WYDZIAŁY POLITECHNICZNE KRAKÓW

BIBLIOTEKA GŁÓWNA

«-►

L. inw.

Druk. U. J. Zam. 356. 10.000.

11

Türen und Tore* Anordnung und Konstruktion, Haustüren, Tore, Balkontüren, Flurtüren

Von

Professor E. Viehweger

Mit 296 Figuren auf 105 Tafeln

Uf

ГО

Hochbautechnische

Bibliothek

aus der Sammlung Göschen

Geologie von Dr. Edgar Dacqué.

I. Allgemeine Geologie. Mit 75 Figuren

Nr. 13

II. Stratigraphie. Mit 56 Figuren und 7 Tafeln .... Nr. 846 Mineralogie von Prof. Dr. R. Brauns. Mit 132 Figuren . Nr. 29 Petrographie von Prof. Dr. W. Bruhns. Mit 15 Figuren . Nr. 173 Praktisches Zahlenrechnen von Professor Dr.-Ing.

P. Werkmeister. Mit 58 Figuren........ ...

Technische Tabellen und Formeln von Dr.-Ing.

W. Müller. Mit 106 Figuren......

Materialprüfungswesen. Einführung in die moderne Technik der Materialprüfung von Dipl.-Ing K.Memmler.

I. Materialeigenschäften.— Festigkeitsversuche.— Hilfsmittel für Festigkeitsversuche. Mit 58 Figuren . . . Nr.'Sll

II. Metallprüfung und Prüfung von Hilfsmaterialien des Maschinenbaues. — Baumaterialprüfung. — Papierprüfung. — Schmiermittelprüfung. — Einiges über Metallographie. Mit 31 Figuren Statik von Prof. W. Hauber.

I. Die Grundlehre der Statik starrer Körper. Mit 82 Figuren Nr. 178

Nr. 179

Nr. 405

Nr. 579

Nr. 312

II. Angewandte Statik. Mit 61 Figuren.........

Graphische Statik mit besonderer Berücksichtigung der Einflublinien von Dipl.-Ing. Otto Henkel. 2 BSnde. Mit 207 Figuren Statische Berechnung des Bautechnikers von Dipl.-Ing. Walter Selckmann.

I.    Die statische Untersuchung der Bauteile des einfachen Wohnhauses. Mit 174 Figuren.......

II.    Die zusammengesetzte Festigkeit. Die statische Unter-Dachbinders. Die Stand-

Nr. 603. 695

Nr. 784

suchung des eisernen

VfJl 1 -l-l П —

Festig! Biblioteka Politechniki Krakowskiej Aufgal sung Hydra Kinem

. . Nr. 785

iren. Nr. 288

: Lö-

. . Nr. 491 . . Nr. 397

Elastiz Allgei Platte Max I

100000295817

uren Nr. 584 und эепе •Ing.

. . Nr. 519

Geometrisches Zeichnen von H. Becker, neubearbeitet von Vrof. J. Vonderlinn. Mit 290 Figuren und 23 Tafeln Nr. 58 SchattenKonstruKtionen von Prof. J. Vonderlinn. Mit

Nr. 236

114 Figuren.....................

Nr. 57

ParallelperspeKtive. Rechtwinklige und schiefwinklige Axonometrie von Prof. J. Vonderlinn. Mit 121 Figuren Nr. 260 Zentral-PerspeKiive von Hans Freyberger, neubearbeitet

von Prof. J. Vonderlinn. Mit 132 Figuren........

Darstellende Geometrie von Prof. Dr. Robert Haubner.

Nr. 142 Nr. 143

I.    Mit 110 Figuren.................

II.    Mit 88 Figuren..............

Die BaustofFKunde von Prof. H. Haberstroh. Mit vielen

Figuren....................Nr. 506,853, 854

Vermessungskunde von Prof. Dipl.-Ing. P. Werkmeister.

I.    Feldmessen und Nivellieren. Mit 146 Figuren . . . Nr. 468

II.    Der Theodolit. Trigonometr. und barometrische Höhenmessung. Tachymetrie. Mit 109 Figuren ... Nr. 469

Das Veranschlagen im Hochbau. Kurzgefabtes Handbuch über das We.«en des Kostenanschlages von Architekt

Nr. 385

B. D. A. Emil Beutinger. Mit 16 Figuren .......

Nr. 399

Die Kostenberechnung im Ingenieurbau von Professor E. Kuhlmann und Dr.-Ing. H. Nitzsche. Mit 5 Tafeln . . Nr. 750 Bauführung von Architekt B. D. A. Emil Beutinger. Mit

20 Figuren......................

Maurer- und Steinhauerarbeiten von Prof. Dipl.-Ing.

W. Becker.

Nr. 419

I.    Mauern und Maueröffnungen; Fundamente. Mit

168 Figuren .................

Nr. 420

II.    Gewölbe und Gurtbogen, Steinerne Fubböden u.

Treppen. Mit 185 Figuren...........

III.    Putz- und Stückarbeiten, Wandbekleidungen u. Steingesimse. Mit 73 Figuren ............Nr. 421

Schlosserar о eiten von Prof. E. Viehweger. 2 Bände.

Mit zahlreichen Figuren..............Nr. 761,762

Nr. 322

EisenKonstruKtionen im Hochbau von Ing. Georg

Janetzki. Mit 175 Abb.    ..........

Zimmerarbeiten von Prof. Carl Opitz.

Nr. 489

I.    Allgemeines, Balkenlagen, Zwischendecken u. Deckenbildungen, hölzerne Fubböden, Fachwerkswände,

Hänge- und Sprengewerke. Mit 169 Figuren ....

II.    Dächer, Wandbekleidungen, Simsschalungen, Block-,

Nr. 490

Bohlen- und Bretterwände, Zäune, Türen, Tore,

Tribünen und Baugerüste. Mit 167 Figuren ....

Tischler- (Schreiner-) Arbeiten von Prof. E.Viehweger.

Nr. 502

I.    Materialien, Handwerkszeuge, Maschinen, Einzelverbindungen, Fubböden, Fenster, Fensterladen,Treppen,

Aborte. Mit 628 Figuren auf 75 Tafeln.......

II.    Türen und Tore, Anordnung und Konstruktion,

Nr. 503

Haustüren, Tore, Balkontüren, Flurtüren. Mit 296 Figuren auf 105 Tafeln..............

III. Innere Türen, Pendeltüren, Schiebetüren, Dreh

Nr. 755

türen, Wandverkleidungen, Decken. Mit 323 Figuren auf 98 Tafeln............

Der Eisenbetonbau von Regierungsbaumeister K. Röfele.

Neubearbeitet von Dipl.-lng. O. Henkel. Mit 77 Figuren. Nr. 349 Heizung und Lüftung von Ingenieur Johannes Körting.

I. Das Wesen und die Berechnung der Heizungs- und

Lüftungsanlagen. Mit 34 Figuren.........

