4 2d

-ф- i Ф- -ф-

—-о-

1,ьа ■    4 4:4 v 4

-—^-¹—

-^--тттттф

Fg 26

ТТЛ

till 1

TT

Ф -ф.......-ф—Ф—О ф -ф- Ô <t> ф

HB-4dK

Fg

74t

-i* Fg 29

♦г-)

ow

o’-

; 28

4 c< TCŁT

Fg. 30

/ъ

ф ф -ф ф -ф ^-ф -ф

\----------h

t* 8d Gebräuchlich 5-6d

-ф -ф -ф -ф -ф- ,-ф- ,-ф-

Fg.31

✓^Ч    '    /^ч    /^Ч

Hämmer, die mit Luftdruck, Druckwasser oder auch elektrisch betrieben werden.)

Man unterscheidet einschnittige Niete (Fig. 20), zweischnittige Niete (Fig. 21) und mehrschnittige Niete. Zweischnittige sind den einschnittigen vorzuziehen, weil sie auf Abscheren die doppelte Scherfläche bieten (Fig. 22) und keine Drehwirkung haben (Fig. 23). Bezüglich der Nietentfernungen gilt im allgemeinen das in Fig. 24 dargestellte Schema. (Siehe Statik.) Ver-schwächungen der Bleche durch Nietlöcher sind nach statischen Gesetzen zu berücksichtigen (Fig. 25). Für eine Laschennietung gilt das Beispiel in Fig. 26. Es soll nach Tunlichkeit symmetrisch zur Achse genietet werden. Bei Winkeleisen und anderen Walzprofilen müssen die Nietmittelpunkte in die Wurzel- oder Streichlinie gesetzt werden (Fig. 27 bis 30). Die sogenannten Wurzelmaße e, сг und c₂ sind in den zugehörigen Tabellen enthalten. Die Maße i und / sollen wenigstens 5 mm betragen (Fig. 29). Ein Beispiel für einen genieteten Träger bringt Fig. 31. Tabelle XIII gibt Werte für die Tragkraft von Nieten. Die Berechnung hat auf Abscheren und Lochleibungsdruck zu erfolgen.

§ 10. Schrauben.

Bestandteile einer Mutterschraube sind :Kopf, Schaft, Mutter und Unterlagsscheibe (Fig. 32). Man unterscheidet flachgängige (Fig. 33) und scharfgängige Schrauben (Fig. 34). (Im Bauwesen wendet man nur letztere an.) Die Mutter ist immer sechskantig. Zum Anziehen dient ein Schraubenschlüssel (Fig. 35 oder 36). Zur Sicherung wendet man Gegenmuttern an (Fig. 37). Zur Befestigung von Trägern dienen Unterlagsplättchen (Fig 38) oder Hakenschrauben (Fig. 39).

r*j~ il:

ЩрйЫ

m i -i i

**№&&£ <ê i

Fg.41

-r

ilr⁵—

!----i

-g№

us

Fg. 44

i I

11

Рщп.. i

Ша-i

BjI

ci

öcÄtciwb

Fg. 43.

létil

i чгн <

•tr

lefisà

Fg. 37

Fg. 34

iflN

^ i—_^.

■y s

•c^C

Fg.39

* —4-

!,

Fg. 32

i-3

3°°

«?4

I iiR*

2 4-~

' T-

-t?t

c

In Fig. 40 u. 41 sind eine Kopfschraube, eine Steinschraube mit Hülse und eine Gewindeschraube mit versenktem Kopf, in Fig. 43 und 44 eine Ankerschraube zum Feststellen von Maschinenteilen an Fundamenten dargestellt. Steinschrauben zeigen Fig. 45, 46 und 47. Das Vergießen hat mit Zementmörtel (1 : 1) zu

ИЗ g +Pfl

Spannringe haben ein kreisrundes oder

4-

g-ss

%,

ши

/< x

vS

-*■=№ s

<>

<ß!

14

PL ~

Fg.4&

ш m-m*

Fg.60

ЦД-

1 Ц N

Г

àî Я

•1 4

- т»»-

Fe.t2

•з

чА-,

sjl

rh

S гЧ ¹

J, т Иг

«il- I ; I

*4ï|^C

V i S 5

i<£-§

QQt

I- Ьъ -U- *

<я

1 1 i XX

geschehen.

anders geformtes Schloß (Fig. 48 u. 49). Häufig gelangen bei Verankerungen Spannschlösser zur Verwendung (Fig. 50, 51 u. 52); eine zugehörige Ankerplatte, wandseitig, zeigt Fig. 53. Zur Bindung von Unterzügen verwendet man Schraubenbolzen in Verbindung mit Gas-

h 1л cm

як

jXfp

ia

— 122

TT

'L

|i

* <?

ас

S IIP.³

Mil

⁵T

ФёёёшА

4-

Jûi'

s?

-UU

-V

СУЛ

+-

C/rtv

s*»*

^EL’I! ',5-

! tr

H "pb-l2i - —i

K------ 240

ft 4- osi -4

r,*

en.

Émd/u/n^ .m ($\unci- un<ł

HT «

*vf.

2_.

1 pH

XhN

Ц)

PT

-b**-

4F-

RY\ i

s;

- f4r S

5П

X *k-

h£

.я*

Шх

rohren oder Gußstücken (Fig. 54,55 u. 56). Zur Verbindung von Bund- und Flacheisen dienen manchmal bewegliche Gelenkbolzen (Fig. 57 u. 58).

Schrauben werden wie Niete auf Abscherung, Loch-leibungsdruck und unter Umständen auch auf Zug berechnet,

Tabelle XIV.

Normalschrauben-Tabeile (Whitworthsches Gewinde).

Durchmesser der Schraube

in engl. Zollen

rain m

3 Kerndurch- A 3 messer , **

Kemquerschnitt

_nd\

cm²

Anzahl der Gewindegänge

auf

einen engl.

_Zoll

die Länge

22,22 18,61 2,72

CO M о O

« «î. ri Я iî M M

os -a <1 со

Kopf u.Mutter

g hi = Höhe d. Mutter = Ф des Bolzens В h₀= Höhe d. Kopfes

= 0,7 ?h_

а

I D₀ = Schlüssel weite

Unter-

lags-

scheibe

^ Durchmesser der s Scheibe in mm

ci,, Dicke der s Scheibe in mm

sechseckigen    g    g g    §* о

Kopfes_ р.    t» ^

quadratischen    g*    S’'S    g. a

Kopfes    и    и P    м я

CW

Durchmesser der Schraube in engl. Zollen

© 00

StîSS

7    0,988    1,06    ,l³/₈*

1V₂* 38,10 32,68 8,39 1 %* 41,27 34,77 9,495 13/₄* 44,45 37,94 11,31 VL* 47,62 40,40 12,82

WWW

¹⁰

50,80 43,57 14,91 57,15 49,02 18,87 63,50 55,37 24,08 69,85 60,55 28,80

h*

3g g-"

Ф O O O

_

<IOiCTCT|CT^rf».^ Otf^MM OOJW©

t^^^ce ccceioM

©CTOOS i^HtOOs

«ot'-^o eotoo© w io œ cc i 00 © ^ гч и H ri N CÎ m" 10 N

5,78 2V2 7,62    2%

3    76,20 66,90 35,15    3 y₂ 10 i/₂ 76    53 112    145 12    9,10 9,78    3

Die mit * bezeichneten Schrauben entsprechen den Normalien der preußischen Staatsbahnen. Die übrigen Schrauben sind der Whitworthschen Schrauben tabeile entnommen.

Schraubenlänge I = e + du + \ + 5 mm (abzurunden auf eine durch 5 teilbare Länge, welche handelsüblich ist). e ist die Entfernung zwischen Unterlagsscheibe und Kopf. (Ф =* Durchmesser.)

Am meisten wendet man Schrauben des Whitworthschen Systems an (Tabelle XIV). Auf Zugbeanspruchung gelten folgende Zahlen:

Bean

spru

chung

Schraubendurchmesser in englischen Zollen

7я I Va I ⁵/s i 74 I Vs I 11 1У₄| 1V»I 1³Л1 2 I 2l/g ' I 3

in

kg/qcm

Kern-Querschnitt in qcm

0,44

0,785

1,31

1,96

2,72

3,57

5,77

8,39

11,31 14,91

24,08

35,15

480

210

375

630

940

1300

1715

600

265

470

785

1175

1630

2145

2775

3450

800

Schrau-ben-durch-messer in mm

350

630

1050

1575

2175

2850

4600

4025

5026

5875

5425

6775

9050

9,52

12,70

15,87

19,05

22,22

25,40

31,75 38,10 44,45

7150

8950

11925

11560

14450

19265

16875

21090

28120

50,80

63,50

76,20

III. Abschnitt. .

Einzelverbindungen.