II. Ausführung der Heizungs- und Lüffungsanlagen.

Mit 191 Figuren..................

Entwässerung und Reinigung der Gebäuüe von

Dipl.-Ing. Wilhelm Schwaab. Mit 92 Figuren.....

Gas- und Wasserversorgung von Dipl.-Ing. W. Schwaab.

Mit vielen Figuren................. . . .

Wohnhäuser von Reg.-Baumeister Kurt Gabriel.

1. Anlage und Konstruktion des Wohnhauses. Mit

91 Figuren...................

II. Die Räume des Wohnhauses. Mit 44 Figuren . . Gasthäuser und Hotels von Architekt Max Wohler.

I. Die Bestandteile und die Einrichtung des Gasthauses. Mit 70 Figuren.............Nr. 525

II. Die verschiedenen Arten v. Gasthäusern. Mit 82 Fig. Nr. 526 Geschäfts- u. Warenhäuser von Baurat H.Schliepmann.

I.    Vom Laden zum .Grand Magasin*. Mit 23 Figuren. Nr. 655

II.    Die weitere Entwicklung d. Kaufhäuser. Mit 39 Figuren. Nr. 656 Industrielle und gewerbliche Bauten (Speicher, Lagerhäuser und Fabriken) von Architekt Heinrich Salzmann.

I.    Allgemeines über Anlage und Konstruktion der Industriellen und gewerblichen Bauten.......Nr. 511

II.    Speicher und Lagerhäuser. Mit 121 Figuren .... Nr. 512 Ländliche Bauten von Baurat Ernst Kühn.

I.    Kultus- und Gemeinde-Bauten. Mit 64 Figuren . .

II.    Das landwirtschaftliche Gehöft der Gegenwart. Mit

61 Figuren....................

III.    Landhäuser, Ferienhäuser, Arbeiterwohnungen,

Gasthäuser und Wohnhäuser mit gewerblichen Anlagen. Mit 77 Figuren..............

Militärische Bauten von Regierungsbaumeister R. Lang.

I. Mit 59 Figuren..................

Die Baukunst des Schulhauses von Prof. Dr.-Ing.

Ernst Vetterlein.

I. Das Schulhaus. Mit 38 Figuren..........Nr. 443

II. Die Schulräume — Die Nebenanlagen. Mit 31 Figuren Nr. 444 Märkte und Markthallen für Lebensmittel von Städt.

Baurat Richard Schachner.

I.    Zweck und Bedeutung von Märkten und Markthallen,

ihre Anlage und Ausgestaltung..........Nr. 719

II.    Markthallenbaufen. Mit zahlreichen Figuren .... Nr. 720 Öffentliche Bade- und Schwimmanstalten von Stadt-

Oberbaurat Dr. Carl Wolff. Mit 50 Figuren......

Sportanlagen von Prof. Dr. phil. und Dr.-Ing. E. Schmitt.

I. Mit 78 Figuren..................

Nr. 342

Nr. 343

Nr. 822

Nr. 412

Nr. 839 Nr. 840

Nr. 758

Nr. 759

Nr. 760

Nr. 626

Nr. 380

Nr. 684

Weitere bände sind in Vorbereitung

Sammlung Göschen

Tischler-

(Schreiner-) Arbeiten

Türen und Toro

Anordnung und Konstruktion, Haustüren, Tore. Balkontüren, Flurtüren

Von

Professor E. Viehweger

Architekt in Köln a. Bh.

Mit 296 Figuren auf 105 Tafeln Durchgesehener Neudruck

Berlin und Leipzig

Vereinigung wissenschaftlicher Verleger

Walter de Gruyter & Co.

vormals G. J. Göscliei^eche Verlagshandlung — J. Guttentag, Verlagsbuchhandlung — Georg Keimer, — Kail J. ïrübner — Veit & Comp.

1919

/ KRAKÓW

NS*. «hni«*^

Ш

#

Alle Rechte, namentlich das Übersetzungsrecht, von der Verlagshandlung Vorbehalten.

*

«

Druck von Julius ßeltz, Langensalza.

. Nr.

.ikSlsi

Inhalt.

I. Abschnitt. Allgemeines über Türen und Tore § 1. Anordnung der Türen und Tore......

П. Abschnitt. Konstruktion der Türen und Tore § 2. Ausführung der Türen und Tore......

Ш. Abschnitt. Äußere Türen und Tore

§ 3. Haustüren ...............

§ 4. Tore..................

§ 5. Balkontüren u. dgl.............

IV. Abschnitt. Innere Türen

§ 6. Flurtüren................

Preiszusammenstellung...............

Register.....................

Seite

11

36

64

85

98

т-Н rH r-H ?-Н

I. Abschnitt.

Allgemeines über Türen und Tore.

§ 1. Anordnung der Türen und Tore (Tafel 6—9).

Durchgangs- oder Durchfahrts-Öffnungen für geschlossene Räume, auch Einfriedigungen und Höfe, versieht man mit beweglichen Türen und Toren. Im allgemeinen sind diese nach dem praktischen Bedürfnis zu bilden, leicht beweglich einzurichten und mit dem Aufbau in Einklang zu bringen. Grundsätzlich soll dabei das Hirnholz durch Langholz gedeckt sein. Durch geeignetes Zusammenfügen der Einzelteile (siehe Bd. I, Seite 7) soll ein „Arbeiten“ der Hölzer möglich sein. Je nach dem Zweck erhalten die Türen und Tore verschiedene Abmessungen (lichte Weite). Als Mindestmaß gilt 0,60 zu 1,80 m. Nach polizeilichen Bestimmungen sind Haustüren mindestens 1,00 (0,90) zu 1,80 m und Tore mindestens 2,30 zu 2,80 m groß zu machen. Guter Verschluß ist anzustreben. Zugluft, Wärme, Kälte und Regenschlag ist abzuhalten. Unbefugten ist der Zutritt zu erschweren. Gegebenenfalls sind die Türen durch Eisenbeschlag feuersicher zu machen.

Man unterscheidet nach der Art der Anbringung „äußere und innere Türen“, der Konstruktion und Ausführung „Latten-, Bretter-, verdoppelte und gestemmte Türen“, der Beweglichkeit „Flügel-, Pendel-, Schiebe-und Drehtüren“, ferner nach der Art der Anwendung „Haustüren und Tore, Balkontüren, Flurtüren, Zimmertüren“ usw. Die Abmessungen betragen im allgemeinen für:

Fg.ö

Fg.6

r-f

CD

OS ‘s-08 ‘l

Finwärte

Fg,r

rechts

linke

rechts-

gängig

Fg.4

Я -S

Fg.3

Ян

rg.n

\ СО'

вд \

, f4 \

Fg. 10

gängig

Fg.l

Flügeltüren

normale einflügelige Zimmertüren 0,90 breit u. 2,10m hoch i. L.