(Taf. S. 42-46.)

§ 11. Allgemeines.

Die Möglichkeit, zwei oder mehrere Eisenteile miteinander zu verbinden, ist so vielgestaltig, daß dem Umfang des vorliegenden Büchleins entsprechend nur eine Anzahl Typen hervorgehoben werden kann. Andere Anordnungen ergeben sich in den weiteren Abschnitten und im zweiten Teil des Werkes.

Als Grundsatz kann gelten, daß zum Anschluß zweier größere Kräfte übertragender Eisen niemals ein Niet oder eine Schraube zu verwenden ist, selbst dann nicht, wenn nach der Rechnung ein Stück ausreichen sollte,

Knotenbleche macht man nicht größer als unbedingt nötig; eingebogene Ecken sind wegen des Yorbohrens zu vermeiden. Winkeleisen und Träger prof ile sollen nach Tunlichkeit rechtwinklig zur Längsachse abgeschnitten werden.

§ 12. Beispiele für Verbindungen.

Fig. 1 u. 2 zeigen Verlängerungen von Flacheisen. (Vernietung symmetrisch zur Längsachse.) Fig. 3 u. 4 zeigen einfache Kreuzungen, Fig. 5 u. 6 solche mit Laschen. Bei Geländerkonstruktionen kommt häufig eine Verschränkung der Eisen vor (Fig. 7). Bei schrägen Anschlüssen benutzt man Knotenbleche (Fig. 8). Zwischen den einzelnen Eisen läßt man kleine Zwischenräume (2—5 mm) (Fig. 8,9 u. 10). In Fig. 10 ist das Knotenblech mit genauer Nietstellung herausgezeichnet (Werkstattzeichnung in natürlicher Größe!). Um Kröpfungen zu vermeiden, legt man Futterbleche unter (Fig. 11). (Dasselbe gilt für Winkeleisen.) Einen Anschluß durch zwei kleine Winkeleisenstücke zeigt Fig. 12; einen Winkelst о ß Fig. 13, mit DeckungsVarianten Fig. 14 u. 15; einen Universal- und versetzten Winkelstoß für vier Winkel Fig. 16 u. 17. Einen rechtwinkligen und schiefen Zusammenschluß zweier Winkeleisen, sowie eine Kreuzung bringen Fig. 18 bis 23. Einige Verbindungen von C- und I-Eisen sind aus den Fig. 24 bis 26 zu entnehmen. Bezüglich Träger und Trägeranschlüsse wird näheres im 2. Teil gebracht.

Das Bohren der Löcher geschieht durch Bohrknarre und Bohrhebel Fig. 27 oder durch Lochmaschinen (Fig. 28 u. 29).

⁶tW&n$uu'vvij'

}    (-Ф- Ф-j i }

—» -50 ,у6о

4 о^4о,

бо jt3o»-

-€Ь

Pg.l

_«ш£^

f« I

^ hO

X7-T?

— * 6o* — —/2o    -.-

i AL

AS AO\ '

BÉà

iSCt

Mi*

Fg.2

zany wił

гф"1 t

ll

Fg.3

l*o

Fg.4

— - Go j—

nè-jj-è-

—* 3oi i- 6 o-i i- éoi ьЗо- ь—

фф

j^^Z+K

Fs-⁶j,o 44tK

Fg.6

kf

2

'S

/60

л°

<!-

U ^в-⁷

N7

Fg.8 £

^95

-3

-é- -é- -ф-

/>

t±.

4 [4- 4j J-*]

96

Fg. 9

y ą?

4)

<») c&* #-

Sinctcn- uni ötafcfcet&ücjt

oKuefce/nWccÂ,

, Л*/Ю

Z. 6)0. bo- é

/л

•$-

•Ф-

17

w =35 .

-€■>

Fg. 12

1 4e4- -#±

6?o

ylóo

Fg. 11

Jfe

5?

fo -и 6о-*-4Юч<-4о^ 6o 4r Go

J -ф- -ф- -ф-

Ф -Ф- Ф!

ф -ф, ф

ф ЛУО —* —

Fg. 13

XT CT"

-J -Afcr- ^7 -ф 6o-i\r- 6о -,<- 6о -î<-    ^?нк?ф

/ Zo

—+/*

7а -4/

^culcnai

си

ъ/л

Г"

00    —4

ф1

X,

iS

HZ « 44¹⁶

yfoo

£ ЛО0. too • /о / *<?

t{ pi

SS

iS

7- :

Fg. 14

6$

-L_ y/o 4-

Oo

03

§c$vm\)c €*D

4-i

-ф—ф- ф i ф—ф. ф

-----¹-----------

*SSRpK bt-^p

SUMS

J60

4.

⁶⁰ \ <Ś [

540

4Ô0

Ct7

VI/

4-So

-U- sf<zo 4.

Oj

W\

V60

Fg. 17

63-

63

/<■

Гф-

i 63

!e

H-

lO-

!6>

63

>N

■}

o-

-63

-o

63

€3

Mi

ШШ 009

tt ti/l

4-60

Ofio u, Ш0&

_!- -

Ci--

Ci

<0^

bo ьЧО±-

Leo во 0

! “Ф"

I U#f

-Ф-

Nh

1Ц_

Z ÔO 6'Jft

Fg. 18

F g. 19

F g . 20

r----

*<T

b?

<0

Ч⁷

ибо

"l во во 0

-Ф- X

J=e

+r

- Il Fg 23

2 7<?

* / ZO

-J

«P

яу <

ft

X7

Fg.31

r'-ł-

#<

»°

%⁰

'jâ хЛ®

1ST

4-

400    50

/ЮО

zoo

mm

Fg. 22 *

^ID/wa-fecÉci^aocRCilM«

/гз

ltP-Ъо

L//0./AO- П

* £ £■

^)t

-)^-гоо 4-

— ел»

FU

J [ itPsC

/л

J»

■i

Fg.24

ftiT 4"‘" MI ^

/00

22.0

^ cT»/*»

■400 O

1 ■ ‘ h-r'r~ł

Fg.25

✓А»    200 JOO Jffoo foo &0

l i Ul

\uiotto^⁴W*

4-

=f

$do$vt, -

1>Р2ё

^Cjlbut

Fß. 27

Ilf 28

Fg.26

Шт

Fg.28

Fg.29

IV. Abschnitt.

Schmuckformen im Schlosserhandwerk.

(Taf. S. .49-72.)

Konstruktionsteile § 13, Arbeiten aus dem Mittelalter § 14, Arbeiten aus der Renaissance § 15, Arbeiten aus der Barock-und Rokokozeit § 16, Arbeiten aus der Neuzeit § 17. v

Den guten Handwerksleistungen des 12. bis 18. Jahrhunderts kann die heutige Zeit nur wenig Gleichwertiges gegenüberzustellen. Der Handwerksmeister ist zurzeit vielfach der Arbeiter des Fabrikanten oder der gewinnsüchtige Geschäftsmann geworden. Fabrikmäßig hergestellte Arbeiten lassen sich im allgemeinen nicht mit guter Handwerksarbeit vergleichen. Freilich würde es heute schlecht angebracht sein, Schlösser usw., die der Schlosser früher selbst fertigte, handwerksmäßig herzustellen. Sie würden zu teuer werden und folglich keine Verwendung finden. Ein gewisser Teil von Schlosserarbeiten, namentlich Beschlagteile aller Art als Massenartikel, wird man zweckmäßig der Fabrik überlassen. Die Maschinen arbeiten gleichmäßig und gut, so daß bei preiswerten Angeboten recht gute Fabrikate geliefert werden können. Diesen Fabrikaten steht die Handwerksarbeit als Qualitätsware gegenüber. Durch Aufklärung der breiten Volksschichten, namentlich bezüglich des guten Geschmackes für Formen, sind durchgängig recht nennenswerte Erfolge erzielt worden. Es mehren sich fortgesetzt solche Auftraggeber, die gute Handwerksarbeit der Fabrikarbeit vorziehen. Der Handwerker kann sich demnach wieder als unabhängiger Meister betätigen. Die frühere Selbständigkeit wird er zwar nicht erreichen, da der Architekt die Gesamtwirkung jeder eigenartigen Bauanlage überwacht und sich die einzelnen

Teilarbeiten der Handwerker dieser unterordnen müssen. Bei der Betätigung des Schlossers muß es darauf ankommen, daß alles handgeschmiedet ist und die materialgemäße Bearbeitung ersichtlich wird. Gesuchte Behandlung der Arbeiten, insbesondere gekünstelte und *materialwidrige ist zu verwerfen. Alle Arbeiten sollen zunächst die rein konstruktive Zweckbestimmung erfüllen, woran sich dann einfache und schlichte oder reichere formale Ausbildung anschließen kann.

§ 13. Konstruktionsteile. (Taf. S. 49 u. 50.)

Als Konstruktionselemente sind die Vernietungen (Fig. 1—9), die Verschraubungen (Fig. 10—15), die Überblattungen (Fig. 16—24), die Durchschiebungen (Fig. 25—32) und die Bunde (Fig. 33—41) zu erwähnen.

Über die Stärken und Abstände der einzelnen Teile sind im II. Abschnitt nähere Angaben gemacht. An den nachstehenden Abbildungen von Schlosserarbeiten aus früheren Zeiten sollen ihre besonderen Merkmale gekennzeichnet werden.

§ 14. Arbeiten aus dem Mittelalter.

12.—16. Jahrhundert. (Taf. S. 51—72.)

„Romanisch“ (Fig. 42—57). Konstruktionsprinzip ; kirchlich beeinflußt. Runde Formen; stilisierte Ornamente mit kräftiger Linienführung; hervorquellende Rundungen; tiefe Auskehlungen; Zickzack-, Rollen- und Schuppenbänder. „Gotisch“ (Fig. 58—77). Spitzbogenform; stilisierte Ornamente mit Übergängen zu den Naturformen; scharfe Ecken und Ornamentspitzen; Glanzbuckel; Zickzackbänder; Maßwerk mit Fischblasen.

Abd,

Mi-

Fg. 17

Fg- 20

Fg.23

Fg.24

-i

•o

Fg. 22

■s

Fg. 16

Fg. 18

Ci

bi

Рч

Fg. 6

Fg. 5

Fg. 9

>ib

‘Ï5Ë

Fg. 8

Л1

OCafl Fg. 16

V"

j,

■i

Fg. 4

Fg.7

Fg.12

Fg. 14

Fg. 11

'II

Fg. 2

Fg. 3

•5

Fg. 10

ьЬс^

Еч

Viehweger, Schlosserarbeiten. I.

Fg. 34

о»

со

ьо_

и* \

Fg.41

а

1

Рч

щ

Fg. 40

Fg. 33

Fg. 36

ЬО

Ьы

Fg.38

Fg.27

СО

w

ьЬ_

Fg. 31

D

Fg.32

I

Fg. 26

i

i

i

ю

03

00

w

ьЬ

In

g

ob

In

i

н

ч\

li

Fg.48

ЭШ

CTjIT

XJ

‘4

F«-« JW

^©О~И2»0©

Fg.43

Fg.49

ft

09 '³Jl

Fg-61 Fg.5S

'iSert&MÓ©©

ЙЙК⁴

4^"

/°

^Цв^-ЛПООШ.®^ ^

o—o—o—o—o—I

Fg.44

Fg.45

Fg.46

/?

Oj

•Й-

Fg. 54 a

к

7

*

X

1

/

X : ё

14

ff

Fg. БВ

Fg. 59

О'

,o.

Fg. 60 ■

- G^oUat^ Ш0-4б00 —

Y,

iY

J/j.

F g. 64

89'Э'Д

Fg.62

Го.

Fg. 55

//

Fg.57

тт

F«. 54

//

Fg.66

о

Fg.74

^ £

w

&<

OKftQl

O¹

ZŁ '»Л

Шж

hS^^i    y; £ 1

(Ć

⁴S^/V

*ф=-

Fg. 71

o

o

*

Ulfe

[O,

Pr. 73

fm

for

см

o

окя ,o

i( 4°

\\ (o A

O

O

W

ko

o

Fg.70

QjMk&Öi

\\ « Vo⁴^

£/o

O —

99 ‘*A

9^

N

.p's

<

V

cc

b.

1

N>

Fg.S7

i

£

~4V

89

ca •

ш

сГ

99

6

I

'/

;

r^t

/■ Г;'-Г';.    ■ ч- 'V ‘ ’    ; V - '■ ' '    \

■■■ \ V. '*    '",■•■■• : ■■■'•■.;'r': '    -    ■ ■■

55

Schmuckformen im Schlosserhandwerk.

Ff.73a •

дай?

1

er%

Й:

?A

.j

«

iV -

Il> •.

§ 15. Arbeiten aus der Renaissance. 14.-16. Jahrhundert. (Taf. S. 57-59.)

„Italienische Ren.u (Fig. 78—87). Vorwiegend weltlich beeinflußt. Heiterer und lebensvoller Schmuck. Vor-

Iffi

;v

p.

Fl

ЬШМШ

®P

mTRÉ'- u

§|PP

ИМИ

>г'ч

Żi

-~г~.

-W-Чбоо 3h.

/Г'

Fg.78

e8‘sJ

Fg. 81

Fg.87

hb

fr«

Fg. 85

98    :

901

ft

°A%glÄ

‘i¹

1 ОТ)

110

115

кг

120

ХЁгШУ/с

soi

zu

114

6П/,

104

106

108'"—

601

¹¹³ Шг

Tg. 103

9U

'118

i/«

НЕ

1;

ГРРР"

й

Й

:*.'Л

4/

:?Vg\ Jr

r&v

%%т

ш

JS)>.

tL-à-

С) 93

88

i i S' S    te //

г,

poi

ЮТ! I Lf>

S

Ш

U

Fg. 128

Fg. 125

Fg. 126

Fg. 127

Fg. 129

rA

Fg. 131

881

LVv

;t

!

Fg. 130

136

<ИШ

щ

■\

Гг

§

м>

2

(г

ы>

Ьц

'З^ллЛлЖе /К.11л.вил^

/ц-бо-лЬоо cMj.

[Л

о

ж

135

Ь-к

№

сГг

Ш

Fg. 122

$

®)g°>±Jo

ш »д

«А\

V7

WP

wiegend Nachbildung einer Distelart (Akanthus); edle Linienführung und Einzelverhältnisse.

„Deutsche Een.“ (Fig. 88—139). Etwas schwerfällige und gedrungene Formen; kräftige Ornamente in nationaler Umarbeitung; vielfältige Durchschiebungen; Eundeisen. Hohe Entwickelung des Kunstgewerbes.

§ 16. Arbeiten aus der Barock- und Rokokozeit. 16.—18. Jahrhundert. (Taf. S. 61—67.)

„Barock“ (Fig. 140—159). Hauptsächlich Dekorationsprinzip. Schiefrunde Formen; Vorliebe für Kurven; reiche Kröpfungen ; willkürliche Blattverrenkungen.

„Eokoko“ (Fig. 160—169). Dekorationsprinzip. Muschelformen; üppige Ornamente; lockeres Geringei, langgestreckte Ornamente; überhaupt schnörkelhafte Deko-rationsmotivé.

§ 17. Arbeiten aus der Neuzeit.

20. Jahrhundert. (Taf. S. 68—72.)

„Modern“ (Fig. 170—198). Zweckmäßigkeitsprinzip. Beeinflußt durch, verbesserte Werkzeuge, besonderes Schweißverfahren, Profil- und Ziereisen. Es treten ganz neue Formen auf, die vielfach der Tier- und Pflanzenwelt entnommen sind.

11

&

091

Fg. 151

Fg. 152

I)

L

169

fjp QQI-SjI

9

Fg. 154

&

156

BS

Ж

157ЛМО]

ш

J

6

158

Fg. 149

A

'g. 15:

Я

Fg. 142

"1%

яал¹“

Fg 140

Fg. 143

Fg. 146

Ж

Fg. 141

Fg. 144

IbosAo&k -^R<rfcv^fo Лбоо-^БО

Fg. 148

m

Fg. 147

1

О':

г #

ч *

4

i

В:

£ V. !

cv

- ,

-À

Л

4«

ш

м

п

': ;

л 4.

g

M

L

' f'W

к

Fg. 156 a.

w

*

&

Fg. 161

i

ss

Fg. 164

?

Fg. 162

m

I

СП

V Fg. 16

Fg. 163

Fg. 160

&

Tg 165

7

7

Й

mm

m

Fg 168

■ !

/

ft

О

ft

V

7 С

N

691

s

•/

?

V

à

IM

a

m

Pi

K

л'

:

m

m

Fg 167

.

г.

?>i. à

Sr"

Yiehweger, Schlosserarbeiten. I.