Tore je nach Benutzung 2,30—3,50 breit u. 2,80—4,50 m hoch.

it

tf

zweifl.

„Flügeltüren“ drehen sich um ihre linke oder rechte Höhenkante (Fig. 1—9). Bei Öffnungen über 1,0 m

I-

■'I

Fg.i6

Zimmer

Zimmer

Zimmer-Türen

Fg. 14

Zimmer

Fg.13

Zimmer

Fg.17

Breite kommen zwei-und mehrteilige Türen zur Anwendung.

„Pendeltüren“ (Fig. 10, 11,12), die aus-und einwärts schwingen (pendeln), werden ein- und zweiteilig ausge-

führt. Sie beanspruchen kleineren Bewegungsraum als die Flügeltüren. Für die Flügeltüren ist zu beachten, daß diese „auswärts“ oder „einwärts“, „links- und rechts-

Ü¹

,    ш'-

Fd. 21

FA. 2*

11

RI

10

tilrea

Tore

CO

Fg.20

cvl

геЬ.

[_______

[ л.

IQ

■ gDi*

H 1

05

IF

11

i .2

•ob

tu

.    Fg-22

äq

gängig“ (Fig. 1—4) angeordnet werden können oder müssen, was bei Bestellung der fabrikmäßig hergestellten Beschlagteile deutlich anzugeben ist. Die Drehbeschläge richten sich nach dem Türanschlag und der Türfalzbildung (Fig. 13—IG). Sie werden in die Steingewände ein-

gefügt und auf die Flügel aufgesetzt oder eingesteckt. Besser ist immer die Bildung eines Anschlagfutters, so

s

CO

lg

FÜ.27 Flügeltüren Fg.28

FŚ.31

•w

го

gp

•f

о-*-

щгь

Fg.26

TU 29

daß die Beschläge hierauf befestigt werden können. Alle Zimmertüren sollen so angeordnet werden, daß man die

Räume beim Betreten vom Flur aus vollständig übersehen kann (Fig. 17 u. 18). Mittelwandtüren sollen sich immer gegen die Fensterwand öffnen. Zimmerwärts schlagende Türen haben immer den Nachteil, daß hinter der Tür keine Einrichtungsstücke aufgestellt werden können. Es empfiehlt sich deshalb, die Türen flurwärts zu öffnen, wobei allerdings entsprechende Flurbreiten vor-eusehen sind.

„Schiebetüren“ (Tore), die mit Hängebeschlägen befestigt werden (Fig. 19—21) sind ein- und zweiteilig. Sie werden an der Wand oder in einem Mauerschlitz angebracht. Ihr Vorteil ist ungehinderte Beweglichkeit.

„Drehtüren“ (Fig. 22—25), die sich um ihre lotrechte Mittelachse kreisförmig bewegen, sind für viel belaufene Räume zu empfehlen. Sie beanspruchen kleinen Bewe-gungsrauiri, halten die Räume zugfrei und sind zusammenklappbar (Fig. 25). Sie gestatten also während günstiger Witterung freien Durchgang.

„Haustüren“ als Flügeltüren schlagen in der Regel einwärts (Fig. 26—28). Auswärts schlagende Türen sind jedoch vorzuziehen, weil man namentlich bei Feuersgefahr ungehindert ins Freie gelangen kann. Für viel belaufene Geschäftsräume sind auswärtsschlagende Türen (Fig. 29—31) aus feuerpolizeilichen Gründen vorgeschrieben,    „

П. § 2. Ausführung der Türen und Tore.

11

II. Abschnitt.

Konstruktion der Türen und Tore.

§ 2. Ausführung der Türen und Tore (Tafel 11—35).

„Äußere Türen“ (Haus- und Balkontüren) müssen ein bruchsicher, wetterbeständig, zugfrei und regenschlag-abwehrend konstruiert werden, deshalb ist vollseitiger Anschlag, auch an der Schwelle, erwünscht. Besteht die Türeinrahmung (Fig. 1 u. 2) aus Holzfachwerk, so

ШЩ

Щ Ш

Fg. 1 Fg, 2

ЩШШШ

Fg. 7 Fg. 8

Pfoßtea

Fg. 3

Fg. 4

firn

Pfoßtea

Verkleidung Fg. 9

Шшш'

Futter

Fg. öa

-VMuh)):

Schwelle

Tür

- i ' ■

Fg. 10 a.    Schwelle

¹ Fg. 10c

'/h

/Tür

y/yy/A -

Hola

Sola

^ Ausfüttexuag Futter

Fg. 5h

—I Fg. 6

Holzfach werk

30cm

ШШШ*'Verkleidung Fg. 10b

yj

Fg. U

kann man die Tür direkt darauf, stumpf (Fig. 1) oder eingefälzt (Fig. 2) befestigen. Besser ist eine Futterrahmen-

Fg. lö

иш

Kloben

Stein

Ут

Го]

'Г -

Pfosteage stelle

Fg. 13a

ШШ

>ч-,§

Ху

dST

Baakeisen

-Ь,

iр-

н;

F g. 12a

Fg. 16

О)

Tüi

з ï

ta

СО

tf

mm

bildung (Fig. 3, 4 u. 6), an der die Tür anschlägt oder die Bildung einer Türverkleidung (Fig. 7—11), bestehend

aus Futterrahmen und Verkleidung. Vorstehendes gilt auch für Türumrahmungen aus Stein (Fig. 14—17), weil

SS

Futter

3:

VN

ъо

ГА

Fg, 19c

Futter

il

Fg. 19 b

Bohlenge stelle f. 6-26cm, et. Mauern*

I 30cm

СП

hb

Рч

... lîâi

Fg.20

man dann die Beschläge am Futter befestigen kann. Die Befestigung des Futters (Fig. 17 u. 18) erfolgt durch Steinschrauben oder Bankeisen.

Material: wetterbeständiges Holz.

„Innere Türen“, Zimmertüren, Flurtüren usw. Dichte

sa

Fg. 21b

é,

Lv\xllAusfütteruilg

Verkleidung

t-

Futter

ni i ! n

Fg.31a _____ Stolle agexüste f. i-2St. et Mauern

Verschlüsse und gute Einzel Verbindungen müssen auch hierbei ausgeführt werden. Da diese Türen den schädlichen Witterungseinflüssen nicht ausgesetzt sind, so

FXLtZr+Ш

mmz

NDeckböLze7

— V erkleidung

Dtibelstein

Fg.2Sa

Fg.22b

мШя

%«®É

Щ/ууу

г

тп i i

Dübelsteln:

Pg. 23

Pg. 24a

können ihre Einzelteile, namentlich die Zapfen verleimt und die Füllungen furniert werden. * Anschlagschwellen sind, was bequemen Durchgang an betrifft, nicht beliebt, teilweise jedoch erwünscht. Die Anbringung der Innentüren, namentlich bei 8—12 cm starken Mauern erfolgt

Putz

/put smi

r lilill yiiiiSÉ

Ш^\\\

1/

-/4 I

Tür

Dübelstein

Fg.24b

/^^FutterraJimen

Fg.25

an „Türgerüsten“, die ans Bohlen (Fig. 19 u. 20) oder „Stollen“ (Fig. 21) hergestellt sind. Bei stärkeren Mauern verwendet man hierzu „Deckhölzer“, nagelbare Dübelsteine (Fig. 22), ausgefütterte Trägerflansche (Fig. 23) eingespannte Leibungs- (Fig. 24) oder Anschlagsfutterrahmen (Fig. 25). Die Wetterschenkel (Fig. 26 und 27) sind überflüssig, dagegen sind Schutzbleche teilweise erwünscht*

CementmiLchl: 1

m

Tür

g

g *

Schutzblech,

T

/

Z

a

1

g

!