66

IV. Abschnitt.

ш

•i

!

:

I

1Щ

< .

tf

i

:

Fg. 169 d.

*

I

ш

: 'Лы

ч

f

\

ËÉà

%

'ts?

1?J

4

m

7/

\

<v

Ą

bé

ШШ.

;

%

-

Ą

i: A

Fg. 169 e.

Пэ\

СП О О СГД о П7

е>

.Сч, 0

Fg. 170

£П

о 1C

,о

вч

Fg. 171

Fg. 173

Fg. 172

.о

Fg. 174

Fg. 175

ff

Fg. 176

jVLocUtw 1000 5И.

'il

F g" 178

Fg, m

74

sa

• Fg, 180

LU,

72

2ÎS

ik

812

Fg. Ш

«г

278

jfei

'*wmgr Fg. 185

F«^ô6iL^K^»Npy

jre.-l8Ł;

«нгя

lOs

Fg. 183

s U.V»

fv

{]

c.

ы «ГГ 4

•* *

Aas He. 281 ««fertigt,

Fg. Ж

Г- -    ""

i'i

-- -*•

тт

'ÿfû

ГЛ

»йишжйй

Ł' J&Éfe*

F* 192

Шй

•*»\

4*d>\

Au* Но. 274 gefcrttgŁ

îKÜS

681 аЛ

P*. 19t

iff .

l'Fg, 190

/Т-

ai

'ИвТШЩ>вцрШ1    S»0

21?

куШ

ш i

äfti

•шт

[rna

Ж1Т

S'

*g.l96

276

'«L2

Fg. 198

ш •%

~—law—

rr*pa

ZK

..-44^. - :• "

Fg.193

Fg> 194

’ЦТ

№ra

V. Abschnitt.

Fenster aus Schmiedeeisen.

(Taf. S. 74, 76—125.)

Sprossenfenster § 18, Flügelfenster § 19, Doppelfenster § 20, Schiebefenster § 21, Schaufenster § 22.

„Allgemeines.“ Licht- und Luftöffnungen bei Hochbauten schließt man ab durch Fenster. Sie bestehen aus Rahmen und den darin eingesetzten Glasscheiben. Die Räume sollen durch die Fenster gegen schädliche Witterungs -einflüsse geschützt werden. Zwecks Lüftung sind bewegliche Teile (Flügel) einzufügen. Die schmiedeeisernen Fenster werden im Hochbau verhältnismäßig wenig angewendet, trotzdem sie bei guter Konstruktion allen Anforderungen genügen. Für Räume, in denen sich Wasserdunst entwickelt (Fabriken, Färbereien, Ställen usw.) sind hölzerne Fenster ungeeignet. Der dichte Verschluß gegen Zugluft und Regenschlag wird erreicht durch geeignete Falzbildung. Wasser abführende Wetterschenkel sind vorzusehen. Das Öffnen und Schließen der Fenster erfolgt durch die Flügel, welche sich um lot- oder wagerechte Achsen drehen, sich verschieben oder auslegen lassen. Die Flügel sind meist nach innen gerichtet.

„Abmessungen und Teilung.“ Die Fenstergröße und Form ist zunächst abhängig von der Zweckmäßigkeit und dann auch von der Art des Aufbaues. Man kann durch gute Teilung vorteilhafte Wirkungen erzielen. Im allgemeinen rechnet man Ve der Raumfläche als Fensterfläche. Bei kleinscheibigen Fenstern (Fig. 1) ist eine Windversteifung in Abständen von 1 m vorzusehen. Bei Flügelfenstern ist zu beachten, daß die Flügel höchstens 0,8 m breit und 1,5 m hoch gemacht werden (Fig. 3 u. 4), da sie sonst schwer und unhandlich werden»

-a>

2 ja.

a.

s*

,4

bo

Ao

У, gtilyt    2

a, hsoOüo ,6 100^500

Fg.3

■И,»0

jr^

Fg.2

Fg. 7

p?

Ikw:

v^7

Fg.5

Tg. 6

Fg.8

-6oXj

71/И

Fg.9

r — И,о -.....>

Fg.4

<AA

Fg.10

Fg.ll

UT Fg. 12

Fg.13

„Konstruktion.“ Man verwendet hierzu Flach-, Winkel-; T-, U-, Z-Eisen (Fig. 5—8) oder besonders geformte Fensterprofileisen (Fig. 9—13). Die Firma Mannstädt fertigt dgl. in großer Auswahl an. Die Sprossen werden zusammengeschlitzt. Die Ecken erhalten Versteifungswinkel. Die Flügel legen sich in einfache oder doppelte Falze. Werden die Falze so gebildet, daß ein Dichtungsmaterial (Filz,Gummi, Linoleum usw.) eingefügt werden kann, so erhält man tadellose Eisenfenster.

Die Befestigung der Rahmen erfolgt durch Bankeisen, Holz- oder Steinschrauben, Anker usw. Der Beschlag (Fabrikware) ist in den einschlägigen Geschäften in großer Auswahl vorhanden. Vor dem Einsetzen der Rahmen sind alle Eisenteile mit einem Rost

schutzmittel (Mennige usw.) zu streichen. Der wetterbeständige Anstrich ist alle zwei Jahre zu erneuern. Das durchsichtige Material ist ⁴/₄ (2—2,5 mm), ⁶/₄ (2,5—3,5 mm), ⁸U (3%—4% mm) starkes Tafelglas oder 4—8 mm starkes geschliffenes Spiegelglas. Die einzelnen Scheiben werden mit Stiften (Fig. 5) oder Deckleisten (Fig. 12) befestigt und verkittet.

„Die Kosten“ ergeben sich aus Materialverbrauch, Arbeitslohn, Geschäftsunkosten und Verdienst. Das Material wird nach Gewicht (siehe Tabellen) berechnet. Da die Eisenpreise großen Schwankungen unterworfen sind, können Durchschnittspreise für 1 qm Fensterfläche nicht ermittelt werden.

§ 18. Sprossenfenster. (Taf. S. 74, 76—94.)

Kellerfenster zum Ausheben (Fig. 14—18) sind sehr zweckmäßig, weil man die Öffnung als Einwurf für Brennmaterial usw. benutzen kann. Der Rahmen ist gebildet aus L-Eisen. Am Stoßwinkel (Fig. 17) ist ein Teil des Rahmens umgelappt und vernietet. Der Verschluß besteht

'/л

во

—ц-с

Fg.14

'~Ф~

Fg. 15

q    ^^viXU^»i»Ux>

C^wa/Ac&fcw

Iwvw

Si

Fg. 20

Fg. 19

Г⁵

<£■

l IÇ.lS.'b 1./15И5Л

îp

ü5 --

ri

mÇ

Ml

LJ.-

\%y

Н+Ж

Fg.17

as —

Fg* 18

/Cl

т4л°

Fg.2l

fa

V,

Fg.26^3/

<s>

'<s>

4.

Fg.27

■'t—

Fg.28

05 I

VCX&ÖaVUH^

Fg.S2

v.\\ I >0.1+

Fg. 29

PP

Fg. 30

^-LH5.45.^ I

icui

ЩИ!

Fg. 23

Fg.24 -Sc£)/ha#Cл*y_& Fg. 25

-АО

АС>-

ж

Вж

сН

Fe. ³¹

.StWVL

&4ир/\МЛУ.

_Fg. 34

7 ¹

tif

rJ

.*5-1

Ti

1*5

ä«

|J

.-О

£>w|. С&иХ&У 4ViV* Xw, L<S/t^C^ №

Fg. 33

\.лЪ.лЪУ\

L iO.Zo.b

Fg. 35

⁶?Ц.

асах

Cjÿfrw£vyal4

иоо-

Fg. 36

ль

■л 5

2>C

6/

■лЬ

Уль-

t_

©•

V/

Pilił

<%

лб

ль

Fg.40

л><

Wß

Щшж

1}

\ i -S/CkvûXtSb

Vvvvwv -

СЮ.Ч- Fg. 38

3ÜXC t

iHâ^p

Щт\&и    ^

0    еЯд Fg. 37

«да

■SF

•AfLQ

Fg.41

ITT)

/3

ШМ

//

r°

■И, IfO

4/HV

ИГ

3Fg.4S

e-ł

l°S

2SŁ

Fg.44    II

I ЦЗО.ЬО.Ч’ I 2)0.4-

<p.

i.'