Tût

жшёШШШШШШ

Türbefestigung an. mass. Mauern.

Fg.26

Viehweger, Tischlerarbeiten П.

2

„Lattentüren" (Fig. 28—41) für untergeordnete Räume und Einfriedigungen bestehen aus Latten und " übernagelten Quer- und Strebeleisten.

r.

si

RR

Fg. 3-i

Fg.40

Fg. 32

Fg. 33

Fg.39

II

na

Fg. 31

Fg.38

Ą VW".

Fg.29

Fg. 30

Fg. 35

kl

Firn

mm

Fg. 28

Fs- 37 Fg. 36

!■

«о

«tt)

,,Br^ttertürenrf (Fig. 42—58) für Neben räume, Stall-fctiren usw. werden aus stumpf gestoßenen oder gespun-

deten Brettern, aufgenagelten oder eingeschobenen Quer-und Strebeleisten hergestellt.    ,

i:i!!

! I!

.!!

ZA

- - ‘Z--- :    -

Fg.41

i!i

Türen aus Latten

„Verdoppelte Türen" (Fig. 59—64) für Waschküchen, Stallungen, Haustüren usw. bestehen aus zweifach gekreuzter, vernagelter oder verschraubter Bretterlage.

Fg.43

Fg.43

Fg.44

Fg.45

m

Fg.46

\K

Fg. 47

Fg.48

Fg« 49

„Gestemmte Türen" (Fig. 65—85), für alle Zwecke verwendbar, bildet man aus gestemmten Rahmen, eingeschobenen (Fig. 65—72) oder überschobenen Füllungen (Fig. 73), Kehlstoß (Fig. 74) mit ein geschoben en oder überschobenen Füllungen (Fig. 75) und den verschiedenartigen Füllungen mit Profilleisten (Fig. 76—85).

l!

II

II

У:У

Fg.50

Л /wv'.

Fg.61

Fg,53

Material je nach Anwendung — fast alle Holzarten.

„Beschläge.“ Die Drehbeschläge (Fig. 86—101), Aufsatz- oder Einst eckbänder mit Angeln oder Fitschen, befestigt man teils an feststehende Gewände oder feststehende Futter und teils auf oder in die beweglichen Türen. Man verwendet hierzu geschmiedete, auswärts gekehrte (Fig. 86), einwärts gekehrte (Fig. 87) oder gekröpfte (Fig. 88) Schippen-, Kreuz-, Lang- oder

AVK»

os

\N

Fg. 56

f QQ ‘³Ä „

i—— -Ck

Fg.64

ВИДЫ«

SS

SS

Fg. 63

Fg.67 I

Türen a. einf. Bretterlage

Jpg. 66

l\

■M

Fg. 61

'//Æ

<noOT ¥

09 'Я J

WMŁ

V/,

69 '³£

Fg.64

шт

HI

Fg. 62

Türea a. dopp. Bretterlage Fg. 63

Rahmen

Fg.68

j—30-45 —l

V—4

Fg.65

Türen cl Rahmen n. Füllungen

шШ

Fg.69

Fg.66

Fg.67

Fg.7Q

Fg.71

Fg. 73

T-

Rahmen

Bahmen Fg. 72

II

Fg. 74

Fg.7ö

r-ril

IvJ

«*»

g*

fco

Cb

CD

Rahmen

Kehlst о ss

Fg.78

08 ’ЯЛ

Fg.77

Fg« 79

Rahmen .— Б0-46

ЗчпцМ

.Fg. 76

r.

Fg.84

Fg.85

■M

Fg.83

Fg.82

ru

Fg.81

Fg.87

(4

ч4

Pł

:0

со

oo

16*-35

Kreuzband

ьЬ

fa

moot i i i i i i I i ■ ! i

98’ЭД

,5

rt»+-8B

Schippenband

от-g/

d-eschm.. Auf gatzbLader

s?

in

Fg. 89 L&ngband

fil

Kurzband

ШВЯЁШ

06'SÆ

Winkelband

Fg.91

Winkelbänder (Fig. 86—91) oder aber fabrikmäßig hergestellte Fitschen (Fig. 92—101). Für normale einteilige Türen gelten die angegebenen Abmessungen und Stär-

901"Oä

DOsse Id.

co

'c:

05-----

(СЙ

fcb

fr-.-inr

öO

Wm

„г .

Fg.94

^4

<3>

cq

■à

H-091-001

iQ

IO

90I-0Ä —*

03

05

Сч

3-6

ken. Für größere und schwerere Türen sind entsprechend stärkere Beschlagteil з zu wählen.

Die „Verschlußbeschläge“ (Fig. 102—109), die Schlösser, werden entweder aufgesetzt oder eingesteckt. Erstere

nennt man Kastenschlösser, letztere Einsteckschlösser. Sie bestehen aus Schließkasten mit Druckriegel oder Drückerfalle und Schloßriegel nebst Schließblech. Die eingetrage-

■'Л

«*з

66

Fg. 100

.а

•а

■з

Fg.96

45-66

OIS-ок-

Fitschen

i.

Fg.97

«»ОЪ

I'

BtKäL—

ail

Fg.98

Fg. 101

nen Abmessungen gelten für normale Türen. Die Schlösser werden fabrikmäßig hergestellt und sind in allen denkbaren Ausstattungen und mit allen Vervollkommnungen erhältlich. Man beschaffe sich bei Bedarf Kataloge der Baubeschlaggeschäfte.

al

ЩИ

йёш

tjf

<1=4])

fill

Ili

Fg. 104 |i

ЛОТ '³Ä

IL».:

Fg. 103

Kastenschlösser

Einsteckschlösser

Fabrikware

mm

SOI >3Л

Fg. 106

es

ЁШш

Viehwoger, Tischlerarbeiten II.

ШИ

55

Jpg. 108 I

10cm

55--Ą

Fg. 109

III. Abschnitt.

Äußere Türen und Tore.

§ 3. Haustüren (Tafel 37—63).

Da Haustüren den schädlichen Witterungseinflüssen ausgesetzt sind und vor allem einbruchssicher sein müssen, fertigt man sie aus dauerhaftem Material, meist Eiche. Holzstärke mindestens 5 cm. Man konstruiert sie aus zweifacher Bretterlage (Fig. 1—13) oder aus kräftigen Futterrahmen, kräftigen Türrahmen mit verdoppelten (Fig. 14—27) oder überschobenen (Fig. 28—29) Füllungen. Man vermeide übermäßige Gliederungen und Kröpfungen. Die besonders gefährdeten Teile an der Schwelle und am Schloß schützt man zweckmäßig durch Metallbleche. Am Kämpfer, am Unterschenkel und da, wo es weiter nötig ist, sind Wetterschenkel einzufügen. Durchschaufenster, auch da wo die Türen zwecks Beleuchtung der Flure Oberlichtfenster erhalten, sind durchgängig einzufügen. Die schmalen Fenstersprossen fertigt man am besten aus Profileisen oder man bringe Schutzgitter an. Brief ein wurf söffnuu gen mit einwärts gekehrten Anschlußkästen sind nach Bedarf vorzusehen.

Abmessungen:

normale einteilige Tür mindestens 1,00 (0,90) m breit und 2,50 (2,00) m hoch,

normale zweiteilige Tür mindestens 1,50 m und darüber.

An Fachwerksumrahmungen können die Türen (Fig. 30 und 31) direkt anschließen, dagegen müssen an Steinumrahmungen immer kräftige Futterrahmen angebracht werden (Fig. 32—51). Die Mannigfaltigkeit der Gestaltung

§ 3. Haustüren.

со

F g. 6

«I

Fg.U

Fg.10

Fg.4:

Fg.ö

е⁻»л

м=>м~<-

Fg.2

F:

Г»Л

wMr,

Fg,7

W/A

gjgM Г,

Fg.13

[/

13

—Ш о rlü <Я

G-rundrisse

Haustüren

Fg.12

Шв

Haustür

i

;!ä:

m

m

\

:

§ 3. Haustüren.

CementiTulchl: S

Futter

y

ZD

s

/_ Me tall ble cli

Puts

10c JA

V

\V

и

Fg. 14c

Borsten

ш

ii

Gummi

i

F g. 14D

Fg.144    Fg.14«

Fg.i4a

«r

ei

1, О

Fg, 16

95

Fg, 15

шй

Haustüren

8Т'ЭЯ

Iffi

§ 3. Haustüren*

тш

Fg.20a

SS

ееее

ГД⁻."

iii

!Г

4.0S -siä

Fg. ID

: ?!

- г '; -

./

mźm

1,80

41

'№

Ll

•fife

ill

ï:

Ił

90

TgTSIäT

im

Schnitt Л Fg.210

1KR

Fg.21fc

Sclmitt П

'9.22

SES

ЩЖМЮ

===

сг

ох 3

l7J*I 1 — КЧ—1

Fg. 23b

OL

F g. 23a

'Vv    Щ: f ■ \ЧГ;    V    '

U

Ш. Äußere Türen und Tore.

4

3

7

м

Haustüren

Ж

Fg.2ô

а

и ² а

i

.

1

■

р

с<

F g. 35а

Щ

F g. 26 b

■

§ 3. Haustüren.

45

Fg. 28c

Haust it

-Futter -

i

I

“3

У

pH

\X\v\V\>\\\\\

410

;•■• )

Q

10cm

*

f ;

lv

I

А — )

!'

\

Zapfen

V/,

t

: :

- ><-..... ......." ~"~T'

ШЁ

Fg. 28a

jn. Anschlag Fg.29

Fg. 23b

%

Haustür

2, 25

Hi

ii,

mm

Fg. 30

§ 3. fîausttiren.

tr.oq

la

h?¹?;

Metallblecb

<t0S*3£

Fg. 30a

Ж

I

тш

i

:

Ж

ш

■

J

со

m

$

о

m

of

Нк

Wy

■ V

is

ca

Fg.31

Im

Ш;

NI

Шж

Fg.31&

Viehweger, Tischlerarbeiten П,

F g. 31b

и

ш

Fc. 83

-

i

i*!

■:

i

ш

m

ш

ш

II

i

Щ

Ш

=rTiî

rui

Я

Ю

Haustu г c a

* ■

« 1

lis I

Ййш111|

шт

1,0

Ш

ii

Fe. 32

«

«»OT I I I I I I' 1 I I I 'I

V/

Fg.36

■Л

laiiiiiiiiiiiiiiHiiiiiiiiiiiiiiiiiiiiTiTT

Fg.35

'/A

Vs

Fg.34

**

sei an den Beispielen gezeigt. Eine Kastentür (Fig. 51\ gebildet aus dreiteiliger Innentür und zweiteiliger Außer -

Fg. 39

Ir - —

i.

T‘8

82

i:;

Fg.37

Fg.4

tür, ist für besondere Zwecke recht empfehlenswert. Aue-geführte Beispiele Fig. 52—57.

Material: Man verwendet hierzu fast ausschließlich Eichenholz und einheimisches oder amerikanisches Kie-

0)

Walter de Gruyter & Co. Berlin W. 10 und Leipzig.

0)

■m

oj.

0»

ТТЛ

'■•‘A

H&uetüren. >: JJ || Fg. 40

ii

ii

IB

:: ' j

iii

lilii

им

Fg.41

г*

(Z

ii! i

'h

’§|

fernholz. Die naturfarbig belassenen oder gebeizten Holz-. teile sind gut zu ölen oder zu streichen und darauf gut zu lackieren.

ттщщт

■>

1L

Fg.45

М11ЯШ^.Ч

НщйшЫ

Ql ‘S

[q‘Ą

шш

шшШ

Fg.44

ii

T‘s

aga

ВНш

Fg.43

r

i

ТФ

1

il

■Ÿ

I

5§

:

§ 3. Haustüren.

&

HIT

2,8

fi

55

Ip

fç

- V

1ПШ1! { 11 ПП 11 II I It I П lilii 1111 il 11 I 111 1111111 \lili*'i.

Г

Fg.4;6

1.1

Ю

Ю

..

Iw

«===?

Hi

Ei

pin

iliiSi

MS

•ähin nim in 111 ii 11 nun nim ilu i ni u 1111111111 ilu 1111 in ill lilt

li

£•:

Ue

1,5

Fr.«

§ 3. Haustüren.

п п п

1

FS А8

ba

Fg. 43

Fg.bO

«т50слх

Haustüren

; $Ш

Ш£Ш

г;

Ł.