{;

pwvvv

[Щита

it

А'

тг

И,О-

Fg.46 в

fyvwvJ/Uife CÎD

Fg.47 -S^4/\vvCt Clfo

Fg.48

шштж

АП

Fg.51

g^Cn^t^VVpAVlV^t 6    I

Fg.49    L

LÎ5.Î5.4-

4.ÏO.Îÿ<4

//

ъо.гом

ЧЕ-

-Л;

:-W

2t

-L 'bû.’bO.H

Fg. 50

Viehweger, Schlosserarbeiten. I.

✓z

ÇvvvvV

1ЫГ

JET

I [TT

•лю-

&ЖаУ>Ь 4«Л

3b

Pg. бз <€

9&мХ<ЛМНЛ±!./>ч I B’

iL^......U-^i

I Е10Л0'⁴ Fg-⁵⁹J 1=

Iba

те

»8i    То eo 1 П

TW i -ir

H ÿ^lo-w.i* ^JL^fc.W pg 59 Fg. 66 I, /    «Il ' "Еч iJbe.îo>y^ Я

‘v4

tD

me.

li.bO.bOM

ww

•A

Fg. 61

b_J

-идо

Я ir

'3

«*■

11

Fg. 63

, CD

/л

Fff. 64

Tg. 65

t...........t----J 50

J К—    >

L.b5.2)5.4 lAQh70i bî.^.u и6$?    К Л1 i_Xöh5.5

Fff. 66

(3^уидгоий/>Л/С ./L»&îb

5O

-nov

m-

Tj

■S3

trr

'-e

N:

[■$7

7/

Fg.68

e -e

гИН—¹ o:

|/i‘V

MQ

S-*

Fg.69

Ш

№

♦

Y~a4

f»

• •.

—-—5b—§; -*Л *---«401-

?

Рч

⁰⁴ II-

h

i

V2

», .ô

» 1

if do

8

il

. :

47

Hi-+-

7

ъьлъ ^

j-A

l-ZOH*.*)

CS f=

i

SUÉ

+

*- ъь

Я

КЙ

S'

Ш+Н

1

Fenster aus Schmiedeeisen.

00

г

Fg.73

*-/1,40

m

&

&

\

' \

^ d -лл^

I

I

i

t*oy.

I

1

I

I

I

1

I

L

Л-

I

I

i

ISlSr

о

T

.

I

,

fy

IM»

*0

Lj 4

LJ

Ш

К- 50

rrî

Fg-, 75

сХЧ^ЛУУ&Оие/рЧс c^»/lgfeO- 40.fi* Л J

•лхъ ч

tfi 1—1——л

Z3II.1

essiür

Ü^IK-

mu

-Ф-

«ДО

5-

ÎT?

I

; -ф#

rxi

u»

е-

4.

■Ф-

«> AW.Ąr I -Тб'/i

Fg. 76

V0-

Fg. 78

F g. 77    —j

лл/. Йола<пусСилу

шт,

*1

V/У/

I»

•>

KiHfW

? Ал

F g. 79

Г~ I- łO.iO.4 М»Л

__    Fg.81

i-ao

=1

-IT

ïï

jfrai.

ПЙ

Tg. 80

Sk

-го-»-2и

<yffb

/С4

c4/n**ofot V.3

/wwvwv'

g U-

qAssMa/I*

|60.4Ъ

J_

L-i Sü'^s.e

~A

Л?5

\aj

4a*gfet

I So.6

Fg. 84

fcCwfCсг. Fg. 86

■0- 0-

1-

2 5^>

•-2.0

EH

г/

⁰ .K

-lo -4*—»-о

-10-

ïc

05€

60.U0.7

.0

F g. 85

aus Vorreiber (Fig. 20) oder Vorhängeschloß (Fig. 19). Sprossenfenster (Fig. 21—32) erhalten kleine Scheiben von 15—30 cm Breite und 20—50 cm Höhe. Zur Be- und Entlüftung der Räume genügt ein kleiner Flügel. Das Rahmengestell ist gebildet aus I- und L-Eisen und ist in die Fensterlaibung eingesetzt (Fig. 22 u. 23). Verwendet man hierzu 1-Eisen (Fig. 31), so müssen Eckbefesti-güngslappen (Fig. 34) angebracht werden. Bildet man dieses dagegen aus 30-30 L-Eisen (Fig. 36—42), so genügen bei kleinen Fenstern Ecklaschen (Fig. 40); bei größeren dergl. sind dann Eck- und Zwischenlappen (Fig. 44) vorzusehen. Die Fenster (Fig. 46—60) mit Kippflügel sind zusammengesetzt aus 1- und L-Eisen. Am Knotenpunkt E (Fig. 52) und E (Fig. 58) sind übergreifende Wetterschenkel angebracht. Bei Anwendung von Fensterprofileisen (Fig. 61—71) bestehen die Rahmen aus L-Eisen und die Sprossen aus Mannstädteisen N. 1701 u. 1627. Große Fenster (Fig. 73—87) müssen entsprechende Windversteifungen erhalten. Für das Beispiel Fig. 73 ergeben sich nach der Berechnung für die Hauptstütze ED ein C-Eisen Nr. 8 (80/45) und ein 1-Eisen 80/80. (Fig. 84 Taf. S.90.)

„Berechnung.“ Die mehrfache Sprossenteilung läßt es gerechtfertigt erscheinen, die einzelnen Träger als gleichmäßig belastet zu rechnen. Der Winddruck sei mit 100 kg/qm angenommen. (75 kg/qm würde genügen.)

„Sprosse GHU (Fig. 73):1,0 • 0,35 -100 = 35 kg = Q. Ql_ 35-10

Mmax

= 4,4 kgm = 440 kgcm. Erforder-

1200

= 0,37 cm³ Wx—-±b h²=^

Mmax 440 liches W — —— к

0,5 • 4² = 1,33 cm³ (Fig. 78). Rechnet man des Auschnittes wegen nur 25 m/m, so ist

Wx = -i- 0,5 - 2,5 ² = 0,52³, also ausreichend.

-y

<b.    6у»Длу7

57

Fg. 90

l;.-v

йЯл*Л*УС

Fg.91

■Л0

2,0-—4^чо

Fg.89

0?

7/.

•у.

ту

yq

•А'.

|Лу

j_4o/bo ,ъ    х&оЛаъ

LlMM

Fg. 88

iWuLu^i

* !>

Ijjljlljjjl

ш.

t#»

's

г?- аз! I. |,Ш I.

ciïUUwàfâiJUibMY

г©

2зЧ*.

-лсо

— Io—»«MV»

И“

у:.у

*///////

Pgr 92

I л7" L—S—4

Fg. 98

Fg. 94

\.

94

V. Abschnitt.

жХ^

►ł?

jfi-

\ł

0-0

Fg. 95

cftCvCM/y ЛУ, 5 с^Су’Уу^ллллуили г 3,VW

I t Ni/

x;

Fg. 100

Х-.-Л

Fg. 99

Fg. 96

Fg. 101

0?

0/y

\уС^Х<л|уУУиу -

g. 97

ĆUA^a^iC^Wfryt /уи^дЬ

„Sprosse JA“ (Fig. 73): Q = 1,4.1,0-100 = 140kg.

14000

.Mmax =

M max

14000 kgcm. Wx = —-

IC

12000

^ 12 cm³;

vorhanden C Nr. 8 mit 26,5 cm³ (Tabelle IV).

„Pfosten CD (Fig. 73) mit Windversteifung“: Q = 3,0. 1,4-100 = 420 kg.

Mmax = 42000 kgcm. Wx

35 cm³.

Mmax 42000

Je 1200

Vorhanden C NP 8 mit Wx = 26,5 (Tabelle IV) und 1 Nr.⁸/⁸ „ Wx = 12,8 (Tabelle X)

zusammen 39,3 cm³, also ausreichend.

Die Hauptteile sind aus C-Eisen gefertigt (Fig. 78 u. 84), welche miteinander verlascht sind. Zur Befestigung des Bahmens sind Maueranker zu verwenden. Die Sprossen sind überblattet. Da bei dieser Verbindung jeder einzelne Teil bis zur Hälfte geschwächt wird, empfiehlt sich diö Verwendung von Fenstereisen nach Fig. 90 und 91. Bei Fenstern mit M-Eisen (Fig. 92) vereinfacht sich die Konstruktion (Fig. 94 und 95) ganz wesentlich. Eine empfehlenswerte Kreuzung bzw. Durchschiebung der Sprossen zeigt Fig. 97.

§ 19. Flügelfenster. (Taf. S. 96-101.)