¹ к

j.j

\ 1

i

вшив

■

и

i

'W

fi

V* •

ц

i

■\

¥

?ЬЙ

\ щ

Щ=Р

и

Ш

i

,

«

Ь:

Ш

о

D

Щщ

Ï

ж

н

i

Ш

1

1

’¥

1

ч⁴

00

Г -,

жм

ЩфШ*Ы*кф1.Ф

таим

тыттМтжш

ИНН..._

Ж{& p|

'    - *'    i    :.т

'

ЯЙШШ

ЯмВ1

IVS!

.Ï

:ü

Ti и

цж|й

ЩЪЛЗ&

ИД

рМвг!

ЯШВН№

a:;V-

tmês

‘ TV “к ł’;t' "*Г' .1 ■- .

7j’

.у1

Я«*

Pg. 52.

s*

gj

Ш,

Г'

Ш »

I¹ allй

i,'*’*#

ЙййарйЙЬ:

|в|

ft

mm

-I

:Jf

Ж,

s

:

ft

s

m

■ Л :

'

nu: *

“

im

ЩЩ

ШяШШ-'

m*

WSM

HHppi^l

âzÀMk

ШЖ&

l.....:

II

■FÏSI

ffism РЧ

лЯ11§-

;;

ii

mm

::

ms ,

щшШ I

i P "I

#:::•*■

■

Äi

ÄS

UM

ili

V Ji

■fei

;5fl:

li

l'-M

iT

P rT7:

V ШШГГЩ

JT

H TU-

III

:§ш

шштм

I    ———— —...

I !    : Î !

Ш,    ;•• ::......m^MMLï.±.Æü ■

Fg. 56.

11H ■

! 1

11:' £

,.-L. ' ' : -j

N

3

1 1

щ

\

Л ....»■/

¹

I * I ' |:

а

KR

1

► i

S'*    4

E||jg

■,!

i Bll

N»

■?

Ш

«■■•• •?

*

ш

Я

¹

й

«*

1Я

.

iS!

fljjt

®|

ЛШШ!

CO

§ 4. Tore (Tafel 65—84).

Die geringste Breite der Tore beträgt 2,30 m, daher ein Flügel 1,15 m. Normale Abmessungen sind: 3 bis 4 m Breite und 3,50—4,50 m Höhe. Die Türflügel werden hierbei verhältnismäßig breit und folglich schwer, weshalb entsprechende Holzstärken und entsprechend kräftige Beschlagteile zu verwenden sind. Die Flügelteilung nach Breite und Höhe, Einfügen einer Durchgangstür oder Anordnen von Oberlichtern erfolgt je nach Zweck. Sie werden aus Latten, Quer-, Höhen und Strebebohlen (Fig. 1—4); aus gespundeten Brettern, mit Quer- und Kreuzstreben (Fig. 5 und 7) hergestellt. Schiebetore mit Hängebeschlag bestehen aus Höhenbohlen mit Kreuzverstrebung (Fig. 6). Bei besonders schweren Flügeln kommen Stollengerüste (Fig. 8—11) zur Anwendung. Diese sind, wie auch die Bohlenteile stets nach innengerichtet. Am Fuß der Schlagleiset ist ein Biegel anzu-bringen. Die weiteren Beispiele (Fig. 12—31) zeigen Tore in verschiedenartiger Teilung und Ausführung. Die aus doppelter Bretterlage und Deckleisten hergestellten Tore verwendet man für Scheunen, Bauernhäuser und dergleichen, während Häustore und solche für andere Zwecke meist aus gestemmtem Kähmen werk und Füllungen bestehen (Fig. 32—39). Auch diese haben sich dem Gesamtaufbau anzupassen.

Material : Hierzu darf nur wetterbeständiges, trockenes harziges Kiefernholz oder Eichenholz, nur ausnahmsweise Tannenholz verwendet werden. Die Holzteile sind gegebenenfalls zu beizen, dann zu ölen, mit Deckfarbe zu streichen und hierauf mit wetterfestem Lack zu überziehen

Jù

§ 4.

=а

Fg.3

Band

ШШШШ

г»д

Fallriegel

Tore

fl—(j)

Fg.2

Viehweger, Tischlerarbeiten EL

СП

Шщ

■йя

miń пн;

■та

,тж

ищи

Ti

Y/Z/MÊ:

'ёШ

J-

iffl

Hi

|v-

-—'g.

»Jl t

мша

“'И.,...

X

"Х„

V,;

^jUŁ

F g. 4

A

i

Tor«

§ 4. Tore.

Fg.7

С£>

«о

шш

1Ш

S

И

Я

s

Fg.6

ШШ

= Л !' = "Т-' . •: -г_"

=

gâ

ЦЩ1

ü~E

==?5

1

Fg.ö

ш

ЁШ

ü

&

I;

li!

Г^г

ЦЦ

l'i

ÉÉ

I-

mm

ЖШ

ЬШш

id

JnrTFr

Fg.8

iüli!

3t

ix*£0t£äm

i

я

Fg. 13

ь

■

"13m

Fg.9

Halseisen

ж

О о

о

О

о

Fg. 10 Dre Morn

У

^g. Ы ii

Riege] falle

Г:?Л

is

Js.

А

Тоге

Fg. 12

\'N

<S

lm

\V

ki

I

lii

■1

Ilf

H 3m Pg. 18

p iC

^ Pg. 16 J

Pg. 17

ËÈëgËS

Pg. 15

igcS-i

Tore

V/уУУ/?-,

Fg.19

•s

ia

•г\.

X Л "/

/г.'

~ vi

■ILL

ГЛ

UL

Fg.20

la ?e-21

шзяё

.==

F g. 23

ii

II

::J:

Fg. 22

Tore

Щу

mm

\_

Toro

Fg.26

Fg.27

Fg.28

8m

F'E

‘I

ШШШ

Fg.29

I®

W\

20

il

1111

ШМп

20

F g. 80

•im

Г g. 81    ^

il

Ш

[S^

:

й»

. •

". , .

<цл7НЩ

[Ж

ID

шш

w

„ot

'~~7. ^T.

l»V • *s

I

«

f/!

я

>C b>

* > •' À

ÜT

~~—

I

111

fej

■ff.

И

гъъИМШШт

Ш ^

Ь> vH

Г0Щ

Штж%

<т%

W

î-WÈ

mm

I ül

Щ.iüll'Jull

ШШГ

<L

**»*3

ЩЩ|

ПК I

W'*'"*'“

У^уШДшггпгтут^,

Si

7'

H-

ii

■:

::

P iM

Ш !•

l;

■!

I,

ai

\Hm

'-)> ) ) л^лл}) > >/

aiy,LU>J

mm

...

.

Hä®

»аь*. •

■ >■

i:

t •• i ■ *. ii

i :

j ' ' !ÎHim

*■. *

Г if 1

j ■;

и

mm

îpfc

if

il

Ht «к

mi

m

gMÉ

Fg. 34.

щШ

•' ...

■JMM

■4i

âsm

sat

L,

Fg. 25

il

Г *1

шт

Ш!

щ.₉

щ* ,

: .