Die Fenster bestehen aus feststehenden Futterrahmen und den beweglichen Flügeln. Die einfachsten Konstruktionen (Fig. 103—106) mit einer Anschlagsfläche am Dichtungsfalz genügen im allgemeinen. Mit Doppelfalzen (Fig. 107—109) erzielt man einwandfreie Fenster, die für Wohn-räume gut verwendbar sind. Die Beschläge bestehen aus Drehbändern (Fig. 108), den Stangenverschlüssen und den Oberlichtschnäppern (Fig. 111—128).

щг*]

гг

w.

ЪЮО 4«,*. iq.4-

/Я

SSL

Tg. 104

Ox

v>

УУШ/Л Fg. 103

U W.W.%

tfu-    ¹¹¹

ЬлЛ4Л^.

i5

K5

йЧл'^'Ь»

gg

?>c

ш////т

u>

o»

bo

СЛ

Ь0

Cû

Vs

Vs

■Ло

/iw

«t

Ш

1

1

го

Fg. 110

лщ

о

pi#

Fg. 107

-h=H——I—и 50

сЧ Mc)

.г~‘⁴

-л

:J

, 5

45

V/,

t

ж

cV\.

9/.

Fg 108

r- 60

Yiehweger, Schlosserarbeiten. I.

7

A.

i§p

r>

mm

Fg. 118

»Fg. 121

Sil

Fgj20

Fg. 122

ïï

mi

Fg. 119

Fg. 117

Fg. 112

F g. ИЗ

5T

Fg. 116

Fg. 114

t®

Bei Anordnung eines Fensterfalzes (Fig. 131) mit eingelegtem Dichtungsmaterial (Gummi, Filz, Linoleumstreifen usw.) erzielt man eine Fensterkonstruktion, die den größten Anforderungen entspricht.

Der Preis eines vollständigen Beschlages für ein Fenster (Fig. 107) beträgt 8-15 M.

IS

F g. 124

и*

-*И

Fg. 123

IWS-

йГ

°!

i i

;ъ

Ires'

' Il

йЖяЙИ?

if

ii*

If

li

F g. 125 Fg. 126 Fg. 127    Fg.128

§ 20. Doppelfenster. (Taf. S. 101.)

Kastenfenster (Fig. 133 u. 134) sind notwendig, wo es die örtlichen Verhältnisse bedingen. Das nachteilige Beschlagen der Fenster wird damit verhindert. Bei günstiger Witterung können die Innenflügel ausgehoben werden. Der Zwischenraum vom Außen- und Innenfenster kann zur Aufstellung von Blumentöpfen benutzt werden. Gut ausgeführte Doppelfenster, namentlich solche mit Dichtungsfalzen (Fig. 133), genügen allen Anforderungen.

§ 21. Schiebefenster. (Taf. S. 102.)

Räume, in denen freie Ausblickfläche gewünscht wird, soll man mit leicht beweglichen, in beliebiger Lage einstellbaren Schiebefenstern ausstatten (Fig. 135—139). Sie gewähren bei geringster Platzausnutzung ungehinderte Beweglichkeit und bei Anwendung der sehr praktischen Beschlagteile (Fig. 137—139) Fenster Verschlüsse, die bestens empfohlen werden können. Die Flügel werden in Laufnuten geführt. Der Beschlag besteht aus Laufrolle mit Hanf- oder Drahtseil und Gegengewicht, aus dem Klemmverschluß und den Handgriffen.

Der Preis für vollständigen Beschlag (Fig. 135) beträgt 6-20 M.

§ 22. Schaufenster. (Taf. S. 104—125.)

Laden- oder Kaufhausfenster (Fig. 1—6) bestehen aus feststehenden, kräftigen Futterrahmen, den Spiegelscheiben und den Deckleisten. Die großen Scheiben werden von außen eingesetzt. Der Rahmen ist durch kräftige Ankerlaschen zu befestigen. Zur Herstellung derartiger Fenster empfehlen sich ganz besonders die Mannstädt-Konstruk-tions- und Deckprofile (Fig. 7—19). Einfache Fenster

Fg. 129

Fg. 130

Fg. 131

é.

Fg. 133    '

Fg. 132

Ш?,л

*-40

.■Mm

1ГШ

Fg. 134

'//////////

г,

f«i

ь

■J¹

£*t%Ubç^+*ttt

и

! H

;

f

ш

a

RI

Fg. 137

^ сП

'im

m

40

I

I

E

T

t£

ш ■

■ ■ t

I

I

/

\

I I--

3

•Г

i

~r

V

ъ

\

•/

! ; • /

Fg. 188

I

11/

I

' \ ■

t

§

/

\

I

m

m

w +

1

\

/

>0

Fg. 139

I

CO

CD

(Fig. 20—27) bestehen aus Z-Eisen, Scheibe und Kehlleiste. Das lästige Beschlagen der Scheiben wird behindert durch Außenbelüftung der Auslageräume. Hierzu benutzt man dann M-Eisen Nr. 187 (Fig. 30). In der Kegel sind vor dem Fenster Rolladen anzubringen, welche in einer Nut (Fig. 31) zu führen sind. Angemessene gute Fensterteilung und zweckmäßige Beleuchtung sind immer anzustreben (Fig. 28—35). Die Anordnung des Zuganges richtet sich nach der Zweckmäßigkeit, mit dem Ziel, tunlichst große . Fensterschaufläche zu erhalten (Fig. 36—47). Die Einzelheiten über Anschlüsse am Gewände (Fig. 48—52), über Bildung der Pfosten (Fig. 53—57), der Pfosten mit Türanschluß (Fig. 58—60), über Bildung der Kämpfer (Fig. 62—63) und Brüstungen (Fig. 64 u. 65) zeigen die Darstellungen. In besonderen Fällen ist die ganze Schaufensteranlage aus Holz konstruiert (Fig. 66—83) und ihre äußeren Teile mit Kupferblech und dgl. belegt. Man erzielt damit sehr saubere Ausführungen, die keines Anstriches bedürfen. Mit Hilfe der Ma nnstädt-Schaufensterprofile (Fig. 84—100) ergeben sich Anlagen mit geringsten Querschnitten und größten Fensterflächen. Ganz besonders sei auf die Konstruktions- und Deckprofile (Fig. 101—111) ^hingewiesen. Ihre Anwendung ist so mannigfaltig, daß sie für einfache und umfangreiche Fälle immer geeignet sind (Fig. 113—143), was aus den Einzeldarstellungen deutlich hervorgeht. Die Beschaffung der diesbezüglichen Musterbücher wird bestens empfohlen.

ah,силс&шяял, c-7Z &

Q'i

«л⁴

«—j— 4,o

Fg.l

*mr

Fg.2

IF

Fg'³ I

I

ШШ

Fg.4

Li5,35.if

Л54-2Л

гг-

1Л

f-^Ф

LîS.36>

* H—

——so

Fg.6

Fg. 6

So

ОцСль

И-⁻!

й».щ.^гц^,а1

ïv*

«О

ЛХ5

5 ооо f

'А

м?,Ц

Fg.8

Fe-,7 ^~г<5

aAt^vvvvvÆdg

g.^7 ^/ÜC^QAofcXc

JW/^Г

— Ъ6 —

Fg. 10

И—bj-~-

T шрмн

Ш

»D

Fg. 14

lii

g-

15#

F-6,

O'

4SI

5 CüX>

«—Хб->

f2f

Ml

*/è *

Ł001

4Й.

Fg.18

и»

^ i у-

r

so

«—ъ5—»

Fg. 11

:4f-

Ll£

4S3

/ Fg. 19

Fg. 13

Fg. 12

4Jft

иор

JcaaaUsas

Fg. 20

сЧ^

сЧл&а

c4]*i

Fg. 21

Fg.24

6c

еЧг îS.Sc.M 5

ï_*

2>S

*-iS—>

/Я

Fg. 26

Fg. 28

w/ÆÈMm

Fg. 25

Fg. 22

бо

Fg. 27    <•-

иоо

шмшШ

11

Fg.28

■çft>

-Ю0

*100,(э0

Fg.31

сЛС /fSrb

9$-«

ЛаЪъ

11

GQ

v-T±

in

99-

cK M i

<o

л

Fg. 30

'ул

Fg-²⁹«WÄ

////////////

mm

Ш

i

i

f i

9 ‘ *

fi

Fg.32

:

.

S? 4

>

i

ч42 .i

w A - i

I

i :■    •

«у.

• Л

Ail

ääS«4,*« *ï    A ‘

'

t:

¹

!'t

Fg-33 ;

■:.: -.r.~r3fe

P⁵»**

m

.

a

S r-4

шшг mm.

-

.

1

W5

;s

Г

s

мг

1

I

■

11

P

Й& 8

w

i a

г

¹

Ю

ш

.

;

I

i "

u

w.

, »• ■

ПЩ

[ ' * • '**№/*$

f

VH

тН

V. Abschnitt.

Uel

У

l*"⁵

^ 111 I

es

*%» Ir

ß»

-3,4-0----

Vo

fa

К-ЪО-

bÛ

^-оч

1,10

65

5:

Fg. 36

!ro

l-F

Fg.37

bb

t-*

Fg 38

SÇ

Ja®

ся

ГУ

35

к - ЪС

łj>

|Ч9

!Ф

Рч

ТО

г 0Î

35

р

О*]

та

Lî.L.j

TL

-A.

Ф'

I---

Fg.4

Fg.45

---r

1Л

|С^0Л&/УУ

04

Fg.46

/Fg.47

-69 —

44

сЧ SCJ1

ьМ *Q22r

*4-1

3‘

f.

h¹⁴

-.аб

Fg.48

Fg.49

'00

c5b/cuwb

С1уу»лкСилгс &, С^длучуууси u 6ö.40.5

40

mm.

17

1Л

55

Fg.51

io—4 cM. >ti>q

Ci И

b.

оЧ лЬЪ

S\MvAa»*

Ш1 Fg.50

HF

рЧ -5000

сМ 5ооп

■40

И*-»

Fg.53

65

Я6

Fg.54

55

^ pftvi

сАМ&Ь

о*

о»

Ь^Слу

1_

/' //

es-

¹    Fg.55

й^0ЛУ»/Сг ■ /р1. ЩМ'СЬУУ'

ЪЪ

ъ

g-56    _

п»

er»

*ЩгЩ

у.

Fg.57

И00

ü4lA4ly^&Üofo

Viehweg-er, Schlosserarbeiten. I.

V

:

• >.

Ми

кл*1л

Ш .JT»?

ШЁ5Я

ill

Fg.58

ftüvv

L 9ЛШ X *5.30*

<

' ->ч

-30

\

->y,

X-

Fg. 61

T

s

.миге

dMtV

»T-4

сЛ1 ^S4-

+

4^

лчЪ-

Fg. 60

ïïtTl

^5™° I r

y---J|

-ôo

cM 4fe4>

bh

AIS

^Зи^фл.

Fg.62

-u V5.50

L 10.10

III

U)

'О

Fg.63

^!!    ПЙ

^ —$ i    -L

-16

'Л

Fg.66

U»

Tg, 64

уЖЖмт.

-ЬЖл^ии

ШШ

*4.

ODDD

ПИШ1

— Si

-A-

И, ‘ n

-4ft éo-

И:т-

Fg. 66

*0

Fg.73

I y,w Fg. 67 ' XX

SxAav. сЛ^сВ

1*

fcl

&t.k/W-

^Fg.69 j-*M

îô -J

-i- >4 —4

i*

^ Fg. 70

—*j

P

iS

->г-

■Stb-w. cA,--S

s.

. Fg. 74

/lio

Fg.76

*~Г

\

Jp

VI» ł VD

Fg.76 T|_L

T? »ДС ^|-ll

⁷

ł

■o

1

О

icSP.0

Fg.77

I Æ

■‘H

ZI

çM

>£

MS

ар

Fg.82

"С

л гл <г^.

т-

тт

Шж

акмлсрмХйсу

JP*

•/М$

«-а*

«SdW.

F*. 81

|иоо

5004

ft^voUwya^t

ИЬЭ. U!7Æ3b-    Fg.86

Fg.87

Fg.83    |*Щ-

k ГШ||1 ęĄWvvvtXól<U

cj^u^vtcvs-^vv V

J

Fg. 88ц

§£<ХЛ^|/вл

5014

5004

Xo-

Fg.95

fl¹

Fg.96

Fg.89

nil

Fg.93

Ui>

\\    Fg.90

%

F g. 91

Fg.92

U.Î

F g. 94

&&МаЬ

fl

JY 50j

•II,*

ń.

it 501Ł

jJl—Fg. 97

500Hp

5014

VS

<Л

50:4

Soi'b

F g. 98

Fg.99

iFg. 100.

.ъ

Fg. 101

«*»

сЧ

Fg. 102

rsr^m

с*1 Hf w

*ЪЬ

Fg. 103

j-

X£3

Xe,5.

.иЦг

Fg. 104

<t>

Fg. 105

vO

^а^/и|лХ<. F g. 106

^54-

55

1Д|5

Fg. 107

н-2>5—*

Fg. 108

XV

исо

54 *

Al ьъ

Fg. 109

К- ^,5

'9

4ZSÔ

U— ц-i —J

Fg. 110

SX" «Mlii

4ÏÜ

Fg. Ill

_LL_Ł_

ßl

«-■

t-o о-

/I/VW*

Он Û.-H

Fg. 113

Q.

EINGANG

шЛ-

Fg. 114

IT

Fg. 115

■В

в- -

-С С-

□с

%.

'ЬЧ-

V. Abschnitt.

■/////////////Л _

Щк

ОД

CgU

-ОД I-F Fg. 117

Ik

т-g

aCó^ffct

Fg. 118

лб-

I- к

*4-—*

Fg. 119

ь-

•V

' Fg. 120

as-c

A1ß&

JL-K

-*9

Fi

Л1Я

Г--*

4! [IL

С-Ъ

Fg. 124

ъГу\ЛЛ4скжС

U»

ln

тП

Ло

И0О

Tg. 123 H

11-

/10«

Cub

'Ч

1c

Tg. 126

un

•#»

-L

■4

«Л

r

■Ш«

kîtf.iW

N-0

8

J v*

ŚJC&

Fg. 131

Fg. 132

L Л^.лЬ.'Ь

КЗ

■:fc

k- *ц-

Fg. 128

Fg. 130

fl

4Ï»

55

Fg. 133

3-C

MH

Fg. 136

<r

Fg. 135

со

HÜ

F g. 134

boo

ШМ

шм

Ö--V.Ö

К-0

*и6 -*

Fg. 139

г$Ч

Fg. 140

If*

»г*

J&

'IL-ri

|И|

»,

..

- •

::ыаКй

SS

L-4 т

F g. 138

иСО

Fg. 141

чуб

ta.

Fg. 142

Fg. 143

VI. Abschnitt.

Verschiedenes. (Taf. S. 127—132.)

Windfahnen § 23, Grabkreuze § 24.

§ 23. Windfahnen. (Taf. S. 127 u. 128.)

Wetterfahnen bringt man an, um daran die jeweilige Windrichtung zu erkennen. Sie müssen leicht beweglich sein und sollen sinngemäße, den Verhältnissen angepaßte Gestaltung erhalten. In der Regel bekrönen sie die höchstgelegenen Bauteile und dienen dann gleichzeitig als Blitzableiter. Der Übergang zur Dachfläche und gleichzeitig die Überdeckung dieser wird durch Aufsätze aus Metallblech hergestellt. Einwandfreie Befestigung ist vorzunehmen. Fahnen mit kleinen Abmessungen (Fig. 1—3) bestehen aus Rundeisenstangen (Fig. 3) mit Gabelüberwürfen (Fig. 2) und darüber geschobenen drehbaren Gasrohrhülsen. Erhalten diese größere Abmessungen und folglich mehr Gewicht, worunter ihre Beweglichkeit abnimmt, so verwendet man ineinander geschobene Gasrohren, Kugellagerung und ausgelegte Gegengewichte zur Gleichgewichtserzielung (Fig. 4—9).

§ 24. Grabschildträger. (Taf. S. 129 u. 130.)

Grabkreuze (Fig. 1—3) und Schildträger (Fig. 4—6) lassen sich mit einfachen Mitteln zwecksmäßig und geschmackvoll herstellen. Man vermeide sinnwidriges Bronzieren und Verzieren. Ihre Haltbarkeit ist die denkbar größte gegenüber solchen aus anderen Materialien.

§ 25. Hilfsverbindungen. (Taf. 131 u. 132.)

Der Maurer und Zimmermann bedient sich der geschmiedeten Dübel, Klammern, Anker (Fig. 1—9) und Hängeeisen (Fig. 10 u. 11).

ИЗ/

«к

!•

51

et

ii*.

u»

4-

•л

jfrv

I»

»a

Fg.3

Fg.5

ïi

Fg.l

+i

Fg.2

2/UvlC

д&у^пл^А*

Fg.4

Fg.6

Fg.7

Л

o>

•Л$5

ÜB

e

Г

b-**

к

i

!\

ГТПТп

I

KV.

u

T

V

*

\

г

W‘

,i

"I

1

ü

4

.