¹ ‘{Я ifÊSf-

’ИМИ».

_ И Щ=штщ

ъг‘:< TjÊ

:Lv.

Fg. 36.

!•

Ï - i

I ¹

.

Viehweger, Tischlerarbeiten II.

**

(О

ÿn*

гШ i

“1

i-

is

щ'Ж

IS

:-ы

11

liiSiiiii

iii

жм*

Ä

*.y

mm

r py

■

■j

!.

ШШЙ

Щ]

Iff

is

...

If«³!

m. ш

им

:f

рш

V;.

Wh

1111 IS

ms

;.J

тШц

»,

В

Fg. 39.

;i

pp*

I к .•',

P

li:

жмм.г-

i.- ;i

fci

vf

,,

It

ШШИ

§ 5. Balkontüren und dergleichen (Tafel 85—97).

60

Balkontüren u. dgl. führen regelmäßig von Baikonen usw. direkt nach den Zimmern, weshalb ringsum, namentlich aber an den Schwellen, dichter Verschluß vorzusehen ist. Der Fußboden dei; Baikone wird dabei um einige Zentimeter oder eine Stufe tiefer als der Zimmerfußboden angeordnet, um Regenwasser-einlauf zu verhindern. Die Außentür ist so zu bilden, daß der Schlagregen einwandfrei abgeführt wird. Das Türfutter ist mit Teerstricken, Q Filz usw. gut abzudichten. ^

Der obere Teil der Tür erhält ⁰¹    -

отч

zwecks Durchsicht eine fenstermäßige Bildung, bestehend aus Bähmenwerk und Verglasung. Einwärts

holz. Der Balkonfußboden ist mit Metallblech abgedeckt, welches durch einen Lattenrost geschützt wird. Vorteilhafter bildet man die Schwelle aus Riffelblech, Flach-, Winkel- (Fig. 7—12) oder Kehleisen. Doppelfalze (Fig. 9 und 10) sind immer vorzusehen, und wo es nur angängig ist, soll man den Knęiffalz anwçndçn (Fig. 11). ln be-

Schutzeisen

IV

Fg.4

l/

'/У/л

У/ШШЯЩ,

Metallblech ^

7.

7Л

Fg.5

Hdlz

Balkontüren u. dsgl.

Fg.6a

Lattenrost

stimmten Fällen läßt man die Glasfüllung bis zur Schwelle herabgehen (Fig. 13—15), muß aber dann eine Griffschutzstange anbringen. Vielfach werden die Türrahmen am Fensterteil (Fig. 16—18) zurückgesetzt, also der obere Teil mit Kämpfer und Wetterschenkel nach Art der Fen-

Fg.3

Fg.^

Fg. 6c

10cm

т&Мл,

Fg.6

ster ausgeführt. Seltener setzt man in die Türrahmen die Fenster ein (Fig. 19—23), weil dadurch die Durchsichtigkeit beeinträchtigt wird. Eine vorzügliche Falzbildung für zweiteilige Türen (Fig. 24—29) ist der Kneif-Wolfsrachenverschluß. Die denkbar größte Sicherung gegen Zugluft usw. gewährt eine Kastentür (Fig. 30—33).

egel

6cm

Fg. 6b

N-tegigl

II

■vs

Hela

Fg.9

Fg. 10

Fg. U

Fg.7

Balkontüren u-dsgl.

WMÊA

.8

Putz

шшвш

■Щ,

1Ш

m&sm-

Riffelbleoh

Winkeleison

у'У ^ a

Eisenbeton *'*■

< lOcm 4

(~ÎOTnp>ntf<riTipr.bi<;ht od. Flättchen

Balkontüren u-dsgl,

of

JTilzdiciitungj

Fg. 15a .

tui

06

Fg. 13

Material: Wetterbeständiges trockenes Kiefern- oder Eichenbolz. Ausnahmsweise Tannenholz. Vor dem Einsetzen sind die Holzteile gut zu ölen. Die naturfarbig

+—t

yA

Fg.'m

Fg.14

belassenen oder mit Deckfarbe gestrichenen Türen sind darauf mit wetterbeständigem Lack zu überziehen. Die Innenseiten solcher Türen werden der inneren Einrichtung angepaßt.

Balkontüren u.dgl.

lm

2, 86

r-T

x:

Fs. 16

uiog

09

м.

93—*

53»

'ЩШЩШ

IT‘S£

§ 5. Balkontüren;

03

t

ШЩЩ

Ьщшсъ*

V •    -

Fg. 22

я

pS‘T

Io

Iw

⁴ lm

N

m

,

Fg. 19

i

3i

ö; 25

W;

Fg.SO

m

Fg. 23

Uiog

Fc.21

щ§

Ti

Gi

Ql

1,30 —

л-ан

Fg. 24

ь—^-Ш^..г4— L, ■{-— ■ I— !тт-[..    1 2.ХД

Fg.27

'ŹŹ.

yA

Fg.^8

V/,

VZ.

ШХ

F^26

Fg.2S

Fg.29

йщтм

шШШ/

Laatentür

г:

Fg. 33

Fg. 31а

Fg.33

ШЦ

%É

ff /уУ-

jÉli

>>

Fg. 31b

'ż%

Fg-ЗОЪ

\Ж.

шрр

дашя

'Z/

Fg.30a

шш

■»-■■-< 10 та

Viehweger, Tischlerarbeiten IX.

IV. Abschnitt.

Innere Türen.

§ 6. Flurtüren (Tafel 99—113).

Flurtüren finden fast ausschließlich Verwendung bei Miethäusern als Abschlußtüren der Etage Wohnungen. Ihr oberer Teil wird zwecks Durchsicht und Belichtung der Flure verglast. Meist erhalten sie Sprossenteilung mit Rauhglas, Blei- oder Buntverglasung. Um der Einbruchsgefahr vorzubeugen, fertigt man die Sprossen aus Eisen oder man bringt Schutzgitter an. Briefeinwurfsöffnungen sollten hierbei nie fehlen. Je nach der Größe werden sie einteilig (Fig. 1—3), mit zurückgesetztem Glasrahmen oder als Schaltertüren (Fig. 4—7), ein- und zweiteilig mit Oberlicht (Fig. 8—14) drei- oder mehrteilig (Fig. 15 bis 27) konstruiert. Ausgeführte Beispiele Fig. 28 u. 29.

Material : Tannen-, Kiefern- oder Eichenholz. Da diese Türen den äußeren Einflüssen nicht ausgesetzt sind, können hierfür auch weniger wetterfeste Hölzer verwendet werden. Nach dem Anschlägen werden die Türen gebeizt, geölt oder gestrichen und hierauf lackiert, gewachst oder poliert.

Flurtüren

ШШУ,

mm

WÆ

2,10

ШР

v/Z'

УА0

Fg.1

Fg. 2

*stL

Fg. 3

0*2

агездвв

<*

Fg. 4

О, 80

Tg. 6

Flurtür

mit

Schalter

Fg.5

ww

f!