AXv

c\

л.

•M

Fg.8

У/УГ1;

*4 ⁴

c*

to

Vorschiodones.

1-29

<î>

I----î*

s

44

Y

1

/•

10:

YO

'⁶!io

! f

'

Ш

MO -

*

w

ÎD

m

m

il

m

Ж

-Mb

H « и

f

'il

lil'

y

. Ы fU

^iûifiuiiiriinn(tfiVinriimuArii!»miAini^№^^^^(aiira)iit'i»{iiiui\iuiiiùii]imi!i!iii!iiviùu!uiliHîuuiuit«Hi!ii^.

Fg. 1

F g. 2

Vie hw ege r, Sehlosserarbeiten. I.

9

-y

*— ii

-H

*•/*

•»

PSVI

iïxa

ri

^яя-а

ppl

iiiSi

SSSSBi

S«"

ЛЙ

(Я

läi

S3

ШШ

ЯШ

; сштш

]'У\

01

Fg-,4

Fg.5

Fg.6

20-^0—*

Fg.l

Fg.2

40 - bO

чо -bo

ó*U/ic*»A

Fg.3

4=4

44

I»

Гг=И

Fg.4

Fg.5

Fg.6

4=4

60

7W

Fg.7

tll

»,

£    ИЧ-2.0

.i i

.11

Sri-OU

7^:

l-Ъ /

'io- a5*t 40- 15

'i

у'л-ъ

✓ 6-*o

II,

Fg.lO

j«. — 20-25 —»4»— 20-2S —**■—

«Й.З

łAwK^t,

г-ъ

Fg. 12

I—1=1-N—I-N

Fg. 13

ф- -ф-

Fg. 11

~ZJ

Register.

Ankerschraube 30. Auslagen 108, 109.

Ilakenschraube 30. Hängcblech 0.

I Rolladen 114.

I Romanisch 51. ; Rundeisen 6.

Bankeisen 79.

Barock 61, 67. Befestigungslappen 78. Beschläge 98, 99.

Bleche 6.

Blechverkleidung 116 bis 118.

Blitzableiter 127. ßohrhebel 46.

Brüstungen 115. Buckelplatten 6.

Bunde 49.

Castorfenstęr 92.

Deutsche Renaissance 58. Dichtungen 101. Doppelfenster 101. Döpper 30. Durchschiebungen 50.

I-Eisen 7.

Italienische Renaissance : Schaufenster 104-125.

Schiebefenster 102. Schrauben 36, 37.

I Schraubentabelle 39.

Schwelle 111. i Spannschloß v37. Sprossenfenster 74. Konstruktionsteilt¹ 42, 43. j Stabeisen 6. Kreuzungen 42.

Kugellager 127.

' Tabellen 8—11, 14—28. ! Ladeneinrichtung 104 bis i T-Eisen 12. i 125.

Ladentür 110.

Laschen 31.

Leisten 106.

Lochmaschine 46.

57.

Kämpfer 111. Kellerfenster 76. Kippfenster 81. Knotenblech 43.

Steinschrauhe 36.

Tonnenblech 6. Türpfosten 113.

Überplattungen 49. U-Eisen 7. Universalstoß 43.

Mannstädteisen 105, 119,

120.

Einfache Fenster 74. Einzelverbindungcn 42 bjs

Mittelalter 51. Modern 68.

46.

Fischblasen 53. Flügelfenster 96.

Niete 30, 31, 34. Nietstock 30. Niettabelle 32.

Verlängerungen 42. Verlaschungen 42. Verschränkungen 49. Verschraubungen 49.

(legenmutter 36.

Ge wärideanschl fisse 7 6. Glas 75.

Gotisch 54. Grabschildträgcr 129.

Pfosten 113. Profileisen 7.

Renaissance 57. Riffelblech 6. Rokoko 63.

Walzprofile 7, 12, 13. Wellblech 6. Windfahnen 127. Windversteifung 87. Winkelanschlüsse 45. Winkeleisen 7. Winkelstoß 43.

Z-Eisen 12.

⁼⁼⁼T!

!Г

! Vereinigung wiffenfdiaftticher Verleger jj

Walter de Gruyter & Co.

I vormals G. J. Göschen'sche Verlagshandlung / J. Guttentag, Verlags-j buchhandlung / Georg Reimer / Karl J. Trübner / Veit ® Comp. \[

»!

I Berlin W. 10, Genthiner Sir. 38 » Leipzig, Marienslr. 18 j

!!

II

II

It

II

II

II

II

II

II

II

Von dem gleichen Verfasser ist noch erschienen:

II

II

II

II

Schlosser - Arbeiten

ii

(Sammlung Göschen Nr. 762)

ж;

Preis 1 Mk. 80 Pf.

!!

II

II

II

II

II

==TÏ

! Vereinigung wiffenfchafilicherVerleger j|

Walter de Gruyter & Со.

I vormals G. J. Göschen'sche Verlagshandlung / J. Guttentag, Verlags- |J

H buchhandlung / Georg Reimer / Karl J. Trübner / Veit SI Comp. \

I Berlin W. 10, Genthiner Str. 38 * Leipzig, Marienstr. 18 jj

---

!!

In der „Sammlung Göschen“ ist ferner erschienen: [;

II

II

Tischler-II (Schreiner-) Arbeiten

II

Von

Professor E. Viehweger

Architekt in Coin a. Rh.

JJ 3.Teile Sammlung Göschen Nr. 502, 503 u. 755

I: Materialien, Handwerkszeuge, Maschinen, Einzelverbindungen, Fußböden, Fenster, Fensterladen, Treppen und Aborte. Mit 628 Figuren auf 75 Tafeln.

I II: Türen und Tore, Anordnung und Konstruktion, Haustüren, Tore, Balkontüren, Flurtüren. Mit 296 Figuren auf 105 Tafeln, j;

II

II

II

II

II

II

II

II

II

III: Innere Türen, Flügeltüren, Pendeltüren, \ Schiebetüren, Drehtüren, Wandverklei- j düngen, Decken. Mit 323 Fig. auf 98 Taf.

Jeder Band 1 Mark 80 Pfennig

ILsssssssMsssssssssssssssssesasssssesstssJI

■==================================Ш

Î Vereinigung wiffenfchafflicher Verleger j{

U    Walter de Gruyter & Co.    ^

И vormals G. J. Göscchen'sche Verlagshandlung / J. Guttentag, Verlags- ||

I buchhandlung / Georg Reimer / Karl J. Trübner / Veit Si Comp. |

! Berlin W. 10, GenthinerSfr. 38 * Leipzig, Marienstr. 18 jj

II

-----------==jj

II Aus der „Sammlung Göschen“ empfehlen wir ferner: j

II

!!

II

II

II

II

II

II

II

II

II

!!

II

ii

ii

i!

II

!!

II

II

II

II

II

II

II

!!

ii

II

=======

II

Statik. Von Dipl.-Ing. Professor W. Haub er

I. Teil: Die Grundlehren der Statik starrer Körper. | Mit 82 Figuren. — II. Teil: Angewandte Statik.

Mit 61 Figuren. (Sammlung Göschen Nr. 178 u. 179)

Graphische Statik mit besonderer Berücksichtigung der Einflußlinien. Von Oberlehrer Dipl.-Ing. Otto Henkel.

(Sammlung Göschen Nr. 603.. 695)

Festigkeitslehre. Von Dipl.-Ing. Prof. W.Haubcr „

Mit 56 Figuren.

Aufgabensammlung zur Festigkeitslehre mit Lösungen. Von Dipl.-Ing. R. Haren |(

(Sammlung Göschen Nr. 49 О | |

Der Eisenbetonbau. Von Karl Rößle, neu- jj

bearbeitet von Dipl.-Ing. O. Henkel. Mit 73 Abb. || (Sammlung Göschen Nr. 349)

Das Veranschlagen im Flochbau.

Von Architekt E. В eit ting er. Kurzgefaßtes Hand- |{ buch über das Wesen des Kostenanschlags. Mit II iS Figuren.    (Sammlung Göschen Nr. 383) Л

-Jeder Band 1 Mark 80 Pfennig- |!

Mit 42 Figuren.

2 Teile.

Mit 207 Figuren.

, (Sammlung Göschen Nr. 288)

II

II

ii

========

тал

N

и.

л /

V

тШШШШ

шшш

ЯМЩ1

шва

«Mise

ШШвШ

Biblioteka Politechniki Krakowskie|

1-301470

!ï

g\K7%

Mm

4M

ii

*****

Biblioteka Politechniki Krakowskiej

100000298043