9Ö

Fg.8

h-L

'Л

■/А

Fg 10

2,8

1,2 --

Fg- 9

*

Ш

J

'A

V.

к

Fg.U

Fg.13

Ш

»

4

il

m

Fg.14

Flurtüren

Fg.ia

■ i

X

1.

к

ОШй.

Fg.15

шП

о

«г

]

d.

Fg.lQ

&

1

Fg. 18

%

»

'Л

%

'A

m

Flurtüren

Fg.17

со

2,0

«ИШ

JuL

i!

Fg. 20

Fg. 2J

Fg. 23

!!*1

fî: :

f

щш

!

ri H

:i

li

i

I

v:

П

ira

ш

l

f

i

iii i

IÜ

m

J

il

Fg.2 3

lm

8,20

JPg. 24

08

01‘g

3mm Furniere

Abgesp. Holz.

If

Te. 27

шР

Fg. 25

Fe. as

■I 5cm

r$$

Fluitüren

Щ¹;*. : :

щрррш

ГШШ

am

шшМ

: ET

i..

• 1 w

Wâ £^ ' *32.

Vi

S3 ’Яд

u4

fe|;l

8ЯМ

il

,1

Ml

ЩШр <Ш

*®3"ŁJPC

Кка

Щ?л^й2Х:::-г::.

■

к«®

I --;

f:'2:€

' : . . ■

щ.

'.Z

' i w

■mm

:

4.

-w.

‘А

::

te

li

КШВ i. M.

0*Æ.ïi

ï'

Fg. 28.

’ fe

aëagg;

il

HÜ

V i e hwe g e r, Tischlerarbeiten II.

Prciszusammenstellung (nur annähernd).

Haustüren. Verdoppelte Türen (Fi?. 15—27). S. 40.

Tanne oder Kiefer Beschlag* M. 10—20.

Gestemmte Türen (Fi?. 30 u. 31). S. 46.

Pitchpine M. 50—90 ; qm M. 23—25. Eiche

Beschlag* „

Tür vollständig Pitchpine „

Eiche

qm M. 15—20.

„    100—180;    „    „    46—50.

15—30.

75—120.

„ 115—210.

Gestemmte Türen (Fig. 32—41). S. 50.

Pitchpine M.    60—100;    qm    M.    25—30. -

Eiche „    120—200;    „    „    50—60.

20—40. 80—140. „ 140—240.

Beschlag „

Tür vollständig Pitchpine „

Eiche

Balkontüren. Gestemmte Türen (Fig. 1). S. 85.

Eiche

Beschlag „

Gestemmte Türen (Fig. 13). S. 89.

Pitchpine M. 24—40; qm M. 12—20.

„ 48—80;    „ „ 24—4Ö.

20-30.

Flurtüren. Gestemmte Türen (Fig. 1, 8— ?5). S. 99.

Kiefernholz M. 40—60; qm M. 20—30. Beschlag „ 10—30.

Pitchpine M.    40—50 ;    qm    M.    20—23.

„    80—100;    „    „    40-46.

15-25.

Eiche Beschlag „

Register.

Abgesperrtes Holz 111. Äußere Türen 36-97. Anordnung der Türen 5. Ansehlagsfutter 5. Aufsatzbänder 21, *29 u.30. Ausführung der Türen 11 bis 28.

Ausfütterung 14.

Balkontüren 85—97. Bankeisen 13. Berliner Band 31. Beschläge 21, 29—35. Bohlengestelle 14. Brettertore 65. Brettertüren 5.

‘Cementfeinschicht 88.

Deckhölzer 15. Drehdorn 69. Drehtüren 8. Dübelsteine 15. Düsseid. Band 31.

üinsteckbänder 31. Einsteckschlösser 30—35.

Fachwerkstür 46. Fallriegel 65.

Falze 11.

Falzverkleidung 11. Filzdichtung 39. Fitachen 32.

Flügeltüren 6. Flurtüren 98. Füllungen 25. Furnier 111. Futterrahmen 17.

Gekröpfte Bänder 29. Gestemmte Rahmen 25. Gestemmte Türen 25.

Halseisen 69. Hängebohlen 67. Haustüren 37.

Innere Türen 98.

Kämpfer 49. Kastenschlösser 33. Kastentür 57. Kehlleisten 27. Kehlstoß 27. Kneiffalz 96. Kreuzband 29. Kreuzstrebe 67.

Langband 30. Lattenrost 86. Lattentor 66. Lattentür 18.

Metallblech 18. Moderne Türen 50.

Oberlichter 37.

Pendeltüren 6. Pfostengestelle 14.

Querleiste 18. Querriegel 18.

Rahmen 25. Riegelfalte 68. Riffelblech 88.

Schaltertür 100. Schiebetür. 8. Schippenband 31. Schlagleiste 19. Schlösser 38. Schutzblech 17. Schutzeisen 88. Steinschraube 12. Stollengerüst 14. Strebenbohle 67.

Tore 65.

Türbefestigung 13. Türen 6.

Türgerüst 18.

Verdoppelte Tore 77. Verdoppelte Türen 37, Verkleidungen 14.

Wetterschenkel 17. Winkelband 30. Wolfsrachenfalz 97.

Zimmertüren 7.

ÜJ

Vereinigung wissenschaftlicher Verleger

Walter de Gruyter & Co. Berlin W. 10 und Leipzig.

Von dem gleichen Verfasser erschien früher:

Tisehler-

(Sehreiner-) Arbeiten

I. Teil

Materialien, Handwerkszeug©, Maschinen, Einzelverbindungen, Fussböden, Fenster, Fensterladen, Treppen, Aborte

Mit Ö28 Figuren auf 75 Tafeln (Sammlung Göschen 502)

Preis einschliesslich aller Zuschläge jetzt M. 1,80

Dieses Werkchen ist für alle jene, die sich mit Bauschreinerarbeiten befassen, ein vollkommenes, zweckmässiges, billiges und handliches Nachschlage-buch. Sämtliche Konstruktionen sind m a s s 1 i c h wiedergegeben, so dass eine direkte Benutzung erfolgen kann. Der Text ist kurzgefasst und leichtverständlich. Als Grundsatz für die Bearbeitung war massgebend : Einfache Darstellung und Erläuterung, übersichtliche Gruppierung der Materie, Beispiele einfacher, bewährter Konstruktionen, entsprechend moderner Anschauungen unter Berücksichtigung maschineller Holzbearbeitung.

.

■

i

■

.

ym

'

Щ

•x;,

ïr-

>:

X.

-

Ш

<

в-*

.

/•

J

t

■\

\

\.

I

/

•V

/

T

■

'

Biblioteka Politechniki Kiakowskiei

1-301410

Biblioteka Politechniki Krakowskiej

100000295817